目录

简介

先决条件

要求

使用的组件

背景信息

验证

相关的思科支持社区讨论

简介

Ping数据包测试通常用于排除连接问题。  本文档将说明使用ping测试来检查网络融合系统6000(NCS6K)慢速转发数据包的系统方法。

先决条件

要求

本文档的读者应掌握以下这些主题的相关知识：

- 基本IP路由。

- XR操作系统。

使用的组件

本文档针对NCS6K平台创建。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

背景信息

NCS6K与传统IOS-XR平台有一个关键区别：NCS6K利用虚拟化技术构建系统。每个节点(路由处理器(RP)或线卡(LC))可以运行多个虚拟机(VM)，如系统管理VM、IOS-XR VM1、IOS-XR VM2等，这些节点结合在一起可创建一个功能齐全的XR节点。下图显示RP和LC运行一个IOS-XR VM的示例：

图 1

有一个控制以太网网络来连接RP和LC。RP和LC之间的控制平面流量将通过此控制以太网网络。由于这是虚拟化环境，因此会出现以下问题：如何将这些数据包传送到特定虚拟机，以及RP或LC中的Nicantic(NIC)如何知道发往它们的数据包？

简而言之，VLAN用于区分不同虚拟机的流量，此过程由NIC完成。图2显示NIC如何将VLAN 3074流量传送到IOS-XR虚拟机，将VLAN 3073流量传送到管理VM。

图 2

将这些转发组件组合在一起，您可以获得用于ping测试场景的简化转发路径，如图3所示。

从RP执行ping测试时，数据包在机箱内采用以下转发路径：

RP_PING <—> RP_NETIO <—> RP_SPP <—> RP_Linux_Kernel_Socket <—>交换机<—> LC_FIA <—> LC_NPU（包括PSE、PLIM_ASIC）<—>线路

图 3

验证

在本文档的其余部分，将以从RP发起ping的场景为例。将向Te0/0/0/2/0上的直连主机发起ping操作。以下步骤将逐步显示验证此ping数据包路径的方法。

RP/0/RP0/CPU0:NCS6k-Deploy#show ip interface brief

Interface                      IP-Address      Status                Protocol

Bundle-Ether671                10.67.2.2       Up                    Up

Bundle-Ether672                10.67.3.2       Down                  Down

Loopback0                      10.17.17.17    Up                    Up

MgmtEth0/RP0/CPU0/0            10.7.54.11      Up                    Up

TenGigE0/0/0/2/0               10.67.1.2       Up                    Up

TenGigE0/0/0/2/1               unassigned      Up                    Up

TenGigE0/0/0/2/2               unassigned      Up                    Up

TenGigE0/0/0/2/3               unassigned      Up                    Up

TenGigE0/0/0/2/4               unassigned      Up                    Up

TenGigE0/0/0/2/5               unassigned      Down                  Down

[snip]

RP/0/RP0/CPU0:NCS6k-Deploy#show run interface Ten 0/0/0/2/0

interface TenGigE0/0/0/2/0

ipv4 address 10.67.1.2 255.255.255.252

load-interval 30

RP/0/RP0/CPU0:NCS6k-Deploy#ping 10.67.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.67.1.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 5/6/7 ms

1. RP节点上的“show IPv4 traffic”计数器将显示已发送的互联网控制消息协议(ICMP)回应数和已返回的ICMP应答数。

RP/0/RP0/CPU0:NCS6k-Deploy#show ipv4 traffic

IP statistics:

Rcvd:  1495334 total, 80112 local destination

0 format errors, 0 bad hop count

23 unknown protocol, 0 not a gateway

0 security failures, 0 bad source, 0 bad header

133207 with options, 0 bad, 0 unknown

Opts:  0 end, 0 nop, 0 basic security, 0 extended security

0 strict source rt, 0 loose source rt, 0 record rt

0 stream ID, 0 timestamp, 133207 alert, 0 cipso

Frags: 0 reassembled, 0 timeouts, 0 couldn't reassemble, 0 fragments received

0 fragmented, 0 fragment count, 0 fragment max drop

Bcast: 0 sent, 0 received

Mcast: 1361652 sent, 1376283 received

Drop: 0 encapsulation failed, 237 no route, 0 too big

Sent: 1437435 total

ICMP statistics:

Sent: 0 admin unreachable, 63 network unreachable

8 host unreachable, 0 protocol unreachable

16 port unreachable, 0 fragment unreachable

0 time to live exceeded, 0 reassembly ttl exceeded

24 echo request, 30024 echo reply

0 mask request, 0 mask reply

0 parameter error, 0 redirects

30131 total

Rcvd: 0 admin unreachable, 21 network unreachable

0 host unreachable, 0 protocol unreachable

0 port unreachable, 0 fragment unreachable

0 time to live exceeded, 0 reassembly ttl exceeded

30024 echo request, 15 echo reply

0 mask request, 0 mask reply

0 redirect, 0 parameter error

0 source quench, 0 timestamp, 0 timestamp reply

0 router advertisement, 0 router solicitation

30063 total, 0 checksum errors, 0 unknown

2. 检查网络输入输出(NETIO)组件。

下一步是检查RP FINT NETIO链计数器。您必须看到网络链中IPv4节点的“OUT”计数器。如果增加，则意味着数据包已到达NETIO组件，并正从NETIO组件发出。

Check initial NETIO counter value.

RP/0/RP0/CPU0:NCS6k-Deploy#sh netio chains FINT loc 0/rp0/cpu0 | in Stats

<Protocol number> (name)  Stats

<6> (fint_n2n)   Stats IN: 0 pkts, 0 bytes; OUT: 0 pkts, 0 bytes

<10> (clns)   Stats IN: 0 pkts, 0 bytes; OUT: 0 pkts, 0 bytes

<12> (ipv4)   Stats IN: 2788 pkts, 115373 bytes; OUT: 2816 pkts, 117933 bytes

<13> (mpls)   Stats IN: 16482 pkts, 2467508 bytes; OUT: 0 pkts, 0 bytes

<18> (lpts)   Stats IN: 47234 pkts, 10381065 bytes; OUT: 0 pkts, 0 bytes

<19> (ipv6)   Stats IN: 0 pkts, 0 bytes; OUT: 0 pkts, 0 bytes

<30> (ipv4_preroute)   Stats IN: 0 pkts, 0 bytes; OUT: 0 pkts, 0 bytes

<32> (ipv6_preroute)   Stats IN: 0 pkts, 0 bytes; OUT: 0 pkts, 0 bytes

<34> (fint_proto_tp)   Stats IN: 0 pkts, 0 bytes; OUT: 0 pkts, 0 bytes

<36> (l2transport)   Stats IN: 0 pkts, 0 bytes; OUT: 0 pkts, 0 bytes

Initiate 10 ping packets.

RP/0/RP0/CPU0:NCS6k-Deploy#ping  10.67.1.1 coun 10

Type escape sequence to abort.

Sending 10, 100-byte ICMP Echos to 10.67.1.1, timeout is 2 seconds:

!!!!!!!!!!

Success rate is 100 percent (10/10), round-trip min/avg/max = 4/7/8 ms

Check NETIO counter again. You would see increment of 10 packets.

RP/0/RP0/CPU0:NCS6k-Deploy#sh netio chains FINT  loc 0/rp0/cpu0 | in Stats

<Protocol number> (name)  Stats

<6> (fint_n2n)   Stats IN: 0 pkts, 0 bytes; OUT: 0 pkts, 0 bytes

<10> (clns)   Stats IN: 0 pkts, 0 bytes; OUT: 0 pkts, 0 bytes

<12> (ipv4)   Stats IN: 2788 pkts, 115373 bytes; OUT: 2826 pkts, 118933 bytes

<13> (mpls)   Stats IN: 16482 pkts, 2467508 bytes; OUT: 0 pkts, 0 bytes

<18> (lpts)   Stats IN: 47234 pkts, 10381065 bytes; OUT: 0 pkts, 0 bytes

<19> (ipv6)   Stats IN: 0 pkts, 0 bytes; OUT: 0 pkts, 0 bytes

<30> (ipv4_preroute)   Stats IN: 0 pkts, 0 bytes; OUT: 0 pkts, 0 bytes

<32> (ipv6_preroute)   Stats IN: 0 pkts, 0 bytes; OUT: 0 pkts, 0 bytes

<34> (fint_proto_tp)   Stats IN: 0 pkts, 0 bytes; OUT: 0 pkts, 0 bytes

<36> (l2transport)   Stats IN: 0 pkts, 0 bytes; OUT: 0 pkts, 0 bytes

您还可以使用KornShell(ksh)命令“show_netio_fwder_stats -g”检查注入/punt计数器是否增加。

注意：在生产环境中，可能存在其他后台流量，这使得很难检查ping数据包是否到达此组件。解决方法是，可以使用超时为0的大量数据包：“ping x.x.x.x count 10000 time 0”并检查计数器是突然增加还是出现峰值。

Check initial counter value.

RP/0/RP0/CPU0:NCS6k-Deploy#run show_netio_fwder_stats -g

RECEIVE STATISTICS SUMMARY:

rx_pkts: 2224455

punt_pkts: 2224447

ingress_total_drops: 8

TRANSMIT STATISTICS SUMMARY:

inject_pkts: 2077319

tx_pkts: 2058041

egress_total_drops: 2

RECEIVE STATISTICS DETAILS:

Rx Pkt type stats:

lpts_pkts: 2220753

Rx Listener tag stats:

ipv4: 1116092

ipv6: 658627

clns: 112549

ipv4_l: 286252

raw4: 23

raw6: 43984

ospf_mc4: 45

ospf_mc6: 2

udp4: 7

tcp4: 405

isis: 2767

Rx Punt reason stats:

IFIB: 2220753

Rx Drop stats:

null_fint_ifh_drops: 8

ingress_total_drops: 8

TRANSMIT STATISTICS DETAILS:

Tx Pkt type stats:

ipv4: 2852

mpls: 42647

osi: 78760

ipv4_preroute: 1339401

ipv6_preroute: 613659

Tx Protocol Id stats:

clns: 78760

ipv4: 2852

mpls: 42647

ipv4_preroute: 1339401

ipv6_preroute: 613659

Tx Drop stats:

invalid_queue_drops: 2

hdr_init_drops: 2

egress_total_drops: 2

Initiate 10 ping packets.

RP/0/RP0/CPU0:NCS6k-Deploy#ping  10.67.1.1 coun 10

Type escape sequence to abort.

Sending 10, 100-byte ICMP Echos to 10.67.1.1, timeout is 2 seconds:

!!!!!!!!!!

Success rate is 100 percent (10/10), round-trip min/avg/max = 3/4/7 ms

Check counter again to check to se increment of 10 packets.

RP/0/RP0/CPU0:NCS6k-Deploy#run show_netio_fwder_stats -g

RECEIVE STATISTICS SUMMARY:

rx_pkts: 2224465

punt_pkts: 2224457

ingress_total_drops: 8

TRANSMIT STATISTICS SUMMARY:

inject_pkts: 2077332

tx_pkts: 2058051

egress_total_drops: 2

RECEIVE STATISTICS DETAILS:

Rx Pkt type stats:

lpts_pkts: 2220763

Rx Listener tag stats:

ipv4: 1116102

ipv6: 658627

clns: 112549

ipv4_l: 286252

raw4: 23

raw6: 43984

ospf_mc4: 45

ospf_mc6: 2

udp4: 7

tcp4: 405

isis: 2767

Rx Punt reason stats:

IFIB: 2220763

Rx Drop stats:

null_fint_ifh_drops: 8

ingress_total_drops: 8

TRANSMIT STATISTICS DETAILS:

Tx Pkt type stats:

ipv4: 2865

mpls: 42647

osi: 78760

ipv4_preroute: 1339401

ipv6_preroute: 613659

Tx Protocol Id stats:

clns: 78760

ipv4: 2865

mpls: 42647

ipv4_preroute: 1339401

ipv6_preroute: 613659

Tx Drop stats:

invalid_queue_drops: 2

hdr_init_drops: 2

egress_total_drops: 2

RP/0/RP0/CPU0:NCS6k-Deploy#

3. 检查SPP组件。

使用SPP CLI查看数据包是否到达SPP。

Check initial counter value.

RP/0/RP0/CPU0:NCS6k-Deploy#sh spp node-counters

0/0/CPU0:

pdma/rx

slice1 high pkts:              10

-------------------------------

pdma/tx

slice1 low pkts:              10

-------------------------------

panini/classify

forwarded to spp clients:              10

-------------------------------

client/inject

pkts injected into spp:              10

-------------------------------

client/punt

punted to client:              10

-------------------------------

0/RP0/CPU0:

panini/classify

forwarded to spp clients:           22070

-------------------------------

client/inject

pkts injected into spp: 4640

-------------------------------

socket/rx

ce low pkts:              45

mgmt interface pkts:           22025

-------------------------------

socket/tx

ce pkts:              45

mgmt interface pkts:            4595

-------------------------------

client/punt

punted to client: 22070

-------------------------------

Initiate 100 ping packets.

RP/0/RP0/CPU0:NCS6k-Deploy#ping  10.67.1.1 count 100

Type escape sequence to abort.

Sending 100, 100-byte ICMP Echos to 10.67.1.1, timeout is 2 seconds:

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

Success rate is 100 percent (100/100), round-trip min/avg/max = 3/3/8 ms

Check counter again to see increment of 100 packets.

RP/0/RP0/CPU0:NCS6k-Deploy#sh spp node-counters

0/0/CPU0:

pdma/rx

slice1 high pkts:              10

-------------------------------

pdma/tx

slice1 low pkts:              10

-------------------------------

panini/classify

forwarded to spp clients:              10

-------------------------------

client/inject

pkts injected into spp:              10

-------------------------------

client/punt

punted to client:              10

-------------------------------

0/RP0/CPU0:

panini/classify

forwarded to spp clients:           22172

-------------------------------

client/inject

pkts injected into spp: 4740

-------------------------------

socket/rx

ce low pkts:             145

mgmt interface pkts:           22027

-------------------------------

socket/tx

ce pkts:             145

mgmt interface pkts:            4595

-------------------------------

client/punt

punted to client:    22172

-------------------------------

4. 使用tcpdump工具转储来自Linux内核组件的数据包。

从以下输出中，在NCS6K XR VM ksh下，您可以看到几个子接口：

RP/0/RP0/CPU0:NCS6008-SJ#

RP/0/RP0/CPU0:NCS6008-SJ#run

Tue Jun 24 10:51:51.972 UTC

[xr-vm_node0_RP0_CPU0:/]$

[xr-vm_node0_RP0_CPU0:/]$ ifconfig -a

eth-vf1   Link encap:Ethernet  HWaddr 46:91:EE:A5:48:A8

inet6 addr: fe80::4491:eeff:fea5:48a8/64 Scope:Link

UP BROADCAST RUNNING MULTICAST  MTU:9700  Metric:1

RX packets:518403076C3 errors:0 dropped:0 overruns:0 frame:0

TX packets:969599306 errors:0 dropped:0 overruns:0 carrier:0

collisions:0 txqueuelen:1000

RX bytes:138405352234 (128.9 GiB)  TX bytes:242828863250 (226.1 GiB)

eth-vf1.514 Link encap:Ethernet  HWaddr 4C:4E:35:B6:63:68

inet6 addr: fe80::4e4e:35ff:feb6:6368/64 Scope:Link

UP BROADCAST RUNNING MULTICAST  MTU:9700  Metric:1

RX packets:13547000 errors:0 dropped:0 overruns:0 frame:0

TX packets:116957 errors:0 dropped:10 overruns:0 carrier:0

collisions:0 txqueuelen:0

RX bytes:623478135C3 (594.5 MiB)  TX bytes:26876899 (25.6 MiB)

eth-vf1.3073 Link encap:Ethernet  HWaddr 4C:4E:35:B6:63:69

inet addr:192.0.0.4  Bcast:192.255.255.255  Mask:255.0.0.0

inet6 addr: fe80::4e4e:35ff:feb6:6369/64 Scope:Link

UP BROADCAST RUNNING MULTICAST  MTU:9700  Metric:1

RX packets:102364757 errors:0 dropped:0 overruns:0 frame:0

TX packets:100689507 errors:0 dropped:3 overruns:0 carrier:0

collisions:0 txqueuelen:0

RX bytes:29925046692 (27.8 GiB)  TX bytes:7562528012 (7.0 GiB)

eth-vf1.3074 Link encap:Ethernet  HWaddr 4E:41:50:00:10:01

inet addr:172.0.16.1  Bcast:172.255.255.255  Mask:255.0.0.0

inet6 addr: fe80::4c41:50ff:fe00:1001/64 Scope:Link

UP BROADCAST RUNNING MULTICAST  MTU:9700  Metric:1

RX packets:402491385 errors:0 dropped:0 overruns:0 frame:0

TX packets:350389778 errors:0 dropped:6 overruns:0 carrier:0

collisions:0 txqueuelen:0

RX bytes:100599198478 (93.6 GiB)  TX bytes:96834116492 (90.1 GiB)

lo        Link encap:Local Loopback

inet addr:127.0.0.1  Mask:255.0.0.0

inet6 addr: ::1/128 Scope:Host

UP LOOPBACK RUNNING  MTU:16436  Metric:1

RX packets:1029861486 errors:0 dropped:0 overruns:0 frame:0

TX packets:1029861486 errors:0 dropped:0 overruns:0 carrier:0

collisions:0 txqueuelen:0

RX bytes:201624257033 (187.7 GiB)  TX bytes:201624257033 (187.7 GiB)

eth-vf1.514用于与Mgmtehter接口通信，但您看不到IPv4地址。XR VM中的Mgmtether接口依赖于IOS-XR的IP堆栈，而不是Linux中的IP堆栈。

ether-vf1.3073用于与管理VM通信。

eher-vf1.3074用于XR VM相关控制平面流量。Ping测试数据包将通过此子接口（使用Linux网络协议栈）。

与Linux关联的Tcpdump在如何转储相关流量方面有许多选项。此外，您可以使用tcpdump工具嗅探安全域路由器(SDR)控制平面流量(vlan 3074)或嗅探VLAN 3073中的进程间通信(IPC)通信等其他流量。

xr-vm_node0_RP0_CPU0:/]$ tcpdump -i eth-vf1.3074 -XX -vv

tcpdump: listening on eth-vf1.3074, link-type EN10MB (Ethernet), capture size 65535 bytes

01:49:21.798386 IP (tos 0x6,ECT(0), ttl 1, id 0, offset 0, flags [DF], proto UDP (17), length 340)

172.0.16.1.10150 > 239.255.0.4.10150: [bad udp cksum ab2a!] UDP, length 312

0x0000:  0100 5e7f 0004 4e41 5000 1001 0800 4506  ..^...NAP.....E.

0x0010:  0154 0000 4000 0111 cc8e ac00 1001 efff  .T..@...........

0x0020:  0004 27a6 27a6 0140 ad56 abcd abcd 0000  ..'.'..@.V......

0x0030:  0000 0280 f502 0000 0000 0000 0000 0000  ................

0x0040:  0000 0000 0000 7856 3412 0128 0204 0000  ......xV4..(....

0x0050:  0000 5508 0100 0100 0000 3c25 2600 0000  ..U.......<%&...

0x0060:  0000 d007 0000 0000 0000 ffff 0000 0000  ................

0x0070:  0000 0000 0000 0000 0000 0000 0000 0000  ................

0x0080:  0000 0000 0000 4800 0000 0200 0000 0000  ......H.........

0x0090:  0000 8800 0000 0000 0000 0000 0000 0000  ................

0x00a0:  0000 0100 0000 0000 0000 0000 0000 0000  ................

0x00b0:  0000 0000 0000 c2ca 0031 0000 0000 0000  .........1......

0x00c0:  0000 0000 0000 0000 0000 5508 0000 6510  ..........U...e.

0x00d0:  0000 ed53 4c00 0000 0000 0000 0000 0000  ...SL...........

0x00e0:  0000 0000 0000 0000 0000 0000 0000 6264  ..............bd

0x00f0:  7863 0000 0000 0000 0000 0000 0000 0000  xc..............

0x0100:  0000 0000 0000 0000 0000 0000 0000 0000  ................

0x0110:  0000 0100 0000 0000 0000 0000 0000 30ff  ..............0.

0x0120:  0002 0000 0000 0000 0000 0000 0000 0000  ................

0x0130:  0000 0000 0000 0000 0000 0000 0000 0000  ................

0x0140:  0000 0000 0000 0000 0000 0c00 0000 0000  ................

0x0150:  0000 0000 0000 0000 0000 0000 0000 0000  ................

0x0160:  0000                                     ..

01:49:21.799167 IP (tos 0x6,ECT(0), ttl 64, id 0, offset 0, flags [DF], proto UDP (17), length 380)

172.0.0.1.8197 > 172.0.16.1.8197: [udp sum ok] UDP, length 352

0x0000:  4e41 5000 1001 4e41 5000 0001 0800 4506  NAP...NAP.....E.

0x0010:  017c 0000 4000 4011 d168 ac00 0001 ac00  .|..@.

0x0040:  0000 0000 0000 7856 3412 0128 0204 0000  ......xV4..(....

0x0050:  0000 5508 0100 0100 0000 3d25 2600 0000  ..U.......=%&...

0x0060:  0000 d007 0000 0000 0000 ffff 0000 0000  ................

0x0070:  0000 0000 0000 0000 0000 0000 0000 0000  ................

0x0080:  0000 0000 0000 4800 0000 0200 0000 0000  ......H.........

0x0090:  0000 8800 0000 0000 0000 0000 0000 0000  ................

0x00a0:  0000 0100 0000 0000 0000 0000 0000 0000  ................

0x00b0:  0000 0000 0000 c2ca 0031 0000 0000 0000  .........1......

0x00c0:  0000 0000 0000 0000 0000 5508 0000 6510  ..........U...e.

0x00d0:  0000 ee53 4c00 0000 0000 0000 0000 0000  ...SL...........

0x00e0:  0000 0000 0000 0000 0000 0000 0000 6264  ..............bd

0x00f0:  7863 0000 0000 0000 0000 0000 0000 0000  xc..............

0x0100:  0000 0000 0000 0000 0000 0000 0000 0000  ................

0x0110:  0000 0100 0000 0000 0000 0000 0000 30ff  ..............0.

0x0120:  0002 0000 0000 0000 0000 0000 0000 0000  ................

0x0130:  0000 0000 0000 0000 0000 0000 0000 0000  ................

0x0140:  0000 0000 0000 0000 0000 0c04 0000 0000  ................

0x0150:  0000 0000 0000 0000 0000 0000 0000 0000  ................

0x0160:  0000                                     ..

01:49:21.802982 IP (tos 0x6,ECT(0), ttl 64, id 0, offset 0, flags [DF], proto UDP (17), length 380)

172.0.0.1.8197 > 172.0.16.1.8197: [udp sum ok] UDP, length 352

0x0000:  4e41 5000 1001 4e41 5000 0001 0800 4506  NAP...NAP.....E.

0x0010:  017c 0000 4000 4011 d168 ac00 0001 ac00  .|..@.@..h......

0x0020:  1001 2005 2005 0168 672f abcd abcd 0000  .......hg/......

0x0030:  0000 3c80 f502 0000 0000 0000 0000 0000  ..<.............

0x0040:  0000 0000 0000 7856 3412 0411 0008 0000  ......xV4.......

0x0050:  0000 5508 0000 0100 0000 3d25 2600 0000  ..U.......=%&...

0x0060:  0000 d007 0100 0000 0000 ffff 0000 0000

[snip]

注意：由于是VM方案，发送到VM的流量可以使用外部报头中的VM接口地址进行封装，以便此流量可以到达VM接口。
上述数据包转储实际上是使用源/目标地址为172.0.16.1的UDP数据包报头封装的，该地址为IOS-XR VM中的eth-vf1.3074 ip地址。
注意：采用的捕获是为了演示该方法，并且没有Internet控制消息协议(ICMP)流量。

5. 正在检查FIA组件在线卡。

Check initial counter value.

RP/0/RP0/CPU0:NCS6k-Deploy#sh controllers fia statistics instance 1 loc 0/0/cpu0

FIA Statistics Rack: 0, Slot: 0, Asic instance: 1

FIA Rx (To Fabric) Statistics.

------------------------------------------------------------------------

Input Pkt counters                                 Pkts             Bytes

Rx pkts from pse                 :              250             53000

Rx pkts from switch              :           993528         349564509

bcast pkts from switch       :                0

mcast pkts from switch       :           993278

ucast pkts from switch       :              250

Rx pkts enqueued(IQM)            :              500             86500

Rx pkts dequeued(IQM)            :              500             86500

Rx pkts sent to fabric           :              500

Cell counters:

Data cells sent to fabric        :              500             86500

Control cells sent to fabric     :     183039783411

Drop counters:

Rx burst error drops(NBI)        :                0

Rx error drops(Switch)           :                0

Rx error drops(pse)              :                0

Rx pkt discard drops(IQM)        :           993277         334570329

Pkt crc error drops(FDT)         :                0

Unreachable dest cell drops      :                0

Internal Error Count             :         41984110

Internal Drop Count              :                0

FIA Tx (From Fabric) Statistics

------------------------------------------------------------------------

Cell counters:                                     Pkts             Bytes

Data cells                       :              500

Control cells                    :     179368087015

Reassembled packet counters:

Pkts received from fabric        :              500

Tx Ucast pkts                    :              500             86500

Tx Mcast pkts                    :                0                 0

Tx pkts (EPNI)                   :              500             81000

Tx pkts sent to switch           :              250             53000

Bcast pkts sent to switch    :                0

Mcast pkts sent to switch    :                0

Ucast pkts sent to switch    :              250

Tx segments sent to pse          :              250             29000

Tx pkts sent to pse (NBI)        :              500             49000

Drop counters:

Tx pkts dropped EPNI             :                0

Tx Ucast pkts dropped            :                0

Tx Mcast pkts dropped            :                0

Tx pkts dropped in EGQ(RQP + EHP):                0

Control cell Drops               :                0

Data cell Drops                  :                0

Tx pkts dropped switch           :                0

Tx pkts dropped pse              :                0

Internal Error Count             :                0

Internal Drop Count              :                0

Initiate ping of 1000 packets.

RP/0/RP0/CPU0:NCS6k-Deploy#ping  10.67.1.1 count 1000

Type escape sequence to abort.

Sending 1000, 100-byte ICMP Echos to 10.67.1.1, timeout is 2 seconds:

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!

Success rate is 100 percent (1000/1000), round-trip min/avg/max = 2/3/8 ms

Check counters again to see increment of 1000 packets.

RP/0/RP0/CPU0:NCS6k-Deploy#sh controllers fia statistics instance 1 loc 0/0/cpu0

FIA Statistics Rack: 0, Slot: 0, Asic instance: 1

FIA Rx (To Fabric) Statistics.

------------------------------------------------------------------------

Input Pkt counters                                 Pkts             Bytes

Rx pkts from pse                 :             1250            265000

Rx pkts from switch              :           994927         349849612

bcast pkts from switch       :                0

mcast pkts from switch       :           993677

ucast pkts from switch : 1250

Rx pkts enqueued(IQM)            :             2500            432500

Rx pkts dequeued(IQM)            :             2500            432500

Rx pkts sent to fabric           :             2500

Cell counters:

Data cells sent to fabric        :             2500            432500

Control cells sent to fabric     :     183111332632

Drop counters:

Rx burst error drops(NBI)        :                0

Rx error drops(Switch)           :                0

Rx error drops(pse)              :                0

Rx pkt discard drops(IQM)        :           993676         334707420

Pkt crc error drops(FDT)         :                0

Unreachable dest cell drops      :                0

Internal Error Count             :         42004879

Internal Drop Count              :                0

FIA Tx (From Fabric) Statistics

------------------------------------------------------------------------

Cell counters:                                     Pkts             Bytes

Data cells                       :             2500

Control cells                    :     179438200981

Reassembled packet counters:

Pkts received from fabric        :             2500

Tx Ucast pkts                    :             2500            432500

Tx Mcast pkts                    :                0                 0

Tx pkts (EPNI)                   :             2500            405000

Tx pkts sent to switch           :             1250            265000

Bcast pkts sent to switch    :                0

Mcast pkts sent to switch    :                0

Ucast pkts sent to switch    :             1250

Tx segments sent to pse : 1250 145000

Tx pkts sent to pse (NBI)        :             2500            245000

Drop counters:

Tx pkts dropped EPNI             :                0

Tx Ucast pkts dropped            :                0

Tx Mcast pkts dropped            :                0

Tx pkts dropped in EGQ(RQP + EHP):                0

Control cell Drops               :                0

Data cell Drops                  :                0

Tx pkts dropped switch           :                0

Tx pkts dropped pse              :                0

Internal Error Count             :                0

Internal Drop Count              :                0

6. 检查分组交换引擎(PSE)计数器。

Check initial counter value.

RP/0/RP0/CPU0:NCS6k-Deploy#sh control pse statistics summ instance 1 loc 0/0/cpu0

STATISTICS SUMMARY:

INGRESS

-------

From L2 [LSIM]:

Packets: 1261

Bytes:   163336

To Fabric:

Packets: 1250

Bytes:   265000

EGRESS

------

From Fabric:

Packets: 1250

Bytes:   145000

To TM:

Packets: 1272

To L2 [LSIM]:

Packets: 1261

Bytes:   142962

TO/FROM CPU

-----------

To CPU:

Packets: 11

From CPU:

Packets: 11

Generate 1000 ping packets.

RP/0/RP0/CPU0:NCS6k-Deploy#ping  10.67.1.1 count 1000

Type escape sequence to abort.

Sending 1000, 100-byte ICMP Echos to 10.67.1.1, timeout is 2 seconds:

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!

Success rate is 100 percent (1000/1000), round-trip min/avg/max = 3/4/9 ms

Check counter again to see increment of 1000 packets.

RP/0/RP0/CPU0:NCS6k-Deploy#sh control pse statistics summ instance 1 loc 0/0/cpu0

STATISTICS SUMMARY:

INGRESS

-------

From L2 [LSIM]:

Packets: 2261

Bytes:   293336

To Fabric:

Packets: 2250

Bytes:   477000

EGRESS

------

From Fabric:

Packets: 2250

Bytes:   261000

To TM:

Packets: 2272

To L2 [LSIM]:

Packets: 2261

Bytes:   256962

TO/FROM CPU

-----------

To CPU:

Packets: 11

From CPU:

Packets: 11

7. 正在检查物理层接口模块(PLIM)ASIC计数器。

Check initial counter value.

RP/0/RP0/CPU0:NCS6k-Deploy#sh controllers  plim  asic statistics interface  Te0/0/0/2/0

Node: 0/0/CPU0

-------------------------------------------------------------------------------

TenGigE0/0/0/2/0 Tx Statistics

----------------------------------------------

Total Packets            : 2256              Total Bytes              : 265884

Total Good Packets       : 2256              Total Good Bytes         : 265884

Unicast Packets          : 2256              Multicast Packets        : 0

Broadcast Packets        : 0                 64 Byte Packets          : 6

65to127  Byte Packets    : 2250              128to255 Byte Packets    : 0

256to511 Byte Packets    : 0                 512to1023 Byte Packets   : 0

1024to1518 Byte Packets  : 0                 1519to1522 Byte Packets  : 0

1523to1548 Byte Packets  : 0                 1549to2000 Byte Packets  : 0

2001to_MRU Byte Packets  : 0                 Non Pause BPDU Packets   : 0

Classic Pause Packets    : 0

Class Based Pause Pkts 0 : 0                 Class Based Pause Pkts 1 : 0

Class Based Pause Pkts 2 : 0                 Class Based Pause Pkts 3 : 0

Class Based Pause Pkts 4 : 0                 Class Based Pause Pkts 5 : 0

Class Based Pause Pkts 6 : 0                 Class Based Pause Pkts 7 : 0

Dropped Packets

===============

Drained Packets          : 0                 Abort                    : 0

Length Error             : 0                 Giant                    : 0

Tail Drop: HP Queue      : 0                 Tail Drop: LP Queue      : 0

TenGigE0/0/0/2/0 Rx Statistics

----------------------------------------------

Total Packets            : 2256              Total Bytes              : 265884

Total Good Packets       : 2256              Total Good Bytes         : 265884

Unicast Packets          : 2256              Multicast Packets        : 0

Broadcast Packets        : 0                 64 Byte Packets          : 6

65to127  Byte Packets    : 2250              128to255 Byte Packets    : 0

256to511 Byte Packets    : 0                 512to1023 Byte Packets   : 0

1024to1518 Byte Packets  : 0                 1519to1522 Byte Packets  : 0

1523to1548 Byte Packets  : 0                 1549to2000 Byte Packets  : 0

2001to_MRU Byte Packets  : 0                 Non Pause BPDU Packets   : 0

Classic Pause Packets    : 0

Class Based Pause Pkts 0 : 0                 Class Based Pause Pkts 1 : 0

Class Based Pause Pkts 2 : 0                 Class Based Pause Pkts 3 : 0

Class Based Pause Pkts 4 : 0                 Class Based Pause Pkts 5 : 0

Class Based Pause Pkts 6 : 0                 Class Based Pause Pkts 7 : 0

Dropped Packets

===============

Runts                    : 0                 Fragments                : 0

Jumbo                    : 0                 Jabber                   : 0

CRC                      : 0                 Code Error               : 0

Code Violation           : 0                 Bad Preamble             : 0

IPG Violation            : 0

Packet HPQ QoS Ctl Drop  : 0                 Bytes HPQ QoS Ctl Drop   : 0

Packet HPQ QoS HP Drop   : 0                 Bytes HPQ QoS HP Drop    : 0

Packet HPQ Ctl Tail Drop : 0                 Bytes HPQ Ctl Tail Drop  : 0

Packet HPQ HP Tail Drop  : 0                 Bytes HPQ HP Tail Drop   : 0

Packet LPQ LP1 Tail Drop : 0                 Bytes LPQ LP1 Tail Drop  : 0

Packet LPQ LP2 Tail Drop : 0                 Bytes LPQ LP2 Tail Drop  : 0

Packet TCAM Miss         : 0                 Bytes TCAM Miss          : 0

Packet EOP Abort Drop    : 0                 Bytes EOP Abort Drop     : 0

Packet Policy Deny       : 0                 Bytes Policy Deny        : 0

Rx Packet Drop Details

======================

Unknown Dest MAC Pkts    : 0

Unknown E-Type Pkts      : 0

Unknown Encap Pkts       : 0                 Unknown Encap Bytes      : 0

Unknown VLAN Pkts        : 0                 Unknown VLAN Bytes       : 0

L2 Subif VLAN Deny Pkts  : 0                 L2 Subif VLAN Deny Bytes : 0

Rx Accepted Packet Details

============================

Packet HPQ CTL Sent      : 6                 Bytes HPQ CTL Sent       : 384

Packet HPQ HP  Sent      : 0                 Bytes HPQ HP  Sent       : 0

Packet LPQ LP1 Sent      : 0                 Bytes LPQ LP1 Sent       : 0

Packet LPQ LP2 Sent      : 0                 Bytes LPQ LP2 Sent       : 0

Initiate 1000 ping packets.

RP/0/RP0/CPU0:NCS6k-Deploy#ping  10.67.1.1 count 1000

Type escape sequence to abort.

Sending 1000, 100-byte ICMP Echos to 10.67.1.1, timeout is 2 seconds:

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!

Success rate is 100 percent (1000/1000), round-trip min/avg/max = 3/5/9 ms

Check counter again to see increment of 1000 packets.

RP/0/RP0/CPU0:NCS6k-Deploy#sh controllers  plim  asic statistics interface  Ten0/0/0/2/0

Node: 0/0/CPU0

-------------------------------------------------------------------------------

TenGigE0/0/0/2/0 Tx Statistics

----------------------------------------------

Total Packets            : 3256              Total Bytes              : 383884

Total Good Packets       : 3256              Total Good Bytes         : 383884

Unicast Packets          : 3256              Multicast Packets        : 0

Broadcast Packets        : 0                 64 Byte Packets          : 6

65to127  Byte Packets    : 3250              128to255 Byte Packets    : 0

256to511 Byte Packets    : 0                 512to1023 Byte Packets   : 0

1024to1518 Byte Packets  : 0                 1519to1522 Byte Packets  : 0

1523to1548 Byte Packets  : 0                 1549to2000 Byte Packets  : 0

2001to_MRU Byte Packets  : 0                 Non Pause BPDU Packets   : 0

Classic Pause Packets    : 0

Class Based Pause Pkts 0 : 0                 Class Based Pause Pkts 1 : 0

Class Based Pause Pkts 2 : 0                 Class Based Pause Pkts 3 : 0

Class Based Pause Pkts 4 : 0                 Class Based Pause Pkts 5 : 0

Class Based Pause Pkts 6 : 0                 Class Based Pause Pkts 7 : 0

Dropped Packets

===============

Drained Packets          : 0                 Abort                    : 0

Length Error             : 0                 Giant                    : 0

Tail Drop: HP Queue      : 0                 Tail Drop: LP Queue      : 0

TenGigE0/0/0/2/0 Rx Statistics

----------------------------------------------

Total Packets            : 3256              Total Bytes              : 383884

Total Good Packets       : 3256              Total Good Bytes         : 383884

Unicast Packets          : 3256              Multicast Packets        : 0

Broadcast Packets        : 0                 64 Byte Packets          : 6

65to127  Byte Packets    : 3250              128to255 Byte Packets    : 0

256to511 Byte Packets    : 0                 512to1023 Byte Packets   : 0

1024to1518 Byte Packets  : 0                 1519to1522 Byte Packets  : 0

1523to1548 Byte Packets  : 0                 1549to2000 Byte Packets  : 0

2001to_MRU Byte Packets  : 0                 Non Pause BPDU Packets   : 0

Classic Pause Packets    : 0

Class Based Pause Pkts 0 : 0                 Class Based Pause Pkts 1 : 0

Class Based Pause Pkts 2 : 0                 Class Based Pause Pkts 3 : 0

Class Based Pause Pkts 4 : 0                 Class Based Pause Pkts 5 : 0

Class Based Pause Pkts 6 : 0                 Class Based Pause Pkts 7 : 0

Dropped Packets

===============

Runts                    : 0                 Fragments                : 0

Jumbo                    : 0                 Jabber                   : 0

CRC                      : 0                 Code Error               : 0

Code Violation           : 0                 Bad Preamble             : 0

IPG Violation            : 0

Packet HPQ QoS Ctl Drop  : 0                 Bytes HPQ QoS Ctl Drop   : 0

Packet HPQ QoS HP Drop   : 0                 Bytes HPQ QoS HP Drop    : 0

Packet HPQ Ctl Tail Drop : 0                 Bytes HPQ Ctl Tail Drop  : 0

Packet HPQ HP Tail Drop  : 0                 Bytes HPQ HP Tail Drop   : 0

Packet LPQ LP1 Tail Drop : 0                 Bytes LPQ LP1 Tail Drop  : 0

Packet LPQ LP2 Tail Drop : 0                 Bytes LPQ LP2 Tail Drop  : 0

Packet TCAM Miss         : 0                 Bytes TCAM Miss          : 0

Packet EOP Abort Drop    : 0                 Bytes EOP Abort Drop     : 0

Packet Policy Deny       : 0                 Bytes Policy Deny        : 0

Rx Packet Drop Details

======================

Unknown Dest MAC Pkts    : 0

Unknown E-Type Pkts      : 0

Unknown Encap Pkts       : 0                 Unknown Encap Bytes      : 0

Unknown VLAN Pkts        : 0                 Unknown VLAN Bytes       : 0

L2 Subif VLAN Deny Pkts  : 0                 L2 Subif VLAN Deny Bytes : 0

Rx Accepted Packet Details

============================

Packet HPQ CTL Sent      : 6                 Bytes HPQ CTL Sent       : 384

Packet HPQ HP  Sent      : 0                 Bytes HPQ HP  Sent       : 0

Packet LPQ LP1 Sent      : 0                 Bytes LPQ LP1 Sent       : 0

Packet LPQ LP2 Sent      : 0                 Bytes LPQ LP2 Sent       : 0

8. 选中“show interface”计数器。

最好在第一步中检查此项，但在数据包流的顺序中，此项将是最后一项。它有助于确定数据包是否已发送到线路，以及数据包是否已从线路返回。它有助于缩小问题范围，无论问题是在机箱内还是在机箱外。

Check initial counter values.

RP/0/RP0/CPU0:NCS6k-Deploy#show inter ten 0/0/0/2/0

TenGigE0/0/0/2/0 is up, line protocol is up

Interface state transitions: 1

Hardware is TenGigE, address is e051.2a0f.8c29 (bia e051.2a0f.8c29)

Description: Connected to 0/7/0/1 - CRS-F

Internet address is 10.67.1.2/30

MTU 1514 bytes, BW 10000000 Kbit (Max: 10000000 Kbit)

reliability 0/255, txload 0/255, rxload 0/255

Encapsulation ARPA,

Full-duplex, 10000Mb/s, SR, link type is force-up

output flow control is off, input flow control is off

loopback not set,

ARP type ARPA, ARP timeout 04:00:00

Last input 00:14:22, output 00:14:22

Last clearing of "show interface" counters 22:08:42

30 second input rate 0 bits/sec, 0 packets/sec

30 second output rate 0 bits/sec, 0 packets/sec

3256 packets input, 370860 bytes, 0 total input drops

0 drops for unrecognized upper-level protocol

Received 0 broadcast packets, 0 multicast packets

0 runts, 0 giants, 0 throttles, 0 parity

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

3256 packets output, 370860 bytes, 0 total output drops

Output 0 broadcast packets, 0 multicast packets

0 output errors, 0 underruns, 0 applique, 0 resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

Initiate 1000 ping packets.

RP/0/RP0/CPU0:NCS6k-Deploy#ping  10.67.1.1 cou 1000

Type escape sequence to abort.

Sending 1000, 100-byte ICMP Echos to 10.67.1.1, timeout is 2 seconds:

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!

Success rate is 100 percent (1000/1000), round-trip min/avg/max = 3/4/8 ms

Check counter again to see increment of 1000 packets.

RP/0/RP0/CPU0:NCS6k-Deploy#show inter ten 0/0/0/2/0

TenGigE0/0/0/2/0 is up, line protocol is up

Interface state transitions: 1

Hardware is TenGigE, address is e051.2a0f.8c29 (bia e051.2a0f.8c29)

Description: Connected to 0/7/0/1 - CRS-F

Internet address is 10.67.1.2/30

MTU 1514 bytes, BW 10000000 Kbit (Max: 10000000 Kbit)

reliability 255/255, txload 0/255, rxload 0/255

Encapsulation ARPA,

Full-duplex, 10000Mb/s, SR, link type is force-up

output flow control is off, input flow control is off

loopback not set,

ARP type ARPA, ARP timeout 04:00:00

Last input 00:00:00, output 00:00:00

Last clearing of "show interface" counters 22:09:38

30 second input rate 1000 bits/sec, 2 packets/sec

30 second output rate 1000 bits/sec, 2 packets/sec

4256 packets input, 484860 bytes, 0 total input drops

0 drops for unrecognized upper-level protocol

Received 0 broadcast packets, 0 multicast packets

0 runts, 0 giants, 0 throttles, 0 parity

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

4256 packets output, 484860 bytes, 0 total output drops

Output 0 broadcast packets, 0 multicast packets

0 output errors, 0 underruns, 0 applique, 0 resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions