目录

简介

背景信息

先决条件

要求

使用的组件

CG522-E的一般信息

硬件安装步骤：

思科蜂窝网关522-E的侧面板

CG522-E上的状态LED指示

安装SIM卡

安装室内5G天线

启动CG522-E

软件安装步骤：

通过控制台访问CG522-E

通过SSH访问CG522-E

更改密码

如何查看运行配置

简介

本文档介绍蜂窝网网关522-E的初始配置和安装过程。

背景信息

任何复杂的配置过程均不属于本出版物的范围。CG522-E是一种即插即用设备，但提供的信息易于使用。下面是所有已发布的CG522-E文档的超链接。

先决条件

要求

Cisco 建议您具有以下主题的基础知识：

- 5G蜂窝网络基础知识

- Cisco IOS® XE和Cisco IOS® CG

使用的组件

CG522-E(v.17.04.01a)

CG522-E调制解调器EM9190(v.SWIX55C_01.07.13.00)

WS-C3850-12X48U(v.03.07.04E)

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您的网络处于活动状态，请确保您了解所有命令的潜在影响。

CG522-E的一般信息

CG522作为NSA（非独立）设备工作。这意味着5G频段位于数据平面上，而LTE位于控制平面上。因此，NSA设备需要将流量从4G频段聚合到5G频段才能从CG522传入和传出。

硬件安装步骤：

思科蜂窝网关522-E的侧面板

此图显示CG522-E的I/0侧面板：

1

PWR插槽

2

千兆以太网WAN

3

双SIM插槽盖(SIM 0 | SIM 1)

4

重置按钮

5

AUX 端口

6

控制台(RJ-45)

CG522-E上的状态LED指示

◉

固体

✺

闪烁

○

off

初始启动LED

4G

5G

功能

◉

○

- 操作系统已启动

- 调制解调器未连接

- LAN接口打开

✺ / ○

○

- 操作系统已启动

- 调制解调器状态未定义

- LAN接口关闭

◉

○

- 开机，引导加载程序

- 操作系统已启动，但未找到SIM

✺ / ○

○

- 正在进行系统启动

额定LED

4G

5G

功能

◉

○

- 正常运行

- 最大4G蜂窝信号 — 3或4条等值

- LAN接口打开

✺ / ○

○

- 正常运行

- 中等4G蜂窝信号 — 1或2条等值

- LAN接口打开

○

◉

- 正常运行

- 最大5G蜂窝信号 — 3或4条等值

- LAN接口打开

○

✺ / ○

- 正常运行

- 中等5G蜂窝信号 — 1或2条等值

- LAN接口打开

边缘条件LED

4G

5G

功能

◉

◉

低功率模式

✺ / ○或◉

✺ / ○

热缓解模式已激活，带4G信号的无线打开

✺ / ○

✺ / ○或◉

热缓解模式已激活，带5G信号的无线打开

✺ / ○

✺ / ○

热缓解模式已激活，无线电关闭

安装SIM卡

在以太网端口旁边，CG522-E有一个盖子用于SIM插槽。盖子由飞利浦的头螺钉固定在一起。小心地拆下螺钉，以露出SIM插槽。

SIM卡大小仅与MICRO SIM(高度：15毫米，宽度：12毫米，厚度：0.76毫米)。

1

SIM卡盖

2

MICRO SIM适配器

3

NANO SIM

注意：使用适用于NANO SIM卡的微SIM卡适配器。

安装室内5G天线

有时，需要在CG522-E上安装5G天线。唯一支持的室内5G天线是5G-ANTM-SMA-D（多频旋转安装偶极天线）(SMA)。 要插入天线，请确保CG522-E没有电源，取下天线的SMA凸式连接器端，将连接器扭曲到CG522-E的凹式连接器中，直到略紧。

注意：5G-ANTM-SMA-D供室内使用。天线设计为连接到设备上的专用天线端口。安装天线无需特殊工具。

警告：有关安全防范措施和操作雷电活动的协议，请参阅5G-ANTM-SMA-D安装指南。

启动CG522-E

CG522-E可通过多种方式供电，包括PoE+和12V 2.5A电源模块4针连接器。

要确认CG522-E是否兼容PoE，请在以太网端口上查找闪电符号。

注意：PoE+电缆的长度不得超过100米。如果更换非PoE CG522-E单元，则接收相同的单元。

提示：这是最基本级别的硬件安装。有关详细信息，请使用此硬件安装指南。

软件安装步骤：

通过控制台访问CG522-E

控制台会话可以访问CG522-E。参数包括：

- 波特率：115200位/秒

- 8 个数据位

- 无奇偶校验

- 1个停止位(8N1)

- 无需流量控制

- username：admin

- password：设备序列号

通过查看设备的底部找到设备序列号。启动序列中也会显示该字段。将显示以下消息：

Device is using default day0 password: xxxxxxxxxxx

通过SSH访问CG522-E

CG522-E可通过SSH从交换机/路由器通过第2层接口访问。确保为接口分配了192.168.1.x子网内的IP地址，因为CG522-E默认接口的IP地址设置为192.168.1.1。

在上行链路设备（交换机/路由器）上，配置以下命令：

Switch# configure terminal

Switch(config)# interface

Switch(config-if)# no switchport Switch(config-if)# ip address 192.168.1.2 255.255.255.0 Switch(config-if)# exit Switch(config)# exit Switch# ssh -l admin 192.168.1.1 Password:

在CG522-E上，初始参数为：

- IP 地址：192.168.1.1

- username：admin

- password：设备序列号

通过查看设备的底部找到设备序列号。它也会显示在启动序列中。控制台上将出现此消息：

Device is using default day0 password: xxxxxxxxxxx

提示：您可以通过SSH连接到交换机的SVI，然后使用这种方法通过SSH连接到CG522-E，但是SVI不足以交换CG522和上行链路设备。您必须在CG522-E的上行链路接口内包含L2接口。

更改密码

一旦有控制台或SSH访问，请使用以下命令更改CG522-E的用户名和密码。

CellularGateway# configure terminal

CellularGateway(config)# aaa authentication users user admin change-password old-password

执行这些命令后，请观察以下提示：

Value for 'old-password' (

): ********* Value for 'new-password' (

): ******** Value for 'confirm-password' (

): ********

如何查看运行配置

运行此命令以查看CG522-E的运行配置：

CellularGateway# show running-config

如何升级CG522-E软件

在使用前升级您的CG522-E是最佳选择。

使用此程序上传和升级CG522-E的软件版本。

- 拥有可访问的TFTP服务器，将软件映像复制到服务器上，并确保文件的权限是匿名的TFTP用户可以访问文件。

下载和安装软件的综合配置指南；请单击此处。

首先，确认CG522-E的版本：

CellularGateway# show version

Active image

Product name       = Cisco Cellular Gateway

Build version      = 17.04.01a.0.211.1608270185..Bengaluru

Software version   = 1.0.0

Build date         = 2023-08-08_23.41

Build path         = /san1/BUILD/workspace/CCO_c174_throttle_EIO/base/build_eio

Built by           = aut

Firmware info

Uboot version      = 2018.03-7.1.0-cwan-0.0.16

Uboot date         = 10/06/2020

Last reboot reason = SoftReset

然后，使用以下步骤：

CellularGateway# gw-action:request software upgrade

tftp://192.168.1.2/cg-ipservices-17.09.04.SPA.bin

System is about to download and install the selected software, Continue? [no,yes] yes

Software successfully upgrade

CellularGateway# gw-action:request system reboot

System is about to reload, Continue? [yes,no]

注意：在此场景中，交换机被用作TFTP服务器。此超链接中包含软件页面的链接。

如何在映像分区之间查看和切换：

CellularGateway# show gw-system:system partition

Primary Image

Partition    = image2

File name    = cg-ipservices-17.09.04.SPA.bin

Version      = 17.09.04.0.0.1691563291..Bengaluru

Build Date   = Wed Aug  9 06:41:31 2023

Install Date = Sun Jun  4 02:03:23 2000

Boot Status  = Boot Successful.

Backup Image

Partition    = image1

File name    = cg-ipservices.17.04.01a.SPA.bin

Version      = 17.04.01a.0.211.1608270185..Bengaluru

Build date   = Fri Dec 18 05:43:05 2020

Install Date = Fri Jun 22 11:13:59 2018

Boot Status  = Boot Successful.

CellularGateway# gw-action:request software activate

System is about to reload, Continue? [yes,no]

检查PID、正常运行时间、内存、闪存大小

提供的信息对兼容性检查和故障排除非常有用。有关CG522-E故障排除指南，请单击此超链接。

CellularGateway# show gw-system:system status

SYSTEM INFO

Platform PID                   = CG522-E

Product Serial Number          = FGL2504LB7Y

System Up Time                 = up 15 days

Current Time                   = Thu Aug 24 22:37:22 UTC 2023

Current CPU Usage              = 5%

RAM

Total Memory in KBytes         = 993852

Memory Used in KBytes          = 557760

Memory Free in KBytes          = 436216

STORAGE

Disk type                      = Bootflash

Disk Size in KBytes            = 999320

Disk Used in KBytes            = 88944

Disk Available in KBytes       = 841564

Disk Used Percentage           = 10%

TEMPERATURE

Ambient temperature            = 53 deg C

Power source                   = AC

检查硬件信息

此处提供的信息对兼容性检查和故障排除非常有用。有关CG522-E故障排除指南，请单击此超链接。

CellularGateway# show cellular 1 hardware

Modem Firmware Version = SWIX55C_01.07.13.00 000000 jenkins

Device Model ID = EM9190

International Mobile Subscriber Identity (IMSI) = xxxxxxxxxxxxxxx

International Mobile Equipment Identity (IMEI) = yyyyyyyyyyyyyyy

Integrated Circuit Card ID (ICCID) = zzzzzzzzzzzzzzzzzzzz

Mobile Subscriber Integrated Services Digital Network Number (MSISDN) = xxxxxxxxxxx

Factory Serial Number (FSN) = yyyyyyyyyyyyyy

Current Modem Temperature = 43 deg C

PRI SKU ID = zzzzzzz

PRI Version = 016.006_004

Carrier = GENERIC

OEM PRI Version = 001.002

Modem Status = MODEM_STATE_NETWORK_READY

检查会话连接

此信息允许您确定连接的APN、会话状态等。

以下是断开会话状态的示例：

CellularGateway# show cellular 1 connection

Profile ID = 1

---------------------------

APN = broadband

Connectivity = Attach and Data

Session Status = Disconnected

Call end mode =

Session disconnect reason type = (0)

Session disconnect reason = (0)

Cellular Interface = 1/1

Backoff timer = NOT Running

Back off error count = 0

Back off timer index = 0

Back off timer array (in minutes) = 0 1 1 1 1 5 10 15 30 60

Period of Backoff = 0 minute(s)

以下是连接会话状态的示例：

CellularGateway# show cellular 1 connection

Profile ID = 1

---------------------------

APN = broadband

Connectivity = Attach and Data

Session Status = Connected

IPv4 Address = x.x.x.x

IPv4 Gateway Address = y.y.y.y

IPv4 Primary DNS = z.z.z.z

IPv4 Secondary DNS = x.x.x.x

Tx Packets = 6821, Rx Packets = 6

Tx Bytes = 1301756, Rx Bytes = 888

Tx Drops = 0, Rx Drops = 0

Tx Overflow Count = 0, Rx Overflow Count = 0

检查无线电信息

提供的信息对兼容性检查和故障排除非常有用。有关CG522-E故障排除指南，请单击此超链接。

CellularGateway# show cellular 1 radio

Radio Power Mode = online

Radio Access Technology(RAT) Selected = LTE

LTE Rx Channel Number(PCC) = 0

LTE Tx Channel Number(PCC) = 0

LTE Band = 66

LTE Bandwidth = 20 MHz

Current RSSI = -60 dBm

Current RSRP = -94 dBm

Current RSRQ = -14 dB

Current SNR = 2.8 dB

Physical Cell Id = 119

Network Change Event = activated LTE

CellularGateway# show cellular 1 radio-details

Carrier Aggregation Status = Disabled

LTE RX Channel Number(PCC) = xxx

LTE TX Channel Number(PCC) = yyy

LTE Band = 66

LTE Bandwidth = 20 MHz

PCC CA information:

-------------------

LTE band class = 66

E-UTRA absolute radio frequency channel number of the serving cell = 0

Bandwidth = 20 MHz

Physical Cell Id = 119

Current RSRP in 1/10 dBm as measured by L1 = -94 dBm

Current RSSI in 1/10 dBm as measured by L1 = -63 dBm

Current RSRQ in 1/10 dBm as measured by L1 = -12 dB

Measured SINR in dB = 3.8 dB

Tracking area code information for LTE = 31891

5G CC information:

------------------

Current ENDC RSRP in 1/10 dBm as measured by L1 = -101 dBm

Current ENDC RSRQ in 1/10 dBm as measured by L1 = -14 dB

Measured ENDC SINR in dB = 4 dB

5G CC信息是使用5G的指示。所选频段当前显示LTE的利用率，但作为NSA设备，由于此特定模拟中没有流量，因此选择LTE频段。

检查并配置蜂窝接入点名称(APN)

CG522-E通常能够根据其SIM自动配置APN。此过程介绍如何确认活动的APN配置文件。有时，需要配置静态APN配置文件。

CellularGateway# show cellular 1 profile

PROFILE ID   APN        PDP TYPE   STATE     AUTHENTICATION  USERNAME  PASSWORD

---------------------------------------------------------------------------------

1            Broadband  IPv4       ACTIVE      none            -         -

2            ims        IPv4v6     INACTIVE    none            -         -

如何配置自定义APN:

CellularGateway# configure terminal

CellularGateway(config)# controller cellular 1

CellularGateway(config-cellular-1)# sim slot <# of sim slot in use>

CellularGateway(config-slot-0)# profile id <#> apn

pdn-type IPv4v6 authentication

username

password

CellularGateway(config-slot-0)# attach profile <#> CellularGateway(config-slot-0)# commit

提示：某些APN不需要身份验证；这意味着如果不需要则无需定义任何身份验证。例如：profile id <#> apn pdn-type IPv4v6 < — 这是有效命令。

如何删除APN配置文件：

CellularGateway# config term

Entering configuration mode terminal

CellularGateway(config)# controller cellular 1

CellularGateway(config-cellular-1)# sim slot 1

CellularGateway(config-slot-1)# no attach-profile 1

CellularGateway(config-slot-1)# no profile id 1 apn broadband

CellularGateway(config-slot-1)# commit

注意：LTE无需身份验证。

注意：Verizon至少需要2个配置文件；附加配置文件（通常为vzwims或ims）和数据/默认配置文件。AT&T只需要一个数据/默认和附加配置文件（宽带）所需的配置文件。

配置主SIM插槽和SIM故障切换命令

运行这些命令以定义主SIM插槽并使用SIM故障切换计时器功能。手动故障切换将重新定义主SIM插槽。

CellularGateway# config term

Entering configuration mode terminal

CellularGateway(config)# controller cellular 1

CellularGateway(config-cellular-1)# sim primary-slot <0/1>

CellularGateway(config-cellular-1)# commit

Commit complete.

CellularGateway(config-cellular-1)# end

CellularGateway# config term

Entering configuration mode terminal

CellularGateway(config)# controller cellular 1

CellularGateway(config-cellular-1)# sim max-retry 5

CellularGateway(config-cellular-1)# sim failovertimer 7

CellularGateway(config-cellular-1)# commit

Commit complete.

CellularGateway(config-cellular-1)# end

CellularGateway#

检查并配置CG522-E调制解调器固件

使用此程序上传和升级您的CG522-E调制解调器的固件版本。

- 拥有可访问的TFTP服务器，将软件映像复制到服务器上，并确保文件的权限是匿名的TFTP用户可以访问文件。

- 创建子目录以保存调制解调器固件。

- 根据SIM卡确认正确的固件(可在软件页面中查看)。

- 将固件文件(.cwe和.nvu)复制到该目录。

下载和安装固件的综合配置指南；请单击此处。

请按以下步骤操作：

CellularGateway# gw-action:request file download tftp://192.168.1.2/EM9190_01.07.13.00.cwe create_dir

INFO: Created folder

INFO: Accessing file EM9190_01.07.13.00.cwe from tftp://192.168.1.2/EM9190_01.07.13.00.cwe INFO: Please wait while the file is being downloaded to /flash/

/EM9190_01.07.13.00.cwe file received /flash/

/EM9190_01.07.13.00.cwe size(Bytes): 88960399 CellularGateway# gw-action:request file download tftp://192.168.1.2/EM9190_01.07.13.00_GENERIC_016.006_004.nvu create_dir

INFO:

Directory already exists INFO: Accessing file EM9190_01.07.13.00_GENERIC_016.006_004.nvu from tftp://192.168.1.2/EM9190_01.07.13.00_GENERIC_016.006_004.nvu INFO: Please wait while the file is being downloaded to /flash/

/EM9190_01.07.13.00_GENERIC_016.006_004.nvu file received /flash/

/EM9190_01.07.13.00_GENERIC_016.006_004.nvu size(Bytes): 69051 CellularGateway# cellular 1 upgrade firmware

用于检查固件状态的命令：

CellularGateway# show cellular 1 firmware

Firmware Activation Mode = AUTO

INDEX  CARRIER  FW VERSION       PRI VERSION  STATUS

------------------------------------------------------

1      GENERIC  01.07.13.00_GEN  016.006_004  ACTIVE

CellularGateway# show cellular 1 hardware

Modem Firmware Version = SWIX55C_01.07.13.00 000000 jenkins

Device Model ID = EM9190

International Mobile Subscriber Identity (IMSI) = xxxxxxxxxxxxxxx

International Mobile Equipment Identity (IMEI) = yyyyyyyyyyyyyyy

Integrated Circuit Card ID (ICCID) = zzzzzzzzzzzzzzzzzzzz

Mobile Subscriber Integrated Services Digital Network Number (MSISDN) = xxxxxxxxxxx

Factory Serial Number (FSN) = yyyyyyyyyyyyyy

Factory Serial Number (FSN) = 4H0355006001A1

Current Modem Temperature = 43 deg C

PRI SKU ID = 1104703

PRI Version = 016.006_004

Carrier = GENERIC

OEM PRI Version = 001.002

Modem Status = MODEM_STATE_NETWORK_READY

注意：在此场景中，网络交换机用作TFTP服务器。对于固件页面，这是hyperlink。

如何重置调制解调器

调制解调器重置不会清除任何已设置的配置。重新启动后它就起作用了。

CellularGateway# cellular 1 modem-reset

cellular_modem_reset :

您还可以使用AT命令重置调制解调器。

CellularGateway# cellular 1 modem-at-command

at!reset