目录

简介

先决条件

要求

使用的组件

规则

背景信息

配置

网络图

配置

验证

故障排除

相关信息

简介

本文档提供了连接到Cisco 6130数字用户线接入复用器(DSLAM)的Cisco 827数字用户线(DSL)路由器的示例配置，该路由器在Cisco 6400通用接入集中器(UAC)上终止。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档中的信息基于以下软件和硬件版本：

- 采用IOS®软件版本12.1(1)XB的思科827-4V客户端设备(CPE)。

- Cisco 6400 UAC-NRP IOS软件版本12.1(1)DC1（外部DHCP服务器）或12.2(2)B（IOS DHCP服务器）。

- 思科6400 UAC-NSP IOS软件版本12.0(4)DB。

- 思科6130 DSLAM-NI2 IOS软件版本12.1(1)DA。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

背景信息

Cisco 827配置了RFC1483桥接和集成路由与桥接(IRB)。Cisco 827允许以太网段上的PC从6400后面的DHCP服务器或6400 IOS DHCP服务器获取地址。此外，BVI地址还配置为从DHCP服务器获取地址和默认路由。Cisco 6400异步传输模式(ATM)接口配置了路由网桥封装(RBE)，并配置为与NRP上的外部DHCP服务器或IOS DHCP服务器一起运行。

对Cisco 6400，在Cisco 6400节点路由处理器(NRP)的ATM RBE功能寻址在跨接的从末端桥接LAN的RFC1483以太网流量的IP。在路由桥接模式下配置的ATM接口上接收的桥接IP数据包通过IP报头路由。这些接口利用常用于DSL接入的末节LAN拓扑的特性，提供比IRB更高的性能和灵活性。

此外，DHCP客户端的主机路由会在分配IP地址时自动添加到6400路由表中。当释放DHCP地址时，主机路由将从路由表中删除。

配置

本部分提供有关如何配置本文档所述功能的信息。

注：要查找有关本文档中所用命令的其他信息，请使用命令查找工具(仅限注册用户)(仅限注册客户)。

网络图

本文档使用图1和图2所示的网络设置：

图1 — 场景1

图2 — 场景2

配置

本文档使用以下配置：

- Cisco 827

- Cisco 6400 NRP

- 6400调试（将RBE与外部DHCP服务器配合使用）

- 6400调试（将RBE与IOS DHCP服务器配合使用）

Cisco 827

Current configuration:

!

version 12.0

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname R1

!

ip subnet-zero

!

bridge irb

!

interface Ethernet0

no ip address

bridge-group 1

!--- Because the Ethernet0 is bridged to the WAN interface, !--- PCs behind the ethernet0 can be setup as DHCP clients. !--- They get their addresses from the DHCP server behind the 6400, !--- or from the IOS DHCP server on the 6400.

!

interface ATM0

no ip address

no ip directed-broadcast

no ip mroute-cache

no atm ilmi-keepalive

pvc 4/100

encapsulation aal5snap

!

bundle-enable

bridge-group 1

hold-queue 224 in

!

interface BVI1

ip address dhcp client-id Ethernet0

!--- This command tells the BVI interface to get the address !--- from DHCP, and also to get the default route from DHCP.

!

ip classless

!--- Note: The default route will be inserted into !--- the routing table automatically from the DHCP server, and !--- no static routing statement is required.

no ip http server

!

bridge 1 protocol ieee

bridge 1 route ip

!

voice-port 1

timing hookflash-in 0

!

voice-port 2

timing hookflash-in 0

!

voice-port 3

timing hookflash-in 0

!

voice-port 4

timing hookflash-in 0

!

end

Cisco 6400 NRP

Current configuration:

!

version 12.1

no service pad

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname NRP

!

redundancy

main-cpu

no auto-sync standard

no secondary console enable

ip subnet-zero

!

interface Loopback1

ip address 198.1.1.1 255.255.255.0

no ip directed-broadcast

!--- This address and mask must match the intended !--- scope and network configured on the external DHCP server.

!

interface ATM0/0/0

no ip address

no ip directed-broadcast

no ip mroute-cache

no ATM ilmi-keepalive

!

interface ATM0/0/0.4 point-to-point

!--- The interface ATM0/0/0.4 point-to-point uses IP !--- unnumbered Loopback1 for its IP address requirements.

ip unnumbered Loopback1

ip helper-address <dhcp server ip address>

atm route-bridged ip

PVC 4/100

encapsulation aal5snap

!

interface Ethernet0/0/1

no ip address

no ip directed-broadcast

!

interface Ethernet0/0/0

no ip directed-broadcast

!

interface FastEthernet0/0/0

no ip address

no ip directed-broadcast

full-duplex

!

ip classless

!--- Note: For every DHCP client that is relayed an address, !--- a host route will be automatically inserted in the routing !--- table, and no host route statement for a DHCP client is required.

end

6400调试（将RBE与外部DHCP服务器配合使用）

debug ip dhcp server events

Looks for existing binding. . .

00:10:56:  find_or_create(): Look for existing binding for:

00:10:56:  find_or_create(): dhcp->chaddr = 616EF9BC

00:10:56:  find_or_create(): dhcp->hlen = 6

00:10:56:  find_or_create(): dhcp->htype = 1

00:10:56:  find_or_create: address = 124.124.124.1

00:10:56:  find_or_create(): Creating new binding with data

00:10:56:  find_or_create(): dhcp->chaddr = 616EF9BC

00:10:56:  find_or_create(): dhcp->hlen = 6

00:10:56:  find_or_create(): dhcp->htype = 1

00:10:56:  find_or_create: address = 124.124.124.1

!--- Forwards DHCP DISCOVER packet from the client to the !--- external DHCP server.

00:10:56: DHCPD: Received DHCPDISCOVER on UNNUM-IF

00:10:56: DHCPD: Forwarding reply on un-numbered intf

!--- Forwards the DHCP OFFER packet from the external DHCP server !--- to the client.

00:10:56: DHCPD: Unnum: Received DHCPOFFER

00:10:56:  DHCPD: Server Address = 200.200.200.2

00:10:56:  DHCPD: Giaddr Address = 124.124.124.1

00:10:56:  find_or_create(): Look for existing binding for:

00:10:56:  find_or_create(): dhcp->chaddr = 616EF9BC

00:10:56:  find_or_create(): dhcp->hlen = 6

00:10:56:  find_or_create(): dhcp->htype = 1

00:10:56:  find_or_create: address = 124.124.124.1

!--- Forwards the DHCP REQUEST packet from the client to the external !--- DHCP server.

00:10:56: DHCPD: Received DHCPREQUEST on UNNUM-IF

00:10:56:  DHCPD: request_on_unnumif ():Real Server = 200.200.200.2

00:10:56: DHCPD: Forwarding reply on un-numbered intf

!--- Forwards the DHCP ACK packet from the DHCP server to the client.

00:10:56: DHCPD: Unnum: Received DHCPACK

00:10:56:  DHCPD: lease time = 86400

!--- Adds a dynamic host route to the client into the routing table.

00:10:56: DHCPD: dhcpd_lookup_route: host = 124.124.124.2

00:10:56: DHCPD: dhcpd_lookup_route: index = 126

00:10:56:  DHCPD: Adding new route to host 124.124.124.2

00:10:56: DHCPD: dhcpd_lookup_route: host = 124.124.124.2

00:10:56: DHCPD: dhcpd_lookup_route: index = 126

00:10:56: DHCPD: dhcpd_create_and_hash_route: host = 124.124.124.2

00:10:56: DHCPD: dhcpd_create_and_hash_route index = 126

00:10:56: DHCPD: dhcpd_add_route: lease = 86400

00:10:56:  DHCPD: Server ID saved in Binding = 200.200.200.2

00:10:56:  DHCPD: Server ID saved in Route block = 200.200.200.2

00:10:56:  DHCPD: Giaddr Address = 124.124.124.1

6400调试（将RBE与IOS DHCP服务器配合使用）

debug ip dhcp server events

Assigns an address to the client from the IOS DHCP server.

23:19:09: DHCPD: assigned IP address 124.124.124.3 to

client 0063.6973.636f.2d30.3030.302e.3063.3036.2e32.3339.342d.4256.31.

23:19:10:  DHCPD: lease time = 86400

Adds a dynamic host route to the client into the routing table.

23:19:10: DHCPD: dhcpd_lookup_route: host = 124.124.124.3

23:19:10: DHCPD: dhcpd_lookup_route: index = 127

23:19:10:  DHCPD: Adding new route to host 124.124.124.3

23:19:10: DHCPD: dhcpd_lookup_route: host = 124.124.124.3

23:19:10: DHCPD: dhcpd_lookup_route: index = 127

23:19:10: DHCPD: dhcpd_create_and_hash_route: host = 124.124.124.3

23:19:10: DHCPD: dhcpd_create_and_hash_route index = 127

23:19:10: DHCPD: dhcpd_add_route: lease = 86400

验证

当前没有可用于此配置的验证过程。

故障排除

目前没有针对此配置的故障排除信息。

相关信息

- 配置 Cisco 827 路由器，使之通过 RFC1483 桥接以 RBE 模式在 Cisco 6400 上终止

- DSL产品支持页