目录

简介

背景信息

先决条件

要求

使用的组件

恢复步骤

简介

本文档介绍在CGR 1000上恢复bootflash和系统映像的故障排除步骤。

背景信息

CGR1000使用思科安全数字(SD)卡内存存储启动映像、系统映像、配置等  在极少数情况下，SD卡损坏。结果，启动映像和/或系统映像损坏。这会阻止CGR启动。启动顺序如图所示。本文中的步骤大纲是从损坏的SD卡内存状态恢复CGR。

先决条件

1.本地PC上安装的简单文件传输协议(TFTP)服务器

2.设置TFTP服务器，使其具有启动映像和系统映像

要求

Cisco 建议您了解以下主题：

1.控制台电缆

2.第5类

3.启动映像和系统映像

使用的组件

本文档仅限于在CGR 1120和CGR1240上运行的CGOS版本。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

恢复步骤

1.使用putty设置控制台电缆。

2.将CAT5电缆从本地pc网卡连接到CGR ETH 2/2。这是恢复过程中唯一工作的接口。

3.将本地pc NIC设置为与CGR位于同一子网中。

例如，PC网卡是192.0.2.1子网255.255.255.0。

对于CGR，子网为192.0.2.2，子网为255.255.255.0。

4.在“Putty”课程中，您会看到：

"loader>"

IOFPGA @ 0xd0000000 version=0x30020700, datecode=0xc080d17 CPLD version 0x14

Reset Reason = 0(0)

Scratch pad test passed !!!

BIOS Version: Build # 12 -   Wed 06/27/2012

CGR Loader Version: 1.00.01

Filesystem type is ext2fs, partition type 0x83

Filesystem type is ext2fs, partition type 0x83

GNU GRUB  version 0.97

CGR Loader Version 1.00.01

loader>

5.使用命令“set ip”设置ETH2/2的IP地址。

set ip 192.0.2.2 255.255.255.0

Correct - ip addr is 192.0.2.2, mask is 255.255.255.0

Found Intel IOH GBE [2:0.1] at 0xe020, ROM address 0x0000

Probing...[Intel IOH GBE]

MAC address 78:da:6e:8:ad:e1

External PHY link UP @ 1000/full

Address: 192.0.2.2

Netmask: 255.255.255.0

Server: 0.0.0.0

Gateway: 0.0.0.0

loader>

6.使用命令“set gw”将网关地址设置为本地PC网卡。

set gw 192.0.2.1

Correct gateway addr 192.0.2.1

Address: 192.0.2.2

Netmask: 255.255.255.0

Server: 0.0.0.0

Gateway: 192.0.2.1

7.使用命令“boot tftp://”从本地tftp服务器启动启动映像。

loader> boot tftp://192.0.2.1/cgr1000-uk9-kickstart.5.2.1.CG4.3.SPA.bin

Address: 192.0.2.2

Netmask: 255.255.255.0

Server: 192.0.2.1

Gateway: 192.0.2.1

Filesystem type is tftp, using whole disk

Booting: /cgr1000-uk9-kickstart.5.2.1.CG4.3.SPA.bin console=ttyS0,9600n8nn quie

t loader_ver="1.00.01"....

...............................................................................

................Kickstart image verification Successful

Image verification OK

INIT: Checking all filesystems ....... done.

Warning: switch is starting up with default configuration

Creating boot config file...

/etc/rc.d/rcS.d/S26check-flash: line 528: /mnt/bootloader/boot/grub/menu.lst.local: No such file or directory

cp: cannot stat `/mnt/cfg/0/boot/grub/menu.lst.local': No such file or directory

WARNING: image sync is going to be disabled after a loader netboot

Loading system software

INIT: Sending processes the TERM signal[H[J

INIT: Sending processes the TERM signal

INIT: Sending processes the

KILL signal

8.  映像启动后，您将看到类似于此输出的输出。

Router(boot)# ?

Exec commands:

clear     Reset functions

config    Enter configuration mode

copy      Copy from one file to another

delete    Delete a file or directory

dir       Directory listing for files

exit      Exit from the EXEC

find      Find a file below the current directory

format    Format disks

init      Initialize internal disk

load      Load system image

mkdir     Create new directory

move      Move files

no        Disable debugging functions

pwd       View current directory

reload    Reboot this supervisor module

rmdir     Remove existing directory

show      Show running system information

sleep     Sleep for the specified number of seconds

ssh       SSH to another system

tail      Display the last part of a file

telnet    Telnet to another system

9.使用命令“format bootflash：”格式化损坏的SD卡。

This command is going to erase the contents of your bootflash:.

Do you want to continue? (y/n)  [n] y

Formatting bootflash:

Formatting started at:  Fri Feb 20 23:56:00 UTC 2015

mke2fs 1.35 (28-Feb-2004)

Formatting finished at:  Fri Feb 20 23:56:52 UTC 2015

Formatting completed

10.运行init系统(选项步骤：此命令格式化SD卡并清除所有内容)。

Router(boot)# init system

This command is going to erase your startup-config, licenses as well as the contents of your bootflash:.

Do you want to continue? (y/n)  [n] yInitializing the system

mount: /dev/mmcblk0p4 already mounted or /bootflash busy

mount: according to mtab, /dev/mmcblk0p4 is already mounted on /bootflash

ERROR: cannot mount filesystem

cp: omitting directory `/bootflash/'

Partitioning failed

11.设置管理接口（将启动和系统映像复制到bootflash中需要此接口）。

Router(boot)# configure terminal

Router(boot)(config)# interface mgmt0

Router(boot)(config-if)#ip address 192.0.2.2 255.255.255.0

Router(boot)(config-if)#no shut

12.将启动和系统映像复制到bootflash中。

Router(boot)# copy tftp://192.0.2.1/cgr1000-uk9-kickstart.5.2.1.CG4.3.SPA.bin bootflash:

Trying to connect to tftp server......

Connection to server Established. Copying Started.....

TFTP get operation was successful

Copy complete, now saving to disk (please wait)...

Router(boot)# copy tftp://192.0.2.1/cgr1000-uk9.5.2.1.CG4.3.SPA.bin bootflash:

Trying to connect to tftp server......

Connection to server Established. Copying Started.....

TFTP get operation was successful

Copy complete, now saving to disk (please wait)...

13.使用“dir”验证启动和系统映像是否在CGR上。

Router(boot)#dir

29167616    Feb 21 00:39:59 2015  cgr1000-uk9-kickstart.5.2.1.CG4.3.SPA.bin

143332283    Feb 21 00:42:06 2015  cgr1000-uk9.5.2.1.CG4.3.SPA.bin

372    Feb 23 17:55:52 2015  fpga.log

1905    Feb 23 18:39:54 2015  mts.log

Usage for bootflash://

691462144 bytes used

8859394048 bytes free

9550856192 bytes total

14.使用“load bootflash”命令启动系统映像。

Router(boot)# load bootflash:cgr1000-uk9.5.2.1.CG4.3.SPA.bin

Loading system software

Uncompressing bootflash:/cgr1000-uk9.5.2.1.CG4.3.SPA.bin..........done. (in 37 seconds)

Loading plugin 0: core_plugin...

INIT: Switching to runlevel: 3

INIT: Sending processes the TERM signal

Router(boot)#

INIT:

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

2015 Feb 21 00:47:56  %$ VDC-1 %$ %COPP-2-COPP_NO_POLICY: Control-plane is unprotected.System is coming up ... Please wait ...

2015 Feb 21 00:47:58  %$ VDC-1 %$ %VDC_MGR-2-VDC_ONLINE: vdc 1 has come online 2015 Feb 21 00:47:58 Router %$ VDC-1 %$ %PLATFORM-2-

INPUT_POWER_SOURCE_TRANSITION: Three Phase and DC Input Status Alert:  L1 Phase ON, L2 Phase OFF, L3 Phase OFF, DC Input Absent

15. CGR启动到系统映像后，您需要使用“install all bootflash:<kickstart-image> system bootflash:<system image>”安装启动和系统映像。

cgr1120# install all kickstart bootflash:cgr1000-uk9-kickstart.5.2.1.CG4.3.SPA.bin system bootflash:cgr1000-uk9.5.2.1.CG4.3.SPA.bin

Verifying image bootflash:/cgr1000-uk9-kickstart.5.2.1.CG4.3.SPA.bin for boot variable "kickstart".

-- SUCCESS

Verifying image bootflash:/cgr1000-uk9.5.2.1.CG4.3.SPA.bin for boot variable "system".

-- SUCCESS

Verifying image type.

-- SUCCESS

Extracting "system" version from image bootflash:/cgr1000-uk9.5.2.1.CG4.3.SPA.bin.

-- SUCCESS

Extracting "kickstart" version from image bootflash:/cgr1000-uk9-kickstart.5.2.1.CG4.3.SPA.bin.

-- SUCCESS

Extracting "bios" version from image bootflash:/cgr1000-uk9.5.2.1.CG4.3.SPA.bin.

-- SUCCESS

Checking for Battery Power Mode.

-- SUCCESS

Checking for Module Power Status.

-- SUCCESS

Checking for WPAN upgrade compatibility.

-- SUCCESS

Performing module support checks.

-- SUCCESS

Notifying services about system upgrade.

-- SUCCESS

Compatibility check is done:

Module  bootable          Impact  Install-type  Reason

------  --------  --------------  ------------  ------

1       yes      disruptive         reset  Hitless upgrade is not supported

Images will be upgraded according to following table:

Module       Image                  Running-Version(pri:alt)           New-Version  Upg-Required

------  ----------  ----------------------------------------  --------------------  ------------

1      system                              5.2(1)CG4(3)          5.2(1)CG4(3)            no

1   kickstart                              5.2(1)CG4(3)          5.2(1)CG4(3)            no

1        bios   v16.1.0(10/15/2013):V12.1.0(06/27/2012)   v16.1.0(10/15/2013)            no

1        fpga                                   2.07.00               2.07.00            no

Switch will be reloaded for disruptive upgrade.

Do you want to continue with the installation (y/n)?  [n] y