目录

简介

背景信息

问题

解决方案

简介

本文档介绍在Cisco ASR5000上执行同步传输模块(STM)/OC3卡切换所需的步骤。

背景信息

ASR5000上的STM1/OC3卡提供STM-1端口，因此需要特别小心处理。

的 STM-1 (级别1)是同步数字层次结构(SDH)ITU-T光纤网络传输标准。其比特率为155.52 Mb/s。

SDH与以太网不同，并且包含一些必须考虑的细节。

问题

该设置有一对STM1/OC3卡，配置了自动保护交换(APS)模式冗余 — 卡21和卡37。卡37处于活动状态，卡21处于备用状态。端口21/1和21/2处于关闭状态，APS工作。37/1和37/2端口已启用，并受APS保护。

card 21

redundancy aps-mode

aps 1+1 uni-directional non-revertive

framing sdh e1

initial-e1-framing crc4

service-type frame-relay

#exit

******** show card table all *******

Slot        Card Type                               Oper State   SPOF Attach

----------- -------------------------------------- ------------- ---- ------

21: LC      4 PORT STM1/OC3 Channelized Card       Standby          -    5

37: LC      4 PORT STM1/OC3 Channelized Card       Active          No    5

[local]gre2mme01# show aps info 37/1

Port :37/1

Role : Protected

Mode : 1+1

Revertive : No

State : Active

Direction : Uni

Wait To Restore(sec) : 0

Redundant Port : 21/1

Lockout : No

[local]gre2mme01# show aps info 21/1

Port :21/1

Role : Working

Mode : 1+1

Revertive : No

State : Standby

Direction : Uni

Wait To Restore(sec) : 0

Redundant Port : 37/1

Lockout : No

[local]mme01# show port table

Thursday March 08 11:20:20 CET 2018

Port  Role Type                      Admin   Oper Link State   Pair Redundant

----- ---- ------------------------ -------- ---- ---- ------- ----- ---------

21/1  Srvc STM1/OC3 Channelized     Enabled     - Down Standby 37/1 APS Workn

21/2  Srvc STM1/OC3 Channelized     Enabled     - Down Standby 37/2 APS Workn

37/1  Srvc STM1/OC3 Channelized     Enabled     - Up   Active 21/1 APS Protd

37/2  Srvc STM1/OC3 Channelized     Enabled     - Up   Active 21/2 APS Protd

在卡21和37之间执行切换的代表因“冗余模式错误”错误而失败。

[local]gre2mme01# card switch from 37 to 21

Friday March 09 00:28:10 CET 2018

Failure: wrong redundancy mode

解决方案

具有APS模式冗余的STM1/OC3卡不支持从X到Y的卡切换。

必须使用APS特定命令。

aps { clear slot#/port# | exercise slot#/port# | lockout slot#/port# | switch { force | manual } slot#/port# }

switch { force | manual } slot#/port#

Switch to either the working port or the protection port:

force: Forces a switch of ports, even if there is an active alarm state.

manual: Implements a switch of ports if there are no active alarms.

slot#/port# is the CLC2/OLC2 slot number (valid range is 17 - 48) and appropriate port number (CLC2 valid range is 1 - 4; OLC2 valid value is 1)

在本例中，问题通过以下方式解决：

aps switch manual 37/1

aps switch manual 37/2

注意：如果手动切换失败，可能是因为端口上的错误。使用“show aps port-status <card/slot>”验证端口状态。 切换仍然可以使用“force”选项强制进行。

[local]gre2mme01# show aps port-status 21/1

Friday March 09 13:19:49 CET 2018

Port                      : 21/1

Role                      : Working

Lockout                   : No

APS  Signal Failure       : No

APS  Signal Degrade       : No

Switch Over               : No

Far End Failiure          : No

Remote Not Compatible     : No

Current Command           : No Request

Switch Status             : No request

[local]gre2mme01#

[local]gre2mme01# show aps port-status 37/1

Friday March 09 13:20:07 CET 2018

Port                      : 37/1

Role                      : Protected

Lockout                   : No

APS  Signal Failure       : No

APS  Signal Degrade       : No

Switch Over               : No

Far End Failiure          : No

Remote Not Compatible     : No

Current Command           : No Request

Switch Status             : No request

Invalid K1 K2             : No

Rx K1                     : Reqest : 0x 0  (--              Channel - 0)

Rx K2                     : Status : 0x 0  (--              Channel - 0)

Tx K1                     : Reqest : 0x 0  (No Request      Channel - 0)

Tx K2                     : Status : 0x 4  (UNI,1+1         Channel - 0)