目录

简介

先决条件

要求

使用的组件

规则

为远程用户配置 CPE

网络图

逐步指导

配置 Telco NI2 DSLAM

将 HDLC 帧转换为 ATM 信元

针对 PPP 封装配置聚集器

配置帧中继

针对帧中继封装配置聚集器

排除 IDSL PPP 连接故障

故障排除命令

排除 IDSL 帧中继连接故障

故障排除命令

问题和 Bug

相关信息

简介

ISDN数字用户线路(IDSL)是未交换且不包含信令（D信道）的租用线路ISDN基本速率接口(BRI)。IDSL和ISDN BRI使用相同的2B1Q线路调制。在路由器上，这相当于在租用线路配置中放置BRI接口。您可以将线路的速度配置为64 kbps、128 kbps或144 kbps。

通过线路的帧是标准的高级数据链路控制(HDLC)帧。您可以为租用线路BRI接口配置PPP或帧中继封装。将BRI接口视为以慢速运行的同步串行端口。

先决条件

要求

要使用IDSL，需要以下项目：

- 支持isdn leased-line全局配置命令并具有BRI接口的路由器。

- 一种具有IDSL接口的数字用户线接入复用器(DSLAM)，以终止连接的另一端。

目前，思科有8个端口IDSL卡可用于Cisco 6160 DSLAM。计划支持6130 DSLAM。区别在于，Cisco 6130每个IDSL卡仅支持四个端口。

- 与DSLAM配置匹配的速度和封装。

IDSL DSLAM只有几种类型。因此，很容易连接到其他供应商的设备。

- 仅一根管道（64 kbps、128 kbps或144 kbps）。

思科不支持信道化为两个租用线路管道的BRI接口。

使用的组件

本文档中的信息基于以下软件和硬件版本：

- 思科804客户端设备(CPE)IOS ®软件版本12.0(7)T

- 思科6400 UAC节点路由处理器(NRP)IOS软件版本12.0(7)DC

- 思科6400 UAC节点交换处理器(NSP)IOS软件版本12.0(4)DB

- Cisco 6130 DSLAM-NI2 IOS软件版本12.1(1)DA

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

为远程用户配置 CPE

本节介绍如何为远程用户配置CPE。

在此部分，您可以看到本文所描述功能的配置信息。

注意：要查找有关本文档中使用的命令的其他信息，请使用命令查找工具(仅注册客户)。

网络图

本文档使用以下网络设置：

逐步指导

要为路由器配置IDSL的BRI接口，请完成以下步骤：

1. 添加以下命令：

isdn leased-line bri [#] [128|144]

!

interface bri [#]

no shut

!

此时，线路会接通，但线路协议（如串行端口）不会接通。

请勿发出show isdn status命令。因为没有D信道，所以这无关紧要。它有时显示第1层未关闭时处于关闭状态。

2. 发出show int bri[#]命令，并遵循串行接口的线路协议和线路状态规则。

3. 添加PPP或帧中继配置。

此示例显示PPP配置：

isdn leased-line bri 0 128

!

username b-nrp password 0 cisco

!--- b-nrp is the username assigned to the ISDN router !--- to authenticate with the ISP. !--- cisco is the password assigned to the ISDN router !--- to authenticate with the ISP.

!

!

interface BRI0

ip address 7.7.7.2 255.255.255.0

encapsulation ppp

ppp authentication chap

!

以下两个示例显示帧中继配置。确保使用Internet工程任务组(IETF)封装。

示例 1

!

interface BRI0/0

ip address 10.0.0.1 255.255.255.0

no ip directed-broadcast

encapsulation frame-relay IETF

fair-queue 64 16 0

frame-relay map ip 10.0.0.2 300 broadcast IETF

frame-relay lmi-type ansi

!

示例 2

!

interface BRI0/0

no ip address

no ip directed-broadcast

encapsulation frame-relay IETF

fair-queue 64 16 0

frame-relay lmi-type ansi

!

interface BRI0/0.300 point-to-point

ip address 10.0.0.2 255.255.255.0

no ip directed-broadcast

frame-relay interface-dlci 300 IETF

!

注意：请记住，没有信令、拨号器接口、拨号器列表、拨号器字符串和拨号器映射。这是一条专用线路，如专用T1串行线路。唯一的区别是2B1Q调制代替了V.35，后者用于数据服务单元/信道服务单元(DSU/CSU)。

如果线路协议未启用PPP，请发出以下debug命令：

- debug ppp negotiation

- debug ppp authentication

- debug ppp error

配置 Telco NI2 DSLAM

NI2 DSLAM配置假设DSL和ATM配置知识，包括ATM上的PPP(PPPoA)。 IDSL配置比非对称数字用户线(ADSL)或单线数字用户线(SDSL)设置更深入。

要在DSLAM中使用IDSL卡，需要Cisco IOS软件版本12.1(2)DA或更高版本。

在DSLAM上，ADSL和SDSL接口在配置中显示为ATM接口。ADSL和SDSL的思科实施使用ATM。但是，IDSL使用HDLC帧来传输数据。因此，接口在配置中显示为IDSL接口。

对于Cisco 6160 DSLAM中的一个IDSL卡，配置类似于以下输出：

!

interface IDSL3/1

no ip address

no logging event link-status

no arp frame-relay

!

interface IDSL3/2

no ip address

no logging event link-status

no arp frame-relay

!

interface IDSL3/3

no ip address

no logging event link-status

no arp frame-relay

!

interface IDSL3/4

no ip address

no logging event link-status

no arp frame-relay

!

interface IDSL3/5

no ip address

no logging event link-status

no arp frame-relay

!

interface IDSL3/6

no ip address

no logging event link-status

no arp frame-relay

!

interface IDSL3/7

no ip address

no logging event link-status

no arp frame-relay

!

interface IDSL3/8

no ip address

no logging event link-status

no arp frame-relay

!

注意：NI1 DSLAM平台不支持IDSL，并且没有提供此支持的计划。

将 HDLC 帧转换为 ATM 信元

对于每个IDSL接口，都有一个伪ATM接口。在硬件上，HDLC帧在通过NI2 ATM交换矩阵交换之前会转换为ATM信元。

对于PPP，定义具有目标虚拟路径标识符(VPI)和虚拟通道标识符(VCI)的永久虚电路(PVC)。源VCI/VPI不是必需的，因为PPP只有一个连接。

对于帧中继，请设置16条PVC，这些PVC会转换为16条数据链路连接标识符(DLCI)。 配置包括提供源DLCI号和目的VPI/VCI对。

DSL配置有两个主要步骤。对于PPP配置，它们是：

1. 设置IDSL DSL配置文件。

2. 在IDSL接口下设置PVC/SVC。

此外，为IDSL链路设置服务质量(QoS)，以便正确使用到IDSL端口的ATM资源。计算ATM成帧的开销。此表显示您需要为等效IDSL比特率配置的最大ATM峰值信元速率/可持续信元速率(PCR/SCR)。

已配置IDSL比特率(kbps)

最大ATM PCR/SCR(kbps)

56

71

64

81

128

163

144

183

以下PPP选项可用于IDSL配置文件：

idsl bitrate [56 | 64 | 128 | 144]

idsl encapsulation [cisco-ppp | llc-ppp | mux-ppp ]

比特率必须与CPE的比特率匹配。封装指定在聚合器终止的PPPoA封装类型。

以下语法用于创建连接到IDSL PPP终端的PVC:

ppp pvc interface atm 0/x [VPI] [VCI]

没有输入PVC，因为PPP链路只有一个连接。ATM 0/x是从DSLAM到聚合器的ATM管道。

要设置QoS参数，请使用此全局命令。使用PCR/SCR表进行pcr和scr10值。

atm connection-traffic-table-row index [row #] vbr-nrt pcr [#] scr10 [#]

要将这些值应用于IDSL PVC，请将ppp pvc interface atm 0/x [VPI] [VCI]更改为ppp pvc interface atm 0/x [VPI] [VCI] rx-cttr [row #] tx-cttr [row #]。

对聚合器使用128 Kbps和llc-ppp封装的PPP IDSL配置是：

atm connection-traffic-table-row index 128 vbr-nrt

pcr 163 scr10 163

!

dsl-profile idsl1

idsl encapsulation llc-ppp

!--- 128 kbps is the default.

!

!

interface IDSL3/1

dsl profile idsl1

ppp pvc interface ATM0/1 3 300 rx-cttr 128 tx-cttr 128

!

针对 PPP 封装配置聚集器

如果在IDSL配置文件下为encapsulation llc-ppp配置了DSLAM（或者未为封装设置任何内容，因为这是默认设置），则聚合器需要具有以下配置：

!

interface ATM0/0/0.300 point-to-point

no ip directed-broadcast

pvc 3/300

encapsulation aal5snap

protocol ppp Virtual-Template10

!

!

如果DSLAM配置为封装cisco-ppp，请将配置更改为：

!

interface ATM0/0/0.300 point-to-point

no ip directed-broadcast

pvc 3/300

encapsulation aal5ciscoppp Virtual-Template10

!

!

如果为IDSL封装mux-ppp配置了DSLAM，请确保聚合器上的配置为：

!

interface ATM0/0/0.300 point-to-point

no ip directed-broadcast

pvc 3/300

encapsulation aal5mux ppp Virtual-Template10

!

!

配置帧中继

对于帧中继配置，两个主要步骤与PPP配置相同。

1. 设置IDSL DSL配置文件。

2. 在IDSL接口下设置PVC/SVC。

对于帧中继链路上的QoS，无需特殊转换。设置连接表行中的最大速率，使其与CPE上定义的带宽相匹配。

对于IDSL配置文件，以下是帧中继的选项：

idsl bitrate [56 | 64 | 128 | 144]

idsl frame-relay ?

bc-default   Default Bc in bytes

lmi-n392dce  LMI error threshold

lmi-n393dce  set LMI monitored event count

lmi-t392dce  set DCE polling verification timer

lmi-type     Use CISCO-ANSI-CCITT type LMI

upc-intent   UPC to use on Soft-VCs/PVCs

要启用帧中继封装，您还必须添加idsl encapsulation frame-relay命令。

此语法创建连接到IDSL帧中继终端的PVC:

frame-relay pvc [DLCI] service translation interface atm0/1 [VPI] [VCI]

还有一个透明参数，本文档中未讨论。translation关键字将定义的帧中继DLCI转换为定义的ATM PVC。ATM PVC是AAL5SNAP PVC。

要设置QoS参数，请使用以下全局命令：

frame-relay connection-traffic-table-row index [row #] [CIR] [Burst] [PIR] vbr-rt

通常，CIR=PIR等于链路的IDSL配置文件中定义的带宽。突发速率通常最大为32,768 bps。

要将这些值应用于IDSL PVC，请将frame-relay pvc [DLCI] service translation interface atm0/1 [VPI] [VCI] 更改为frame-relay pvc [DLCI] rx-cttr [Row #] tx-cttr [Row #] service translation interface atm0/1 [VPI]VCI]。

使用128 Kbps和lmi类型ANSI的帧中继IDSL配置为：

!

dsl-profile idslframe

idsl encapsulation frame-relay

idsl frame-relay lmi-type ansi

!

frame-relay connection-traffic-table-row index 128 128000 32768

128000 vbr-rt

!

!

interface IDSL2/2

no ip address

dsl profile idslframe

no arp frame-relay

frame-relay pvc 300 rx-cttr 128 tx-cttr 128 service translation

interface  ATM0/1 3 300

!

针对帧中继封装配置聚集器

对于CPE端的帧中继封装，DSLAM将帧中继PVC转换为ATM PVC。ATM PVC封装在AAL5SNAP中。

对于路由的帧中继PVC:

!

interface ATM0/0/0.300 point-to-point

ip address 10.0.0.1 255.255.255.0

pvc 3/300

encapsulation aal5snap

protocol ip (inarp) broadcast

!

!

与插入DSLAM机箱的其他卡类似，IDSL卡可能需要在NI2配置中手动指定。

DSLAM(config)#slot 2 ituc-1-8IDSL

插入IDSL卡后，发出show oir status命令以显示下载到卡的代码的状态。

DSLAM#show oir status 2

Slot 2: timer stopped delay 100

last heard 30348 ms ago, last sent 30348 ms ago

Slot 2: loading. . .         current offset 0x1CFD1, done at 0xBF858

此日志输出已显示。

00:04:20: %SLOT-3-MODULE_DETECTED: CLEAR INFO Slot 2 Module was

detected

00:04:45: %SLOT-3-MODULE_MISSING: CLEAR MAJOR Slot 2 Provisioned

slot is empty

00:04:45: %SLOT-3-MODULE_DETECTED: ASSERT INFO Slot 2 Module was

detected

00:04:48: %LINK-3-UPDOWN: Interface IDSL2/1 to IDSL2/8, changed

state to down

DSLAM#show hardware

Chassis Type: C6160

Slot 1 : STUC-4-2B1Q-DIR-1                      Slot 18: EMPTY

Slot 2 : ITUC-1-8IDSL                           Slot 19: EMPTY

Slot 3 : EMPTY                                  Slot 20: EMPTY

Slot 4 : EMPTY                                  Slot 21: EMPTY

Slot 5 : EMPTY                                  Slot 22: EMPTY

Slot 6 : EMPTY                                  Slot 23: EMPTY

Slot 7 : EMPTY                                  Slot 24: EMPTY

Slot 8 : EMPTY                                  Slot 25: EMPTY

Slot 9 : EMPTY                                  Slot 26: EMPTY

Slot 10: NI-2-155SM-DS3                         Slot 27: EMPTY

Slot 11: EMPTY                                  Slot 28: EMPTY

Slot 12: EMPTY                                  Slot 29: EMPTY

Slot 13: EMPTY                                  Slot 30: EMPTY

Slot 14: EMPTY                                  Slot 31: EMPTY

Slot 15: EMPTY                                  Slot 32: EMPTY

Slot 16: EMPTY                                  Slot 33: EMPTY

Slot 17: EMPTY                                  Slot 34: EMPTY

Fan Module:  Present

Power Supply Module 1:  Present   2:  Not Present

排除 IDSL PPP 连接故障

本节提供可用于排除配置故障的信息。

故障排除命令

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

注意：在发出debug命令之前，请参阅有关debug命令的重要信息。

- debug ppp negotiation — 监控PPP协商事件。

- debug ppp authentication — 确定客户端是否通过身份验证。

- show dsl interface idsl 2/2 — 显示IDSL和连接统计信息。

- show atm vc interface — 显示IDSL接口后面的伪ATM接口。

- show users — 显示有关活动用户的信息。

要排除IDSL PPP连接故障，请发出debug ppp negotiation和debug ppp authentication命令。对于活动连接，这是show users命令的输出

Router#show users

Line       User      Host(s)             Idle       Location

*  0 con 0              idle                00:00:00

Interface   User      Mode                Idle Peer Address

BR0/0         b-nrp   Sync PPP        00:00:03 10.0.0.2

在DSLAM上，这些命令显示IDSL统计信息和连接统计信息。

DSLAM#show dsl interface idsl 2/2

Port Status:

Subscriber Name:         Circuit ID:

IOS admin: UP     oper: UP    Card status: ITUC-1-8IDSL

Last Change: 00 days, 00 hrs, 07 min, 13 sec  No. of changes: 1

Loopback: none

Firmware version: 961170635

BERT has not been executed on this interface

Configured:

Profile Name:   default

Alarms Enabled: NO

IDSL profile parameters

Bitrate:             128 kbit/sec

Encapsulation:       llc-ppp

Frame Relay parameters:

UPC intent:       pass

Bc default:       32768 bytes

LMI type:         cisco

lmi-n392dce:      2 events

lmi-n393dce:      2 events

lmi-t392dce:      15 seconds

Performance Statistics:

Physical layer

Coding violations        : 0

Errored seconds          : 0

Severely errored seconds : 0

Physical layer (far end)

Coding violations        : 0

Errored seconds          : 0

Severely errored seconds : 0

HDLC layer

Coding violations        : 0

Aborts                   : 0

Aligns                   : 0

Shorts                   : 5

Longs                    : 0

Discards                 : 42

Alarm Status: NONE

请注意，每个IDSL接口后面都有一个关联的伪ATM接口。

DSLAM#show atm vc interface atm-p 2/2

Interface     VPI   VCI   Type   X-Interface  X-VPI  X-VCI   Encap

Status

ATM-P2/2      0    37     PVC     ATM0/1        3      300     UP

DSLAM#show atm vc interface atm-p 2/2 0 37

Interface: ATM-P2/2, Type: ATM-PSEUDO

VPI = 0  VCI = 37

Status: UP

Time-since-last-status-change: 00:02:24

Connection-type: PVC

Cast-type: point-to-point

Packet-discard-option: disabled

Usage-Parameter-Control (UPC): pass

Number of OAM-configured connections: 0

OAM-configuration: disabled

OAM-states:  Not-applicable

Cross-connect-interface: ATM0/1, Type: suni_dual

Cross-connect-VPI = 3

Cross-connect-VCI = 300

Cross-connect-UPC: pass

Cross-connect OAM-configuration: disabled

Cross-connect OAM-state:  Not-applicable

Rx cells: 27, Tx cells: 0

Rx connection-traffic-table-index: 128

Rx service-category: VBR-NRT (Non-Realtime Variable Bit Rate)

Rx pcr-clp01: 163

Rx scr-clp01: 163

Rx mcr-clp01: none

Rx      cdvt: none

Rx       mbs: 1024 (from default for interface)

Tx connection-traffic-table-index: 128

Tx service-category: VBR-NRT (Non-Realtime Variable Bit Rate)

Tx pcr-clp01: 163

Tx scr-clp01: 163

Tx mcr-clp01: none

Tx      cdvt: none

Tx       mbs: none

您还可以从另一侧（从聚合器到CPE）查看PVC。

DSLAM#show atm vc interface atm 0/1 3 300

Interface: ATM0/1, Type: suni_dual

VPI = 3  VCI = 300

Status: UP

Time-since-last-status-change: 00:03:20

Connection-type: PVC

Cast-type: point-to-point

Packet-discard-option: disabled

Usage-Parameter-Control (UPC): pass

Number of OAM-configured connections: 0

OAM-configuration: disabled

OAM-states:  Not-applicable

Cross-connect-interface: ATM-P2/2, Type: ATM-PSEUDO

Cross-connect-VPI = 0

Cross-connect-VCI = 37

Cross-connect-UPC: pass

Cross-connect OAM-configuration: disabled

Cross-connect OAM-state:  Not-applicable

Rx cells: 0, Tx cells: 68

Rx connection-traffic-table-index: 128

Rx service-category: VBR-NRT (Non-Realtime Variable Bit Rate)

Rx pcr-clp01: 163

Rx scr-clp01: 163

Rx mcr-clp01: none

Rx      cdvt: none

Rx       mbs: 1024 (from default

for interface)

Tx connection-traffic-table-index: 128

Tx service-category: VBR-NRT (Non-Realtime Variable Bit Rate)

Tx pcr-clp01: 163

Tx scr-clp01: 163

Tx mcr-clp01: none

Tx      cdvt: none

Tx       mbs: none

排除 IDSL 帧中继连接故障

本节提供可用于排除配置故障的信息。

故障排除命令

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

注意：在发出debug命令之前，请参阅有关debug命令的重要信息。

- show frame lmi — 显示有关本地管理接口(LMI)的统计信息。

- debug frame lmi — 确定LMI数据包是否正确发送和接收。

- show frame-relay pvc — 显示帧中继接口的PVC统计信息。

- show frame map — 显示当前映射条目和有关连接的信息。

- show frame-relay interface resource — 显示QoS参数。

- show interface idsl — 显示帧中继统计信息。

- show atm vc interface — 显示IDSL接口后面的伪ATM接口。

要排除IDSL BRI端口连接故障，请使用用于排除串行端口故障的相同命令。

Router#show frame lmi

!--- Check for status messages received and Enq. sent.

LMI Statistics for interface BRI0/0 (Frame Relay DTE) LMI TYPE = CISCO

Invalid Unnumbered info 0             Invalid Prot Disc 0

Invalid dummy Call Ref 0              Invalid Msg Type 0

Invalid Status Message 0              Invalid Lock Shift 0

Invalid Information ID 0              Invalid Report IE Len 0

Invalid Report Request 0              Invalid Keep IE Len 0

Num Status Enq. Sent 71               Num Status msgs Rcvd 0

Num Update Status Rcvd 0              Num Status Timeouts 70

超时表示没有来自NI2交换机的通信。

要进行调试，请发出debug frame lmi命令，其方式与用于串行接口的方式相同。您还可以发出show frame-relay pvc和show frame map命令。

Router#show frame lmi

LMI Statistics for interface BRI0/0 (Frame Relay DTE) LMI TYPE = ANSI

Invalid Unnumbered info 0             Invalid Prot Disc 0

Invalid dummy Call Ref 0              Invalid Msg Type 0

Invalid Status Message 0              Invalid Lock Shift 0

Invalid Information ID 0              Invalid Report IE Len 0

Invalid Report Request 0              Invalid Keep IE Len 0

Num Status Enq. Sent 17               Num Status msgs Rcvd 18

Num Update Status Rcvd 0              Num Status Timeouts 0

Router#show frame-relay pvc

PVC Statistics for interface BRI0/0 (Frame Relay DTE)

Active      Inactive      Deleted      Static

Local         1            0             0            0

Switched      0            0             0            0

Unused        0            0             0            0

DLCI = 300, DLCI USAGE = LOCAL, PVC STATUS = ACTIVE, INTERFACE = BRI0/0

input pkts 0             output pkts 0            in bytes 0

out bytes 0              dropped pkts 0           in FECN pkts 0

in BECN pkts 0           out FECN pkts 0          out BECN pkts 0

in DE pkts 0             out DE pkts 0

out bcast pkts 0         out bcast bytes 0

pvc create time 00:02:30, last time pvc status changed 00:02:30

Router#show frame map

BRI0/0 (up): ip 10.0.0.2 dlci 300(0x12C,0x48C0), static,

broadcast,

IETF, status defined, active

在DSLAM端，您还可以发出show frame lmi命令。

DSLAM#show frame-relay lmi interface idsl2/2

LMI Statistics for interface IDSL2/2 (Frame Relay DCE) LMI TYPE = ANSI

Invalid Unnumbered info 0             Invalid Prot Disc 0

Invalid dummy Call Ref 0              Invalid Msg Type 0

Invalid Status Message 0              Invalid Lock Shift 0

Invalid Information ID 0              Invalid Report IE Len 0

Invalid Report Request 0              Invalid Keep IE Len 0

Num Status Enq. Rcvd 2                Num Status msgs Sent 2

Num Update Status Sent 0              Num St Enq. Timeouts 0

要查看QoS参数，请发出show frame-relay interface resource 命令。

DSLAM#show frame-relay interface resource idSL 2/1

Encapsulation: FRAME-RELAY

Resource Management state:

Available bit rates (in bps):

128000 vbr-nrt RX, 128000 vbr-nrt TX

128000 vbr-rt RX,  128000 vbr-rt TX

128000 ubr RX,

128000 ubr TX

Allocated bit rates (in bps):

0 vbr-nrt RX, 0 vbr-nrt TX

0 vbr-rt RX,  0 vbr-rt TX

0 ubr RX,     0 ubr TX

当接口配置为帧中继模式时，请发出show interface idsl命令以显示帧中继统计信息。

DSLAM#show interface idsl2/2

IDSL2/2 is up, line protocol is up

Hardware is idsl

MTU 1500 bytes, BW 128 Kbit, DLY 0 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation FRAME-RELAY IETF, loopback not set

Keepalive set (10 sec)

LMI enq sent  0, LMI stat recvd 0, LMI upd recvd 0

LMI enq recvd 8, LMI stat sent  8, LMI upd sent  0, DCE LMI up

LMI DLCI 0  LMI type is ANSI Annex D  frame relay DCE

Broadcast queue 0/64, broadcasts sent/dropped 0/0, interface broadcasts 0

Last input 00:00:03, output 00:00:03, output hang never

Last clearing of "show interface" counters 00:01:20

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

8 packets input, 112 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

8 packets output, 117 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

DSLAM#show dsl interface idsl 2/2

Port Status:

Subscriber Name:           Circuit ID:

IOS admin: UP      oper: UP    Card status: ITUC-1-8IDSL

Last Change: 00 days, 00 hrs, 06 min, 09 sec  No. of changes: 64

Loopback: none

Firmware version: 961170635

BERT has not been executed on this interface

Configured:

Profile Name:   idslframe

Alarms Enabled: NO

IDSL profile parameters

Bitrate:            128 kbit/sec

Encapsulation:      frame-relay

Frame Relay parameters:

UPC intent:      pass

Bc default:      32768 bytes

LMI type:        ansi

lmi-n392dce:     2 events

lmi-n393dce:     2 events

lmi-t392dce:     15 seconds

Performance Statistics:

Physical layer

Coding violations        : 0

Errored seconds          : 0

Severely errored seconds : 0

Physical layer (far end)

Coding violations        : 0

Errored seconds          : 0

Severely errored seconds : 0

HDLC layer

Coding violations        : 0

Aborts                   : 0

Aligns                   : 0

Shorts                   : 0

Longs                    : 0

Discards                 : 0

Alarm Status: NONE

DSLAM#show atm vc interface atm-p 2/2

Interface     VPI   VCI   Type   X-Interface  X-VPI X-VCI   Encap

Status

ATM-P2/2      0    37     PVC     ATM0/1        3     300    UP

DSLAM#show atm vc interface atm-p 2/2 0 37

Interface: ATM-P2/2, Type: ATM-PSEUDO

VPI = 0  VCI = 37

Status: UP

Time-since-last-status-change: 00:06:59

Connection-type: PVC

Cast-type: point-to-point

Packet-discard-option: disabled

Usage-Parameter-Control (UPC): pass

Number of OAM-configured connections: 2

OAM-configuration: Ais-on

OAM-states:  OAM-Up

OAM-Loopback-Tx-Interval: 5

Cross-connect-interface: ATM0/1, Type: suni_dual

Cross-connect-VPI = 3

Cross-connect-VCI = 300

Cross-connect-UPC: pass

Cross-connect OAM-configuration: Ais-on

Cross-connect OAM-state:  OAM-Up

OAM-Loopback-Tx-Interval: 5

Rx cells: 0, Tx cells: 0

Rx connection-traffic-table-index: 100

Rx service-category: VBR-NRT (Non-Realtime Variable Bit Rate)

Rx pcr-clp01: 106

Rx scr-clp0 : 106

Rx mcr-clp01: none

Rx      cdvt: none

Rx       mbs: 50

Tx connection-traffic-table-index: 100

Tx service-category: VBR-NRT (Non-Realtime Variable Bit Rate)

Tx pcr-clp01: 106

Tx scr-clp0 : 106

Tx mcr-clp01: none

Tx      cdvt: none

Tx       mbs: 50

问题和 Bug

IDSL的Cisco 800系列不支持帧中继上的PPP。

如果希望将Cisco路由器用于IDSL应用，并且路由器运行早于12.1的Cisco IOS软件版本，则必须配置ISDN交换机类型。有关详细信息，请参阅配置思科路由器以与IDSL一起使用。

如果不配置ISDN交换机类型，则路由器的BRI接口在IDSL线路关闭并备份后可能不会恢复。为防止此问题，请在全局配置模式下发出isdn switch-type basic-ni命令。

如果思科路由器运行Cisco IOS软件版本12.1或更高版本，则不会出现此问题。

相关信息

- Cisco DSL技术支持信息

- Cisco DSL产品支持信息

- 技术支持和文档 - Cisco Systems