Contents

Introduction

Prerequisites

Requirements

Components Used

Conventions

Configure

Network Diagram

配置

Verify

Troubleshoot

故障排除命令

Related Information

Introduction

本文解释如何支持通过以太网接口被连接的Cisco IOS路由器的一个以太网点对点协议(PPPoE)客户端到DSL调制解调器或DSL客户端前置设备(CPE)另一个供应商。

ISP经常提供他们的用户有一个以太网接口连接到用户以太网段的DSL调制解调器和另一个接口为DSL线路连通性。在这种情况下，如果CPE为任何IP连通性或增强的功能不是可配置的在DSL， DSL调制解调器只作为网桥。这对一个PPPoE客户端PC只限制您的连接。增加Cisco IOS路由器被连接到DSL调制解调器的以太网，您能运行在Cisco路由器的PPPoE客户端IOS功能。这能连接在以太网段的多台PC被连接到Cisco IOS路由器。使用使用Cisco IOS路由器，您能提高您的DSL连接和所有IOS功能，例如安全、网络地址转换(NAT)和动态主机配置协议(DHCP)到内部主机。

PPPoE功能允许您起动在一个简单的桥接以太网连接的客户端的一次PPP会话。会话在ATM链路被传输通过被封装的以太网桥接帧。您能终止会话在市话运营商中心局或ISP Point of Presence。

Prerequisites

Requirements

There are no specific requirements for this document.

Components Used

本文档中的信息基于以下软件和硬件版本：

- Cisco 827-4V CPE IOS软件版本12.1(1)XB

- 运行Cisco IOS Software Release 12.2(2)T1镜像的Cisco 2611路由器

- 运行Cisco IOS Software Release 12.1(5)DC1镜像的Cisco 6400通用接入集中器(UAC)

The information in this document was created from the devices in a specific lab environment.All of the devices used in this document started with a cleared (default) configuration.If your network is live, make sure that you understand the potential impact of any command.

Conventions

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

Configure

在此部分，向您介绍用于的信息为了配置在本文描述的功能。

Note: 要查找有关本文档中所使用的命令的详细信息，请使用命令查找工具（仅限注册用户）。

Network Diagram

本文档使用此图所示的网络设置。

Note: 在本文中， PPPoE客户端连接从Cisco路由器首次。这是在此配置的Cisco 2611路由器。Cisco 827路由器在图表中表示非Cisco的DSL CPE。

配置

本文档使用以下配置。

- 2611 路由器

- Cisco DSL 827路由器

- Cisco 6400 Router

2611 路由器

!

hostname pooh

ip host rund 172.17.247.195

!

ip subnet-zero

no ip domain-lookup

!

vpdn enable

no vpdn logging

!

vpdn-group 1

request-dialin

protocol pppoe

!

!

!

!

interface Ethernet0/0

ip address 10.200.56.22 255.255.255.0

ip nat inside

no ip mroute-cache

!

!

!

!

interface Ethernet0/1

no ip address

pppoe enable

pppoe-client dial-pool-number 1

!

interface Dialer1

ip address negotiated

ip nat outside

ip mtu 1492

encapsulation ppp

no ip mroute-cache

dialer pool 1

dialer-group 1

ppp authentication pap

ppp pap sent-username cisco password cisco1

!

ip classless

no ip http server

!

dialer-list 1 protocol ip permit

ip nat inside source list 1 interface Dialer1 overload

ip route 0.0.0.0 0.0.0.0 dialer1

access-list 1 permit 10.200.56.0 0.0.0.255

!

line con 0

exec-timeout 0 0

transport input none

line vty 0 4

login

password ww

!

end

Cisco DSL 827路由器

Building configuration...

Current configuration : 821 bytes

!

version 12.2

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname Chansey

!

!

ip subnet-zero

no ip domain-lookup

!

!

!

interface Ethernet0

no ip address

bridge-group 1

!

interface ATM0

no ip address

no atm ilmi-keepalive

bundle-enable

bridge-group 1

dsl operating-mode auto

!

interface ATM0.1 point-to-point

pvc 53/53

!--- vpi/vci given by the ISP

!

!

ip classless

ip http server

!

bridge 1 protocol ieee

!

line con 0

exec-timeout 0 0

stopbits 1

line vty 0 4

exec-timeout 0 0

password ww

login local

!

scheduler max-task-time 5000

end

Cisco 6400 Router

Current configuration : 3231 bytes

!

version 12.1

no service single-slot-reload-enable

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname alyssa_nrp1

!

logging rate-limit console 10 except errors

aaa new-model

aaa authentication ppp default local

enable password ww

!

username cisco password  cisco1

redundancy

main-cpu

auto-sync standard

no secondary console enable

ip subnet-zero

ip cef

vpdn enable

no vpdn logging

!

vpdn-group cisco

accept-dialin

protocol pppoe

virtual-template 2

!

!

!

!

!

!

!

interface Loopback5

ip address 212.93.195.100 255.255.255.0

!

!

interface ATM0/0/0

no ip address

no ip mroute-cache

load-interval 30

atm pvc 16 0 16 ilmi

no atm ilmi-keepalive

pvc 10/100

!

hold-queue 1000 in

!

interface ATM0/0/0.60 multipoint

pvc 6/60

encapsulation aal5snap

protocol pppoe

!

!

interface Ethernet0/0/1

no ip address

!

interface Ethernet0/0/0

ip address 10.200.56.8 255.255.255.0

!

interface FastEthernet0/0/0

no ip address

full-duplex

!

!

interface Virtual-Template2

ip unnumbered Loopback5

ip mtu 1492

no ip route-cache cef

peer default ip address pool nrp1

ppp authentication pap

!

ip local pool nrp1 212.93.198.1

ip classless

!

!

line con 0

exec-timeout 0 0

password ww

transport input none

line aux 0

line vty 0 4

exec-timeout 0 0

password ww

!

!

end

Verify

本部分提供了可用于确认您的配置是否正常运行的信息。

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

- show vpdn session全显示VPDN会话信息。此信息包括接口、隧道、用户名、信息包、状态和窗口统计数据。

- show interface ethernet 0/1 —显示关于以太网接口的信息在路由器。

- show interfaces dialer 1 —显示关于拨号程序的信息在路由器。

- show ip local pool nrp1 —显示关于ip local pool的信息。

- show ip route —显示关于IP路由的信息在路由器。

这是在Cisco 2611的show vpdn session all命令输出。

pooh#show vpdn session all

%No active L2TP tunnels

%No active L2F tunnels

%No active PPTP tunnels

PPPoE Session Information Total tunnels 1 sessions 1

session id: 1

!--- Local MAC address.

local MAC address: 0030.9424.af21,

remote MAC address: 0050.736f.4c37

virtual access interface: Vi1, outgoing interface: Et0/1

599 packets sent, 599 received

9202 bytes sent, 8154 received

!--- Verify that the outgoing interface for the PPPoE session !--- is Ethernet0/1 and the local MAC address that displays is the !--- MAC address of Ethernet0/1. The remote MAC address that displays !--- is the MAC address of the Aggregator device (6400). !--- You can see it on the 6400 as the local MAC address in the !--- show vpdn session on the 6400.

这是在Cisco 2611的show interface ethernet 0/1命令输出。

pooh#show interface ethernet 0/1

Ethernet0/1 is up, line protocol is up

Hardware is AmdP2, address is 0030.9424.af21 (bia 0030.9424.af21

MTU 1500 bytes, BW 10000 Kbit, DLY 1000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Keepalive set (10 sec)

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:00:40, output 00:00:01, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

739 packets input, 64127 bytes, 0 no buffer

Received 57 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 input packets with dribble condition detected

1153 packets output, 89766 bytes, 0 underruns(1/0/0)

0 output errors, 1 collisions, 1 interface resets

0 babbles, 0 late collision, 2 deferred

0 lost carrier, 0 no carrier

0 output buffer failures, 0 output buffers swapped out

这是在Cisco 2611的show interfaces dialer 1命令输出。

pooh#show interfaces dialer 1

Dialer1 is up, line protocol is up (spoofing)

Hardware is Unknown

Internet address is 212.93.198.1/32

MTU 1500 bytes, BW 56 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

DTR is pulsed for 1 seconds on reset

Interface is bound to Vi1

Last input never, output never, output hang never

Last clearing of "show interface" counters 01:38:43

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations  0/0/16 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 42 kilobits/sec

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

403 packets input, 6082 bytes

403 packets output, 6978 bytes

Bound to:

Virtual-Access1 is up, line protocol is up

Hardware is Virtual Access interface

MTU 1500 bytes, BW 100000 Kbit, DLY 100000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

Interface is bound to Di1 (Encapsulation PPP)

LCP Open

Listen: CDPCP

Open: IPCP

Last input 00:00:09, output never, output hang never

Last clearing of "show interface" counters 00:35:16

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

430 packets input, 6453 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

430 packets output, 7400 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

这是在Cisco 6400的show vpdn session all命令输出。

alyssa_nrp1#show vpdn session  all

%No active L2TP tunnels

%No active L2F tunnels

%No active PPTP tunnels

PPPoE Session Information Total tunnels 1 sessions 1

session id: 1

local MAC address: 0050.736f.4c37, remote MAC address: 0030.9424.af21

virtual access interface: Vi3, outgoing interface: AT0/0/0, vc: 6/60

495 packets sent, 494 received

7369 bytes sent, 7346 received

这是在Cisco 6400的show ip local pool nrp1命令输出。

alyssa_nrp1#show ip local pool nrp1

Pool                     Begin           End             Free  In use

nrp1                    212.93.198.1    212.93.198.1       0       1

Available addresses:

None

Inuse addresses:

212.93.198.1       Vi3                         nrp1

这是在Cisco 6400的show ip route命令输出。

alyssa_nrp1#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 0.0.0.0 to network 0.0.0.0

212.93.198.0/32 is subnetted, 1 subnets

C       212.93.198.1 is directly connected, Virtual-Access3

!--- You have to see the installed route for the remote PPPoE session.

C    212.93.195.0/24 is directly connected, Loopback5

10.0.0.0/8 is variably subnetted, 3 subnets, 2 masks

C       10.200.56.0/24 is directly connected, Ethernet0/0/0

Troubleshoot

本部分提供的信息可用于对配置进行故障排除。

故障排除命令

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

Note: 在发出 debug 命令之前，请参阅有关 debug 命令的重要信息。

- show debugging —显示关于路由器的调试信息。

这是在Cisco 2611的show debugging命令输出。

pooh#show debugging

PPP:

PPP protocol negotiation debugging is on

VPN:

PPPoE protocol events debugging is on

PPPoE control packets debugging is on

01:54:21:  Sending PADI: Interface = Ethernet0/1

01:54:21: pppoe_send_padi:

FF FF FF FF FF FF 00 30 94 24 AF 21 88 63 11 09

00 00 00 0C 01 01 00 00 01 03 00 04 82 2E 39 F0

00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 ...

01:54:21: PPPoE 0: I PADO L:0030.9424.af21 R:0050.736f.4c37 Et0/1

00 30 94 24 AF 21 00 50 73 6F 4C 37 88 63 11 07

00 00 00 2F 01 01 00 00 01 03 00 04 82 2E 39 F0

01 02 00 0B 61 6C 79 73 73 61 5F 6E 72 70 31 ...

01:54:23:  PPPOE: we've got our pado and the pado timer went off

01:54:23: OUT PADR from PPPoE tunnel

00 50 73 6F 4C 37 00 30 94 24 AF 21 88 63 11 19

00 00 00 2F 01 01 00 00 01 03 00 04 82 2E 39 F0

01 02 00 0B 61 6C 79 73 73 61 5F 6E 72 70 31 ...

01:54:23: PPPoE 1: I PADS L:0030.9424.af21 R:0050.736f.4c37 Et0/1

00 30 94 24 AF 21 00 50 73 6F 4C 37 88 63 11 65

00 01 00 2F 01 01 00 00 01 03 00 04 82 2E 39 F0

01 02 00 0B 61 6C 79 73 73 61 5F 6E 72 70 31 ...

01:54:23: IN PADS from PPPoE tunnel

01:54:23: Vi1 Debug: Condition 1, interface Di1 triggered, count 1

01:54:23: %DIALER-6-BIND: Interface Vi1 bound to profile Di1

01:54:23: PPPoE: Virtual Access interface obtained.

01:54:23: %LINK-3-UPDOWN: Interface Virtual-Access1, changed state to up

01:54:23: Vi1 PPP: Treating connection as a callout

01:54:23: Vi1 PPP: Phase is ESTABLISHING, Active Open [0 sess, 0 load]

01:54:23: Vi1 PPP: No remote authentication for call-out

01:54:23: Vi1 LCP: O CONFREQ [Closed] id 1 len 10

01:54:23: Vi1 LCP:    MagicNumber 0x30FCDE42 (0x050630FCDE42)

01:54:23: Vi1 LCP: I CONFACK [REQsent] id 1 len 10

01:54:23: Vi1 LCP:    MagicNumber 0x30FCDE42 (0x050630FCDE42)

01:54:25: Vi1 LCP: I CONFREQ [ACKrcvd] id 2 len 18

01:54:25: Vi1 LCP:    MRU 1492 (0x010405D4)

01:54:25: Vi1 LCP:    AuthProto PAP (0x0304C023)

01:54:25: Vi1 LCP:    MagicNumber 0x5C799D85 (0x05065C799D85)

01:54:25: Vi1 LCP: O CONFNAK [ACKrcvd] id 2 len 8

01:54:25: Vi1 LCP:    MRU 1500 (0x010405DC)

01:54:25: Vi1 LCP: TIMEout: State ACKrcvd

01:54:25: Vi1 LCP: O CONFREQ [ACKrcvd] id 2 len 10

01:54:25: Vi1 LCP:    MagicNumber 0x30FCDE42 (0x050630FCDE42)

01:54:25: Vi1 LCP: I CONFREQ [REQsent] id 3 len 18

01:54:25: Vi1 LCP:    MRU 1500 (0x010405DC)

01:54:25: Vi1 LCP:    AuthProto PAP (0x0304C023)

01:54:25: Vi1 LCP:    MagicNumber 0x5C799D85 (0x05065C799D85)

01:54:25: Vi1 LCP: O CONFACK [REQsent] id 3 len 18

01:54:25: Vi1 LCP:    MRU 1500 (0x010405DC)

01:54:25: Vi1 LCP:    AuthProto PAP (0x0304C023)

01:54:25: Vi1 LCP:    MagicNumber 0x5C799D85 (0x05065C799D85)

01:54:25: Vi1 LCP: I CONFACK [ACKsent] id 2 len 10

01:54:25: Vi1 LCP:    MagicNumber 0x30FCDE42 (0x050630FCDE42)

01:54:25: Vi1 LCP: State is Open

01:54:25: Vi1 PPP: Phase is AUTHENTICATING, by the peer [0 sess, 0 load]

01:54:25: Vi1 PAP: O AUTH-REQ id 4 len 18 from "cisco"

01:54:25: Vi1 PAP: I AUTH-ACK id 4 len 5

01:54:25: Vi1 PPP: Phase is UP [0 sess, 0 load]

01:54:25: Vi1 IPCP: O CONFREQ [Closed] id 1 len 10

01:54:25: Vi1 IPCP:    Address 0.0.0.0 (0x030600000000)

01:54:25: Vi1 CDPCP: O CONFREQ [Closed] id 1 len 4

01:54:25: Vi1 IPCP: I CONFREQ [REQsent] id 1 len 10

01:54:25: Vi1 IPCP:    Address 212.93.195.100 (0x0306D45DC364)

01:54:25: Vi1 IPCP: O CONFACK [REQsent] id 1 len 10

01:54:25: Vi1 IPCP:    Address 212.93.195.100 (0x0306D45DC364)

01:54:25: Vi1 IPCP: I CONFNAK [ACKsent] id 1 len 10

01:54:25: Vi1 IPCP:    Address 212.93.198.1 (0x0306D45DC601)

01:54:25: Vi1 IPCP: O CONFREQ [ACKsent] id 2 len 10

01:54:25: Vi1 IPCP:    Address 212.93.198.1 (0x0306D45DC601)

01:54:25: Vi1 LCP: I PROTREJ [Open] id 4 len 10 protocol CDPCP

(0x820701010004)

01:54:25: Vi1 CDPCP: State is Closed

01:54:25: Vi1 IPCP: I CONFACK [ACKsent] id 2 len 10

01:54:25: Vi1 IPCP:    Address 212.93.198.1 (0x0306D45DC601)

01:54:25: Vi1 IPCP: State is Open

01:54:25: Di1 IPCP: Install negotiated IP interface address 212.93.198.1

01:54:25: Di1 IPCP: Install route to 212.93.195.100

01:54:26: %LINEPROTO-5-UPDOWN: Line protocol on Interface Virtual-Access1,

changed state to up

这是在Cisco 6400的show debugging命令输出。

*Aug 16 15:58:51.346: PPPoE: IN PADI discovery packet

*Aug 16 15:58:51.346:   PPPoE: LMAC:ffff.ffff.ffff RMAC:0030.9424.af21 6/60

AT0/0/0.60

FF FF FF FF FF FF 00 30 94 24 AF 21 88 63 11 09

00 00 00 0C 01 01 00 00 01 03 00 04 82 2E 39 F0

00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 ...

*Aug 16 15:58:51.346: PPPoE: PADO OUT from PPPoE tunnel

*Aug 16 15:58:51.346:   PPPoE: LMAC:0050.736f.4c37 RMAC:0030.9424.af21 6/60

AT0/0/0.60

00 05 09 00 AA AA 03 00 80 C2 00 07 00 00 00 30

94 24 AF 21 00 50 73 6F 4C 37 88 63 11 07 00 00

00 2F 01 01 00 00 01 03 00 04 82 2E 39 F0 01 ...

*Aug 16 15:58:53.390: PPPoE: IN PADR discovery packet

*Aug 16 15:58:53.390:   PPPoE: LMAC:0050.736f.4c37 RMAC:0030.9424.af21 6/60

AT0/0/0.60

00 50 73 6F 4C 37 00 30 94 24 AF 21 88 63 11 19

00 00 00 2F 01 01 00 00 01 03 00 04 82 2E 39 F0

01 02 00 0B 61 6C 79 73 73 61 5F 6E 72 70 31 ...

*Aug 16 15:58:53.394: Vi3 PPP: Phase is DOWN, Setup [0 sess, 0 load]

*Aug 16 15:58:53.418: PPPoE: Create session: 1

*Aug 16 15:58:53.418: PPPoE:  1: Created

*Aug 16 15:58:53.418:   PPPoE: LMAC:0050.736f.4c37 RMAC:0030.9424.af21 6/60

AT0/0/0.60

*Aug 16 15:58:53.418: PPPoE: PADS OUT from PPPoE tunnel

*Aug 16 15:58:53.418:   PPPoE: LMAC:0050.736f.4c37 RMAC:0030.9424.af21 6/60

AT0/0/0.60

00 05 09 00 AA AA 03 00 80 C2 00 07 00 00 00 30

94 24 AF 21 00 50 73 6F 4C 37 88 63 11 65 00 01

00 2F 01 01 00 00 01 03 00 04 82 2E 39 F0 01 ...

2d08h: %LINK-3-UPDOWN: Interface Virtual-Access3, changed state to up

*Aug 16 15:58:53.426: Vi3 PPP: Treating connection as a dedicated line

*Aug 16 15:58:53.426: Vi3 PPP: Phase is ESTABLISHING, Active Open [0 sess,

0 load]

*Aug 16 15:58:53.426: Vi3 LCP: O CONFREQ [Closed] id 1 len 18

*Aug 16 15:58:53.426: Vi3 LCP:    MRU 1492 (0x010405D4)

*Aug 16 15:58:53.426: Vi3 LCP:    AuthProto PAP (0x0304C023)

*Aug 16 15:58:53.426: Vi3 LCP:    MagicNumber 0x5C7E3144 (0x05065C7E3144)

*Aug 16 15:58:53.466: Vi3 LCP: I CONFREQ [REQsent] id 1 len 10

*Aug 16 15:58:53.466: Vi3 LCP:    MagicNumber 0x31017223 (0x050631017223)

*Aug 16 15:58:53.466: Vi3 LCP: O CONFACK [REQsent] id 1 len 10

*Aug 16 15:58:53.466: Vi3 LCP:    MagicNumber 0x31017223 (0x050631017223)

*Aug 16 15:58:53.470: Vi3 LCP: I CONFNAK [ACKsent] id 1 len 8

*Aug 16 15:58:53.470: Vi3 LCP:    MRU 1500 (0x010405DC)

*Aug 16 15:58:53.470: Vi3 LCP: O CONFREQ [ACKsent] id 2 len 18

*Aug 16 15:58:53.470: Vi3 LCP:    MRU 1500 (0x010405DC)

*Aug 16 15:58:53.470: Vi3 LCP:    AuthProto PAP (0x0304C023)

*Aug 16 15:58:53.470: Vi3 LCP:    MagicNumber 0x5C7E3144 (0x05065C7E3144)

*Aug 16 15:58:53.510: Vi3 LCP: I CONFACK [ACKsent] id 2 len 18

*Aug 16 15:58:53.510: Vi3 LCP:    MRU 1500 (0x010405DC)

*Aug 16 15:58:53.510: Vi3 LCP:    AuthProto PAP (0x0304C023)

*Aug 16 15:58:53.510: Vi3 LCP:    MagicNumber 0x5C7E3144 (0x05065C7E3144)

*Aug 16 15:58:53.510: Vi3 LCP: State is Open

*Aug 16 15:58:53.510: Vi3 PPP: Phase is AUTHENTICATING, by this end [0

sess, 0 load]

*Aug 16 15:58:53.514: Vi3 PAP: I AUTH-REQ id 5 len 18 from "cisco"

*Aug 16 15:58:53.514: Vi3 PPP: Phase is FORWARDING [0 sess, 0 load]

*Aug 16 15:58:53.514: Vi3 PPP: Phase is AUTHENTICATING [0 sess, 0 load]

*Aug 16 15:58:53.514: Vi3 PAP: Authenticating peer cisco

*Aug 16 15:58:53.514: Vi3 PAP: O AUTH-ACK id 5 len 5

*Aug 16 15:58:53.514: Vi3 PPP: Phase is UP [0 sess, 0 load]

*Aug 16 15:58:53.514: Vi3 IPCP: O CONFREQ [Closed] id 1 len 10

*Aug 16 15:58:53.514: Vi3 IPCP:    Address 212.93.195.100 (0x0306D45DC364)

*Aug 16 15:58:53.574: Vi3 IPCP: I CONFREQ [REQsent] id 1 len 10

*Aug 16 15:58:53.574: Vi3 IPCP:    Address 0.0.0.0 (0x030600000000)

*Aug 16 15:58:53.574: Vi3 IPCP: Pool returned 212.93.198.1

*Aug 16 15:58:53.574: Vi3 IPCP: O CONFNAK [REQsent] id 1 len 10

*Aug 16 15:58:53.574: Vi3 IPCP:    Address 212.93.198.1 (0x0306D45DC601)

*Aug 16 15:58:53.574: Vi3 CDPCP: I CONFREQ [Not negotiated] id 1 len 4

*Aug 16 15:58:53.574: Vi3 LCP: O PROTREJ [Open] id 3 len 10 protocol CDPCP

(0x820701010004)

*Aug 16 15:58:53.574: Vi3 IPCP: I CONFACK [REQsent] id 1 len 10

*Aug 16 15:58:53.574: Vi3 IPCP:    Address 212.93.195.100 (0x0306D45DC364)

*Aug 16 15:58:53.618: Vi3 IPCP: I CONFREQ [ACKrcvd] id 2 len 10

*Aug 16 15:58:53.618: Vi3 IPCP:    Address 212.93.198.1 (0x0306D45DC601)

*Aug 16 15:58:53.618: Vi3 IPCP: O CONFACK [ACKrcvd] id 2 len 10

*Aug 16 15:58:53.618: Vi3 IPCP:    Address 212.93.198.1 (0x0306D45DC601)

*Aug 16 15:58:53.618: Vi3 IPCP: State is Open

*Aug 16 15:58:53.622: Vi3 IPCP: Install route to 212.93.198.1

2d08h: %LINEPROTO-5-UPDOWN: Line protocol on Interface Virtual-Access3,

changed state to up

Related Information

- 配置Cisco 827 Router

- Cisco DSL技术支持信息

- Technical Support - Cisco Systems