目录

简介

先决条件

要求

使用的组件

规则

配置

网络图

配置

验证

故障排除

相关信息

简介

此示例配置使连接到Cisco 677非对称数字用户线路(ADSL)路由器的PC能够通过Cisco 6130高级数字用户线路接入复用器(ADSLAM)连接到单个或多个思科通用接入集中器(UAC)。 此配置使用的特定设备不是必需的。例如，您可以用Cisco 678替换Cisco 677。

此示例配置在Cisco 677上启用了ADSL推广的常用功能。这些功能包括网络地址转换(NAT)、端口地址转换(PAT)和动态主机配置协议(DHCP)。 这些功能允许cookie截断器转出。由于所有机箱都具有相同的配置，因此推广和文档的成本显着降低。

您可以将基于Cisco IOS®的节点路由处理器(NRP)和节点交换处理器(NSP)的代码复制并粘贴到您的配置中。但是，Cisco 677使用思科宽带操作系统(CBOS)，您不能复制并粘贴此代码。配置Cisco 677时使用的命令也包含在此配置示例中。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档中的信息基于以下软件和硬件版本：

Hardware

- PC或工作站

- Cisco 677 ADSL客户端前置设备(CPE)

- 您的本地Telco的ADSL服务

- 思科6130 ADSLAM，带NI-2、DMT-II ATU-C

- 有1个x NRP和1个x NSP的Cisco 6400 UAC

软件

- 思科IOS软件版本12.0.7-DC，用于思科6400 UAC NRP

- 思科IOS软件版本12.0.7-DB，用于思科6400 UAC NSP

- CBOS版本2.3.0.012，用于Cisco 677 ADSL路由器

- 思科IOS软件版本12.0.8-DA1，用于思科6130 ADSLAM

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

规则

有关文件规则的更多信息请参见“ Cisco技术提示规则”。

配置

在此部分，您可以看到本文所描述功能的配置信息。

注意：要查找有关本文档中使用的命令的其他信息，请参阅命令查找工具(仅限注册客户)。

网络图

本文档使用以下网络设置：

配置

配置注释

您必须在Cisco 6130上配置永久虚拟连接(PVC)，以允许测试用户进行连接。在NSP上配置PVP并终止NRP上的PPP会话时，必须在Cisco 6400上记录虚拟路径标识符/虚拟通道标识符(VPI/VCI)配置。

此配置示例显示NSP的虚拟路径。此路径允许Cisco 6400通过信元从ADSLAM传输到终端路由器或另一台ATM交换机。在此，您可以设置PVP，将ATM信元交换到公司网络或ISP，而不终止位于中心办公室的Cisco 6400的PPP会话。

此示例配置允许远程用户透明访问其公司网络（如果他们已连接）以收发电子邮件、共享文件/打印、公司内部网和互联网以进行Web浏览等。不使用公司Internet连接。

当Cisco 677上配置了多条PVC时，可以通过每条PVC路由流量。ADSLAM和UAC-NSP的配置将这些PVC路由/交换到PPP可以终止的正确目的ISP/ASP或公司。此配置可减少流量，从而增加企业网络的可用带宽，并使用当前ISP帐户来传输Web流量。

本文档使用以下配置：

- PC配置

- 思科67x CPE

- 向Cisco 67x CPE发出的命令

- 61xx ADSLAM

- 6400 NSP

- 6400 NRP（插槽1）

- 6400 NRP（插槽2）

PC配置

设置IP编址，以便自动获取IP地址。设置WINS，使其使用DHCP进行WINS解析。保证没有设置默认网关。由于DHCP无法传递此信息，因此可能需要设置域名。

Cisco 67x CPE(show run)

[[ IP Routing = Section Start ]]

IP NAT = enabled

IP Port Address = 00, 172.22.10.254

IP Default Route for Unnumbered Links = 002, 01, 0

IP Static Route Table Entries for Unnumbered Links = 172.22.32.0, 001, 255.255.2

55.0, 1, 0;

[[ CBOS = Section Start ]]

NSOS Maximum Number of VCs = 2

NSOS Root Password = <

root password

>

NSOS Enable Password = <

enable password

>

[[ PPP Device Driver = Section Start ]]

PPP Port User Name = 00, <

username for wan0-0

>

PPP Port User Password = 00, <

password for wan0-0

>

PPP Port User Name = 01, <

username for wan0-1

>

PPP Port User Password = 01, <

password for wan0-1

>

PPP Port Option = 01, IPCP,IP Address,3,Auto,Negotiation Not Required,Negotiable

,IP,0.0.0.0

[[ DHCP = Section Start ]]

DHCP Server = enabled

DHCP Server Pool IP = 00, 172.22.10.0

DHCP Server Pool Gateway = 00, 172.22.10.254

[[ ATM WAN Device Driver = Section Start ]]

ATM WAN Virtual Connection Parms = 00, 1, 32, 0

ATM WAN Virtual Connection Parms = 01, 2, 63, 0

向Cisco 67x CPE发出的命令

cbos#set nat enabled

NAT is now enabled

You must use "write" then reboot for changes to take effect.

cbos#set int wan0 maxvcs 2

You must use "write" and reboot for changes to take effect.

cbos#write

NVRAM written.

cbos#reboot

Hello! Expanding CBOS image...

CBOS v2.3.5.012 - Release Software

User Access Verification

Password:<

root password

>

cbos>en

Password:<

enable password

>

cbos#set ppp wan0-0 login

User name for wan0-0 has been set to router.

cbos#set ppp wan0-0 password

Password for wan0-0 has been set to <password for wan0-0>

cbos#set ppp wan0-1 login

Password for wan0-1 has been set to <username for wan0-1>

cbos#set ppp wan0-1 password

Password for wan0-1 has been set to <password for wan0-1>

cbos#set ppp wan0-0 ipcp 0.0.0.0

PPP wan0-0 IPCP Address set to 0.0.0.0

cbos#set ppp wan0-1 ipcp 0.0.0.0

PPP wan0-1 IPCP Address set to 0.0.0.0

cbos#set int eth0 address 172.22.10.254

eth0 ip address changed from 10.0.0.1 to 172.22.10.254

cbos#set int eth0 netmask 255.255.255.0

eth0 netmask changed from 255.255.255.0 to 255.255.255.0

You must use "write" then reboot for changes to take effect

cbos#set dhcp server enable

DHCP Server enabled

cbos#set dhcp server pool 0 ip 172.22.10.0

Pool 0 IP parameter is now 172.22.10.0

cbos#set dhcp server pool 0 netmask 255.255.255.0

Pool 0 netmask parameter is now 255.255.255.0

Size of pool 0 is automatically changed to max size 252

cbos#set dhcp server pool 0 gateway 172.22.10.254

Pool 0 gateway parameter is now 172.22.10.254

cbos#set password exec

Exec Password Change Successful!

cbos#set password enable

Enable Password Change Successful!

cbos#set route default wan0-1

Default Route set

cbos#set route add ip 172.22.32.0 mask 255.255.255.0 gw wan0-0

Route added

cbos#set int wan0-0 close

Closing connection wan0-0

cbos#set int wan0-1 close

Closing connection wan0-1

cbos#set int wan0-0 vpi 1

Change completed.

cbos#set int wan0-0 vc1 32

Change completed.

cbos#set int wan0-1 vpi 2

Change completed.

cbos#set int wan0-1 vci 63

Change completed.

cbos#set int wan0-0 open

Opening connection wan0-0

cbos#set int wan0-1 open

Opening connection wan0-1

cbos#write

NVRAM written

cbos#reboot

61xx ADSLAM

interface ATM 1/1

no ip address

no ip directed-broadcast

no atm ilmi-keepalive

pvc 1 32 int atm 0/1 40 40

pvc 2 63 int atm 0/1 50 51

6400 NSP（插槽8）

interface ATM 8/0/1

no ip address

no ip directed-broadcast

no atm ilmi-keepalive

atm pvp 40 interface ATM 1/0/0 40

atm pvp 50 interface ATM 2/0/0 50

6400 NRP（插槽1）

aaa new-model

aaa authentication ppp default local

!

!

username <username for wan0-0> password <password for wan0-0>

!

!

interface ATM 0/0/0.200 multipoint

no ip directed-broadcast

pvc 40/40

encapsulation aal5ciscoppp Virtual-Template 2

!

!

interface FastEthernet 0/0/0

ip address 172.22.32.1 255.255.255.0

no ip directed-broadcast

!

!

interface Virtual-Template 2

ip unnumbered FastEthernet 0/0/0

no ip directed-broadcast

peer default ip address pool <pool name A>

ppp authentication pap

!

!

ip local pool <pool name A> 172.22.40.25 172.22.40.50

6400 NRP（插槽2）

aaa new-model

aaa authentication ppp default local

!

!

username <username for wan0-1> password <password for wan0-1>

!

!

interface ATM 0/0/0.300 multipoint

no ip directed-broadcast

pvc 50/51

encapsulation aal5ciscoppp Virtual-Template 21

!

!

interface FastEthernet 0/0/0

ip address 172.16.32.1 255.255.255.0

no ip directed-broadcast

!

!

interface Virtual-Template 21

ip unnumbered FastEthernet 0/0/0

no ip directed-broadcast

peer default ip address pool <pool name B>

ppp authentication pap

!

!

ip local pool <pool name B> 172.16.100.10 172.16.100.25

验证

本部分提供的信息可帮助您确认您的配置是否可正常运行。

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

在Cisco 675 CPE上使用这些指令：

- show interface wan0 — 显示ADSL链路的训练速度。

- show interface wan0-0 — 显示wan0-0上的PPP会话信息。

- show interface wan0-1 — 显示wan0-1上的PPP会话信息。

- show dhcp server pool 0 — 显示客户端站点的DHCP信息。

在Cisco 6400 UAC上使用以下命令：

- show atm pvc — 显示是否建立了正确的PVC。

故障排除

本部分提供的信息可用于对配置进行故障排除。

使用在Cisco 6400 UAC的这些指令：

- debug ppp negotiation — 显示PPP协商调试消息。

- debug ppp authentication — 显示客户端是否通过身份验证。

- debug ppp error - 显示与 PPP 连接协商和操作关联的协议错误和错误统计数据。

在尝试任何debug命令之前，请参阅“Importent Information on Debug Commands”。

相关信息

- Cisco DSL技术支持信息

- 产品支持信息

- 技术支持 - Cisco Systems