目录

简介

先决条件

要求

使用的组件

配置

网络图

验证

故障排除

相关信息

简介

本文档介绍如何使用LACP基于负载的分组，确定VMM与ACI集成上的主用 — 主用配置的问题。

先决条件

要求

Cisco 建议您了解以下主题：

- 链路聚合控制协议(LACP)

- 虚拟机监视器(VMM)

- 网络接口控制(NIC)

- 以应用为中心的基础设施(ACI)

使用的组件

本文档不限于特定的软件和硬件版本。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您的网络处于活动状态，请确保您了解所有命令的潜在影响。

配置

网络已在两台服务器上允许的VM配置上配置了基于主用 — 主用LACP负载的分组NIC，并连接到VMM集成上两个不同枝叶交换机上的ACI。

网络图

下一个图像是高级参考，用于说明设计。

vPC 5成员是枝叶1上的接口Eth 1/1和枝叶2上的接口Eth 1/2。

vPC 6成员是枝叶1上的接口Eth 1/3和枝叶2上的接口Eth 1/4。

VM IP:10.10.10.1

VM MAC:AA.AA.AA.AA.AA.AA

连接:

服务器1 NIC 1 <->枝叶1 Eth 1/1

服务器1 NIC 2 <->枝叶2 Eth 1/2

服务器2 NIC 1 <->枝叶1 Eth 1/3

服务器2 NIC 2 <->枝叶2 Eth 1/4

验证

当前没有可用于此配置的验证过程。

思科 CLI 分析器（仅适用于注册客户）支持某些 show 命令。要查看对 show 命令输出的分析，请使用思科 CLI 分析器。

故障排除

本节提供可用于对配置进行故障排除的信息。

导航到APIC GUI上的终端跟踪器(EP)跟踪器以跟踪服务器的IP，并查看附加/分离日志以识别抖动。

步骤1:登录思科APIC GUI

第二步：导航到Operations -> EP Tracker

第三步：在End Point Search区域中，输入IP地址

第四步：单击“搜索”

确定抖动后，下一步是在每台枝叶交换机上运行命令。

LEAF1# show endpoint ip 10.10.10.1

Legend:

S - static           s - arp              L - local            O - peer-attached

V - vpc-attached     a - local-aged       p - peer-aged        M - span

B - bounce           H - vtep             R - peer-attached-rl D - bounce-to-proxy

E - shared-service   m - svc-mgr

+-----------------------------------+---------------+-----------------+--------------+-------------+

VLAN/                           Encap           MAC Address       MAC Info/       Interface

Domain                          VLAN            IP Address        IP Info

+-----------------------------------+---------------+-----------------+--------------+-------------+

2                                          vlan-100    aaaa.aaaa.aaaa LV                        po6

common:common-VRF                          vlan-100      10.10.10.1   LV                        po6

LEAF2# show endpoint ip 10.10.10.1

Legend:

S - static           s - arp              L - local            O - peer-attached

V - vpc-attached     a - local-aged       p - peer-aged        M - span

B - bounce           H - vtep             R - peer-attached-rl D - bounce-to-proxy

E - shared-service   m - svc-mgr

+-----------------------------------+---------------+-----------------+--------------+-------------+

VLAN/                           Encap           MAC Address       MAC Info/       Interface

Domain                          VLAN            IP Address        IP Info

+-----------------------------------+---------------+-----------------+--------------+-------------+

1                                          vlan-100    aaaa.aaaa.aaaa LV                        po6

common:common-VRF                          vlan-100      10.10.10.1   LV                        po6

LEAF1# show port-channel summary

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

b - BFD Session Wait

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

-------------------------------------------------------------------------------

5     Po5(SU)     Eth      LACP      Eth1/1(P)

6     Po6(SU)     Eth      LACP      Eth1/3(P)

LEAF2# show port-channel summary

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

b - BFD Session Wait

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

-------------------------------------------------------------------------------

5     Po5(SU)     Eth      LACP      Eth1/2(P)

6     Po6(SU)     Eth      LACP      Eth1/4(P)

LEAF1# show system internal epm endpoint ip 10.10.10.1

MAC : aaaa.aaaa.aaaa ::: Num IPs : 1

IP# 0 : 10.10.10.1 ::: IP# 0 flags :

Output omitted

...

Interface : port-channel6                          <<<<<<<<<<<<<<<< learned on this interface

Output omitted

...

EP Flags : local|vPC|IP|MAC|sclass|timer|mac-ckt|

::::

LEAF1# show system internal epm endpoint mac aaaa.aaaa.aaaa

MAC : aaaa.aaaa.aaaa ::: Num IPs : 1

IP# 0 : 10.10.10.1 ::: IP# 0 flags :  ::: l3-sw-hit: No

Output omitted

...

Interface : port-channel6                         <<<<<<<<<<<<<<<< learned on this interface

Output omitted

...

EP Flags : local|vPC|IP|MAC|sclass|timer|mac-ckt|

::::

LEAF2# show system internal epm endpoint ip 10.10.10.1

MAC : aaaa.aaaa.aaaa ::: Num IPs : 1

IP# 0 : 10.10.10.1 ::: IP# 0 flags :  ::: l3-sw-hit: No

Output omitted

...

Interface : port-channel5                         <<<<<<<<<<<<<<<< learned on this interface

Output omitted

...

EP Flags : local|vPC|IP|MAC|sclass|timer|mac-ckt|

::::

LEAF2# show system internal epm endpoint mac aaaa.aaaa.aaaa

MAC : aaaa.aaaa.aaaa ::: Num IPs : 1

IP# 0 : 10.10.10.1 ::: IP# 0 flags :  ::: l3-sw-hit: No

Output omitted

...

Interface : port-channel6                         <<<<<<<<<<<<<<<< learned on this interface

Output omitted

...

EP Flags : local|vPC|IP|MAC|sclass|timer|mac-ckt|

::::

从之前的输出中，您可以确定，由于VMware上的主用 — 主用配置，ACI同时在两个端口通道上接收相同的信息。

所有VM将每对上行链路用作逻辑上的一条上行链路，拓扑配置有两对不同的端口通道，每对使用相同的信息到达ACI。

注意：思科不建议这种部署，因为这种配置的工作方式与MAC定位类似，并且每30秒根据链路利用率（根据节点或端口之间的MAC/IP摆动派生）重新固定一次。

如果需要类似的拓扑，建议使用链路聚合组(LAG)，例如LACP或静态端口通道。

思科 CLI 分析器（仅适用于注册客户）支持某些 show 命令。要查看对 show 命令输出的分析，请使用思科 CLI 分析器。

使用 debug 命令之前，请参阅有关 Debug 命令的重要信息。

相关信息

- 技术支持和文档 - Cisco Systems