目录

简介

先决条件

要求

使用的组件

重要说明

EtherChannel

中继

规则

配置

网络图

配置

验证

Catalyst 6500 show 命令

Cisco 7500 路由器 show 命令

故障排除

相关信息

简介

本文档提供运行CatalystOS(CatOS)的Catalyst 6500交换机与Cisco 7500路由器之间快速以太网通道(FEC)、交换机间链路(ISL)和802.1Q中继的示例配置。执行命令时，每个命令的结果都将显示出来。虽然此配置中使用Catalyst 6000交换机，但您可以替换运行CatOS的Catalyst 4000或Catalyst 5000系列交换机。

先决条件

要求

尝试进行此配置之前，请确保满足以下要求：

- Catalyst 6000 系列交换机

- 支持EtherChannel需要5.1(1)CSX或更高版本的CatOS

- 思科7000或7500系列路由器

- 带7000系列路由交换处理器(RSP7000)或机箱接口(RSP7000CI)的Cisco 7000系列路由器，或带快速以太网接口处理器(FEIP)或通用接口处理器(VIP)的Cisco 7500系列路由器2)端口适配器

- 如果使用PA-2FEISL端口适配器，则必须有硬件修订版1.2或更高版本。

有关此问题的示例，请参阅 Field Notice：*过期* FN - 8791_11301999 - PA-2FEISL 2端口快速以太网ISL更换建议，以了解详细信息。

- Cisco IOS®软件版本12.1(3)T中引入了encapsulation dot1Q native命令。此命令会更改配置。

有关详细信息，请参阅本文档的Cisco 7500 802.1Q配置(适用于12.1(3)T之前的Cisco IOS软件版本)部分。

- 默认情况下，Cisco 7500系列路由器上已启用Cisco快速转发。但是，在Cisco IOS软件版本12.2和12.2T之前，IEEE 802.1Q VLAN之间的IP路由的Cisco快速转发支持不可用。在以前版本中仍可以配置802.1Q封装，但必须先发出全局no ip cef命令以禁用Cisco快速转发。

- 当7500系列路由器配置为多协议标签交换(MPLS)和FEC时，当前不支持从MPLS接口流向FEC接口的路由(MPLS” IP)数据包。因此，不建议MPLS和FEC配置在单台路由器上共存。

- 支持EtherChannel需要Cisco IOS软件版本11.1(14)CA或更高版本。

支持ISL中继需要Cisco IOS软件版本11.3(1)T（任何加号功能集）或更高版本。

支持IEEE 802.1Q中继需要Cisco IOS软件版本12.0(1)T（任何加号功能集）或更高版本。

使用的组件

本文档中的信息基于以下软件和硬件版本：

- 运行CatOS版本5.5.14的Catalyst 6500

- 运行Cisco IOS软件版本12.2.7b的Cisco 7500

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

重要说明

- 请记住，Catalyst 4000系列交换机不支持ISL中继。此外，Catalyst 5000系列交换机上的某些交换模块不支持EtherChannel。发出show port capabilities module命令以确定特定模块是否支持EtherChannel及其支持的中继封装。

- EtherChannel和中继的配置有某些指导原则。请务必参阅交换机的软件文档。

例如，如果您在Catalyst 5000上运行软件版本5.5.x，请参阅软件配置指南(5.5)，并仔细检查“配置快速EtherChannel和千兆EtherChannel”部分中的任何配置指南和限制。

EtherChannel

FEC或千兆位以太网通道(GEC)功能允许将多个点对点链路捆绑到一个逻辑链路中。Catalyst 6000在全双工模式下最多支持八个端口，为FEC提供1600 Mbps或1.6 Gbps的吞吐量，为GEC提供16 Gbps的吞吐量。Cisco 7500系列支持每个FEC最多四个端口(800 Mbps)。EtherChannel功能和性能因交换机或路由器而异。有关详细信息，请参阅在Catalyst交换机上实施EtherChannel的系统要求。

EtherChannel将流量分布到所有链路，并在一个或多个链路发生故障时提供冗余。有关EtherChannel的详细信息和配置示例，请参阅了解Catalyst交换机上的EtherChannel负载均衡和冗余 。

有关详细信息，请参阅Cisco技术支持和文档的EtherChannel页。

中继

中继是通过点对点链路或两台设备之间的EtherChannel捆绑来传输来自多个VLAN的流量的一种方式。以下是实施以太网中继的两种方式：

- ISL（思科专有中继封装）

- 802.1Q（IEEE标准中继封装）

有关详细信息，请参阅Cisco技术支持和文档的VLAN中继协议页。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

配置

本部分提供有关如何配置本文档所述功能的信息。

注意：使用命令查找工具(仅限注册客户)可查找有关本文档中使用的命令的详细信息。

这些示例配置向您展示如何执行以下操作：

- 在Catalyst 6500上为VLAN 1中的工作站1和VLAN 2中的工作站2配置两个接入端口。

- 在Cisco 7500上，将工作站1的默认网关配置为10.10.10.1 /24，将工作站2的默认网关配置为10.10.11.1/24。

- 在Catalyst 6500交换机和Cisco 7500路由器之间通过双端口FEC配置ISL和802.1Q中继。

- 为VLAN间路由配置两个端口通道子接口的IP地址。

网络图

本文档使用以下网络设置：

中继VLAN 1和VLAN 2通过2端口FEC

配置

本文档使用以下配置：

- Catalyst 6500 交换机

- Cisco 7500 路由器

- 12.1(3)T之前的Cisco IOS软件版本的Cisco 7500 802.1Q配置

Catalyst 6500 交换机

!--- Set the IP address and default gateway for VLAN 1 for management purposes.

Catalyst6500> (enable) set interface sc0 10.10.10.2 255.255.255.0

Interface sc0 IP address and netmask set.

Catalyst6500> (enable) set ip route default 10.10.10.1

Route added.

!--- Set the VTP mode. In this example, the mode is set to be transparent. Depending on your !--- network, set the VTP mode accordingly. !--- For details on VTP, refer to Understanding and Configuring VLAN Trunk Protocol (VTP).

Catalyst6500> (enable) set vtp mode transparent

VTP domain modified

!--- Add VLAN 2. VLAN 1 already exists by default.

Catalyst6500> (enable) set vlan 2

VLAN 2 configuration successful

!--- Add port 3/4 to VLAN 2. Port 3/3 is already in VLAN 1 by default.

Catalyst6500> (enable) set vlan 2 3/4

VLAN 2 modified.

VLAN 1 modified.

VLAN  Mod/Ports

---- -----------------------

2     3/4

!--- Set the port speed to 100 and duplex to full. One of the requirements for EtherChannel !--- to work is for speed and duplex to be the same on both sides. To guarantee this, hard !--- code both speed and duplex on ports 3/1 and 3/2.

Catalyst6500> (enable) set port speed 3/1-2 100

Ports 3/1-2 transmission speed set to 100Mbps.

Catalyst6500> (enable) set port duplex 3/1-2 full

Ports 3/1-2 set to full-duplex.

!--- Enable FEC on ports 3/1 and 3/2. Because routers do not understand Port Aggregation !--- Protocol (PAgP), set the channel mode to one which causes ports to channel but which !--- does not generate PAgP frames.

Catalyst6500> (enable) set port channel 3/1-2 on

Port(s) 3/1-2 are assigned to admin group 105.

Port(s) 3/1-2 channel mode set to on.

!--- Enable trunking on ports 3/1 and 3/2. Because routers do not understand Dynamic !--- Trunking Protocol (DTP), set the trunking mode to nonegotiate, which causes ports to !--- trunk but which does not generate DTP frames. !--- Note: Because EtherChannel is configured first, any trunk settings that are applied !--- now to one port automatically apply to all other ports in the channel. !--- Enter the trunking encapsulation as either ISL…

Catalyst6500> (enable) set trunk 3/1 nonegotiate isl

Port(s) 3/1-2 trunk mode set to nonegotiate.

Port(s) 3/1-2 trunk type set to isl.

!--- …or as dot1q. !--- Ensure that the native VLAN (default is VLAN 1) matches across the link. For more !--- information about the native VLAN and 802.1Q trunking, refer to Trunking Between !--- Catalyst 4500/4000, 5500/5000, and 6500/6000 Series Switches Using 802.1Q !--- Encapsulation with Cisco CatOS System Software.

Catalyst6500> (enable) set trunk 3/1 nonegotiate dot1q

Port(s) 3/1-2 trunk mode set to nonegotiate.

Port(s) 3/1-2 trunk type set to dot1q.

Catalyst6500> (enable) show config

This command shows non-default configurations only.

Use 'show config all' to show both default and non-default configurations.

.........

..................

..

begin

!

# ***** NON-DEFAULT CONFIGURATION *****

!

!

#time: Thu May 2 2002, 01:26:26

!

#version 5.5(14)

!

!

#system

set system name  Catalyst6500

!

#!

#vtp

set vtp mode transparent

set vlan 1 name default type ethernet mtu 1500 said 100001 state active

set vlan 2 name VLAN0002 type ethernet mtu 1500 said 100002 state active

set vlan 1002 name fddi-default type fddi mtu 1500 said 101002 state active

set vlan 1004 name fddinet-default type fddinet mtu 1500 said 101004 state active stp ieee

set vlan 1005 name trnet-default type trbrf mtu 1500 said 101005 state active stp ibm

set vlan 1003 name token-ring-default type trcrf mtu 1500 said 101003 state active

mode srb aremaxhop 7 stemaxhop 7

backupcrf off

!

#ip

set interface sc0 1 10.10.10.2/255.255.255.0 10.10.10.255

set ip route 0.0.0.0/0.0.0.0 10.10.10.1

!

#set boot command

set boot config-register 0x2102

set boot system flash bootflash:cat6000-sup.5-5-14.bin

!

#port channel

set port channel 3/1-2 105

!

# default port status is enable

!

!

#module 1 empty

!

#module 2 : 2-port 1000BaseX Supervisor

!

#module 3 : 48-port 10/100BaseTX Ethernet

set vlan 2    3/4

set port disable    3/5

set port speed      3/1-2  100

set port duplex     3/1-2  full

set trunk 3/1  nonegotiate isl 1-1005

set trunk 3/2  nonegotiate isl 1-1005

!--- If IEEE 802.1Q is configured, you will see this output instead: set trunk 3/1 nonegotiate dot1q 1-1005 set trunk 3/2 nonegotiate dot1q 1-1005

set port channel 3/1-2 mode on

!

#module 4 : 24-port 100BaseFX MM Ethernet

!

#module 5 empty

!

#module 6 empty

!

#module 15 empty

!

#module 16 empty

end

Cisco 7500 路由器

!--- Configure a port-channel interface to enable FEC.

7500# configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

7500(config)# interface port-channel 1

01:34:10: %LINEPROTO-5-UPDOWN: Line protocol on Interface Port-channel1, changed

state to down

!--- Configure full-duplex to match the duplex setting on the Catalyst switch side.

7500(config-if)# full-duplex

7500(config-if)# exit

!--- If you are using ISL trunking, configure two port-channel sub-interfaces and issue the !--- encapsulation isl

command to enable ISL trunking. !--- Configure IP addresses for InterVLAN routing.

7500(config)# interface port-channel 1.1

7500(config-subif)# encapsulation isl 1

7500(config-subif)# ip address 10.10.10.1 255.255.255.0

7500(config-subif)# exit

7500(config)# interface port-channel 1.2

7500(config-subif)# encapsulation isl 2

7500(config-subif)# ip address 10.10.11.1 255.255.255.0

7500(config-subif)# exit

!--- If you are using 802.1Q trunking, issue the encapsulation dot1Q

native

!--- command to configure two port-channel sub-interfaces and enable 802.1Q trunking. !--- Configure the IP addresses for InterVLAN routing. !--- Note: The encapsulation dot1Q 1 native command was added in Cisco IOS Software !--- Release 12.1(3)T. If you are using an earlier version of Cisco IOS, see the !--- Cisco 7500 802.1Q Configuration for Cisco IOS Software Releases Earlier than 12.1(3)T !--- section of this document, to configure 802.1Q trunking on the router.

!--- Ensure that the native VLAN (default is VLAN 1) matches across the link. For more !--- information about the native VLAN and 802.1Q trunking, refer to Trunking Between !--- Catalyst 4500/4000, 5500/5000, and 6500/6000 Series Switches Using 802.1Q !--- Encapsulation with Cisco CatOS System Software.

7500(config)# interface port-channel 1.1

7500(config-subif)# encapsulation dot1Q 1 native

7500(config-subif)# ip address 10.10.10.1 255.255.255.0

7500(config-subif)# exit

7500(config)# interface port-channel 1.2

7500(config-subif)# encapsulation dot1Q 2

7500(config-subif)# ip address 10.10.11.1 255.255.255.0

7500(config-subif)# exit

!--- Configure the FastEthernet interfaces for speed 100, depending on the port adapter. !--- Some FastEthernet port adapters can autonegotiate speed (10 or 100) and duplex (half !--- or full). Others are only capable of 100 (half or full).

7500(config)# interface fastethernet 5/1/0

7500(config-if)# speed 100

!--- Issue the channel-group command, to configure the FastEthernet interfaces to be !--- members of port-channel 1.

7500(config-if)# channel-group 1

%Interface MTU set to channel-group MTU 1500.

7500(config-if)# no shut

7500(config-if)#

%Interface MTU set to channel-group MTU 1500.

FastEthernet5/1/0 added as member-1 to port-channel1

01:46:09: %LINK-3-UPDOWN: Interface FastEthernet5/1/0, changed state to up

01:46:10: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet5/1/0,

changed state to up

01:46:12: %LINEPROTO-5-UPDOWN: Line protocol on Interface Port-channel1,

changed state to up

Router(config-if)# exit

Router(config)# interface fastethernet 5/1/1

Router(config-if)# speed 100

Router(config-if)# channel-group 1

%Interface MTU set to channel-group MTU 1500.

Router(config-if)# no shut

Router(config-if)#

%Interface MTU set to channel-group MTU 1500.

FastEthernet5/1/1 added as member-2 to port-channel1

01:54:52: %LINK-3-UPDOWN: Interface FastEthernet5/1/1, changed state to up

01:54:53: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet5/1/1,

changed state to up

Router(config-if)# exit

!--- Remember to save the configuration.

7500# write memory

Building configuration...

[OK]

7500#

!--- Note: To make this setup work and to successfully ping between Workstation 1 and !--- Workstation 2, you must ensure that the default gateways on the workstations are setup !--- properly. For Workstation 1, the default gateway should be 10.10.10.1; and for !--- Workstation 2, the default gateway should be 10.10.11.1.

7500# show running-config

Building configuration...

Current configuration : 1593 bytes

!

version 12.2

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

no service single-slot-reload-enable

!

hostname 7500

!

boot system disk1:rsp-jsv-mz.122-7b.bin

!

ip subnet-zero

!

ip cef

call rsvp-sync

!

!

!

interface Port-channel1

no ip address

full-duplex

hold-queue 300 in

!

interface Port-channel1.1

encapsulation isl 1

ip address 10.10.10.1 255.255.255.0

!

interface Port-channel1.2

encapsulation isl 2

ip address 10.10.11.1 255.255.255.0

!--- If 802.1Q trunking is configured, you will see this output instead: interface Port-channel1.1 encapsulation dot1Q 1 native ip address 10.10.10.1 255.255.255.0 ! interface Port-channel1.2 encapsulation dot1Q 2 ip address 10.10.11.1 255.255.255.0

!

interface FastEthernet5/1/0

no ip address

no ip mroute-cache

speed 100

full-duplex

channel-group 1

!

interface FastEthernet5/1/1

no ip address

no ip mroute-cache

speed 100

full-duplex

channel-group 1

!

!

ip classless

no ip http server

ip pim bidir-enable

!

!

!

!

line con 0

line aux 0

line vty 0 4

login

!

end

12.1(3)T之前的Cisco IOS软件版本的Cisco 7500 802.1Q配置

在低于12.1(3)T的Cisco IOS版本中，子接口下的encapsulation dot1Q 1 native命令不可用。但是，仍需要按照前面所述匹配链路上的本征VLAN。要在12.1(3)T之前的软件版本中配置802.1Q中继，请在主端口通道1接口上配置VLAN 1的IP地址，而不是端口通道子接口。

!--- Configure a port-channel interface to enable FEC.

7500# configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

7500(config)# interface port-channel 1

01:34:10: %LINEPROTO-5-UPDOWN: Line protocol on Interface Port-channel1, changed

state to down

!--- Configure full-duplex to match the duplex setting on the Catalyst switch side.

7500(config-if)# full-duplex

7500(config-if)# exit

!--- Do not configure an interface port-channel 1.1 !--- Instead, create a port-channel 1 main interface and configure the IP address !--- for VLAN 1 here.

7500(config)# interface port-channel 1

7500(config-if)# full-duplex

7500(config-if)# ip address 10.10.10.1 255.255.255.0

7500(config-if)# exit

7500(config)#

!--- It is still necessary to create a subinterface for VLAN 2.

7500(config)# interface port-channel 1.2

7500(config-subif)# encapsulation dot1Q 2

7500(config-subif)# ip address 10.10.11.1 255.255.255.0

7500(config-subif)# exit

!--- Configure the FastEthernet interfaces for speed 100, depending on the port adapter. !--- Some FastEthernet port adapters can autonegotiate speed (10 or 100) and duplex (half !--- or full). Others are only capable of 100 (half or full).

7500(config)# interface fastethernet 5/1/0

7500(config-if)# speed 100

!--- Issue the channel-group command to configure the FastEthernet interfaces to be !--- members of port-channel 1.

7500(config-if)# channel-group 1

%Interface MTU set to channel-group MTU 1500.

7500(config-if)# no shut

7500(config-if)#

%Interface MTU set to channel-group MTU 1500.

FastEthernet5/1/0 added as member-1 to port-channel1

01:46:09: %LINK-3-UPDOWN: Interface FastEthernet5/1/0, changed state to up

01:46:10: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet5/1/0,

changed state to up

01:46:12: %LINEPROTO-5-UPDOWN: Line protocol on Interface Port-channel1,

changed state to up

Router(config-if)# exit

Router(config)# interface fastethernet 5/1/1

Router(config-if)# speed 100

Router(config-if)# channel-group 1

%Interface MTU set to channel-group MTU 1500.

Router(config-if)# no shut

Router(config-if)#

%Interface MTU set to channel-group MTU 1500.

FastEthernet5/1/1 added as member-2 to port-channel1

01:54:52: %LINK-3-UPDOWN: Interface FastEthernet5/1/1, changed state to up

01:54:53: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet5/1/1,

changed state to up

Router(config-if)# exit

!--- Remember to save the configuration.

7500# write memory

Building configuration...

[OK]

7500#

!--- Note: Remember also that—in any version of software previous to 12.2 or 12.2T for the !--- 7000/7500 series—you will have to issue the no ip cef command globally before you !--- configure 802.1Q trunking on a subinterface. Otherwise, you will see this error !--- message: 802.1q encapsulation not supported with CEF configured on the interface. !--- See the Components Used section of this document for more information.

7500# show running-config

Building configuration...

Current configuration : 1593 bytes

!

version 12.1

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 7500

!

!

ip subnet-zero

!

no ip cef

!

!

!

interface Port-channel1

ip address 10.10.10.1 255.255.255.0

full-duplex

hold-queue 300 in

!

interface Port-channel1.2

encapsulation dot1Q 2

ip address 10.10.11.1 255.255.255.0

!

interface FastEthernet5/1/0

no ip address

no ip mroute-cache

speed 100

full-duplex

channel-group 1

!

interface FastEthernet5/1/1

no ip address

no ip mroute-cache

speed 100

full-duplex

channel-group 1

!

!

ip classless

no ip http server

!

!

!

line con 0

line aux 0

line vty 0 4

login

!

end

7500#

验证

使用本部分可确认配置能否正常运行。

命令输出解释程序（仅限注册用户）(OIT) 支持某些 show 命令。使用 OIT 可查看对 show 命令输出的分析。

Catalyst 6500 show 命令

- show interface — 显示sc0管理接口IP地址和VLAN。在本例中，使用默认VLAN(VLAN 1)。

Catalyst6500> (enable) show interface

sl0: flags=51<UP,POINTOPOINT,RUNNING>

slip 0.0.0.0 dest 0.0.0.0

sc0: flags=63

VLAN 1 inet 10.10.10.2 netmask 255.255.255.0 broadcast 10.10.10.255

Catalyst6500> (enable)

- show ip route — 显示默认网关。在本示例中，10.10.10.1是端口通道1（用于802.1Q中继）或端口通道1.1（用于ISL中继）的IP地址。

Catalyst6500> (enable) show ip route

Fragmentation   Redirect   Unreachable

-------------   --------   -----------

enabled         enabled    enabled

The primary gateway: 10.10.10.1

Destination      Gateway          RouteMask    Flags   Use       Interface

---------------  ---------------  ----------   -----   --------  ---------

default          10.10.10.1       0x0          UG      0           sc0

10.10.10.0       10.10.10.2       0xffffff00   U       8           sc0

default          default          0xff000000   UH      0           sl0

Catalyst6500> (enable)

- show port capabilities mod/port — 快速查看交换模块的硬件功能。在本示例中，您可以看到端口3/1（和3/2）支持EtherChannel，支持哪些中继封装以及其他信息。

Catalyst6500> (enable) show port capabilities 3/1

Model                    WS-X6248-RJ-45

Port                     3/1

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  yes

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on),send-(off)

Security                 yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(1q4t),tx-(2q2t)

CoS rewrite              yes

ToS rewrite              DSCP

UDLD                     yes

Inline power             no

AuxiliaryVlan            1..1000,untagged,dot1p,none

SPAN                     source,destination

COPS port group          not supported

Catalyst6500> (enable)

- show port counters mod /port — 快速查看可能的端口错误。在本例中，此端口没有任何错误。如果在端口上遇到错误，请参阅排除交换机端口和接口故障以了解详细信息。

Catalyst6500> (enable) show port counters 3/1

Port  Align-Err  FCS-Err    Xmit-Err   Rcv-Err    UnderSize

----- ---------- ---------- ---------- ---------- ---------

3/1           0          0          0          0         0

Port  Single-Col Multi-Coll Late-Coll  Excess-Col Carri-Sen Runts     Giants

----- ---------- ---------- ---------- ---------- --------- --------- ---------

3/1           0          0          0          0         0         0         -

Last-Time-Cleared

--------------------------

Thu May 2 2002, 02:11:55

Catalyst6500> (enable)

- show port mod — 显示端口状态、VLAN、中继、速度和双工信息。在本例中，工作站1的接入端口是3/3，位于VLAN 1中。工作站2的接入端口是3/4，即VLAN 2。端口3/1和3/2是中继和FEC端口。

Catalyst6500> (enable) show port 3

Port  Name                 Status     VLAN       Duplex Speed Type

----- -------------------- ---------- ---------- ------ ----- ------------

3/1                       connected  trunk        full   100 10/100BaseTX

3/2                       connected  trunk        full   100 10/100BaseTX

3/3                       connected  1          a-half  a-10 10/100BaseTX

3/4                       connected  2          a-full a-100 10/100BaseTX

!--- Output suppressed.

- show vlan — 显示哪些端口已分配给特定VLAN。请注意，本示例（3/1和3/2）中的中继端口未显示在此输出中，这是正常的。

Catalyst6500> (enable) show vlan

VLAN Name                             Status    IfIndex Mod/Ports, Vlans

---- -------------------------------- --------- ------- ------------------------

1    default                          active    119     2/1-2

3/3,3/5-48

4/1-24

2    VLAN0002                         active    124     3/4

!--- Output suppressed.

- show trunk — 显示中继模式、封装类型、允许的VLAN和活动VLAN。在本例中，VLAN 1（默认情况下始终允许并处于活动状态）和VLAN 2是中继的当前活动VLAN。注意，两个中继端口都在VLAN 1中。

Catalyst6500> (enable) show trunk

* - indicates vtp domain mismatch

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

3/1      nonegotiate  isl            trunking      1

3/2      nonegotiate  isl            trunking      1

Port      VLANs allowed on trunk

--------  ---------------------------------------------------------------------

3/1      1-1005

3/2      1-1005

Port      VLANs allowed and active in management domain

--------  ---------------------------------------------------------------------

3/1      1-2

3/2      1-2

Port      VLANs in spanning tree forwarding state and not pruned

--------  ---------------------------------------------------------------------

3/1      1-2

3/2      1-2

对于802.1Q中继，上一命令的输出更改为：

Catalyst6500> (enable) show trunk

* - indicates vtp domain mismatch

Port      Mode         Encapsulation  Status        Native VLAN

--------  -----------  -------------  ------------  -----------

3/1      nonegotiate  dot1q          trunking      1

3/2      nonegotiate  dot1q          trunking      1

Port      VLANs allowed on trunk

--------  ---------------------------------------------------------------------

3/1      1-1005

3/2      1-1005

Port      VLANs allowed and active in management domain

--------  ---------------------------------------------------------------------

3/1      1-2

3/2      1-2

Port      VLANs in spanning tree forwarding state and not pruned

--------  ---------------------------------------------------------------------

3/1      1-2

3/2      1-2

Catalyst6500> (enable)

- show port channel — 显示EtherChannel状态。在本例中，有一个2端口FEC（端口3/1和3/2）打开，以防止PAgP帧传输。您还可以看到7500路由器的远程端口通道接口。

Catalyst6500> (enable)  show port channel

Port  Status     Channel              Admin Ch

Mode                 Group Id

----- ---------- -------------------- ----- -----

3/1  connected  on                     105   833

3/2  connected  on                     105   833

----- ---------- -------------------- ----- -----

Port  Device-ID                       Port-ID                   Platform

----- ------------------------------- ------------------------- ----------------

3/1  7500                            Port-channel1.1           cisco RSP4

3/2

----- ------------------------------- ------------------------- ----------------

Catalyst6500> (enable)

对于具有802.1Q中继的FEC，以前命令的输出将更改为：

Catalyst6500> (enable) show port channel

Port  Status     Channel              Admin Ch

Mode                 Group Id

----- ---------- -------------------- ----- -----

3/1   connected  on                    257   769

3/2   connected  on                    257   769

----- ---------- -------------------- ----- -----

Port  Device-ID                       Port-ID                   Platform

----- ------------------------------- ------------------------- ----------------

3/1       7500                            FastEthernet5/1/0         cisco RSP4

3/2       7500                            FastEthernet5/1/1         cisco RSP4

----- ------------------------------- ------------------------- ----------------

Catalyst6500> (enable)

如果您有来自Cisco设备的show-tech support命令的输出，则可以使用Output Interpreter Tool(仅限注册客户)来显示潜在问题和解决方法。

Cisco 7500 路由器 show 命令

- show interface port-channel channel number — 为物理接口提供成员状态。在本示例中，在Catalyst 6000的端口3/1和3/2之间以及7500的接口FastEthernet 5/1/0和5/1/1之间配置了2端口FEC。端口通道1显示为up/up状态。

它配置了IP地址，这意味着它是802.1Q中继的本征VLAN IP地址。有关详细信息，请参阅本文档的Cisco 7500 802.1Q配置(适用于12.1(3)T之前的Cisco IOS软件版本)部分。VLAN 2 802.1Q子接口的输出也显示在show interface port channel 1.2命令中。

7500# show interface port-channel 1

Port-channel1 is up, line protocol is up

Hardware is FEChannel, address is 0001.6490.f8a8 (bia 0000.0000.0000)

Internet address is 10.10.10.1/24

MTU 1500 bytes, BW 200000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Keepalive set (10 sec)

Full-duplex, Unknown Speed

ARP type: ARPA, ARP Timeout 04:00:00

No. of active members in this channel: 2

Member 0 : FastEthernet5/1/0

Member 1 : FastEthernet5/1/1

Last input 00:00:14, output never, output hang never

Last clearing of "show interface" counters never

Input queue: 0/300/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

6720 packets input, 923310 bytes, 0 no buffer

Received 5010 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 watchdog

0 input packets with dribble condition detected

1902 packets output, 573088 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier

0 output buffer failures, 0 output buffers swapped out

7500#

7500# show interface port-channel 1.2

Port-channel1.2 is up, line protocol is up

Hardware is FEChannel, address is 0001.6490.f8a8 (bia 0000.0000.0000)

Internet address is 10.10.11.1/24

MTU 1500 bytes, BW 200000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation 802.1q Virtual LAN, Vlan ID  2.

ARP type: ARPA, ARP Timeout 04:00:00

以下是ISL中继和FEC的输出：

7500# show interface port-channel 1

Port-channel1 is up, line protocol is up

Hardware is FEChannel, address is 0001.6490.f8a8 (bia 0000.0000.0000)

MTU 1500 bytes, BW 200000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Keepalive set (10 sec)

Full-duplex, Unknown Speed

ARP type: ARPA, ARP Timeout 04:00:00

No. of active members in this channel: 2

Member 0 : FastEthernet5/1/0

Member 1 : FastEthernet5/1/1

Last input 00:00:01, output never, output hang never

Last clearing of "show interface" counters never

Input queue: 0/300/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 1 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

113 packets input, 7278 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 watchdog

0 input packets with dribble condition detected

13 packets output, 2264 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier

0 output buffer failures, 0 output buffers swapped out

7500# show interface port-channel 1.1

Port-channel1.1 is up, line protocol is up

Hardware is FEChannel, address is 0001.6490.f8a8 (bia 0000.0000.0000)

Internet address is 10.10.10.1/24

MTU 1500 bytes, BW 200000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ISL Virtual LAN, Color 1.

ARP type: ARPA, ARP Timeout 04:00:00

7500# show interface port-channel 1.2

Port-channel1.2 is up, line protocol is up

Hardware is FEChannel, address is 0001.6490.f8a8 (bia 0000.0000.0000)

Internet address is 10.10.11.1/24

MTU 1500 bytes, BW 200000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ISL Virtual LAN, Color 2.

ARP type: ARPA, ARP Timeout 04:00:00

- show interfaces fastethernet slot /port-adapter /port — 显示路由器物理接口的状态以及接口上是否存在任何错误。在本例中，它是无错的。

7500# show interface fastethernet 5/1/0

FastEthernet5/1/0 is up, line protocol is up

Hardware is cyBus FastEthernet Interface, address is 0001.6490.f8a8

(bia 0001.6490.f8a8)

MTU 1500 bytes, BW 100000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Keepalive set (10 sec)

Full-duplex, 100Mb/s, 100BaseTX/FX

ARP type: ARPA, ARP Timeout 04:00:00

Last input 1d00h, output 00:00:07, output hang never

Last clearing of "show interface" counters 1d00h

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

2929 packets input, 425318 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 watchdog

0 input packets with dribble condition detected

12006 packets output, 1539768 bytes, 0 underruns

0 output errors, 0 collisions, 6 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier

0 output buffer failures, 0 output buffers swapped out

7500#

故障排除

目前没有针对此配置的故障排除信息。

相关信息

- LAN 产品支持页

- EtherChannel 支持页

- LAN 交换技术支持页

- 技术支持和文档 - Cisco Systems