目录

简介

先决条件

要求

使用的组件

背景信息

被动监控

活动监控

混合模式

配置

网络图

相关配置

验证

被动模式

主动模式

混合模式

故障排除

简介

本文档介绍性能路由第2版(PfRv2)中用于监控分支路由器上广域网(WAN)链路性能的方法。

先决条件

要求

思科建议您具备性能路由(PfR)的基本知识。

使用的组件

本文档不限于特定的软件和硬件版本。

注意：Polaris代码16.x.x不支持PFRv2。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

背景信息

PfRv2使用三种方法来测量边界路由器(BR)链路的性能。主控制器(MC)使用收集到的信息来实施PfR策略。被动监控、主动监控和混合模式。

被动监控

在此模式下，BR上启用的Netflow（默认情况下使用PfR）会收集有关流量类的此信息，并将其发回主控制器。

此信息适用于通过BR的TCP流：

- 可达性：这是根据尚未收到相应TCP ACK的TCP SYN计算的。

- 延迟：TCP三次握手期间TCP SYN消息和TCP ACK消息之间计算的时间。然后总值除以二。

- 损失:根据TCP序列号进行测量。例如，当收到的TCP序列号高于或低于预期时，会报告丢失。

此信息适用于通过BR的所有流（包括TCP）：

- 出口带宽：流量类的吞吐量（使用Netflow以每秒比特数计算）。

- 入口带宽：传入BR的流量类的吞吐量（使用Netflow以比特/秒计算）。

活动监控

在此模式下，BR通过其WAN接口发送IP SLA探测，以测量与流量类相关的多个参数。收集的信息会发回主控制器。测量以下参数：

- 可达性

- 延迟

- 损失

- 出口带宽

- 入口带宽

当在主控制器上配置的监控方法处于活动状态时，这些探测功能会自动生成，也可以手动配置。默认情况下，发送的探测是ICMP回应，但可以根据通过WAN链路发送的流量类型更改为TCP或UDP探测。

当Exit BR选择持续进行时，所有BR将为Netflow获取的前缀发送活动探测。选择退出BR后，其他BR将停止发送活动探测。所选BR将继续发送活动探测。

混合模式

混合模式使用Netflow统计信息和IP服务等级协议(SLA)来决定出口点(BR)和链路监控。在此模式下，IP SLA探测信息用于选择出口点，然后Netflow统计信息用于监控BR到目的地的WAN连接。

当PfR处于学习状态且尚未进入“INPOLICY”状态时，所有BR将为从Netflow收集的前缀发送活动探测。这是为了确定各自的链路条件。当MC状态更改为“INPOLICY”时，所有BR将停止发送主用探测功能，现在监控将被动完成（使用Netflow）。

配置

此图像可用作文档其余部分的示例拓扑：

网络图

相关配置

使用不同模式需要此基本配置。R3配置为MC，因此必须在R3上完成以下配置：

被动模式

pfr master

!

border 10.4.4.4 key-chain pfr

interface Ethernet0/1 external

interface Ethernet0/0 internal

!

border 10.5.5.5 key-chain pfr

interface Ethernet0/0 internal

interface Ethernet0/1 external

!

mode monitor passive

主动模式

pfr master

!

border 10.4.4.4 key-chain pfr

interface Ethernet0/1 external

interface Ethernet0/0 internal

!

border 10.5.5.5 key-chain pfr

interface Ethernet0/0 internal

interface Ethernet0/1 external

!

mode monitor active

混合模式

这是默认模式。如果未提及模式命令，则混合模式将被激活，或者命令模式监控器可同时用于启用它。

pfr master

!

border 10.4.4.4 key-chain pfr

interface Ethernet0/1 external

interface Ethernet0/0 internal

!

border 10.5.5.5 key-chain pfr

interface Ethernet0/0 internal

interface Ethernet0/1 external

注意：如果手动给定命令模式监控器，则配置中不会显示该命令，因为它是默认命令。

验证

大多数验证命令都在MC上执行。这些命令可用于检验不同模式的工作情况。

被动模式

R3#show pfr master

<Output suppressed>

Default Policy Settings:

backoff 90 900 90

delay relative 50

holddown 90

periodic 0

probe frequency 56

number of jitter probe packets 100

mode route control

mode monitor passive

loss relative 10

jitter threshold 20

mos threshold 3.60 percent 30

unreachable relative 50

trigger-log percentage 30

测试1 — 从服务器启动TCP数据流

R3#show pfr master traffic-class

OER Prefix Statistics:

Pas - Passive, Act - Active, S - Short term, L - Long term, Dly - Delay (ms),

P - Percentage below threshold, Jit - Jitter (ms),

MOS - Mean Opinion Score

Los - Packet Loss (percent/10000), Un - Unreachable (flows-per-million),

E - Egress, I - Ingress, Bw - Bandwidth (kbps), N - Not applicable

U - unknown, * - uncontrolled, + - control more specific, @ - active probe all

# - Prefix monitor mode is Special, & - Blackholed Prefix

% - Force Next-Hop, ^ - Prefix is denied

DstPrefix           Appl_ID Dscp Prot     SrcPort     DstPort SrcPrefix

Flags             State     Time            CurrBR  CurrI/F Protocol

PasSDly  PasLDly   PasSUn   PasLUn  PasSLos  PasLLos      EBw      IBw

ActSDly  ActLDly   ActSUn   ActLUn  ActSJit  ActPMOS  ActSLos  ActLLos

--------------------------------------------------------------------------------

10.20.20.0/24              N    N    N           N           N N

INPOLICY        0          10.4.4.4 Et0/1           BGP

46       46        0        0    35502    35502        2        1

N        N        N        N        N        N

10.30.30.0/24              N    N    N           N           N N

INPOLICY        0          10.5.5.5 Et0/1           BGP

1        1        0        0        0        0       14        1

N        N        N        N        N        N

测试2 — 从服务器启动UDP数据流

R3#show pfr master traffic-class

OER Prefix Statistics:

Pas - Passive, Act - Active, S - Short term, L - Long term, Dly - Delay (ms),

P - Percentage below threshold, Jit - Jitter (ms),

MOS - Mean Opinion Score

Los - Packet Loss (percent/10000), Un - Unreachable (flows-per-million),

E - Egress, I - Ingress, Bw - Bandwidth (kbps), N - Not applicable

U - unknown, * - uncontrolled, + - control more specific, @ - active probe all

# - Prefix monitor mode is Special, & - Blackholed Prefix

% - Force Next-Hop, ^ - Prefix is denied

DstPrefix           Appl_ID Dscp Prot     SrcPort     DstPort SrcPrefix

Flags             State     Time            CurrBR  CurrI/F Protocol

PasSDly  PasLDly   PasSUn   PasLUn  PasSLos  PasLLos      EBw      IBw

ActSDly  ActLDly   ActSUn   ActLUn  ActSJit  ActPMOS  ActSLos  ActLLos

--------------------------------------------------------------------------------

10.20.20.0/24               N    N    N           N           N N

INPOLICY        0          10.5.5.5 Et0/1           BGP

U        U        0        0        0        0        13        0

N        N        N        N        N        N

10.30.30.0/24               N    N    N           N           N N

INPOLICY        0          10.5.5.5 Et0/1           BGP

U        U        0        0        0        0        14        0

N        N        N        N        N        N

如前所示，对于TCP流量，您可以看到Delay和Unreachable计数器也已填充，但在UDP流的情况下，您只能看到Bandwidth计数器已填充。

主动模式

R3#show pfr master

<Output suppressed>

Default Policy Settings:

backoff 90 900 90

delay relative 50

holddown 90

periodic 0

probe frequency 56

number of jitter probe packets 100

mode route control

mode monitor active

loss relative 10

jitter threshold 20

mos threshold 3.60 percent 30

unreachable relative 50

trigger-log percentage 30

测试 — 从服务器启动TCP数据流

在主控制器上：

R3#show pfr master traffic-class

OER Prefix Statistics:

Pas - Passive, Act - Active, S - Short term, L - Long term, Dly - Delay (ms),

P - Percentage below threshold, Jit - Jitter (ms),

MOS - Mean Opinion Score

Los - Packet Loss (percent/10000), Un - Unreachable (flows-per-million),

E - Egress, I - Ingress, Bw - Bandwidth (kbps), N - Not applicable

U - unknown, * - uncontrolled, + - control more specific, @ - active probe all

# - Prefix monitor mode is Special, & - Blackholed Prefix

% - Force Next-Hop, ^ - Prefix is denied

DstPrefix           Appl_ID Dscp Prot     SrcPort     DstPort SrcPrefix

Flags             State     Time            CurrBR  CurrI/F Protocol

PasSDly  PasLDly   PasSUn   PasLUn  PasSLos  PasLLos      EBw      IBw

ActSDly  ActLDly   ActSUn   ActLUn  ActSJit  ActPMOS  ActSLos  ActLLos

--------------------------------------------------------------------------------

10.10.20.0/24              N    N    N           N           N N

INPOLICY        0          10.4.4.4 Et0/1           BGP

N        N        N        N        N        N        N        N

54       54        0        0        N        N        N        N

10.30.30.0/24              N    N    N           N           N N

INPOLICY        0         10.4.4.4 Et0/1           BGP

N        N        N        N        N        N        N        N

54       54        0     1000        N        N        N        N

在BR1上：

R4#show pfr border active-probes

OER Border active-probes

Type      = Probe Type

Target    = Target IP Address

TPort     = Target Port

Source    = Send From Source IP Address

Interface = Exit interface

Att       = Number of Attempts

Comps   = Number of completions

N - Not applicable

Type     Target          TPort Source          Interface           Att   Comps

DSCP

echo    10.10.20.11         N 192.168.1.1      Et0/1                 3       3

0

echo    10.30.30.12         N 192.168.1.1      Et0/1                 3       3

0

在BR2上：

R5#show pfr border active-probes

OER Border active-probes

Type      = Probe Type

Target    = Target IP Address

TPort     = Target Port

Source    = Send From Source IP Address

Interface = Exit interface

Att       = Number of Attempts

Comps   = Number of completions

N - Not applicable

Type     Target          TPort Source        Interface           Att   Comps

DSCP

echo     10.10.20.11       N 192.168.2.1      Et0/1                 3       3

0

echo     10.30.30.12       N 192.168.2.1      Et0/1                 3       3

0

一旦MC上的流量类进入“INPOLICY”状态，并且BR1被选为用于发送所有流量的BR，BR2将停止发送探测：

R4#show pfr border active-probes

OER Border active-probes

Type      = Probe Type

Target    = Target IP Address

TPort     = Target Port

Source    = Send From Source IP Address

Interface = Exit interface

Att       = Number of Attempts

Comps   = Number of completions

N - Not applicable

Type     Target          TPort Source          Interface           Att   Comps

DSCP

echo    10.10.20.11         N 192.168.1.1      Et0/1                10      10

0

echo    10.30.30.12        N 192.168.1.1      Et0/1                10      10

0

R5#show pfr border active-probes

OER Border active-probes

Type      = Probe Type

Target    = Target IP Address

TPort     = Target Port

Source    = Send From Source IP Address

Interface = Exit interface

Att       = Number of Attempts

Comps   = Number of completions

N - Not applicable

Type     Target          TPort Source          Interface           Att   Comps

DSCP

混合模式

R3#show pfr master

OER state: ENABLED and ACTIVE

<Output Suppressed>

Default Policy Settings:

backoff 90 900 90

delay relative 50

holddown 90

periodic 0

probe frequency 56

number of jitter probe packets 100

mode route control

mode monitor both

loss relative 10

jitter threshold 20

mos threshold 3.60 percent 30

unreachable relative 50

trigger-log percentage 30

测试 — 从服务器启动TCP数据流

在测量流量类(TC)且状态尚未“INPOLICY”时，两个BR将向从Netflow收集的前缀发送活动探测。这是为了确定各自的链路条件。

在MC上：

R3#show pfr mas traffic-class

OER Prefix Statistics:

Pas - Passive, Act - Active, S - Short term, L - Long term, Dly - Delay (ms),

P - Percentage below threshold, Jit - Jitter (ms),

MOS - Mean Opinion Score

Los - Packet Loss (percent/10000), Un - Unreachable (flows-per-million),

E - Egress, I - Ingress, Bw - Bandwidth (kbps), N - Not applicable

U - unknown, * - uncontrolled, + - control more specific, @ - active probe all

# - Prefix monitor mode is Special, & - Blackholed Prefix

% - Force Next-Hop, ^ - Prefix is denied

DstPrefix           Appl_ID Dscp Prot     SrcPort     DstPort SrcPrefix

Flags             State     Time            CurrBR  CurrI/F Protocol

PasSDly  PasLDly   PasSUn   PasLUn  PasSLos  PasLLos      EBw      IBw

ActSDly  ActLDly   ActSUn   ActLUn  ActSJit  ActPMOS  ActSLos  ActLLos

--------------------------------------------------------------------------------

10.20.20.0/24              N    N    N           N           N N

HOLDDOWN       61          10.5.5.5Et0/1           BGP

1        1        0        0        0        0       16        1

1        1        0        0        N        N        N        N

10.30.30.0/24             N    N    N           N           N N

HOLDDOWN       61         10.5.5.5 Et0/1           BGP

1        1        0        0        0        0       16        1

4        4        0        0        N        N        N        N

在BR1上：

R4#show pfr border active-probes

OER Border active-probes

Type      = Probe Type

Target    = Target IP Address

TPort     = Target Port

Source    = Send From Source IP Address

Interface = Exit interface

Att       = Number of Attempts

Comps   = Number of completions

N - Not applicable

Type     Target          TPort Source          Interface           Att   Comps

DSCP

echo     10.20.20.1          N 192.168.1.1      Et0/1                 1       1

0

echo     10.30.30.1          N 192.168.1.1     Et0/1                 1       1

0

在BR2上：

R5#show pfr border active-probes

OER Border active-probes

Type      = Probe Type

Target    = Target IP Address

TPort     = Target Port

Source    = Send From Source IP Address

Interface = Exit interface

Att       = Number of Attempts

Comps   = Number of completions

N - Not applicable

Type     Target          TPort Source          Interface           Att   Comps

DSCP

echo     10.20.20.1          N 192.168.2.1      Et0/1                 1       1

0

echo     10.30.30.1          N 192.168.2.1      Et0/1                 1       1

在MC上，状态更改为“INPOLICY”时，两个BR将停止发送主动探测，并且各自的监控将切换到被动模式（使用Netflow）。

R3#show pfr master traffic-class

OER Prefix Statistics:

Pas - Passive, Act - Active, S - Short term, L - Long term, Dly - Delay (ms),

P - Percentage below threshold, Jit - Jitter (ms),

MOS - Mean Opinion Score

Los - Packet Loss (percent/10000), Un - Unreachable (flows-per-million),

E - Egress, I - Ingress, Bw - Bandwidth (kbps), N - Not applicable

U - unknown, * - uncontrolled, + - control more specific, @ - active probe all

# - Prefix monitor mode is Special, & - Blackholed Prefix

% - Force Next-Hop, ^ - Prefix is denied

DstPrefix           Appl_ID Dscp Prot     SrcPort     DstPort SrcPrefix

Flags             State     Time            CurrBR  CurrI/F Protocol

PasSDly  PasLDly   PasSUn   PasLUn  PasSLos  PasLLos      EBw      IBw

ActSDly  ActLDly   ActSUn   ActLUn  ActSJit  ActPMOS  ActSLos  ActLLos

--------------------------------------------------------------------------------

10.20.20.0/24              N    N    N           N           N N

INPOLICY        0          10.5.5.5 Et0/1           BGP

1        1        0        0        0        0        3        1

1        1        0        0       N        N        N        N

10.30.30.0/24           N    N    N           N           N N

INPOLICY        0          10.5.5.5 Et0/1           BGP

1        1        0        0        0        0       14        1

1        1        0        0        N        N        N        N

如图所示，您可以看到被动和主动组件的计数器。此外，一旦TC进入“INPOLICY”状态，探测功能将停止在BR上。

R4#show pfr border active-probes

OER Border active-probes

Type      = Probe Type

Target    = Target IP Address

TPort     = Target Port

Source    = Send From Source IP Address

Interface = Exit interface

Att       = Number of Attempts

Comps   = Number of completions

N - Not applicable

Type     Target          TPort Source          Interface           Att   Comps

DSCP

R5#show pfr border active-probes

OER Border active-probes

Type      = Probe Type

Target    = Target IP Address

TPort     = Target Port

Source    = Send From Source IP Address

Interface = Exit interface

Att       = Number of Attempts

Comps   = Number of completions

N - Not applicable

Type     Target          TPort Source          Interface           Att   Comps

DSCP

注意：版本15.6(3)M、15.7(3)M和更高版本的T系列版本不支持PfRv2。此外，版本16.3.1具有PfRv2 CLI，但不支持功能。当代码从MCP移动到Polaris时，功能中断，这在Polaris版本中无法修复。

故障排除

目前没有针对此配置的故障排除信息。