目录

简介

先决条件

要求

使用的组件

规则

配置

网络图

配置

验证

故障排除

相关信息

简介

边界网关协议 (BGP) 是用于实现 Internet 连接冗余的关键协议之一。当您将网络连接到两个不同的 Internet 服务提供商 (ISP) 时，此操作称为多宿主。多宿主可提供冗余和网络优化。它选择为资源提供最佳路径的 ISP。在采用多个服务提供商运行 BGP 时，存在自治系统 (AS) 可能成为中转 AS 的风险。这会导致 Internet 流量通过 AS，可能占用路由器 CPU 的所有带宽和资源。本文档对此问题进行讨论，并提供相应的配置示例。

先决条件

要求

在您继续之前，请参考此文档：

两个不同服务提供商（多宿）间的 BGP 的示例配置

使用的组件

本文档中的信息基于以下软件和硬件版本：

- 装有 Cisco IOS® 软件版本 12.4(13r)T 的 Cisco 2800 系列路由器

- 装有 Cisco IOS 软件版本 12.4(13r)T 的 Cisco 3800 系列路由器

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

配置

本部分提供有关如何配置本文档所述功能的信息。

注意：使用命令查找工具(仅限注册客户)可查找有关本文档中使用的命令的详细信息。

网络图

本文档使用以下网络设置：

在此网络中，路由器 A 连接至两个不同的服务提供商 SP-A 和 SP-B，形成多宿主，其中 1010:1010::/64 和 2020:2020::/64 由 AS 101 向外部通告，网络 1212:1212::/64 从两个不同的 AS，即 AS 202 和 AS 303 进行接收。

注意：以下是视频(在思科支持社区上提供)的链接，提供BGP多宿主的概述，并就如何排除常见BGP问题（如对等和高CPU）提供建议。

BGP 多宿主：设计和故障排除 - 网络直播视频

配置

本文档使用以下配置：

- 路由器 A

- 服务提供商 A

- 服务提供商 B

路由器 A

Router-A#

ipv6 unicast-routing

!---Enables the forwarding of IPv6 packets.

ipv6 cef

interface Serial3/0

description CONNECTED TO SP-A

ip address 192.168.10.1 255.255.255.0

ipv6 address 1202:ABCD::/64 eui-64

ipv6 enable

no fair-queue

clock rate 64000

!

interface Serial3/1

description CONNECTED TO SP-B

no ip address

ipv6 address 2303:ABCD::/64 eui-64

clock rate 64000

!

router bgp 101

bgp router-id 1.1.1.1

no bgp default ipv4-unicast

bgp log-neighbor-changes

neighbor 1202:ABCD::21B:54FF:FEA9:24B0 remote-as 202

!--- Configures SP-A as neighbor.

neighbor 1202:ABCD::21B:54FF:FEA9:24B0 ebgp-multihop 2

neighbor 2303:ABCD::21B:54FF:FE54:FB10 remote-as 303

!--- Configures SP-B as neighbor.

!

address-family ipv6

neighbor 1202:ABCD::21B:54FF:FEA9:24B0 activate

neighbor 2303:ABCD::21B:54FF:FE54:FB10 activate

network 1010:1010::/64

network 2020:2020::/64

exit-address-family

!

服务提供商A

SP-A#

ipv6 unicast-routing

ipv6 cef

interface Serial1/0

no ip address

ipv6 address 1202:ABCD::/64 eui-64

ipv6 enable

no fair-queue

!

router bgp 202

bgp router-id 2.2.2.2

no bgp default ipv4-unicast

bgp log-neighbor-changes

neighbor 1202:ABCD::21C:58FF:FEED:3E90 remote-as 101

!--- Configuers Router A as neighbor.

!

address-family ipv6

neighbor 1202:ABCD::21C:58FF:FEED:3E90 activate

network 1212:1212::/64

exit-address-family

!

服务提供商B

SP-B#

ipv6 unicast-routing

ipv6 cef

interface Serial1/0

no ip address

ipv6 address 2303:ABCD::/64 eui-64

no fair-queue

!

router bgp 303

no synchronization

bgp router-id 3.3.3.3

bgp log-neighbor-changes

neighbor 2303:ABCD::21C:58FF:FEED:3E90 remote-as 101

!--- Configures as Router A as neighbor.

neighbor 2303:ABCD::21C:58FF:FEED:3E90 ebgp-multihop 5

no auto-summary

!

address-family ipv6

neighbor 2303:ABCD::21C:58FF:FEED:3E90 activate

network 1212:1212::/64

exit-address-family

!

验证

使用本部分可确认配置能否正常运行。

命令输出解释程序（仅限注册用户）(OIT) 支持某些 show 命令。使用 OIT 可查看对 show 命令输出的分析。

- 路由器 A 与两个 ISP 配对

Router-A#

show bgp ipv6 unicast summary

BGP router identifier 1.1.1.1, local AS number 101

BGP table version is 6, main routing table version 6

3 network entries using 447 bytes of memory

4 path entries using 304 bytes of memory

4/2 BGP path/bestpath attribute entries using 496 bytes of memory

2 BGP AS-PATH entries using 48 bytes of memory

0 BGP route-map cache entries using 0 bytes of memory

0 BGP filter-list cache entries using 0 bytes of memory

BGP using 1295 total bytes of memory

BGP activity 3/0 prefixes, 14/10 paths, scan interval 60 secs

Neighbor        V    AS MsgRcvd MsgSent   TblVer  InQ OutQ Up/Down  State/PfxRcd

1202:ABCD::21B:54FF:FEA9:24B0   4   202   108     119   6    0    0 00:31:41   1

2303:ABCD::21B:54FF:FE54:FB10   4   303   108     121   6    0    0 00:25:1    1

!--- Indicates that Router A is peering with both the ISP SP-A and SP-B

- 路由器 A 从 SP-A 和 SP-B 获取路由

Router-A#show bgp ipv6 unicast

BGP table version is 6, local router ID is 1.1.1.1

Status codes: s suppressed, d damped, h history, * valid, > best, i - internal,

r RIB-failure, S Stale

Origin codes: i - IGP, e - EGP, ? - incomplete

Network          Next Hop            Metric LocPrf Weight Path

*> 1010:1010::/64   ::                       0                          32768 i

*  1212:1212::/64   2303:ABCD::21B:54FF:FE54:FB10 0  0 303 i

*>                              1202:ABCD::21B:54FF:FEA9:24B0 0  0 202 i

*> 2020:2020::/64   ::                       0                         32768 i

- 在 SP-A 上：

SP-A#sh bgp ipv6 unicast

BGP table version is 4, local router ID is 2.2.2.2

Status codes: s suppressed, d damped, h history, * valid, > best, i - internal,

r RIB-failure, S Stale

Origin codes: i - IGP, e - EGP, ? - incomplete

Network          Next Hop            Metric LocPrf Weight Path

*> 1010:1010::/64   1202:ABCD::21C:58FF:FEED:3E90 0 0 101 i

*> 1212:1212::/64   ::                       0            32768              i

*> 2020:2020::/64   1202:ABCD::21C:58FF:FEED:3E90 0 0 101 i

- 在 SP-B 上：

SP-B#sh bgp ipv6 unicast

BGP table version is 4, local router ID is 3.3.3.3

Status codes: s suppressed, d damped, h history, * valid, > best, i - internal,

r RIB-failure, S Stale

Origin codes: i - IGP, e - EGP, ? - incomplete

Network          Next Hop            Metric LocPrf Weight Path

*> 1010:1010::/64   2303:ABCD::21C:58FF:FEED:3E90 0             0 101 i

*  1212:1212::/64   2303:ABCD::21C:58FF:FEED:3E90  0                 101 202 i

*>                  ::                       0         32768 i

*> 2020:2020::/64   2303:ABCD::21C:58FF:FEED:3E90 0             0 101 i

故障排除

使用debug bgp ipv6 update命令可显示有关更新的调试信息，以帮助确定对等的状态。

相关信息

- 边界网关协议 (BGP)

- BGP 案例分析

- BGP 命令参考

- BGP配置指南

- 技术支持和文档 - Cisco Systems