目录

简介

先决条件

要求

使用的组件

规则

网络图

配置

相关信息

简介

本文档解释在配置到协议独立组播(PIM)稀疏模式邻居的热备用路由器协议(HSRP)地址的静态路由时组播数据包为何不转发。

先决条件

要求

本文档的读者应掌握以下这些主题的相关知识：

- HSRP

- PIM 稀疏模式

使用的组件

本文档不限于特定的软件和硬件版本。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

网络图

在上图中，路由器2和3在子网10.1.3.0上通话HSRP，而路由器2是活动路由器。路由器1、2和3正在通话增强型内部网关路由协议(EIGRP)，而路由器4具有到HSRP虚拟地址的静态默认路由。

配置

路由器 1

路由器 2

Current configuration:

!

ip multicast-routing

!

!

interface Loopback0

ip address 10.10.10.10 255.255.255.255

no ip directed-broadcast

!

interface Ethernet0

no ip address

no ip directed-broadcast

shutdown

!

interface Ethernet1

ip address 10.1.1.1 255.255.255.0

no ip directed-broadcast

ip pim sparse-mode

!

interface Serial1

no ip address

no ip directed-broadcast

encapsulation frame-relay

!

interface Serial1.1 point-to-point

ip address 10.1.2.1 255.255.255.252

no ip directed-broadcast

ip pim sparse-mode

frame-relay interface-dlci 612

!

!

interface Serial1.2 point-to-point

ip address 10.1.2.5 255.255.255.252

no ip directed-broadcast

ip pim sparse-mode

frame-relay interface-dlci 613

!

router eigrp 1

network 10.0.0.0

no auto-summary

!

ip classless

no ip http server

ip pim rp-address 10.10.10.10

!

end

Current configuration:

!

ip multicast-routing

ip dvmrp route-limit 20000

!

!

interface Ethernet1

ip address 10.1.3.1 255.255.255.0

no ip redirects

ip pim sparse-mode

standby 1 priority 110 preempt

standby 1 ip 10.1.3.3

!

interface Serial1

no ip address

encapsulation frame-relay

!

interface Serial1.1 point-to-point

ip address 10.1.2.2 255.255.255.252

ip pim sparse-mode

frame-relay interface-dlci 621

!

router eigrp 1

network 10.0.0.0

no auto-summary

!

ip classless

ip pim rp-address 10.10.10.10

!

end

路由器 3

路由器 4

Current configuration:

!

ip multicast-routing

ip dvmrp route-limit 20000

!

interface Ethernet1

ip address 10.1.3.2 255.255.255.0

no ip redirects

ip pim sparse-mode

standby 1 priority 100 preempt

standby 1 ip 10.1.3.3

!

interface Serial1

no ip address

encapsulation frame-relay

!

interface Serial1.2 point-to-point

ip address 10.1.2.6 255.255.255.252

ip pim sparse-mode

frame-relay interface-dlci 631

!

router eigrp 1

network 10.0.0.0

no auto-summary

eigrp log-neighbor-changes

!

ip classless

no ip http server

ip pim rp-address 10.10.10.10

!

end

Current configuration:

ip multicast-routing

ip dvmrp route-limit 20000

!

!

!

interface Ethernet0

ip address 10.1.4.1 255.255.255.0

no ip directed-broadcast

ip igmp join-group 239.1.2.3

!

interface Ethernet1

ip address 10.1.3.4 255.255.255.0

no ip directed-broadcast

ip pim sparse-mode

!

no ip http server

ip classless

ip route 0.0.0.0 0.0.0.0 10.1.3.3

ip pim rp-address 10.10.10.10

!

end

为了模拟Ethernet 0上的主机，在路由器4的此接口上配置了ip igmp join-group命令：

router4# ip igmp join-group

IGMP Connected Group Membership

Group Address Interface Uptime Expires Last Reporter

224.0.1.40 Ethernet1 4d23h never 10.1.3.1

239.1.2.3 Ethernet0 4d23h never 10.1.4.1

路由器4还可以ping交汇点(RP)地址：

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.10.10.10, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 60/61/68 ms

查看组播路由(mroute)表：

Router4# show ip mroute 239.1.2.3

IP Multicast Routing Table

Flags: D - Dense, S - Sparse, C - Connected, L - Local, P - Pruned

R - RP-bit set, F - Register flag, T - SPT-bit set, J - Join SPT

X - Proxy Join Timer Running

Timers: Uptime/Expires

Interface state: Interface, Next-Hop or VCD, State/Mode

(*, 239.1.2.3), 00:04:28/00:00:00, RP 10.10.10.10, flags: SJCL

Incoming interface: Ethernet1, RPF nbr 10.1.3.3

Outgoing interface list:

Ethernet0, Forward/Sparse, 00:02:12/00:02:53

由于此组有接收方(由于路由器4中使用ip igmp join-group命令)，因此在mroute表中构建(*,G)条目。请注意(*,G)条目的反向路径转发(RPF)邻居为10.1.3.3，即HSRP备用地址。但是，没有(S，G)条目，这表示没有从源接收流量。

由于路由器4具有对组感兴趣的接收方，因此它现在应该向其PIM邻居发送PIM加入/修剪消息。使用show ip pim neighbor命令查看路由器4的PIM邻居，如下所示：

Router4# show ip pim neighbor

PIM Neighbor Table

Neighbor Address Interface Uptime Expires Ver Mode

10.1.3.1 Ethernet1 4d23h 00:01:41 v2

10.1.3.2 Ethernet1 4d23h 00:01:36 v2

如果启用debug ip pim 239.1.2.3命令，则路由器4正在构建此PIM加入/修剪消息，但它实际上并未发送该消息：

*Mar 6 18:32:48:PIM:从10.10.10.10收到Ethernet1上可到达的RP*Mar 6 18:32:48:对于组239.1.2.3 *3月6日18:33:14:PIM:239.1.2.3的建筑加入/修剪消息*3月6日18:34:13:PIM:构建239.1.2.3的加入/修剪消息

为什么路由器不发送Join/Prune消息？RFC 2362 指出“路由器向与每个(S，G)、(*,G)和(*,*,RP)条目关联的每个不同RPF邻居发送定期的加入/修剪消息。仅当RPF邻居是PIM邻居时，才会发送加入/修剪消息。”

在本例中，RPF邻居为10.1.3.3，这是默认静态路由使用的HSRP备用地址。但是，此地址未列为PIM邻居。HSRP备用地址未列为PIM邻居的原因是，运行HSRP的两台路由器（路由器2和3）将不会从HSRP备用地址获取PIM邻居消息。

要解决此问题，请更改路由器4的配置，使RPF邻居也是PIM邻居。为此，请在EIGRP进程中包含路由器4，使其现在通过EIGRP获取RP地址。

注意：由于路由器4能够运行路由协议，因此它不必依赖HSRP备用地址进行连接。HSRP的开发旨在为主机提供快速高效的冗余或故障切换的方法。

以下是启用EIGRP的路由器4的新配置。

ip multicast-routing

ip dvmrp route-limit 20000

!

!

!

interface Ethernet0

ip address 10.1.4.1 255.255.255.0

no ip directed-broadcast

ip igmp join-group 239.1.2.3

!

interface Ethernet1

ip address 10.1.3.4 255.255.255.0

no ip directed-broadcast

ip pim sparse-mode

!

router eigrp 1

network 10.0.0.0

no auto-summary

!

no ip http server

ip classless

ip route 0.0.0.0 0.0.0.0 10.1.3.3

ip pim rp-address 10.10.10.10

!

end

注意：在EIGRP进程（首选方法）中不包括路由器4，而是向路由器4添加静态路由，使其RPF到实际路由器的IP地址，因为在RPF检查中，mroutes优先于单播路由表。例如，添加ip mroute 0.0.0.0 0.0.0.0 10.1.3.2。

相关信息

- HSRP 支持页

- IP 路由协议支持页

- 技术支持 - Cisco Systems