目录

简介

先决条件

要求

使用的组件

背景信息

配置

网络图

地址系列配置模式

地址系列接口配置模式

地址系列拓扑配置模式

比较

可用性

自动转换到命名EIGRP

验证

故障排除

简介

本文档介绍命名增强型内部网关路由协议(EIGRP)模式功能，并借助相关配置讨论传统模式和命名模式之间的差异。

先决条件

要求

Cisco建议您对IP路由和EIGRP协议有基本的了解。

使用的组件

本文档不限于特定的软件和硬件版本。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

背景信息

传统的EIGRP配置方法要求在接口和EIGRP配置模式下配置各种参数。要配置EIGRP IPV4和IPv6，需要配置单独的EIGRP实例。在IPv6 EIGRP实施中，传统EIGRP不支持虚拟路由和转发(VRF)。

使用命名模式EIGRP时，所有配置都在EIGRP配置下的单个位置进行，并且没有前文所述的限制。

配置

网络图

此图像是文档其余部分的示例拓扑。

与传统方法不同，在路由器上配置EIGRP实例时，既未创建也未启动：

R1(config)#router eigrp TEST

配置地址系列和自治系统编号时，将创建实例，例如：

R1(config-router)#address-family ipv4 unicast autonomous-system 1

使用此命名模式时，只需创建一个EIGRP实例。它可用于所有地址系列类型。它还支持仅受可用系统资源限制的多个VRF。有关命名模式，需要注意的一点是，地址系列的配置不会将IPv4路由作为IPv4 EIGRP的传统配置启用。要启动该过程，需要“no shut”：

router eigrp [virtual-instance-name | asystem]

[no] shutdown

命名EIGRP有三种模式，在这三种模式下完成大量配置。即：

- address-family配置模式 — (config-router-af)#

- address-family接口配置模式 — (config-router-af-interface)#

- address-family topology configuration mode -(config-router-af-topology)#

地址系列配置模式

使用以下命令进入此模式：

R1(config-router)#address-family ipv4 unicast autonomous-system 1

R1(config-router-af)#?

Address Family configuration commands:

af-interface                    Enter Address Family interface configuration

default                         Set a command to its defaults

eigrp                           EIGRP Address Family specific commands

exit-address-family             Exit Address Family configuration mode

help                            Description of the interactive help system

maximum-prefix                  Maximum number of prefixes acceptable in aggregate

metric                          Modify metrics and parameters for advertisement

neighbor                        Specify an IPv4 neighbor router

network                         Enable routing on an IP network

no                              Negate a command or set its defaults

shutdown                        Shutdown address family

timers                          Adjust peering based timers

topology                        Topology configuration mode

在此模式下，可以配置以下参数：网络、EIGRP邻居和EIGRP路由器ID。从此模式访问命名EIGRP的另外两种配置模式。

传统配置

Interface GigabitEthernet 0/0

ip bandwidth-percent eigrp 1 75

ipv6 enable

ipv6 eigrp 1

ip bandwidth-percent eigrp 1 75

no shut

!

router eigrp 1

eigrp router-id 10.10.10.1

network 0.0.0.0 0.0.0.0

ipv6 router eigrp 1

eigrp router-id 10.10.10.1

no shut

命名配置

router eigrp TEST

!

address-family ipv4 unicast autonomous-system 1

!

network 0.0.0.0

eigrp router-id 10.10.10.1

no shutdown

exit-address-family

!

address-family ipv6 unicast autonomous-system 1

!

eigrp router-id 10.10.10.1

no shutdown

exit-address-family

地址系列接口配置模式

此模式采用之前在实际接口（逻辑或物理）上配置的所有接口特定命令。  EIGRP身份验证、水平分割和汇总地址配置是现在在此处而不是实际接口上配置的一些选项：

R1(config-router-af)#af-interface g0/0

R1(config-router-af-interface)#?

Address Family Interfaces configuration commands:

authentication             authentication subcommands

bandwidth-percent          Set percentage of bandwidth percentage limit

bfd                        Enable Bidirectional Forwarding Detection

dampening-change           Percent interface metric must change to cause update

dampening-interval         Time in seconds to check interface metrics

default                    Set a command to its defaults

exit-af-interface          Exit from Address Family Interface configuration

hello-interval             Configures hello interval

hold-time                  Configures hold time

next-hop-self              Configures EIGRP next-hop-self

no                         Negate a command or set its defaults

passive-interface          Suppress address updates on an interface

shutdown                   Disable Address-Family on interface

split-horizon              Perform split horizon

summary-address            Perform address summarization

注意：您可以使用af-interface default命令将配置一次应用到所有接口。

地址系列拓扑配置模式

此模式提供了在EIGRP拓扑表上运行的多个配置选项。可以在此模式下配置重分发、距离、偏移列表、差异等。您可以从地址系列配置模式进入此模式。

R1(config-router-af)#topology base

R1(config-router-af-topology)#?

Address Family Topology configuration commands:

auto-summary         Enable automatic network number summarization

default              Set a command to its defaults

default-information  Control distribution of default information

default-metric       Set metric of redistributed routes

distance             Define an administrative distance

distribute-list      Filter entries in eigrp updates

eigrp                EIGRP specific commands

exit-af-topology     Exit from Address Family Topology configuration

maximum-paths        Forward packets over multiple paths

metric               Modify metrics and parameters for advertisement

no                   Negate a command or set its defaults

offset-list          Add or subtract offset from EIGRP metrics

redistribute         Redistribute IPv4 routes from another routing proto

summary-metric       Specify summary to apply metric/filtering

timers               Adjust topology specific timers

traffic-share        How to compute traffic share over alternate paths

variance             Control load balancing variance

比较

下面显示了所讨论的两种配置模式的比较：

可用性

EIGRP命名配置可从以下Cisco IOS®版本获得：

- 15.0(1)M

- 12.2(33)SRE

- 12.2(33)XNE

- 思科IOS XE版本2.5

自动转换到命名EIGRP

有一种将配置从传统方式转换为新方法的自动方法。在EIGRP进程内，

需要输入eigrp upgrade-cli <EIGRP虚拟实例名称>。这会自动将配置转换为命名模式，而不会影响已建立的EIGRP对等：

Traditional Configuration

router eigrp 1

network 10.10.10.1 0.0.0.0

!

interface Ethernet0/0

ip address 10.10.10.1 255.255.255.0

ip hello-interval eigrp 1 100

Configuration

R1(config)#router eigrp 1

R1(config-router)#eigrp upgrade-cli TEST

Configuration will be converted from router eigrp 1 to router eigrp TEST.

Are you sure you want to proceed? ? [yes/no]: yes

*Oct 10 14:14:40.684: EIGRP: Conversion of router eigrp 1 to router eigrp TEST -

Completed.

Converted Named Configuration

router eigrp TEST

!

address-family ipv4 unicast autonomous-system 1

!

af-interface Ethernet0/0

hello-interval 100

exit-af-interface

!

topology base

exit-af-topology

network 10.10.10.1 0.0.0.0

exit-address-family

验证

当前没有可用于此配置的验证过程。

故障排除

目前没有针对此配置的故障排除信息。