目录

简介

先决条件

要求

使用的组件

配置

网络图

配置

验证

显示命令

故障排除

相关信息

简介

本文档介绍如何配置 IPv6 的增强型内部网关路由协议 (EIGRP)。 EIGRP 是思科开发的 IGRP 的增强版本。它是一种增强的距离矢量协议，依靠扩散更新算法 (DUAL) 来计算到网络中某个目的地的最短路径。IPv6 的 EIGRP 与 IPv4 的 EIGRP 的工作原理相同，它们都可以进行单独配置和管理。

先决条件

要求

Cisco 建议您了解以下主题：

- EIGRPv4 基础知识

- IPv6 寻址基础知识

限制

IPv6 的 EIGRP 的配置存在一些限制；其中包括：

- 可以直接使用 IPv6 的 EIGRP 配置接口，而无需使用全局 IPv6 地址。IPv6 的 EIGRP 中没有 network 语句。

- 在运行 EIGRPv6 协议实例之前，需要先为其配置路由器 ID。

- IPv6 的 EIGRP 具有关闭功能。确保路由进程处于“no shut”模式，以运行协议。

使用的组件

本文所述的配置基于运行 Cisco IOS 软件版本 12.4 (15)T 13 的思科 3700 系列路由器。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

配置

在本例中，我们为两台路由器（R1 和 R2）配置了 IPv6 地址。我们在这两台路由器中都分配了环回地址，并将它们配置为位于 EIGRP1 中。 使用以下命令在每个接口级别启用 EIGRPv6：ipv6 eigrp as-number。

网络图

本示例使用以下网络设置：

配置

此示例使用以下配置：

- 路由器 R1 配置

- 路由器 R2 配置

R1 的配置

hostname R1

!

ipv6 unicast-routing

!

interface Loopback0

no ip address

ipv6 address 1010:AB8::/64 eui-64

ipv6 enable

ipv6 eigrp 1

!

interface Loopback1

no ip address

ipv6 address 2020:AB8::/64 eui-64

ipv6 enable

ipv6 eigrp 1

!

interface Loopback2

no ip address

ipv6 address 3030:AB8::/64 eui-64

ipv6 enable

ipv6 eigrp 1

!

interface Serial0/0

no ip address

ipv6 address FE80::1 link-local

ipv6 address 2010:AB8::1/64

ipv6 enable

ipv6 eigrp 1

clock rate 2000000

!

ipv6 router eigrp 1

eigrp router-id 2.2.2.2

no shutdown

!

end

R2 配置

hostname R2

!

ipv6 unicast-routing

!

interface Loopback0

no ip address

ipv6 address 1000:AB8::/64 eui-64

ipv6 enable

ipv6 eigrp 1

!

interface Loopback1

no ip address

ipv6 address 2000:AB8::/64 eui-64

ipv6 enable

ipv6 eigrp 1

!

interface Loopback2

no ip address

ipv6 address 3000:AB8::/64 eui-64

ipv6 enable

ipv6 eigrp 1

!

interface Serial0/0

no ip address

ipv6 address FE80::2 link-local

ipv6 address 2010:AB8::2/64

ipv6 enable

ipv6 eigrp 1

clock rate 2000000

!

ipv6 router eigrp 1

eigrp router-id 1.1.1.1

no shutdown

!

end

验证

使用本部分可确认配置能否正常运行。

思科 CLI 分析器（仅适用于注册客户）支持某些 show 命令。要查看对 show 命令输出的分析，请使用思科 CLI 分析器。

显示命令

show ipv6 eigrp neighbors 命令显示 EIGRPv6 发现的邻居。

Show ipv6 eigrp neighbors

路由器 R1
IPv6-EIGRP neighbors for process 1

H   Address                 Interface       Hold Uptime   SRTT   RTO  Q  Seq

(sec)         (ms)       Cnt Num

0   Link-local address:     Se0/0             13 15:17:58   44   264  0  12

FE80::2

!--- Shows the link local address of router R2.

路由器 R2

IPv6-EIGRP neighbors for process 1

H   Address                 Interface       Hold Uptime   SRTT   RTO  Q  Seq

(sec)         (ms)       Cnt Num

0   Link-local address:     Se0/0             14 16:32:05   30   300  0  12

FE80::1

!--- Shows the link local address of router R1.

show ipv6 route eigrp 命令显示包含 EIGRP 特定路由的 IPv6 路由表的内容。

show ipv6 route eigrp

路由器 R1
R1#show ipv6 route eigrp

IPv6 Routing Table - 12 entries

Codes: C - Connected, L - Local, S - Static, R - RIP, B - BGP

U - Per-user Static route, M - MIPv6

I1 - ISIS L1, I2 - ISIS L2, IA - ISIS interarea, IS - ISIS summary

O - OSPF intra, OI - OSPF inter, OE1 - OSPF ext 1, OE2 - OSPF ext 2

ON1 - OSPF NSSA ext 1, ON2 - OSPF NSSA ext 2

D - EIGRP, EX - EIGRP external

D   1000:AB8::/64 [90/2297856]

via FE80::2, Serial0/0

D   2000:AB8::/64 [90/2297856]

via FE80::2, Serial0/0

D   3000:AB8::/64 [90/2297856]

via FE80::2, Serial0/0

!--- This command shows IPv6-specific EIGRP routes.

路由器 R2

R2#show ipv6 route eigrp

IPv6 Routing Table - 12 entries

Codes: C - Connected, L - Local, S - Static, R - RIP, B - BGP

U - Per-user Static route, M - MIPv6

I1 - ISIS L1, I2 - ISIS L2, IA - ISIS interarea, IS - ISIS summary

O - OSPF intra, OI - OSPF inter, OE1 - OSPF ext 1, OE2 - OSPF ext 2

ON1 - OSPF NSSA ext 1, ON2 - OSPF NSSA ext 2

D - EIGRP, EX - EIGRP external

D   1010:AB8::/64 [90/2297856]

via FE80::1, Serial0/0

D   2020:AB8::/64 [90/2297856]

via FE80::1, Serial0/0

D   3030:AB8::/64 [90/2297856]

via FE80::1, Serial0/0

show ipv6 eigrp interfaces 命令显示有关为 EIGRP 配置的接口的信息。

show ipv6 eigrp interfaces

路由器 R1
R1#show ipv6 eigrp 1 interface

IPv6-EIGRP interfaces for process 1

Xmit Queue   Mean   Pacing Time   Multicast    Pending

Interface        Peers  Un/Reliable  SRTT   Un/Reliable   Flow Timer   Routes

Se0/0              1        0/0        44       0/15         199           0

Lo0                0        0/0         0       0/1            0           0

Lo1                0        0/0         0       0/1            0           0

Lo2                0        0/0         0       0/1            0           0

!--- This command determines which interface EIGRP is active.

路由器 R2

R2#show ipv6 eigrp 1 interface

IPv6-EIGRP interfaces for process 1

Xmit Queue   Mean   Pacing Time   Multicast    Pending

Interface        Peers  Un/Reliable  SRTT   Un/Reliable   Flow Timer   Routes

Se0/0              1        0/0        30       0/15         135           0

Lo0                0        0/0         0       0/1            0           0

Lo1                0        0/0         0       0/1            0           0

Lo2                0        0/0         0       0/1            0           0

故障排除

目前没有针对此配置的故障排除信息。

相关信息

- EIGRP 支持页

- Cisco IOS IPv6 命令参考

- IPv6 技术支持

- 技术支持和文档 - Cisco Systems