目录

简介

先决条件

要求

使用的组件

规则

配置

网络图

配置

验证

显示命令

相关信息

简介

本文档介绍如何配置EIGRP和BGP之间的相互重分发。

先决条件

要求

Cisco 建议您了解以下主题：

- 增强型内部网关路由协议 (EIGRP)

- 边界网关协议 (BGP)

使用的组件

本文中的信息基于装有 Cisco IOS® 软件版本 15.0(1) 的 Cisco 7200 系列路由器。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您的网络处于活动状态，请确保您了解所有命令的潜在影响。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

配置

在本例中，路由器 R1 和 R2 使用 EIGRP 彼此通信。路由器 R2 和 R3 使用 eBGP。为了将eBGP路由双向分配到EIGRP，请使用具有EIGRP指标的redistribute bgp命令。同样，为了将EIGRP路由再分配到BGP，请使用redistribute eigrp AS number  命令。

网络图

本文档使用以下网络设置：

网络图

配置

本文档使用以下配置：

- 路由器 R1

- 路由器 R2

- 路由器 R3

路由器 R1

!

hostname R1

!

ip cef

!

!

interface Loopback0

ip address 10.30.30.30 255.255.255.255

!

interface FastEthernet0/0

ip address 192.168.1.101 255.255.255.0

duplex auto

speed auto

!

router eigrp 100

network 10.30.0.0

network 192.168.1.0

no auto-summary

!

end

路由器 R2

!

hostname R2

!

ip cef

!

!

interface Loopback0

ip address 10.10.10.10 255.255.255.255

!

interface Loopback1

ip address 10.20.20.20 255.255.255.255

!

interface FastEthernet0/0

ip address 192.168.1.100 255.255.255.0

duplex auto

speed auto

!

interface Serial0/0

ip address 172.16.100.50 255.255.255.0

serial restart-delay 0

clock rate 2000000

!

router eigrp 100

redistribute static

redistribute bgp 1000 metric 100 1 255 1 1500

network 10.0.0.0

network 192.168.1.0

no auto-summary

!

router bgp 1000

no synchronization

bgp log-neighbor-changes

network 10.20.20.20 mask 255.255.255.255

redistribute connected

redistribute static

redistribute eigrp 100

neighbor 172.16.100.51 remote-as 2000

neighbor 172.16.100.51 next-hop-self

no auto-summary

!

end

路由器 R3

!

hostname R3

!

ip cef

!

interface Loopback0

ip address 10.22.22.22 255.255.255.255

!

interface Serial0/0

ip address 172.16.100.51 255.255.255.0

serial restart-delay 0

clock rate 2000000

!

router bgp 2000

no synchronization

bgp log-neighbor-changes

network 10.22.22.22 mask 255.255.255.255

network 172.16.100.0 mask 255.255.255.0

neighbor 172.16.100.50 remote-as 1000

neighbor 172.16.100.50 default-originate

default-information originate

!--- Default route is configured!

no auto-summary

!

end

验证

使用本部分可确认配置能否正常运行。

CLI分析器用于查看对show 命令输出的分析。

注意：只有思科注册用户才能访问思科内部工具和信息。

显示命令

为了验证EIGRP接收再分配的路由，请使用show ip route eigrp  命令。

show ip route eigrp

在路由器 R1 中

R1#show ip route eigrp

10.20.0.0/32 is subnetted, 1 subnets

D EX    10.20.20.20

[170/25625856] via 192.168.1.100, 01:00:33, FastEthernet0/0

10.22.0.0/32 is subnetted, 1 subnets

D EX    10.22.22.22

[170/25625856] via 192.168.1.100, 00:59:49, FastEthernet0/0

10.0.0.0/32 is subnetted, 1 subnets

D       10.10.10.10 [90/409600] via 192.168.1.100, 00:55:17, FastEthernet0/0

D*EX 0.0.0.0/0 [170/25625856] via 192.168.1.100, 00:46:24, FastEthernet0/0

!--- Shows the default route from router R3.

!--- EX indicates that the routes are EIGRP external routes.

为了验证EIGRP路由在BGP中正确再分配，请在路由器R3中使用show ip route bgp命令。

show ip route bgp

在路由器 R3 中

R3#show ip route bgp

show ip route bgp

10.20.0.0/32 is subnetted, 1 subnets

B       10.20.20.20 [20/0] via 172.16.100.50, 01:03:02

10.0.0.0/32 is subnetted, 1 subnets

B       10.10.10.10 [20/0] via 172.16.100.50, 01:03:02

B    192.168.1.0/24 [20/0] via 172.16.100.50, 01:03:02

10.30.0.0/32 is subnetted, 1 subnets

B       10.30.30.30 [20/409600] via 172.16.100.50, 00:59:06

!--- The output indicates that the EIGRP routes are

!--- redistributed in BGP.

相关信息

- BGP 支持页

- BGP 案例分析

- EIGRP 支持页

- 思科技术支持和下载