目录

简介

背景

使用的组件

拓扑

配置ITD

验证ITD

简介

本文档介绍Nexus 9000平台上的智能流量导向器(ITD)的配置和基本故障排除

背景

Cisco Intelligent Traffic Director(ITD)如下所示

- 使用Cisco Nexus 5/6/7/9K交换机为第3层和第4层服务和应用提供基于ASIC（硬件）的流量分配。

- 它执行L3和L4流量分配，但不取代第7层负载均衡器。

- 对负载均衡服务器执行运行状况监控和自动故障处理。

- 它会自动创建ACL、路由映射策略，以执行PBR功能来重定向和负载均衡流量。

使用的组件

硬件 — C9372PX

软件 — 7.0(3)I7(2)

许可证要求

Cisco NX-OS-ITD需要网络服务许可证。

在启用“功能ITD”且我们没有所需的许可证时显示以下日志。

VDC-1 %$ iscm[31793]:!!!!!!  警告：未在系统中找到“NETWORK_SERVICES_PKG”许可证  !!!!!!。您已经尝试过

VDC-1 %$ iscm[31793]:系统支持基于荣誉的许可证。功能将启用并完全正常工作。许可证使用

VDC-1 %$ iscm[31793]:如果您错误地启用了此功能，请禁用此功能。如果您尚未购买

为使用ITD需要启用的功能

- 功能ITD

- 功能PBR

- 功能Sla发件人

- 功能SLA响应器*

拓扑

配置ITD

配置ITD服务的四个主要步骤

- 创建设备组

- 创建ITD服务

- 将设备组附加到ITD服务

- 将服务附加到入口接口

N9K_ITD

version 7.0(3)I7(2)

feature itd

itd device-group Test

probe icmp

node ip 192.168.1.1

node ip 192.168.1.2

itd Telnet

device-group Test ( Call the device group )

virtual ip 192.168.2.2 255.255.255.255 tcp 23 ( Optional )

ingress interface Vlan20 ( Assign ingress interface )

no shut

interface Vlan20

no shutdown

ip address 192.168.2.2/24

ip policy route-map Telnet_itd_pool ( This line gets automatically added when we “no shut” the ITD service )

注意：将此信息应用于L2接口会产生以下错误。创建L3接口或SVI。

N9K_ITD(config-itd)# ingress interface ethernet 1/3

ERROR: Interface:Ethernet1/3 is not a layer-3 interface

请注意，以下配置会自动添加，这些是通过PBR为每个定义为LB的节点创建的时段。

Show run | section ITD

feature itd

ip access-list Telnet_itd_vip_1_bucket_1

10 permit tcp 1.1.1.0 255.255.255.127 192.168.2.4/32 eq telnet

ip access-list Telnet_itd_vip_1_bucket_2

10 permit tcp 1.1.1.128 255.255.255.127 192.168.2.4/32 eq telnet

route-map Telnet_itd_pool permit 10

description auto generated route-map for ITD service Telnet

match ip address Telnet_itd_vip_1_bucket_1

set ip next-hop verify-availability 192.168.1.1 track 2

route-map Telnet_itd_pool permit 11

description auto generated route-map for ITD service Telnet

match ip address Telnet_itd_vip_1_bucket_2

set ip next-hop verify-availability 192.168.1.2 track 3

ip policy route-map Telnet_itd_pool

switch(config)# show route-map Telnet_itd_pool

route-map Telnet_itd_pool, permit, sequence 10

Description: auto generated route-map for ITD service Telnet

Match clauses:

ip address (access-lists): Telnet_itd_bucket_1

Set clauses:

ip next-hop verify-availability 192.168.1.1 track 2 [ UP ]

route-map Telnet_itd_pool, permit, sequence 11

Description: auto generated route-map for ITD service Telnet

Match clauses:

ip address (access-lists): Telnet_itd_bucket_2

Set clauses:

ip next-hop verify-availability 192.168.1.2 track 3 [ UP ]

验证ITD

N9K_ITD(config)# show itd Telnet statistics

Service                        Device Group                            VIP/mask

#Packets

-------------------------------------------------------------------------------------

Telnet                             Test                            192.168.2.2 /

255.255.255.255                                   0          (0%)

Traffic Bucket                                   Assigned to

Mode                Original Node                   #Packets

---------------                                  --------------

Telnet_itd_vip_1_bucket_1                        192.168.1.1

Bypass            192.168.1.1                     0          (0%) <<<<<<<<<<

Traffic Bucket                                   Assigned to

Mode                Original Node                   #Packets

---------------                                  --------------

Telnet_itd_vip_1_bucket_2                        192.168.1.2

Bypass            192.168.1.2                     0          (0%) <<<<<<<<<<

switch(config)# show itd Telnet brief

Legend:

C-S(Config-State): A-Active,S-Standby,F-Failed

ST(Status): ST-Standby,LF-Link Failed,PF-Probe Failed,PD-Peer Down,IA-Inactive

Name           LB Scheme  Interface  Status   Buckets

-------------- ---------- ---------- -------- --------

Telnet         src-ip     Vlan20     ACTIVE   2    <<<<<<

Exclude ACL

-------------------------------

Device Group                                       Probe  Port

-------------------------------------------------- ----- ------

Test                                                ICMP

Virtual IP                              Netmask/Prefix Protocol     Port

------------------------------------------------------ ------------ ----------

192.168.2.2 / 255.255.255.255                          TCP          23

Node  IP           C-S WGT Probe Port     Probe-IP   STS

------------------- -- --- ---- ----- --------------- --

1       192.168.1.1  A   1 ICMP                       OK<<<<

2       192.168.1.2  A   1 ICMP                       OK<<<<

Telnet至Vlan 20负载均衡器VIP(SVI)

Laptop - telnet 192.168.2.2

Trying 192.168.2.2...

Connected to 192.168.2.2.

由VIP接收的数据包（31个数据包）转发到节点(192.168.1.1)的31个数据包。

N9K_ITD(config)# show it Telnet statistics

Service                        Device Group                            VIP/mask

#Packets

--------------------------------------------------------------------------------

Telnet                             Test                            192.168.2.2 /

255.255.255.255                                   31       (100.00%)

Traffic Bucket                                   Assigned to

Mode                Original Node                   #Packets

---------------                                  --------------

Telnet_itd_vip_1_bucket_1                        192.168.1.1

Redirect            192.168.1.1                     31       (100.00%)

Traffic Bucket                                   Assigned to

Mode                Original Node                   #Packets

---------------                                  --------------

Telnet_itd_vip_1_bucket_2                        192.168.1.2

Redirect            192.168.1.2                     0        (0.00%)

已知缺陷:

https://bst.cloudapps.cisco.com/bugsearch/bug/CSCvc73162/?reffering_site=dumpcr