目录

简介

先决条件

要求

使用的组件

配置

网络图

配置

验证

故障排除

简介

本文档介绍运行NX-OS操作系统的Cisco Nexus系列交换机的边界网关协议(BGP)中sneke-igp-metric命令的用途。

先决条件

要求

Cisco 建议您了解以下主题：

- Nexus NX-OS 软件。

- BGP路由协议。

使用的组件

本文档中的信息基于以下软件和硬件版本：

- 思科N9K-C9508

- NXOS版本7.0(3)I7(6)

本文档不限于特定的软件和硬件版本。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您的网络处于活动状态，请确保您了解所有命令的潜在影响。

配置

默认情况下，Nexus系列交换机在BGP配置部分将命令sdene-igp-metric 设置为默认值600秒。

这会影响BGP处理为重分发路由报告的内部网关协议(IGP)度量更改的方式。BGP在以批处理方式处理这些更改时，延迟为10分钟。

此命令允许您调整该延迟或将其完全删除，以便更快地响应这些更改。

计时器到期后，BGP MED（多送出鉴别器）属性将使用重分发的IGP路由的新开销更新。

Nexus - Nexus NX-OS

Nexus# configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

Nexus(config)# router bgp 65535

Nexus(config-router)# address-family ipv4 unicast

Nexus(config-router-af)# dampen-igp-metric ?

<20-3600>  Time interval in seconds

*Default value is 600

Nexus(config-router-af)# no dampen-igp-metric

此命令同样可以在BGP配置部分针对地址系列ipv6单播和每个VRF实例进行配置。

注意：当IGP路由使用BGP泄露到其他VRF时，命令sned-igp-metric还控制更新其他BGP属性（如下一跳属性）的延迟时间。

网络图

在此场景中，Nexus交换机已配置为将开放最短路径优先(OSPF)路由从路由表重分发到BGP表。

配置

R1 - Cisco IOS

configure terminal

!

hostname R1

!

router ospf 1

router-id 10.255.255.1

!

interface Loopback0

ip address 10.255.255.1 255.255.255.255

ip ospf 1 area 0

!

interface GigabitEthernet0/0

ip address 10.1.2.1 255.255.255.0

ip ospf network point-to-point

ip ospf 1 area 0

no shutdown

!

end

Nexus - NX-OS

configure terminal

!

hostname Nexus

!

feature ospf

feature bgp

!

route-map ALL

!

router ospf 1

router-id 10.255.255.2

!

router bgp 65535

router-id 10.255.255.2

address-family ipv4 unicast

redistribute ospf 1 route-map ALL

neighbor 10.2.3.3

remote-as 65535

address-family ipv4 unicast

!

interface Ethernet1/1

ip address 10.1.2.2/24

ip ospf network point-to-point

ip router ospf 1 area 0.0.0.0

no shutdown

!

interface Ethernet1/2

ip address 10.2.3.2/24

no shutdown

R3 - Cisco IOS

configure terminal

!

hostname R3

!

router bgp 65535

bgp log-neighbor-changes

neighbor 10.2.3.2 remote-as 65535

!

interface GigabitEthernet0/0

ip address 10.2.3.3 255.255.255.0

no shutdown

!

end

验证

运行命令show bgp internal af。确保IGP Metric Dampening Interval行指示所需的值。

默认值为600（秒）。

Nexus - NX-OS

Nexus# show bgp internal af

. . .

BGP Address Family Information for VRF: default

Import Pending               : No

Import Pending               : never

Import Pending Reset         : never

Table Context Address : 0xcfa08bf4

Address family: IPv4 Unicast

. . .

IGP Metric Dampening Interval  : 600

如果路由表中的OSPF路由更新其开销，则在BGP MED路径属性中会有延迟来反映此新值。

Nexus - NX-OS

Nexus# show ip route 10.255.255.1

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

10.255.255.1/32, ubest/mbest: 1/0

*via 10.1.2.1, Eth1/1, [110/41], 01:58:41, ospf-1, intra

Nexus#

* There is an update in the Cost of the OSPF route 10.255.255.1/32

Nexus# show ip route 10.255.255.1

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

10.255.255.1/32, ubest/mbest: 1/0

*via 10.1.2.1, Eth1/1, [110/190], 00:00:02, ospf-1, intra

Nexus#

Nexus# show bgp ipv4 unicast

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 4, Local Router ID is 10.255.255.2

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-i

njected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup

Network            Next Hop            Metric     LocPrf     Weight Path

*>r10.255.255.1/32    0.0.0.0                 41        100      32768 ?

Nexus#

* After 600 seconds.

Nexus# show bgp ipv4 unicast

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 5, Local Router ID is 10.255.255.2

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-i

njected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup

Network            Next Hop            Metric     LocPrf     Weight Path

*>r10.255.255.1/32    0.0.0.0                190        100      32768 ?

在BGP地址系列配置部分下运行no sned-igp-metric命令，以在路由表的OSPF开销更改后立即更新BGP表中的MED属性。

Nexus - NX-OS

Nexus# configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

Nexus(config)# router bgp 65535

Nexus(config-router)#   address-family ipv4 unicast

Nexus(config-router-af)# no dampen-igp-metric

* There is an update in the Cost of the OSPF route 10.255.255.1/32

Nexus# show ip route 10.255.255.1

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

10.255.255.1/32, ubest/mbest: 1/0

*via 10.1.2.1, Eth1/1, [110/190], 00:00:02, ospf-1, intra

Nexus# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 7, Local Router ID is 10.255.255.2

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-i

njected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup

Network            Next Hop            Metric     LocPrf     Weight Path

*>r10.255.255.1/32    0.0.0.0                190        100      32768 ?

故障排除

要确认NX-OS上snek-igp-metric命令的功能，请打开下一个调试。

- debug-filter bgp prefix <PREFIX/MASK>

- debug logfile <FILE_NAME>

- debug bgp dampening brib

Nexus - NX-OS

Nexus# debug-filter bgp prefix 10.255.255.1/32

Nexus# debug logfile bgpdebug.log

Nexus# debug bgp dampening brib

Nexus#

Nexus# show debug logfile bgpdebug.log

2019 Jul 23 21:13:27.676328 bgp: [25368] (default) BRIB: [IPv4 Unicast] Setting the update pending flag for 10.255.255.1/32

Nexus# show debug logfile bgpdebug.log

2019 Jul 23 21:13:27.676328 bgp: [25368] (default) BRIB: [IPv4 Unicast] Setting the update pending flag for 10.255.255.1/32

2019 Jul 23 21:20:47.641987 bgp: [25368] (default) BRIB: [IPv4 Unicast] Clearing the update pending flag for 10.255.255.1/32

2019 Jul 23 21:20:47.642013 bgp: [25368] (default) BRIB: [IPv4 Unicast] Originating prefix 10.255.255.1/32, route type redist

2019 Jul 23 21:20:47.642075 bgp: [25368] (default) BRIB: [IPv4 Unicast] Installing prefix 10.255.255.1/32 (redist) via 0.0.0.0 (0x0/0x0) into BRIB with extcomm Extcommunity: OSPF RT:0.0.0.0:0:0

2019 Jul 23 21:20:47.642395 bgp: [25368] (default) BRIB: [IPv4 Unicast] Path to 10.255.255.1/32 via 0.0.0.0 already exists, dflags=0x80002

2019 Jul 23 21:20:47.642415 bgp: [25368] (default) BRIB: [IPv4 Unicast] (10.255.255.1/32 (local)): bgp_brib_add: handling nexthop, path->flags2: 0x1

2019 Jul 23 21:20:47.642447 bgp: [25368] (default) BRIB: [IPv4 Unicast] (10.255.255.1/32 (local)): returning from bgp_brib_add, reeval=0new_path: 0, change: 1, undelete: 0, history: 0, force: 0, (pflags=0x2408) rnh_flag_change 0

2019 Jul 23 21:20:47.642475 bgp: [25368] (default) BRIB: [IPv4 Unicast] Cleanup for dest 10.255.255.1/32 exits since it's on newlist

Nexus#

完成后，使用下一个命令禁用调试：

- undebug all

- no debug-filter all

- clear debug logfile <FILE_NAME>