目录

简介

背景信息

先决条件

拓扑

如何进行故障排除

配置

验证

其他平台

实用链接

简介

本文档介绍如何在Nexus 9000上发生mac移动时进行故障排除以及如何防止发生移动。

背景信息

2018 Nov 14 15:53:26.943 N9K %-SLOT1-5-BCM_L2_LEARN_DISABLE: MAC Learning Disabled unit=0

2018 Nov 14 15:53:27.769 N9K %-SLOT1-5-BCM_L2_LEARN_ENABLE: MAC Learning Enabled unit=0

您了解了mac学习的概念，以及交换机收到帧后如何在交换机上维护表，并将发送方的MAC地址与收到该地址的LAN端口相关联。在环路情况下，可能会通过交换机上的两个不同端口获知相同的MAC。

先决条件

了解交换机上的mac学习概念和NX-OS配置

排除第2层交换故障

拓扑

+-----------+ Po6      +------------+

|   N9K_1   +----------+   N9K_2    |

|           +----------+            |

+-----------+          +--+---------+

1/3 |               | 2/1

|               |

|               |

+-+---------------+--+

|       Server       |

+--------------------+

0000.117d.e02e

如何进行故障排除

当BCM ASIC在短时间内获取过多的MAC地址时，BCM_USD可以在硬件中禁用/启用MAC学习，您可以看到此消息出现。如果mac移动/摆动/循环过多或新的mac学习/移动超过某个阈值，则可能会造成这种情况。默认情况下，在Nexus9K上，您看不到明确告诉您交换机经历mac-moves的日志。但是，如果这些移动量很大，您最终会看到这些日志。

2018 Nov 14 15:53:26.943 N9K %-SLOT1-5-BCM_L2_LEARN_DISABLE: MAC Learning Disabled unit=0

2018 Nov 14 15:53:27.769 N9K %-SLOT1-5-BCM_L2_LEARN_ENABLE: MAC Learning Enabled unit=0

2018 Nov 14 15:53:27.863 N9K %-SLOT1-5-BCM_L2_LEARN_DISABLE: MAC Learning Disabled unit=0

2018 Nov 14 15:53:28.770 N9K %-SLOT1-5-BCM_L2_LEARN_ENABLE: MAC Learning Enabled unit=0

这些消息表示MAC表中的事件。当环境中存在连续的mac移动时，可以看到这些消息。基本上，交换机在两个或多个接口上以极高的速率接收具有相同源MAC的帧。交换机具有一种机制，可对MAC的“回移”次数进行计数，并根据MAC地址移动的次数来权衡回移次数。交换机禁用动态MAC学习以保护控制平面。

此时，您可以检查mac-move计数以了解设备是否经历了mac-move以及经历了mac-move的数量。

N9K# sh mac address-table  notification mac-move

MAC Move Notify Triggers: 1

Number of MAC Addresses added: 612336

Number of MAC Addresses moved: 612328

Number of MAC Addresses removed: 0

“移动的MAC地址数量”的输出表明交换机经历了mac移动。

配置

接下来，显而易见的是找出导致此问题的mac地址、vlan以及遇到此问题的接口信息。要查找此信息，您需要在N9K平台上将L2FM的日志记录级别从默认值2提高至5。

N9K# sho logging level l2fm

Facility        Default Severity        Current Session Severity

--------        ----------------        ------------------------

l2fm                    2                       2

0(emergencies)          1(alerts)       2(critical)

3(errors)               4(warnings)     5(notifications)

6(information)          7(debugging)

N9K# conf t

Enter configuration commands, one per line. End with CNTL/Z.

N9K(config)# logging level l2fm 5

N9K(config)# end

N9K# sho logging level l2fm

Facility        Default Severity        Current Session Severity

--------        ----------------        ------------------------

l2fm                    2                       5

0(emergencies)          1(alerts)       2(critical)

3(errors)               4(warnings)     5(notifications)

6(information)          7(debugging)

Any mac moves at this point can be seen in the syslogs:

2018 Nov 14 16:04:23.881 N9K %L2FM-4-L2FM_MAC_MOVE2: Mac 0000.117d.e02e in vlan 741 has moved between Po6 to Eth1/3

2018 Nov 14 16:04:23.883 N9K %L2FM-4-L2FM_MAC_MOVE2: Mac 0000.117d.e02e in vlan 741 has moved between Po6 to Eth1/3

在这种情况下，您可以检测和限制MAC地址从一个端口移动到另一个端口的次数。

在Cisco NX-OS版本6.0(2)U3(1)之前，当在两个端口之间检测到环路时，禁用MAC学习180秒。

但是，从7.0(3)I7(3)开始，现在可以在使用“mac address-table loop-detect port-down”命令检测到此类环路时，将交换机配置为关闭接口索引较低的端口。

N9K# conf t

Enter configuration commands, one per line. End with CNTL/Z.

N9K(config)# mac address-table loop-detect port-down

N9K(config)# exit

N9K#

现在，在启用此命令后，进一步的环路检测会关闭接口索引较低的接口。

2018 Nov 13 19:33:54.773 N9K %ETHPORT-5-IF_DOWN_NONE: Interface port-channel6 is down (None)

2018 Nov 13 19:33:59.046 N9K %ETH_PORT_CHANNEL-5-PORT_DOWN: port-channel6: Ethernet2/1 is down

2018 Nov 13 19:33:59.049 N9K %ETH_PORT_CHANNEL-5-PORT_DOWN: port-channel6: Ethernet2/2 is down

2018 Nov 13 19:33:59.166 N9K %ETH_PORT_CHANNEL-5-FOP_CHANGED: port-channel6: first operational port changed from Ethernet2/1 to none

2018 Nov 13 19:33:59.235 N9K %ETHPORT-5-IF_DOWN_ERROR_DISABLED: Interface port-channel6 is down (Error disabled. Reason:error)

2018 Nov 13 19:33:59.244 N9K %ETHPORT-5-IF_DOWN_CFG_CHANGE: Interface Ethernet2/2 is down(Config change)

2018 Nov 13 19:33:59.252 N9K %ETHPORT-5-IF_DOWN_CFG_CHANGE: Interface Ethernet2/1 is down(Config change)

2018 Nov 13 19:34:05.269 N9K %ETHPORT-5-IF_DOWN_CHANNEL_ERR_DISABLED: Interface Ethernet2/2 is down (Channel error disabled)

2018 Nov 13 19:34:05.303 N9K last message repeated 1 time

2018 Nov 13 19:34:05.303 N9K %ETHPORT-5-IF_DOWN_CHANNEL_ERR_DISABLED: Interface Ethernet2/1 is down (Channel error disabled)

验证

使用此命令验证当前配置的操作。

N9K# show mac address-table loop-detect

Port Down Action Mac Loop Detect : disabled

您可以确认接口的索引，以根据功能验证是否禁用了正确的接口。

N9K# show system internal l2fm l2dbg macdb address 0000.117d.e02e vlan 741

Legend

------

Db:  0-MACDB, 1-GWMACDB, 2-SMACDB, 3-RMDB,    4-SECMACDB  5-STAGEDB

Src: 0-UNKNOWN, 1-L2FM, 2-PEER, 3-LC, 4-HSRP

5-GLBP, 6-VRRP, 7-STP, 8-DOTX, 9-PSEC 10-CLI 11-PVLAN

12-ETHPM, 13-ALW_LRN, 14-Non_PI_MOD, 15-MCT_DOWN, 16 - SDB

17-OTV, 18-Deounce Timer, 19-AM, 20-PCM_DOWN, 21 - MCT_UP

22-VxLAN, 23-L2RIB 24-CTRL, 25-UFDM

Slot:0 based for LCS 31-MCEC 20-OTV/ORIB

VLAN: 741 MAC: 0000.117d.e02e

Time                     If/swid    Db Op     Src Slot FE

Wed Nov 14 16:04:28 2018 0x16000005 0  UPDATE 3   0    0

Wed Nov 14 16:04:28 2018 0x16000005 0  REFRESH_DETECT 3   0    15

Wed Nov 14 16:04:28 2018 0x1a000400 0  UPDATE 3   0    0

Wed Nov 14 16:04:28 2018 0x1a000400 0  REFRESH_DETECT 3   0    15

Wed Nov 14 16:04:28 2018 0x16000005 0  UPDATE 3   0    0

N9K# show int snmp-ifindex

--------------------------------------------------------------------------------

Port             IFMIB Ifindex (hex)

--------------------------------------------------------------------------------

mgmt0           83886080   (0x5000000 )

Eth1/1          436207616  (0x1a000000)

Eth1/2          436208128  (0x1a000200)

Eth1/3          436208640  (0x1a000400)

<snip>

Po6             369098757  (0x16000005)

其他平台

您可以使用这些命令在其他Nexus平台上启用MAC移动通知。

N3K:

mac address table notification mac-move

logging level fwm 6

logging monitor 6

N5K/N6K:

mac address table notification mac-move

logging level fwm 6

logging monitor 6

N7K/N9K:

logging level l2fm 5

IOS:

mac address table notification mac-move

Note: To revert/remove these commands, simply use the `no` version of each command.

以下命令在运行版本6.0(2)N2(1)及更高版本的Nexus5K/6K中也可用，用于关闭端口：

N5K(config)# mac address-table loop-detect ?

port-down  Take port-down action for mac loop detection

N5K(config)# mac address-table loop-detect port-down

Further, the following command is available on the platform to err-disable the edge-port on the MAC move loop detection,

N5K(config)# mac address-table loop-detect port-down edge-port

在Nexus 3000上的NX-OS版本6.0(2)A8(1)中，您可以配置操作以在检测到此类环路时关闭接口索引较低的端口。

N3K(config)# mac address-table loop-detect ?

port-down  Take port-down action for mac loop detection

N3K(config)# mac address-table loop-detect port-down

The following command is available on this platform as well, to err-disable the edge-port on the MAC move loop detection,

N5K(config)# mac address-table loop-detect port-down edge-port

实用链接

Nexus L2FM-4-L2FM_MAC_MOVE系统日志说明

Nexus 5000常见问题：当Nxus 5000交换机在日志中显示“FWM-2-STM LOOP DETECT”消息时，您会做什么