目录

简介

问题

解决方案

简介

本文档介绍基于RCM的UPF由于NSO端出现问题而无法获得配置推送(host/ecs/apn)

问题

在RCM（冗余配置管理器）启动UPF（用户平面功能）重新启动后，当RCM从UPF收到configpushcomplete后，RCM向NSO(Network Services Orchestrator)发送通知消息后，继续下一步 — 按该顺序推送主机、ecs、apn配置文件。

但是，在NSO问题中，当解析发送的RCM通知的时间戳时确定问题。

#当通知的时间戳为格式时，NSO不会继续将配置推送到UPF（观察微秒字段不存在）

netconf-notifications received-notifications notification 2024-01-25T04:59:30+00:00 0

//Sample notification - does not work on NSO

netconf-notifications received-notifications notification 2024-01-25T04:59:30+00:00 0

user          <NSO username>

subscription  alert-notification

stream        alert-notification

received-time 2024-01-25T04:59:30.042866+00:00

data smi-alert-notification starts-at ""

data smi-alert-notification ends-at ""

data smi-alert-notification alert-status Config-Push

NAME           VALUE

-------------------------------

DeviceID

Event          Config-Push

GroupID        2

ManagementIP   <IPv4 address>

NameSpace      <rcm-namespace>

RCMVIP         <IPv4 address>

RecoveryState

SSHIP          <IPv4 address>

UPFState       STANDBY

#当通知的时间戳为格式时，NSO继续执行configpush（观察微秒字段）

netconf-notifications received-notifications 2024-01-25T04:43:30.045+00:00 0

//Sample notification - working on NSO

netconf-notifications received-notifications notification 2024-01-25T04:43:30.045+00:00 0

user          <NSO username>

subscription  alert-notification

stream        alert-notification

received-time 2024-01-25T04:43:30.087872+00:00

data smi-alert-notification starts-at ""

data smi-alert-notification ends-at ""

data smi-alert-notification alert-status Config-Push

NAME           VALUE

-------------------------------

DeviceID

Event          Config-Push

GroupID        2

ManagementIP  <IPv4 address>

NameSpace      <rcm-namespace>

RCMVIP        <IPv4 address>

RecoveryState

SSHIP          <IPv4 address>

UPFState       STANDBY

注意：可以从NSO日志向生产环境请求NSO通知消息。

解决方案

目前RCM的计时器等待时间为100分钟，之后它重新启动停滞的UPF，等待从NSO推送配置。

NSO端修复通过Cisco Bug ID CSCwi70899提供