目录

简介

先决条件

要求

使用的组件

背景信息

拓扑

故障排除方法

简介

本文档介绍如何验证7600设备的分布式转发卡(DFC)线卡上的双向转发检测(BFD)硬件计数器。

先决条件

要求

Cisco 建议您具有以下主题的基础知识：

- 7600系列路由器的配置和功能

- DFC线卡模块配置

使用的组件

本文档中的信息基于7600 IOS版本15.3。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

背景信息

BFD是一种网络协议，旨在检测系统之间任何路径（直接物理链路、虚电路、隧道、MPLS LSP等）中的亚秒级通信故障。

DFC代表DFC，DFC和CFC线卡之间的主要区别是DFC线卡具有嵌入的子卡，带L2引擎和L3/4引擎，这可卸载转发查找，这些查找在CFC线卡上将发送到Supervisor，在线卡上本地完成。

BFD数据包在硬件中的处理方式不会影响CPU，这意味着在DFC卡中，数据包始终在不离开线卡的情况下接收和转发。

拓扑

R1(Te3/21)- R2

故障排除方法

您可以看到R1未在Tengig3/21上与邻居建立BFD邻接关系。

检查邻居详细信息：

R1# sh bfd nei det

IPv4 Sessions

NeighAddr                              LD/RD         RH/RS     State     Int

172.31.11.34                            1/0          Down      Down      Te3/21

Session Host: Hardware

OurAddr: 172.31.11.33

Handle: 1

Local Diag: 1, Demand mode: 0, Poll bit: 0

MinTxInt: 1000000, MinRxInt: 1000000, Multiplier: 5

Received MinRxInt: 200000, Received Multiplier: 5

Holddown (hits): 0(0), Hello (hits): 1000(0)

Rx Count: 37   ßNotice received packets are too low

Tx Count: 9401

Elapsed time watermarks: 0 0 (last: 0)

Registered protocols: ISIS CEF

Downtime: 02:36:34

Last packet: Version: 1                  - Diagnostic: 0

State bit: Up               - Demand bit: 0

Poll bit: 0                 - Final bit: 0

C bit: 1

Multiplier: 5               - Length: 24

My Discr.: 77               - Your Discr.: 1

Min tx interval: 200000     - Min rx interval: 200000

Min Echo interval: 0

R1# sh bfd nei det

IPv4 Sessions

NeighAddr                              LD/RD         RH/RS     State     Int

172.31.11.34                            1/0          Down      Down      Te3/21

Session Host: Hardware

OurAddr: 172.31.11.33

Handle: 1

Local Diag: 1, Demand mode: 0, Poll bit: 0

MinTxInt: 1000000, MinRxInt: 1000000, Multiplier: 5

Received MinRxInt: 200000, Received Multiplier: 5

Holddown (hits): 0(0), Hello (hits): 1000(0)

Rx Count: 37   ß--------------------------------------------------Notice received packets are not incrementing

Tx Count: 9456 ß-------------------------------------------------- Transmit packets are incrementing

Elapsed time watermarks: 0 0 (last: 0)

Registered protocols: ISIS CEF

Downtime: 02:36:34

Last packet: Version: 1                  - Diagnostic: 0

State bit: Up               - Demand bit: 0

Poll bit: 0                 - Final bit: 0

C bit: 1

Multiplier: 5               - Length: 24

My Discr.: 77               - Your Discr.: 1

Min tx interval: 200000     - Min rx interval: 200000

Min Echo interval: 0

您还可以检查硬件的相同命令，该命令提供相同的输出，RX未收到。

R1#show bfd neighbors hardware details

IPv4 Sessions

NeighAddr                              LD/RD         RH/RS     State     Int

172.31.11.34                            1/0          Down      Down      Te3/21

Session Host: Hardware

OurAddr: 172.31.11.33

Handle: 1

Local Diag: 1, Demand mode: 0, Poll bit: 0

MinTxInt: 1000000, MinRxInt: 1000000, Multiplier: 5

Received MinRxInt: 200000, Received Multiplier: 5

Holddown (hits): 0(0), Hello (hits): 1000(0)

Rx Count: 37

Tx Count: 19337

Elapsed time watermarks: 0 0 (last: 0)

Registered protocols: ISIS CEF

Downtime: 05:22:16

Last packet: Version: 1                  - Diagnostic: 0

State bit: Up               - Demand bit: 0

Poll bit: 0                 - Final bit: 0

C bit: 1

Multiplier: 5               - Length: 24

My Discr.: 77               - Your Discr.: 1

Min tx interval: 200000     - Min rx interval: 200000

Min Echo interval: 0

R1#show bfd neighbors hardware details

IPv4 Sessions

NeighAddr                              LD/RD         RH/RS     State     Int

172.31.11.34                            1/0          Down      Down      Te3/21

Session Host: Hardware

OurAddr: 172.31.11.33

Handle: 1

Local Diag: 1, Demand mode: 0, Poll bit: 0

MinTxInt: 1000000, MinRxInt: 1000000, Multiplier: 5

Received MinRxInt: 200000, Received Multiplier: 5

Holddown (hits): 0(0), Hello (hits): 1000(0)

Rx Count: 37

Tx Count: 19348

Elapsed time watermarks: 0 0 (last: 0)

Registered protocols: ISIS CEF

Downtime: 05:22:28

Last packet: Version: 1                  - Diagnostic: 0

State bit: Up               - Demand bit: 0

Poll bit: 0                 - Final bit: 0

C bit: 1

Multiplier: 5               - Length: 24

My Discr.: 77               - Your Discr.: 1

Min tx interval: 200000     - Min rx interval: 200000

之后，您可以继续直接检查线卡上的计数器。

为此，您需要在show bfd neighbors details输出中的Local Discriminator(LD)值，对于本例，LD值为1。

LD，该值用于唯一标识此会话，并且对于此设备中的所有BFD会话，该值必须是唯一且非零的。

您会显示模块，并看到线卡3是DFC。

在要检查BFD值的位置附加线路卡，在本例中为线路卡3。

R1# attach 3

R1-dfc3# show platform npc bfd ld 1

bfd_pak_big 0

bfd_pak_authenticated 0

bfd_x40g_xlifid_ifnum0 0

bfd_wd_hash_table_retry_count 0

bfd_ld_hash_table_retry_count 0

x40g_sso_differ_ld_count 0

Current normal_event_qsize 0 and 0 paks crossed the limit.

****BFD Session info for ld(1) avlnode ld (1) ****

ifnum(25), slotunit(21), txtimer(1000000) detect_timer(0)

p bit(0), f bit(0), srcip(172.31.11.33) dstip(172.31.11.34)

wdog cnterid(65664) tags inner(0) outer(0) tx sess info(0x19F4B7E0)

ADJ registered(0x1) tag_count(0) tx sessid(830)

dmac(dccc.eeee.aaaa), smac(5033.eeeee.8888), rx statid(508546), tx statid(508545)

RX pkt count(5838365), TX pkt count (5208864) ß------------------------------------------ Here you can see the counters for the RX and TX

IPV6 SA(::), IPV6 DA(::), no_adj_retry_tx (0)

R1# show platform npc bfd ld 1

bfd_pak_big 0

bfd_pak_authenticated 0

bfd_x40g_xlifid_ifnum0 0

bfd_wd_hash_table_retry_count 0

bfd_ld_hash_table_retry_count 0

x40g_sso_differ_ld_count 0

Current normal_event_qsize 0 and 0 paks crossed the limit.

****BFD Session info for ld(1) avlnode ld (1) ****

ifnum(25), slotunit(21), txtimer(1000000) detect_timer(0)

p bit(0), f bit(0), srcip(172.31.11.33) dstip(172.31.11.34)

wdog cnterid(65664) tags inner(0) outer(0) tx sess info(0x19F4B7E0)

ADJ registered(0x1) tag_count(0) tx sessid(830)

dmac(dccc.eeee.aaaa), smac(5033.eeeee.8888), rx statid(508546), tx statid(508545)

RX pkt count(5838365), TX pkt count (5208864)  ß-------------------------- RX is not increasing

IPV6 SA(::), IPV6 DA(::), no_adj_retry_tx (0)

此时，请进一步排除故障，并建议在相邻设备上捕获SPAN，以查看该设备是否确实发送了数据包。