目录

简介

支持的HX系统

适用场合

操作方法

分析工具输出 — 后续步骤

CLI命令

简介

本文档介绍在Hyperflex HyperV集群上运行Hypercheck运行状况检查和升级前工具的流程。此工具是对hyperflex系统进行主动自检以确保其稳定性和弹性的实用程序。它有助于在hyperflex系统上自动执行运行状况和升级前检查列表，以节省hyperflex升级和维护操作期间的时间。

注意：在使用工具之前，请始终下载该工具的最新版本。由于该工具经常增强，使用旧版本可能会导致丢失重要检查。

支持的HX系统

- Hyperflex版本 — 3.0、3.5、4.0

- Hyperflex标准集群

- 仅在Microsoft Hyper-V中的Hyperflex集群上受支持

注意：如何在hyperflex ESXi集群上运行Hypercheck，请访问 —

https://www.cisco.com/c/en/us/support/docs/hyperconverged-infrastructure/hyperflex-hx-data-platform/214101-hypercheck-hyperflex-health-pre-upgr.html

适用场合

- 在Hyperflex升级之前。

- 维护窗口前后的Hyperflex运行状况检查

- 识别故障驱动器/磁盘。

- 使用Cisco TAC时

- 随时主动进行运行状况检查。

操作方法

第1步：从此处的Cisco github devnet帐户下载Hyperflex-Hypercheck.zip。请获取最新副本，该副本将包含最新改进和更新。

NOTE:仅使用从Cisco github devnet帐户下载的脚本。

步骤2.使用群集管理IP(CMIP)将其上传到存储控制器VM(SCVM)。

使用首选方法scp/sftp/ftp/tftp — 将Hypercheck-HyperV-master.zip复制到/tmp目录

对于MAC:

从CLI执行SCP（请确认Hyperflex-Hypercheck.zip位于运行scp的同一文件夹中）

# scp Hypercheck-HyperV-master.zip root@<scvm-eth0:mgmtip>:/tmp/

使用以下信息确定HX环境中的集群管理IP - Hyperflex手册

Windows：

我们可以使用WINSCP传输文件，如下所示 —

步骤3.解压缩Hypercheck-HyperV-master.zip的内容

键入cd /tmp以更改为/tmp目录

root@hyper11-stc:~# cd /tmp/

键入unzip Hypercheck-HyperV-master.zip解压缩文件

root@hyper11-stc:/tmp# unzip Hypercheck-HyperV-master.zip

Archive: Hypercheck-HyperV-master.zip

67f0d63639785f5c18b8ed35ff789f748157e944

creating: Hypercheck-HyperV-master/

inflating: Hypercheck-HyperV-master/README.md

inflating: Hypercheck-HyperV-master/ReadMe.txt

inflating: Hypercheck-HyperV-master/TestInfo.txt

inflating: Hypercheck-HyperV-master/VHXTool.py

inflating: Hypercheck-HyperV-master/prettytable.py

inflating: Hypercheck-HyperV-master/progressbar.py

root@hyper11-stc:/tmp#

步骤4.执行VHXTool Python脚本

键入cd Hypercheck-HyperV-master以转到Hypercheck-HyperV-master目录

root@hyper11-stc:/tmp# cd Hypercheck-HyperV-master

键入python VHXTool.py执行脚本

root@hyper11-stc:/tmp/Hypercheck-HyperV-master# python VHXTool.py

步骤5.出现提示时输入HyperV管理员用户名、密码和群集根密码

Please enter below info of Hyper-V Cluster:

Enter the Hyper-V Username(Ex: Domain\Username):

Enter the Hyper-V Password:

Enter the HX-Cluster Root Password:

NOTE:要停止脚本执行，请使用键[CTRL+Z]，它会立即停止

第6步：Hyperflex-Hypercheck工具将提示您询问Active Directory是否安装在环境中的裸机上。

NOTE:无论此处提供的输入（是/否），脚本将继续运行。以下消息将显示为警告消息。

“请注意，所有Active Directory服务器/DNS服务器不应嵌套在Hyperflex数据存储区虚拟机中。您的环境中应始终存在物理（裸机）AD”

步骤7. Hyperflex-Hypercheck工具开始检查。完成此过程大约需要5-10分钟，具体取决于群集中的已收敛节点数

步骤8.了解执行的输出/检查

以下检查由Hyperflex-Hyperchecktool执行

Hyperflex Checks: (Below checks are performed on all the storage controller VMs)

Cluster services check - Verifies the status of storfs, stMgr and stNodeMgr services.

Enospc state check - Checks if the cluster space usage is above the warning threshold or no.

Zookeeper check - Checks whether the Zookeeper is running or no.

Exhibitor check - Verfies the status of the Exhibitor service which manages the ZK.

System Disks Usage - Checks if /sda1, var/stv and /var/zookeeper is less than 80%.

HDD health check - Reports if you have any blacklisted disk in your cluster.

DNS check - Checks whether DNS is configured and reachable.

Timestamp check - Checks if all the controller VMs have the exact same time.

NTP sync check - Checks whether NTP is reachable from the storage controller VMs and synced.

Check package & versions - Checks for packages and versions on Storage Controller VMs.

Check Iptables count - Checks for Iptables count on and ensure it is same on all Storage Controller VMs.

Cache Disks check     - Checks the number of Cache Disks.

Extra pnodes check - Looks for any extra/duplicate pnode entries in the cluster.

Memory usage check - Checks for available memory more than 2GB.

Incidence of OOM in the log file - Checks for any previous incidence of Out Of Memory Condition.

Check permissions for /tmp -  Checks if the /tmp permissions are set correctly.

Check Cluster Access Policy - Checks the Configured Cluster Access Policy

CMIP Hostname – Check if the clustermanagementip has hostname defined

Check domain join health – checking domain join health of the node.

HYPER-V Checks: (Below checks are performed on each HyperV node)

Hostname – check and print the hostname of the node.

Cluster Failover – check and ensure cluster failover is enabled.

Hyper-V Role – Check and ensure HyperV role is enabled.

Node State - Checks the state of the node.

Network Interfaces State - Checks the Network Interfaces State of the node.

Remote Management Enabled - Check if the Remote Management is enabled on the node.

MTU for Storage Data Network - Check MTU for the Storage Data Network of the node.

Domain and forest details -  Check the Domain and forest details of the cluster.

Host file entries- Check if the host file have correct entries.

Check Adapter details - Check Adapter details of the node.

Drivers test - Check the status of minifilter drivers.

SMB Test - Checking SMB Path reachability from the node.

VMMS – Checking the VMMS Service status

步骤9.获取脚本输出报告。您可以获得如下所示的内容

超检查报告tar文件保存在/var/log/springpath和/tmp/Hypercheck-HyperV-master下。因此，您可以从/var/log/springpath或/tmp/Hypercheck-HyperV-master下下载tar捆绑包。或者，您可以只生成并上传storfs-support捆绑包，该捆绑包还将包含超级检查报告tar。

超检查报告tar文件保存在/var/log/springpath下。

报告tar文件示例 — VHX_Report_2020_08_29_08_40_20.tar复制到路径：/var/log/springpath

键入ls -l | grep VHX_Report以查看Hyperflex-Hypercheck工具创建的文件

Under /var/log/springpath,

root@hyper11-stc:/var/log/springpath# ls -l | grep VHX_Report

-rw-r--r--  1 root    root    370K Aug 29 08:47 VHX_Report_2020_08_29_08_40_20.tar

root@hyper10-stc:/var/log/springpath#

Under /tmp/Hypercheck-HyperV-master

root@hyper11-stc:/tmp/Hypercheck-HyperV-master# ls -ltrh

total 576K

-rwxrwxrwx 1 root root  53K Apr 10  2018 prettytable.py

-rwxrwxrwx 1 root root 1.4K Jan 22  2019 progressbar.py

-rwxrwxrwx 1 root root 1.6K Aug 28 00:27 ReadMe.txt

-rwxrwxrwx 1 root root  75K Aug 28 06:32 VHXTool.py

-rwxrwxrwx 1 root root 3.5K Aug 28 06:46 TestInfo.txt

-rw-r--r-- 1 root root  49K Aug 29 08:40 prettytable.pyc

-rw-r--r-- 1 root root 1.8K Aug 29 08:40 progressbar.pyc

drwxr-xr-x 2 root root 4.0K Aug 29 08:47 VHX_Report_2020_08_29_08_40_20

-rw-r--r-- 1 root root 370K Aug 29 08:47 VHX_Report_2020_08_29_08_40_20.tar

Hypercheck日志捆绑包中的文件和日志 —

root@hyper11-stc: tmp/Hypercheck-HyperV-master # cd VHX_Report_2020_08_29_08_40_20

root@hyper11-stc: tmp/Hypercheck-HyperV-master # ls -ltrh

-rw-r--r-- 1 root root  27K Aug 29 08:44 VHX_Report_10.8.16.65.txt

-rw-r--r-- 1 root root  27K Aug 29 08:45 VHX_Report_10.8.16.66.txt

-rw-r--r-- 1 root root  27K Aug 29 08:47 VHX_Report_10.8.16.67.txt

-rw-r--r-- 1 root root 101K Aug 29 08:47 VHX_Tool_Main_Report_2020-08-29_08-47-43_HYPER11-SMB.txt

-rw-r--r-- 1 root root 186K Aug 29 08:47 VHXTool_2020-08-29_08-40-20.log

步骤 10：导出HX_YYYY_MM_DD_HH_MM_SS.tar并与TAC共享。

使用首选方法从SCVM使用scp/sftp/ftp/tftp导出超检查日志，或者只需下载包含VHX_Report tar捆绑包的storfs支持捆绑包。

步骤11.3节点集群的VHXTool输出示例

Please enter below info of Hyper-V Cluster:

Enter the Hyper-V Username(Ex: Domain\Username): hx.local\hxadmin

Enter the Hyper-V Password:

Enter the HX-Cluster Root Password:

Is the Active Directory installed on Physical (bare metal) in your Environment (Enter Yes/No): yes

Note: Please be aware that all Active Directory Servers/ DNS Servers should not be nested in Hyperflex datastore virtual machines. There should always be physical (bare metal) ADs in your environment.

SMB Name: HYPER10-SMB

SSH connection established to HX Node: 10.8.16.65

SSH connection established to HX Node: 10.8.16.66

SSH connection established to HX Node: 10.8.16.67

HX Cluster Nodes:

+-------+-----------------+-------------+-----------------+----------+--------------------------+-----------------+------------+

| Nodes | Eth0 IP Address | HostName    | Eth1 IP Address | Eth1 MTU | Cluster Mgmt IP          | Cluster Data IP | CRM Master |

+-------+-----------------+-------------+-----------------+----------+--------------------------+-----------------+------------+

| 1     | 10.8.16.65      | hyper10-stc | 10.8.18.65      | 9000     | HYPER10-MGMT-IP.hx.local | 10.8.18.69      | 10.8.18.67 |

+-------+-----------------+-------------+-----------------+----------+--------------------------+-----------------+------------+

| 2     | 10.8.16.66      | hyper11-stc | 10.8.18.66      | 9000     | HYPER10-MGMT-IP.hx.local | 10.8.18.69      | 10.8.18.67 |

+-------+-----------------+-------------+-----------------+----------+--------------------------+-----------------+------------+

| 3     | 10.8.16.67      | hyper12-stc | 10.8.18.67      | 9000     | HYPER10-MGMT-IP.hx.local | 10.8.18.69      | 10.8.18.67 |

+-------+-----------------+-------------+-----------------+----------+--------------------------+-----------------+------------+

HX Controller: 10.8.16.65

Cluster services check      [########################] COMPLETE

ZooKeeper & Exhibitor check [########################] COMPLETE

HDD health check            [########################] COMPLETE

Pre-Upgrade Check           [########################] COMPLETE

Hyper-V check               [########################] COMPLETE

HX Controller: 10.8.16.66

Cluster services check      [########################] COMPLETE

ZooKeeper & Exhibitor check [########################] COMPLETE

HDD health check            [########################] COMPLETE

Pre-Upgrade Check           [########################] COMPLETE

Hyper-V check               [########################] COMPLETE

HX Controller: 10.8.16.67

Cluster services check      [########################] COMPLETE

ZooKeeper & Exhibitor check [########################] COMPLETE

HDD health check            [########################] COMPLETE

Pre-Upgrade Check           [########################] COMPLETE

Hyper-V check               [########################] COMPLETE

HX Controller: 10.8.16.65

Test Summary:

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Name                             | Result                                                        | Comments                                                       |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Cluster services check           | PASS                                                          | Checks storfs, stMgr, sstNodeMgr service running on each node. |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Enospc state check               | PASS                                                          | Checks if the cluster storage utilization is above threshold.  |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Zookeeper check                  | PASS                                                          | Checks if Zookeeper service is running.                        |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Exhibitor check                  | PASS                                                          | Checks if Exhibitor in running.                                |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| System Disks Usage               | PASS                                                          | Checks if /sda1, var/stv and /var/zookeeper is less than 80%.  |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| HDD health check                 | PASS                                                          | Checks if any drive is in blacklisted state.                   |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| DNS check                        | PASS                                                          | Checks if configured DNS is reachable.                         |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Timestamp check                  | PASS                                                          | Checks if the timestamp is same across all Nodes.              |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| NTP sync check                   | PASS                                                          | Checks if the NTP is synced with NTP server.                   |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Check package & versions         | PASS                                                          | Checks for count and version of HX packages on each node.      |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Check Iptables count             | PASS                                                          | Checks if the IP Table count matches on all nodes.             |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Cache Disks check                | PASS                                                          | Checks the number of Cache Disks.                              |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Extra pnodes check               | PASS                                                          | Checks for any stale Node entry.                               |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Memory usage check               | PASS                                                          | Checks for available memory more than 2GB.                     |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Incidence of OOM in the log file | PASS                                                          | Checks for any previous incidence of Out Of Memory Condition.  |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Check permissions for /tmp       | PASS                                                          | Checks if the /tmp permissions are set correctly.              |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Check Cluster Access Policy      | Lenient                                                       | Checks the Configured Cluster Access Policy                    |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Check CMIP Hostname              | PASS                                                          | Check if the clustermanagementip has hostname defined.         |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Domain join health               | Name = hyper10-stc                                            | Checking domain join health of the Node.                       |

|                                  | Domain = HX.LOCAL                                             |                                                                |

|                                  | Distinguished Name = CN=HYPER10-STC,OU=HYPER10,DC=hx,DC=local |                                                                |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

HX Controller: 10.8.16.66

Test Summary:

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Name                             | Result                                                        | Comments                                                       |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Cluster services check           | PASS                                                          | Checks storfs, stMgr, sstNodeMgr service running on each node. |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Enospc state check               | PASS                                                          | Checks if the cluster storage utilization is above threshold.  |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Zookeeper check                  | PASS                                                          | Checks if Zookeeper service is running.                        |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Exhibitor check                  | PASS                                                          | Checks if Exhibitor in running.                                |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| System Disks Usage               | PASS                                                          | Checks if /sda1, var/stv and /var/zookeeper is less than 80%.  |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| HDD health check                 | PASS                                                          | Checks if any drive is in blacklisted state.                   |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| DNS check                        | PASS                                                          | Checks if configured DNS is reachable.                         |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Timestamp check                  | PASS                                                          | Checks if the timestamp is same across all Nodes.              |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| NTP sync check                   | PASS                                                          | Checks if the NTP is synced with NTP server.                   |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Check package & versions         | PASS                                                          | Checks for count and version of HX packages on each node.      |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Check Iptables count             | PASS                                                          | Checks if the IP Table count matches on all nodes.             |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Cache Disks check                | PASS                                                          | Checks the number of Cache Disks.                              |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Extra pnodes check               | PASS                                                          | Checks for any stale Node entry.                               |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Memory usage check               | PASS                                                          | Checks for available memory more than 2GB.                     |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Incidence of OOM in the log file | PASS                                                          | Checks for any previous incidence of Out Of Memory Condition.  |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Check permissions for /tmp       | PASS                                                          | Checks if the /tmp permissions are set correctly.              |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Check Cluster Access Policy      | Lenient                                                       | Checks the Configured Cluster Access Policy                    |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Check CMIP Hostname              | PASS                                                          | Check if the clustermanagementip has hostname defined.         |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Domain join health               | Name = hyper11-stc                                           | Checking domain join health of the Node.                       |

|                                  | Domain = HX.LOCAL                                             |                                                                |

|                                  | Distinguished Name = CN=HYPER11-STC,OU=HYPER10,DC=hx,DC=local |                                                                |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

HX Controller: 10.8.16.67

Test Summary:

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Name                             | Result                                                        | Comments                                                       |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Cluster services check           | PASS                                                          | Checks storfs, stMgr, sstNodeMgr service running on each node. |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Enospc state check               | PASS                                                          | Checks if the cluster storage utilization is above threshold.  |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Zookeeper check                  | PASS                                                          | Checks if Zookeeper service is running.                        |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Exhibitor check                  | PASS                                                          | Checks if Exhibitor in running.                                |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| System Disks Usage               | PASS                                                          | Checks if /sda1, var/stv and /var/zookeeper is less than 80%.  |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| HDD health check                 | PASS                                                          | Checks if any drive is in blacklisted state.                   |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| DNS check                        | PASS                                                          | Checks if configured DNS is reachable.                         |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Timestamp check                  | PASS                                                          | Checks if the timestamp is same across all Nodes.              |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| NTP sync check                   | PASS                                                          | Checks if the NTP is synced with NTP server.                   |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Check package & versions         | PASS                                                          | Checks for count and version of HX packages on each node.      |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Check Iptables count             | PASS                                                          | Checks if the IP Table count matches on all nodes.             |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Cache Disks check                | PASS                                                          | Checks the number of Cache Disks.                              |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Extra pnodes check               | PASS                                                          | Checks for any stale Node entry.                               |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Memory usage check               | PASS                                                          | Checks for available memory more than 2GB.                     |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Incidence of OOM in the log file | PASS                                                          | Checks for any previous incidence of Out Of Memory Condition.  |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Check permissions for /tmp       | PASS                                                          | Checks if the /tmp permissions are set correctly.              |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Check Cluster Access Policy      | Lenient                                                       | Checks the Configured Cluster Access Policy                    |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Check CMIP Hostname              | PASS                                                          | Check if the clustermanagementip has hostname defined.         |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Domain join health               | Name = hyper12-stc                                           | Checking domain join health of the Node.                       |

|                                  | Domain = HX.LOCAL                                             |                                                                |

|                                  | Distinguished Name = CN=HYPER12-STC,OU=HYPER10,DC=hx,DC=local |                                                                |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

################################################################################

Hyper-V check:

################################################################################

Hyper-V Clusters: 10.8.16.61, 10.8.16.62, 10.8.16.63

Hyper-V Host: 10.8.16.61

+------------------------------------------+-------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Name                                     | Status                                                                              | Comments                                                    |

+------------------------------------------+-------------------------------------------------------------------------------------+-------------------------------------------------------------+

| HostName                                 | HYPER10                                                                             | Check if the hostname is defined.                           |

+------------------------------------------+-------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Cluster Failover                         | Installed                                                                           | Check if the Failover Cluster Manager feature is installed. |

+------------------------------------------+-------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Hyper-V Role                             | Installed                                                                           | Check if the Hyper-V Manager feature is installed.          |

+------------------------------------------+-------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Node State                               | PASS                                                                                | Check the Node State.                                       |

+------------------------------------------+-------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Network Interfaces State                 | PASS                                                                                | Check the Network Interfaces State.                         |

+------------------------------------------+-------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Remote Management Enabled                | PASS                                                                                | Check if the Remote Management is enabled on the node.      |

+------------------------------------------+-------------------------------------------------------------------------------------+-------------------------------------------------------------+

| MTU for Storage Data Network             | 9000                                                                                | Check MTU for the Storage Data Network.                     |

+------------------------------------------+-------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Check the Domain and forest details      | Description             : HXDC-DOMAIN                                               | Check the Domain and forest details of the cluster.         |

|                                          | DnsForestName           : hx.local                                                  |                                                             |

|                                          | DomainControllerAddress : \\10.8.12.254                                             |                                                             |

|                                          | DomainControllerName    : \\HXDC                                                    |                                                             |

|                                          | DomainName              : HXDC-DOMAIN                                               |                                                             |

|                                          | Status                  : OK                                                        |                                                             |

+------------------------------------------+-------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Check host file entries                  |                                                                                     | Check if the host file have correct entries.                |

|                                          | 10.8.18.65     HYPER10-SMB.hx.local                                                 |                                                             |

|                                          | 10.8.18.69     HYPER10-SMB.hx.local                                                 |                                                             |

+------------------------------------------+-------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Check Adapter details                    | InterfaceAlias                 InterfaceDescription                IPv4Address      | Check Adapter details of the node.                          |

|                                          | --------------                 --------------------                -----------      |                                                             |

|                                          | vswitch-hx-livemigration       Hyper-V Virtual Ethernet Adapter #4 {10.8.17.61}     |                                                             |

|                                          | vswitch-hx-vm-network          Hyper-V Virtual Ethernet Adapter #3 {10.8.19.61}     |                                                             |

|                                          | vswitch-hx-storage-data        Hyper-V Virtual Ethernet Adapter #2 {10.8.18.61}     |                                                             |

|                                          | vswitch-hx-inband-mgmt         Hyper-V Virtual Ethernet Adapter    {10.8.16.61}     |                                                             |

|                                          | vEthernet (New Virtual Switch) Hyper-V Virtual Ethernet Adapter #5 {169.254.84.129} |                                                             |

+------------------------------------------+-------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Drivers test                             | Filter Name                     Num Instances    Altitude    Frame                  | Check the status of minifilter drivers.                     |

|                                          | ------------------------------  -------------  ------------  -----                  |                                                             |

|                                          | CsvNSFlt                                1       404900         0                    |                                                             |

|                                          | CsvFlt                                  0       404800         0                    |                                                             |

|                                          | CCFFilter                               1       261160         0                    |                                                             |

|                                          | storqosflt                              1       244000         0                    |                                                             |

|                                          | ResumeKeyFilter                         0       202000         0                    |                                                             |

|                                          | wcifs                                   0       189900         0                    |                                                             |

|                                          | CldFlt                                  0       180451         0                    |                                                             |

|                                          | FileCrypt                               0       141100         0                    |                                                             |

|                                          | svhdxflt                                0       135100         0                    |                                                             |

|                                          | luafv                                   1       135000         0                    |                                                             |

|                                          | npsvctrig                               1        46000         0                    |                                                             |

|                                          | Wof                                     1        40700         0                    |                                                             |

+------------------------------------------+-------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Virtual Machine Management service check | PASS                                                                                | Checking if VMMS service is Up and Running.                 |

+------------------------------------------+-------------------------------------------------------------------------------------+-------------------------------------------------------------+

| SMB Test                                 | PASS                                                                                | Checking SMB reachability of node.                          |

+------------------------------------------+-------------------------------------------------------------------------------------+-------------------------------------------------------------+

Hyper-V Host: 10.8.16.62

+------------------------------------------+---------------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Name                                     | Status                                                                                      | Comments                                                    |

+------------------------------------------+---------------------------------------------------------------------------------------------+-------------------------------------------------------------+

| HostName                                 | HYPER11                                                                                     | Check if the hostname is defined.                           |

+------------------------------------------+---------------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Cluster Failover                         | Installed                                                                                   | Check if the Failover Cluster Manager feature is installed. |

+------------------------------------------+---------------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Hyper-V Role                             | Installed                                                                                   | Check if the Hyper-V Manager feature is installed.          |

+------------------------------------------+---------------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Node State                               | PASS                                                                                        | Check the Node State.                                       |

+------------------------------------------+---------------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Network Interfaces State                 | PASS                                                                                        | Check the Network Interfaces State.                         |

+------------------------------------------+---------------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Remote Management Enabled                | PASS                                                                                        | Check if the Remote Management is enabled on the node.      |

+------------------------------------------+---------------------------------------------------------------------------------------------+-------------------------------------------------------------+

| MTU for Storage Data Network             | 9000                                                                                        | Check MTU for the Storage Data Network.                     |

+------------------------------------------+---------------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Check the Domain and forest details      | Description             : HXDC-DOMAIN                                                       | Check the Domain and forest details of the cluster.         |

|                                          | DnsForestName           : hx.local                                                          |                                                             |

|                                          | DomainControllerAddress : \\10.8.12.254                                                     |                                                             |

|                                          | DomainControllerName    : \\HXDC                                                            |                                                             |

|                                          | DomainName              : HXDC-DOMAIN                                                       |                                                             |

|                                          | Status                  : OK                                                                |                                                             |

+------------------------------------------+---------------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Check host file entries                  |                                                                                             | Check if the host file have correct entries.                |

|                                          | 10.8.18.66     HYPER10-SMB.hx.local                                                         |                                                             |

|                                          | 10.8.18.69     HYPER10-SMB.hx.local                                                         |                                                             |

+------------------------------------------+---------------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Check Adapter details                    | InterfaceAlias                 InterfaceDescription                IPv4Address              | Check Adapter details of the node.                          |

|                                          | --------------                 --------------------                -----------              |                                                             |

|                                          | vswitch-hx-inband-mgmt         Hyper-V Virtual Ethernet Adapter    {10.8.16.70, 10.8.16.62} |                                                             |

|                                          | vswitch-hx-livemigration       Hyper-V Virtual Ethernet Adapter #4 {10.8.17.62}             |                                                             |

|                                          | vswitch-hx-storage-data        Hyper-V Virtual Ethernet Adapter #2 {10.8.18.62}             |                                                             |

|                                          | vswitch-hx-vm-network          Hyper-V Virtual Ethernet Adapter #3 {10.8.19.62}             |                                                             |

|                                          | vEthernet (New Virtual Switch) Hyper-V Virtual Ethernet Adapter #5 {169.254.247.198}        |                                                             |

+------------------------------------------+---------------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Drivers test                             | Filter Name                     Num Instances    Altitude    Frame                          | Check the status of minifilter drivers.                     |

|                                          | ------------------------------  -------------  ------------  -----                          |                                                             |

|                                          | CsvNSFlt                                1       404900         0                            |                                                             |

|                                          | CsvFlt                                  0       404800         0                            |                                                             |

|                                          | CCFFilter                               1       261160         0                            |                                                             |

|                                          | storqosflt                              2       244000         0                            |                                                             |

|                                          | ResumeKeyFilter                         0       202000         0                            |                                                             |

|                                          | wcifs                                   0       189900         0                            |                                                             |

|                                          | CldFlt                                  0       180451         0                            |                                                             |

|                                          | FileCrypt                               0       141100         0                            |                                                             |

|                                          | svhdxflt                                0       135100         0                            |                                                             |

|                                          | luafv                                   1       135000         0                            |                                                             |

|                                          | npsvctrig                               1        46000         0                            |                                                             |

|                                          | Wof                                     1        40700         0                            |                                                             |

+------------------------------------------+---------------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Virtual Machine Management service check | PASS                                                                                        | Checking if VMMS service is Up and Running.                 |

+------------------------------------------+---------------------------------------------------------------------------------------------+-------------------------------------------------------------+

| SMB Test                                 | PASS                                                                                        | Checking SMB reachability of node.                          |

+------------------------------------------+---------------------------------------------------------------------------------------------+-------------------------------------------------------------+

Hyper-V Host: 10.8.16.63

+------------------------------------------+------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Name                                     | Status                                                                             | Comments                                                    |

+------------------------------------------+------------------------------------------------------------------------------------+-------------------------------------------------------------+

| HostName                                 | HYPER12                                                                            | Check if the hostname is defined.                           |

+------------------------------------------+------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Cluster Failover                         | Installed                                                                          | Check if the Failover Cluster Manager feature is installed. |

+------------------------------------------+------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Hyper-V Role                             | Installed                                                                          | Check if the Hyper-V Manager feature is installed.          |

+------------------------------------------+------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Node State                               | PASS                                                                               | Check the Node State.                                       |

+------------------------------------------+------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Network Interfaces State                 | PASS                                                                               | Check the Network Interfaces State.                         |

+------------------------------------------+------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Remote Management Enabled                | PASS                                                                               | Check if the Remote Management is enabled on the node.      |

+------------------------------------------+------------------------------------------------------------------------------------+-------------------------------------------------------------+

| MTU for Storage Data Network             | 9000                                                                               | Check MTU for the Storage Data Network.                     |

+------------------------------------------+------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Check the Domain and forest details      | Description             : HXDC-DOMAIN                                              | Check the Domain and forest details of the cluster.         |

|                                          | DnsForestName           : hx.local                                                 |                                                             |

|                                          | DomainControllerAddress : \\10.8.12.254                                            |                                                             |

|                                          | DomainControllerName    : \\HXDC                                                   |                                                             |

|                                          | DomainName              : HXDC-DOMAIN                                              |                                                             |

|                                          | Status                  : OK                                                       |                                                             |

+------------------------------------------+------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Check host file entries                  |                                                                                    | Check if the host file have correct entries.                |

|                                          | 10.8.18.67     HYPER10-SMB.hx.local                                                |                                                             |

|                                          | 10.8.18.69     HYPER10-SMB.hx.local                                                |                                                             |

+------------------------------------------+------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Check Adapter details                    | InterfaceAlias                 InterfaceDescription                IPv4Address     | Check Adapter details of the node.                          |

|                                          | --------------                 --------------------                -----------     |                                                             |

|                                          | vswitch-hx-inband-mgmt         Hyper-V Virtual Ethernet Adapter    {10.8.16.63}    |                                                             |

|                                          | vswitch-hx-storage-data        Hyper-V Virtual Ethernet Adapter #2 {10.8.18.63}    |                                                             |

|                                          | vswitch-hx-vm-network          Hyper-V Virtual Ethernet Adapter #3 {10.8.19.63}    |                                                             |

|                                          | vswitch-hx-livemigration       Hyper-V Virtual Ethernet Adapter #4 {10.8.17.63}    |                                                             |

|                                          | vEthernet (New Virtual Switch) Hyper-V Virtual Ethernet Adapter #5 {169.254.18.96} |                                                             |

+------------------------------------------+------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Drivers test                             | Filter Name                     Num Instances    Altitude    Frame                 | Check the status of minifilter drivers.                     |

|                                          | ------------------------------  -------------  ------------  -----                 |                                                             |

|                                          | CsvNSFlt                                1       404900         0                   |                                                             |

|                                          | CsvFlt                                  0       404800         0                   |                                                             |

|                                          | CCFFilter                               1       261160         0                   |                                                             |

|                                          | storqosflt                              2       244000         0                   |                                                             |

|                                          | ResumeKeyFilter                         0       202000         0                   |                                                             |

|                                          | wcifs                                   0       189900         0                   |                                                             |

|                                          | CldFlt                                  0       180451         0                   |                                                             |

|                                          | FileCrypt                               0       141100         0                   |                                                             |

|                                          | svhdxflt                                0       135100         0                   |                                                             |

|                                          | luafv                                   1       135000         0                   |                                                             |

|                                          | npsvctrig                               1        46000         0                   |                                                             |

|                                          | Wof                                     1        40700         0                   |                                                             |

+------------------------------------------+------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Virtual Machine Management service check | PASS                                                                               | Checking if VMMS service is Up and Running.                 |

+------------------------------------------+------------------------------------------------------------------------------------+-------------------------------------------------------------+

| SMB Test                                 | PASS                                                                               | Checking SMB reachability of node.                          |

+------------------------------------------+------------------------------------------------------------------------------------+-------------------------------------------------------------+

Main Report File: VHX_Tool_Main_Report_2020-09-13_09-49-38_HYPER10-SMB.txt

Report tar file: VHX_Report_2020_09_13_21_42_18.tar

Report file copied to path: /var/log/springpath

Release Notes:

https://www.cisco.com/c/en/us/support/hyperconverged-systems/hyperflex-hx-data-platform-software/products-release-notes-list.html

Upgrade Guides:

https://www.cisco.com/c/en/us/support/hyperconverged-systems/hyperflex-hx-data-platform-software/products-installation-guides-list.html

Note:

1) Hypercheck doesnot perform FAILOVER TEST, so please ensure that the upstream is configured for network connectivity for JUMBO or NORMAL MTU size as needed.

分析工具输出 — 后续步骤

- 该工具可自动在Hyperflex系统上运行手动命令。

- 如果工具运行OK并在所有测试上提供PASS/COMPLETED。HX系统适用于脚本执行的所有检查。

- 如果工具在某些检查中失败或无法成功运行，则可以使用CLI命令（如下所示）在Hyperflex系统上执行与脚本手动执行的检查相同的检查。

- 该工具不检查任何旧/新/打开/解决的警告，因此强烈建议在任何升级或维护活动之前查看Hyperflex发行说明和升级指南。

NOTE: 不分段 打开TAC案例，因为脚本运行失败。请手动运行这些命令，找出问题并打开SR找到问题。

CLI命令

在Hyperflex SCVM上 —

ssh to All Hyperflex SCVMs-

# service_status.sh

# sysmtool --ns cluster --cmd enospcinfo

# echo srvr | nc 0 2181

# pidof exhibitor

# sysmtool --ns disk --cmd list | grep -i blacklisted | wc -l

# stcli services dns show (and ping the IPs listed)

# date ; compare the time on all SCVMs. They should ideally be identical

# stcli services ntp show

# sysmtool --ns cleaner --cmd status

# ntpq -p -4

# dpkg -l | grep -i springpath

# iptables -L -n | wc -l

# hxcli cluster info

# df -h ; check that /var/stv should not be more than 80% used

# zgrep -i “out of memory” /var/log/springpath/debug-storfs.*

# domainjoin-cli query

在HyperV节点上 —

Open the Windows Powershell

# Get-ClusterNode

# Get-ClusterNetwork

# Get-Service WinRM, Make sure windows remote management service is running

# Get-Content $env:SystemRoot\System32\Drivers\etc\hosts , Make sure you have correct host entried

# test-path\\<smb-share name fqdn>\<datastorename> This should return true ,if not datastore is not reachable via smb.

# Get-NetIPConfiguration

# Get-NetIPInterface -AddressFamily IPv4 -InterfaceAlias vswitch-hx-storage-data | select NlMtu*