目录

简介

开始使用前

规则

先决条件

使用的组件

配置

网络图

配置

验证

故障排除

故障排除命令

相关信息

简介

本文档提供了在Cisco 1600、1700、2600和3600路由器上使用同步和异步端口进行调制解调器拨入的示例配置。通过以下配置，您可以将路由器的同步和异步接口连接到外部客户端调制解调器，这些调制解调器通过DB-60和RS-232电缆连接到路由器。

注：如果您有USR sportster调制解调器，则应只关闭dip开关3和8。

开始使用前

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

先决条件

本文档没有任何特定的前提条件。

使用的组件

本文档中的信息基于以下软件版本。

- Cisco IOS®软件版本12.1

本文档中的信息都是基于特定实验室环境中的设备创建的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您是在真实网络上操作，请确保您在使用任何命令前已经了解其潜在影响。

配置

本部分提供有关如何配置本文档所述功能的信息。

注：要查找有关本文档中使用的命令的其他信息，请使用命令查找工具(仅注册客户)。

有关安装网络模块和端口编号的详细信息，请参阅连接串行网络模块。

网络图

本文档使用下图所示的网络设置。

配置

本文使用如下所示的配置。

路由器 1

show running-config

!

version 12.1

service timestamps debug datetime msec

no service password-encryption

!

hostname router1

!

boot system slot1:c3640-i-mz.121-20

!

username test password 0 test

!--- Local database entries for authentication.

!

memory-size iomem 10

ip subnet-zero

!

!

interface Loopback0

ip address 1.1.1.1 255.255.255.0

!

interface Ethernet0/0

ip address 10.10.10.1 255.255.255.0

!

interface Serial3/0

no ip address

!

interface Serial3/1

no ip address

shutdown

!

interface Serial3/2

no ip address

shutdown

!

interface Serial3/3

no ip address

shutdown

!

interface Serial3/4

no ip address

shutdown

!

interface Serial3/5

no ip address

shutdown

!

interface Serial3/6

no ip address

shutdown

!

interface Serial3/7

!--- Interface attached to modem.

physical-layer async

!--- Put the interface into async mode. !--- A line appears at the bottom of the configuration. !--- All the other serial ports on this module are in sync mode.

ip unnumbered Loopback0

!--- IP address for the interface.

encapsulation ppp

async mode interactive

!--- Allow both EXEC and PPP sessions.

peer default ip address pool default

!--- Assign IP address to client.

ppp authentication chap

!--- Authenticate using Challenge Handshake !--- Authentication Protocol (CHAP).

!

ip local pool default 1.1.1.2

!--- Local IP pool of one IP address for client connect !--- on the external modem connected to serial3/7.

ip classless

ip route 0.0.0.0 0.0.0.0 10.10.10.100

ip default-gateway

ip http server

!

line con 0

line 104

!--- Line 104 associated with serial 3/7.

modem InOut

!--- Modem attached to line.

modem autoconfigure discovery

!--- We are hoping that the modem is a standard hayes !--- compatible modem. The configuration worked fine.

transport input all

autoselect during-login

autoselect ppp

transport input all

speed 115200

line aux 0

password <removed>

login

line vty 0 4

password <removed>

login

!

end

router1#

请注意，在接口上配置物理层异步后，需要配置的配置（本例中为104）中会显示新的线路号。 如果您不知道哪个行号与哪个接口关联，请发出show line EXEC命令来查看映射。配置完所有这些并安装所有硬件后，您必须反向Telnet至调制解调器，以锁定两台设备之间的数据终端设备(DTE)速度。为此，请Telnet至机箱上处于up/up状态（环回接口对此非常有用）的任何IP地址，端口号为2000+x，其中x是调制解调器连接到的线路号。在本例中，调制解调器在线104，因此Telnet至环回地址(1.1.1.1)端口2104。然后，您可以在空行发出AT命令，调制解调器应回显“OK”。 要断开连接，请按Ctrl-Shift-6，然后按x返回路由器提示符，然后键入disconnect以关闭连接。

注意：确保关闭连接或连接无法工作。

例如：

router1#telnet 1.1.1.1 2104

Trying 1.1.1.1, 2104 ... Open

at

OK

router1#disconnect

Closing connection to 1.1.1.1 [confirm]

router1#

有时，在DTE速度完全锁定之前，您需要向调制解调器发出命令at&b0&w0。在反向Telnet完成后，使用超级终端（或其他ASCII程序）拨入路由器，并查看是否能收到路由器提示。设置应为8N1。如果这样可行，则PPP连接也应该有效。

验证

本节提供可用于确认任何布线问题的信息。以下是同步/异步卡的布线图。另外，请确保线路(104)下的调制解调器硬件状态与下面介绍的类似。

Sync/async port(DB60 female)<------( CAB-232MT=, Part# 72-0793-01)-------->External Modem

注意：CAB-232MT电缆是DTE电缆，它使路由器充当DTE设备。您需要它连接到调制解调器（DCE设备）。 如果将同步/异步端口连接到终端设备(DTE)，则需要使用DCE电缆(CAB-232FC=)，使路由器充当DCE设备。

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

- show diag — 显示有关网络设备的控制器、接口处理器和端口适配器的诊断信息。

- show interfaces serial — 显示有关串行接口的信息。

- show line — 显示终端线路的参数。

router1#show diag

Slot 0:

....

....

<snipped>

....

Slot 3:

Sync/Async Port adapter, 8 ports

Port adapter is analyzed

Port adapter insertion time unknown

EEPROM contents at hardware discovery:

Hardware revision 1.0           Board revision H0

Serial number     10532987      Part number    800-01225-02

Test history      0x0           RMA number     00-00-00

EEPROM format version 1

EEPROM contents (hex):

0x20: 01 25 01 00 00 A0 B8 7B 50 04 C9 02 00 00 00 00

0x30: 88 00 00 00 98 10 23 17 FF FF FF FF FF FF FF FF

router1#show interfaces serial 3/7

Serial3/7 is down, line protocol is down

Hardware is CD2430 in async mode

MTU 1500 bytes, BW 9 Kbit, DLY 100000 usec,

reliability 255/255, txload 1/255, rxload 1/255

....

router1#show interfaces serial 3/0

Serial3/0 is down, line protocol is down

Hardware is CD2430 in sync mode

MTU 1500 bytes, BW 128 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

router1#show line

Tty  Typ    Tx/Rx      A  Modem  Roty AccO AccI   Uses  Noise  Overruns   Int

*    0  CTY     -  -      -    -     -     0     0      0/0         -

I   104 TTY 115200/115200 - inout    -     -     -      0    0      0/0      Se3/7

129 AUX  9600/9600    -    -     -     -     -      0    0      0/0        -

130 VTY               -    -     -     -     -      0    0      0/0        -

131 VTY               -    -     -     -     -      0    0      0/0        -

132 VTY               -    -     -     -     -      0    0      0/0        -

133 VTY               -    -     -     -     -      0    0      0/0        -

134 VTY               -    -     -     -     -      0    0      0/0        -

Line(s) not in async mode -or- with no hardware support:

1-96, 98-128

router1#show line 104

Tty Typ   Tx/Rx      A Modem  Roty AccO AccI   Uses   Noise  Overruns   Int

I 104  TTY 115200/115200- inout   -    -    -      0       0      0/0      Se3/7

Line 104, Location: "", Type: ""

Length: 24 lines, Width: 80 columns

Baud rate (TX/RX) is 115200/115200, no parity, 2 stopbits, 8 databits

Status: No Exit Banner

Capabilities: Modem Callout, Modem RI is CD,

Line usable as async interface

Modem state: Idle

Modem hardware state: noCTS noDSR  DTR RTS

!--- External connected modem is off.

Special Chars: Escape  Hold  Stop  Start  Disconnect  Activation

^^x    none   -     -       none

Timeouts:      Idle EXEC    Idle Session   Modem Answer  Session   Dispatch

00:10:00        never                        none     not set

Idle Session Disconnect Warning

never

Login-sequence User Response

00:00:30

Autoselect Initial Wait

not set

Modem type is unknown.

Session limit is not set.

Time since activation: never

Editing is enabled.

History is enabled, history size is 10.

DNS resolution in show commands is enabled

Full user help is disabled

Allowed input transports are pad v120 lapb-ta telnet rlogin udptn.

Allowed output transports are pad v120 lapb-ta telnet rlogin.

Preferred transport is telnet.

No output characters are padded

No special data dispatching characters

router1#

router1#show line 104

Tty Typ Tx/Rx         A Modem  Roty AccO AccI   Uses   Noise  Overruns   Int

104 TTY 115200/115200 -  inout  -    -    -      0       0       0/0     Se3/7

Line 104, Location: "", Type: ""

Length: 24 lines, Width: 80 columns

Baud rate (TX/RX) is 115200/115200, no parity, 2 stopbits, 8 databits

Status: No Exit Banner, CTS Raised

Capabilities: Modem Callout, Modem RI is CD

Modem state: Idle

Modem hardware state: CTS noDSR  DTR RTS

!--- External connected modem is ON, without any call on it.

Special Chars: Escape  Hold  Stop  Start  Disconnect  Activation

^^x    none   -     -       none

Timeouts:      Idle EXEC    Idle Session   Modem Answer  Session   Dispatch

00:10:00        never                        none     not set

Idle Session Disconnect Warning

never

Login-sequence User Response

00:00:30

Autoselect Initial Wait

not set

Modem type is unknown.

Session limit is not set.

Time since activation: never

Editing is enabled.

History is enabled, history size is 10.

DNS resolution in show commands is enabled

Full user help is disabled

Allowed input transports are pad v120 lapb-ta telnet rlogin udptn.

Allowed output transports are pad v120 lapb-ta telnet rlogin.

Preferred transport is telnet.

No output characters are padded

No special data dispatching characters

route1#

router1#show line 104

Tty Typ  Tx/Rx       A Modem  Roty AccO AccI   Uses   Noise  Overruns   Int

* 104 TTY 115200/115200 - inout   -    -    -       0      1       0/0     Se3/7

Line 104, Location: "", Type: ""

Length: 24 lines, Width: 80 columns

Baud rate (TX/RX) is 115200/115200, no parity, 2 stopbits, 8 databits

Status: PSI Enabled, Ready, Active, No Exit Banner, CTS Raised

Automore On

Capabilities: Modem Callout, Modem RI is CD

Modem state: Ready

Modem hardware state: CTS DSR  DTR RTS

!--- External connected modem is ON, with an active EXEC call on it.

Special Chars: Escape  Hold  Stop  Start  Disconnect  Activation

^^x    none   -     -       none

Timeouts:      Idle EXEC    Idle Session   Modem Answer  Session   Dispatch

00:10:00        never                        none     not set

Idle Session Disconnect Warning

never

Login-sequence User Response

00:00:30

Autoselect Initial Wait

not set

Modem type is unknown.

Session limit is not set.

Time since activation: 00:01:17

Editing is enabled.

History is enabled, history size is 10.

DNS resolution in show commands is enabled

Full user help is disabled

Allowed input transports are pad v120 lapb-ta telnet rlogin udptn.

Allowed output transports are pad v120 lapb-ta telnet rlogin.

Preferred transport is telnet.

No output characters are padded

No special data dispatching characters

router1#show interfaces serial 3/7

Serial3/7 is down, line protocol is down

!--- External connected modem is ON, with an active call in EXEC mode.

Hardware is CD2430 in async mode

Interface is unnumbered. Using address of Loopback0 (10.10.10.10)

MTU 1500 bytes, BW 115 Kbit, DLY 100000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive not set

DTR is pulsed for 5 seconds on reset

LCP Closed

Closed: IPCP

Last input 00:50:32, output 00:51:29, output hang never

Last clearing of "show interface" counters 00:00:38

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations  0/1/16 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

0 packets input, 0 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

0 packets output, 0 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

router1#

故障排除

上述验证部分提供有关电缆连接和异步通信控制信号(CTS DSR DTR RTS)的大部分信息。使用上述路由器1的配置，用户应该能够拨号。

- EXEC模式 — 在EXEC模式下，用户可以使用串行终端实用程序（如hyperterm/procomm）从调制解调器拨号到连接到同步/异步端口的外部调制解调器。在调制解调器之间成功进行培训后，用户应收到router1提示。在EXEC连接到路由器时，会收集验证部分中上述所有show命令。

- PPP模式 — 在PPP模式下，用户可以使用Windows拨号网络从调制解调器拨号到同步/异步端口上连接的外部调制解调器。如果在EXEC模式下拨号正常工作，则PPP也应正常工作，不会出现任何问题。请确保配置与上述完全相同。要排除PPP模式故障，请使用以下debug命令进行拨号，这些命令需要在毫秒时间戳内打开。按照粗体显示的调试行查看调试的进度。如果需要详细信息，请使用以下PPP故障排除流程图。

故障排除命令

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

注意：在发出debug命令之前，请参阅有关Debug命令的重要信息。

- service timestamps debug datetime msec — 用于为调试启用毫秒时间戳。

- debug modem — 用于观察接入服务器上的调制解调器线路活动。

- debug ppp negotiation — 用于查看客户端是否正在传递PPP协商。

- debug ppp authentication — 用于查看客户端是否正在传递身份验证。

- debug chat — 用于显示聊天脚本活动。

- debug confmodem — 用于显示与路由器所连接调制解调器的发现和配置相关的信息。

- show debugging — 用于显示有关为路由器启用的调试类型的信息。

- show users — 用于显示有关路由器上活动线路的信息。

有关故障排除命令示例，请参阅以下命令输出。

router1#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

router1(config)#service timestamps debug datetime msec

!--- Turned on millisecond time stamping for debugs.

router1(config)#end

router1#

router1#debug modem

router1#debug ppp negotiation

router1#debug ppp authentication

router1#debug chat

router1#debug confmodem

router1#show debugging

General OS:

Modem control/process activation debugging is on

PPP:

PPP authentication debugging is on

PPP protocol negotiation debugging is on

Chat Scripts:

Chat scripts activity debugging is on

router1#

!--- The following is the above mentioned !--- debugs log collected from rotuer, !--- when a PPP user tried to dialin with a username = test, password = test.

router1#

router1#clear line 104

[confirm]

[OK]

router1#

*Mar  1 00:06:34.563: TTY104: Line reset by "Exec"

*Mar  1 00:06:34.567: TTY104: Modem: IDLE->HANGUP

*Mar  1 00:06:34.567: TTY104: destroy timer type 0

*Mar  1 00:06:34.567: TTY104: destroy timer type 1

*Mar  1 00:06:34.567: TTY104: destroy timer type 3

*Mar  1 00:06:34.567: TTY104: destroy timer type 4

*Mar  1 00:06:34.567: TTY104: destroy timer type 2

*Mar  1 00:06:35.139: TTY104: dropping DTR, hanging up

*Mar  1 00:06:35.139: tty104: Modem: HANGUP->IDLE

*Mar  1 00:06:40.139: TTY104: restoring DTR

*Mar  1 00:06:41.139: TTY104: autoconfigure probe started

*Mar  1 00:06:41.139: TTY104: Modem command:  --AT&F&C1&D2S0=1H0--

*Mar  1 00:06:43.675: TTY104: Modem configuration succeeded

*Mar  1 00:06:43.675: TTY104: Detected modem speed 115200

*Mar  1 00:06:43.675: TTY104: Done with modem configuration

router1#

router1#

!--- Below are debugs when the PPP user tried to dialin.

*Mar  1 00:08:43.163: TTY104: DSR came up

*Mar  1 00:08:43.163: tty104: Modem: IDLE->(unknown)

*Mar  1 00:08:43.163: TTY104: Autoselect started

*Mar  1 00:08:43.163: TTY104: create timer type 0, 120 seconds

*Mar  1 00:08:44.699: TTY104: Autoselect sample 7E

*Mar  1 00:08:44.699: TTY104: Autoselect sample 7EFF

*Mar  1 00:08:44.699: TTY104: Autoselect sample 7EFF7D

*Mar  1 00:08:44.699: TTY104: Autoselect sample 7EFF7D23

*Mar  1 00:08:44.699: TTY104 Autoselect cmd:  ppp negotiate

*Mar  1 00:08:44.699: TTY104: destroy timer type 0 (OK)

*Mar  1 00:08:44.703: TTY104: EXEC creation

*Mar  1 00:08:44.703: TTY104: create timer type 1, 600 seconds

*Mar  1 00:08:44.707: TTY104: destroy timer type 1 (OK)

*Mar  1 00:08:44.707: TTY104: destroy timer type 0

00:08:46: %LINK-3-UPDOWN: Interface Serial3/7, changed state to up

*Mar  1 00:08:46.707: Se3/7 PPP: Treating connection as a dedicated line

*Mar  1 00:08:46.707: Se3/7 PPP: Phase is ESTABLISHING, Active Open

*Mar  1 00:08:46.707: Se3/7 LCP: O CONFREQ [Closed] id 3 len 25

*Mar  1 00:08:46.707: Se3/7 LCP:    ACCM 0x000A0000 (0x0206000A0000)

*Mar  1 00:08:46.707: Se3/7 LCP:    AuthProto CHAP (0x0305C22305)

*Mar  1 00:08:46.707: Se3/7 LCP:    MagicNumber 0x0014A697 (0x05060014A697)

*Mar  1 00:08:46.707: Se3/7 LCP:    PFC (0x0702)

*Mar  1 00:08:46.707: Se3/7 LCP:    ACFC (0x0802)

*Mar  1 00:08:46.863: Se3/7 LCP: I CONFACK [REQsent] id 3 len 25

*Mar  1 00:08:46.863: Se3/7 LCP:    ACCM 0x000A0000 (0x0206000A0000)

*Mar  1 00:08:46.863: Se3/7 LCP:    AuthProto CHAP (0x0305C22305)

*Mar  1 00:08:46.863: Se3/7 LCP:    MagicNumber 0x0014A697 (0x05060014A697)

*Mar  1 00:08:46.863: Se3/7 LCP:    PFC (0x0702)

*Mar  1 00:08:46.863: Se3/7 LCP:    ACFC (0x0802)

*Mar  1 00:08:47.703: Se3/7 LCP: I CONFREQ [ACKrcvd] id 2 len 50

*Mar  1 00:08:47.703: Se3/7 LCP:    ACCM 0x00000000 (0x020600000000)

*Mar  1 00:08:47.703: Se3/7 LCP:    MagicNumber 0x44B3482A (0x050644B3482A)

*Mar  1 00:08:47.703: Se3/7 LCP:    PFC (0x0702)

*Mar  1 00:08:47.703: Se3/7 LCP:    ACFC (0x0802)

*Mar  1 00:08:47.703: Se3/7 LCP:    Callback 6  (0x0D0306)

*Mar  1 00:08:47.703: Se3/7 LCP:    MRRU 1614 (0x1104064E)

*Mar  1 00:08:47.703: Se3/7 LCP:    EndpointDisc 1 Local

*Mar  1 00:08:47.703: Se3/7 LCP:     (0x131701362F5B168BFB407785EE942EB8)

*Mar  1 00:08:47.703: Se3/7 LCP:     (0xEF5D0700000000)

*Mar  1 00:08:47.703: Se3/7 LCP: O CONFREJ [ACKrcvd] id 2 len 11

*Mar  1 00:08:47.703: Se3/7 LCP:    Callback 6  (0x0D0306)

*Mar  1 00:08:47.707: Se3/7 LCP:    MRRU 1614 (0x1104064E)

*Mar  1 00:08:47.855: Se3/7 LCP: I CONFREQ [ACKrcvd] id 3 len 43

*Mar  1 00:08:47.855: Se3/7 LCP:    ACCM 0x00000000 (0x020600000000)

*Mar  1 00:08:47.855: Se3/7 LCP:    MagicNumber 0x44B3482A (0x050644B3482A)

*Mar  1 00:08:47.855: Se3/7 LCP:    PFC (0x0702)

*Mar  1 00:08:47.855: Se3/7 LCP:    ACFC (0x0802)

*Mar  1 00:08:47.855: Se3/7 LCP:    EndpointDisc 1 Local

*Mar  1 00:08:47.855: Se3/7 LCP:     (0x131701362F5B168BFB407785EE942EB8)

*Mar  1 00:08:47.855: Se3/7 LCP:     (0xEF5D0700000000)

*Mar  1 00:08:47.855: Se3/7 LCP: O CONFACK [ACKrcvd] id 3 len 43

*Mar  1 00:08:47.855: Se3/7 LCP:    ACCM 0x00000000 (0x020600000000)

*Mar  1 00:08:47.855: Se3/7 LCP:    MagicNumber 0x44B3482A (0x050644B3482A)

*Mar  1 00:08:47.855: Se3/7 LCP:    PFC (0x0702)

*Mar  1 00:08:47.859: Se3/7 LCP:    ACFC (0x0802)

*Mar  1 00:08:47.859: Se3/7 LCP:    EndpointDisc 1 Local

*Mar  1 00:08:47.859: Se3/7 LCP:     (0x131701362F5B168BFB407785EE942EB8)

*Mar  1 00:08:47.859: Se3/7 LCP:     (0xEF5D0700000000)

*Mar  1 00:08:47.859: Se3/7 LCP: State is Open

*Mar  1 00:08:47.859: Se3/7 PPP: Phase is AUTHENTICATING, by this end

*Mar  1 00:08:47.859: Se3/7 CHAP: O CHALLENGE id 2 len 28 from "router1"

*Mar  1 00:08:48.015: Se3/7 LCP: I IDENTIFY [Open] id 4 len 18 magic 0x44B3482A MSRASV5.00

*Mar  1 00:08:48.031: Se3/7 LCP: I IDENTIFY [Open] id 5 len 27 magic 0x44B3482A MSRAS-1-IRAH-W2K

*Mar  1 00:08:48.043: Se3/7 CHAP: I RESPONSE id 2 len 25 from "test"

*Mar  1 00:08:48.043: Se3/7 CHAP: O SUCCESS id 2 len 4

*Mar  1 00:08:48.047: Se3/7 PPP: Phase is UP

*Mar  1 00:08:48.047: Se3/7 IPCP: O CONFREQ [Closed] id 2 len 10

*Mar  1 00:08:48.047: Se3/7 IPCP:    Address 10.10.10.10 (0x03060A0A0A0A)

*Mar  1 00:08:48.175: Se3/7 CCP: I CONFREQ [Not negotiated] id 6 len 10

*Mar  1 00:08:48.175: Se3/7 CCP:    MS-PPC supported bits 0x00000001 (0x120600000001)

*Mar  1 00:08:48.175: Se3/7 LCP: O PROTREJ [Open] id 4 len 16 protocol CCP (0x80FD0106000A120600000001)

*Mar  1 00:08:48.191: Se3/7 IPCP: I CONFREQ [REQsent] id 7 len 40

*Mar  1 00:08:48.191: Se3/7 IPCP:    CompressType VJ 15 slots CompressSlotID (0x0206002D0F01)

*Mar  1 00:08:48.191: Se3/7 IPCP:    Address 0.0.0.0 (0x030600000000)

*Mar  1 00:08:48.191: Se3/7 IPCP:    PrimaryDNS 0.0.0.0 (0x810600000000)

*Mar  1 00:08:48.195: Se3/7 IPCP:    PrimaryWINS 0.0.0.0 (0x820600000000)

*Mar  1 00:08:48.195: Se3/7 IPCP:    SecondaryDNS 0.0.0.0 (0x830600000000)

*Mar  1 00:08:48.195: Se3/7 IPCP:    SecondaryWINS 0.0.0.0 (0x840600000000)

*Mar  1 00:08:48.195: Se3/7 IPCP: O CONFREJ [REQsent] id 7 len 34

*Mar  1 00:08:48.195: Se3/7 IPCP:    CompressType VJ 15 slots CompressSlotID (0x0206002D0F01)

*Mar  1 00:08:48.195: Se3/7 IPCP:    PrimaryDNS 0.0.0.0 (0x810600000000)

*Mar  1 00:08:48.195: Se3/7 IPCP:    PrimaryWINS 0.0.0.0 (0x820600000000)

*Mar  1 00:08:48.195: Se3/7 IPCP:    SecondaryDNS 0.0.0.0 (0x830600000000)

*Mar  1 00:08:48.195: Se3/7 IPCP:    SecondaryWINS 0.0.0.0 (0x840600000000)

*Mar  1 00:08:48.199: Se3/7 IPCP: I CONFACK [REQsent] id 2 len 10

*Mar  1 00:08:48.199: Se3/7 IPCP:    Address 10.10.10.10 (0x03060A0A0A0A)

*Mar  1 00:08:48.343: Se3/7 IPCP: I CONFREQ [ACKrcvd] id 8 len 10

*Mar  1 00:08:48.343: Se3/7 IPCP:    Address 0.0.0.0 (0x030600000000)

*Mar  1 00:08:48.343: Se3/7 IPCP: O CONFNAK [ACKrcvd] id 8 len 10

*Mar  1 00:08:48.343: Se3/7 IPCP:    Address 1.1.1.2 (0x030601010102)

*Mar  1 00:08:48.483: Se3/7 IPCP: I CONFREQ [ACKrcvd] id 9 len 10

*Mar  1 00:08:48.483: Se3/7 IPCP:    Address 1.1.1.2 (0x030601010102)

*Mar  1 00:08:48.483: Se3/7 IPCP: O CONFACK [ACKrcvd] id 9 len 10

*Mar  1 00:08:48.483: Se3/7 IPCP:    Address 1.1.1.2 (0x030601010102)

*Mar  1 00:08:48.487: Se3/7 IPCP: State is Open

*Mar  1 00:08:48.487: Se3/7 IPCP: Install route to 1.1.1.2

00:08:49: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial3/7,

changed state to up

router1#

router1#show interfaces serial 3/7

Serial3/7 is up, line protocol is up

Hardware is CD2430 in async mode

Interface is unnumbered. Using address of Loopback0 (10.10.10.10)

MTU 1500 bytes, BW 115 Kbit, DLY 100000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive not set

DTR is pulsed for 5 seconds on reset

LCP Open

Open: IPCP

Last input 00:00:00, output 00:00:09, output hang never

Last clearing of "show interface" counters 00:08:42

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations  0/1/16 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

5 minute input rate 0 bits/sec, 1 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

157 packets input, 10790 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

2 input errors, 2 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

26 packets output, 975 bytes, 0 underruns

0 output errors, 0 collisions, 1 interface resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

router1#show users

Line      User       Host(s)         Idle     Location

*  0 con 0                  idle           00:00:00

104 tty 104   test       Async interface  00:00:01  PPP: 1.1.1.2

Interface      User        Mode           Idle     Peer Address

router1#ping  1.1.1.2

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 1.1.1.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 156/163/172 ms

router1#

相关信息

- 接入产品支持页

- 拨号技术支持页

- 技术支持 - Cisco Systems