目录

简介

使用Internet Explorer时，为什么单击系统的Telnet图标会给我显示“Web page cannot be displayed”错误？

相关信息

简介

本文涉及Cisco TelePresence Management Suite。

问：使用Internet Explorer时，为什么单击系统的Telnet图标会给我一个“Web page cannot be displayed”错误？

A. Microsoft已禁用在Internet Explorer中打开Telnet URL的功能，因此当将Internet Explorer用作TMS的Web浏览器时，此功能不可用。

相关信息

- 技术支持和文档 - Cisco Systems