目录

简介

先决条件

要求

使用的组件

背景信息

Cisco DNA Center CLI日志

步骤

确认

简介

本文档介绍通过CLI在Cisco DNA中心上设置日志的步骤。

先决条件

要求

- 您必须具有对Cisco DNA Center的命令行界面(CLI)访问权限。

- 您必须具有磁悬浮安全套接字外壳(SSH)访问权限才能执行此过程。

使用maglev作为端口2222的用户名。

使用的组件

本文档中的信息基于以下软件版本：

- 思科DNA Center 2.3.3

- 思科DNA Center 2.3.5

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您的网络处于活动状态，请确保您了解所有命令的潜在影响。

背景信息

为了帮助排除服务问题，您可以更改Cisco DNA Center服务的日志记录级别。

如果要通过图形用户界面(GUI)设置日志，您可以查看此文档。

服务的默认日志记录级别为信息(Info)。您可以将日志记录级别从信息性更改为不同的日志记录级别（调试）以捕获更多信息。

注意：由于可以披露的信息类型，在调试级别或更高级别收集的日志必须具有受限访问权限，并且不能长期打开。

- 调试：调试消息

- Info：正常但重要的条件消息

- 警告：警告条件消息

- 错误：错误条件消息

Cisco DNA Center CLI日志

步骤

步骤1:确定服务的端口。

magctl service status [service] | grep -i port

magctl service ip display | grep [service]

第二步： 设置服务的级别日志。

magctl service loglevel set -l debug -t [30|60] [service] [port]

注意：有一些服务无法修改日志级别。

在这种情况下，您必须看到错误：

magctl service loglevel set -l debug -t 30  disaster-recovery-service 8500

Could not complete the operation, either service is down or service does not support the operation

确认

检验更改。

magctl service loglevel display [service] [port]