目录

简介

问题

解决方案

使用rsyslog

简介

本文档介绍如何配置CSPC以将系统日志转发到系统日志服务器。

问题

虽然BCS和NP支持系统日志分析，但有些人已经有其他解决方案，并且喜欢使用Splunk等系统日志服务器。但是，在这种情况下，您需要CSPC将系统日志从CSPC转发到系统日志服务器。

解决方案

确定需要使用的协议(TCP/UDP)和IP/端口。默认端口为514。

注意：必须可以从CSPC访问系统日志服务器。

使用rsyslog

1. 备份/etc/rsyslog.conf。

cp /etc/rsyslog.conf /etc/rsyslog.confbkup<date>

2. 添加转发规则。

# ### begin forwarding rule ###

# The statement between the begin ... end define a SINGLE forwarding

# rule. They belong together, do NOT split them. If you create multiple

# forwarding rules, duplicate the whole block!

# Remote Logging (we use TCP for reliable delivery)

#

# An on-disk queue is created for this action. If the remote host is

# down, messages are spooled to disk and sent when it is up again.

#$WorkDirectory /var/lib/rsyslog # where to place spool files

#$ActionQueueFileName fwdRule1 # unique name prefix for spool files

#$ActionQueueMaxDiskSpace 1g   # 1gb space limit (use as much as possible)

#$ActionQueueSaveOnShutdown on # save messages to disk on shutdown

#$ActionQueueType LinkedList   # run asynchronously

#$ActionResumeRetryCount -1    # infinite retries if host is down

# remote host is: name/ip:port, e.g. 192.168.0.1:514, port optional

#*.* @@remote-host:514

Add here

# ### end of the forwarding rule ###

2.1. TCP示例：

*.* @@138.25.253.132:514

2.2. UDP示例：

*.* @138.25.253.132:514

3. 重新启动rsyslog。

service rsyslog restart

注意：如果配置错误的协议，则会显示错误消息rsyslogd： cannot connect to ： ： Connection refused ... 。如果发生此错误，请进行修改（转到步骤2.1和2.2）。

我们可以通过以下方式生成用于测试的系统日志：

logger "Your message for testing here"

4. 确认是否正在接收系统日志。