目录

简介

问题：部署失败，出现错误“Quota CPU's exceeded”。限制:8.0"

解决方案

简介

本文档介绍如何在Google Cloud上解决CPU的超出错误消息。

问题：部署失败，出现错误“Quota CPU's exceeded”。限制:8.0"

无法在Cisco Call Manager(CCM)版本为4.8.0/4.7.x的Google云GCE上部署实例。它失败，并显示错误“Quota CPU's exceeded”。限制:8.0.”，如图所示：

在CCO渗透日志中，您会发现以下错误：

AppLifecycleImpl[17,Jango,STARTING] 17-05-30 04:21:37 / (running)

==================================================================

ClusterLifecycleImpl[18,CentOS_1,WAITING_TO_START,0] (not started)

2017-05-30 04:21:38,473 INFO  impl.AbstractLifecycle [threadPoolExecutor-2]  - DeploymentJobName=CentOS_1 DeploymentJobID=18 ClusterLifecycleImpl[18,CentOS_1,STARTING,0] state from WAITING_TO_START -> STARTING

2017-05-30 04:21:41,708 WARN  util.MacroUtil  [threadPoolExecutor-2]  - Value for key: JOB_DESC is null

2017-05-30 04:21:42,837 INFO  impl.GatewayServiceImpl [threadPoolExecutor-2]  - VLAN ID:null

2017-05-30 04:21:42,959 INFO  gc.GoogleComputeCloudProviderV1 [threadPoolExecutor-2]  - NetworkInterfaceInfo{privateIPAllocationMode=DHCP, networkID='default', order=1, publicIpAllocate=true, staticIPAllocation=null, ipamCallOutAllocation=null, properties=null}

2017-05-30 04:21:45,951 ERROR gc.BaseGoogleComputeCloudProvider [threadPoolExecutor-2]  - GoogleJsonErrors

2017-05-30 04:21:45,952 ERROR gc.BaseGoogleComputeCloudProvider [threadPoolExecutor-2]  - Google JsonResponse Exception

com.google.api.client.googleapis.json.GoogleJsonResponseException: 403 Forbidden

{

"code" : 403,

"errors" : [ {

"domain" : "usageLimits",

"message" : "Quota 'CPUS' exceeded. Limit: 8.0",

"reason" : "quotaExceeded"

} ],

"message" : "Quota 'CPUS' exceeded. Limit: 8.0"

}

登录到Google Cloud UI，然后选中Notification选项卡，在该选项卡中可以找到确切的错误，如图所示。

根据您订用的计划限制资源分配。如果你超过了限制。

要验证，请登录GCC并选择配额（如图所示），您可以找到现有计划的配额。

解决方案

这可以通过检查GCE当前订用和升级（如有必要）或删除未使用的实例来释放资源来解决。