目录

简介

问题

解决方案

简介

本文档介绍如何向云中心管理器(CCM)和云中心协调器(CCO)添加代理，以使云中心无需直接连接到互联网即可工作。

问题

要成功部署和运行云中心，强烈建议直接访问互联网以下载软件包。对于私有数据中心或内部网络，需要有HTTP/HTTPS代理服务器才能访问互联网。

解决方案

注意：将配置中的“proxyserver.com”替换为代理服务器地址。

环境中的设置：

http_proxy=http://proxyserver.com:80

export http_proxy

https_proxy=https://proxyserver.com:80

export https_proxy

编辑yum.conf:

vi /etc/yum.conf

http_proxy=http://proxyserver.com:80

https_proxy=https://proxyserver.com:80

编辑Tomcat环境：

vi /usr/local/tomcat/bin/setenv.sh

export JAVA_OPTS="-Dhttp.proxySet=true -Dhttp.proxyHost=proxyserver.com -Dhttp.proxyPort=80 -Dhttps.proxySet=true -DhttpsHost=proxyserver.com -Dhttps.proxyPort=80"