目录

简介

背景信息

缩写

vPC端口通道故障排除的前提条件

vPC验证

1. vPC状态：show vpc

2. vPC角色、vPC系统mac和LAG ID:show vpc role

3. Port-channel Status : show port-channel extended

4. TEP详细信息和逻辑对等链路状态：show system internal epm vpc

5. ZMQ连接详细信息：show system internal vpcm zmq statistics

排除VPC端口通道故障

1.物理端口关闭

2.由LACP暂停

3.由vPC暂停

4. LACP暂停个人

其他错误

1. mcp-loop-err-disable

2. bpdu-guard-error-disable

简介

本文档介绍如何识别和解决ACI中的vPC可能出现的问题。

背景信息

虚拟端口通道(vPC)允许物理上连接到两个不同ACI枝叶节点的链路显示为连接到第三台设备（即网络交换机、服务器、支持链路聚合技术的任何其他网络设备）的单个端口通道。vPC包括两个指定为vPC对等交换机的ACI枝叶交换机。在vPC对等设备中，一个为主设备，另一个为辅助设备。交换机构成的系统称为vPC域

vPC对等设备之间没有专用对等链路；交换矩阵本身充当MCT。

·对等可达性协议 — 使用ZMQ代替CFS。

· ZMQ是一个开源的高性能消息库，使用TCP作为传输。

·此库在交换机上打包为libzmq，并链接到需要与vPC对等设备通信的每个应用程序。

对等连通性不是通过物理对等链路来处理；而是使用路由触发器来检测对等连通性。

· vPC Manager向URIB注册对等路由通知。

·当ISIS发现到对等体的路由时，URIB会通知vPC管理器，然后尝试打开与对等体的ZMQ套接字。

·当对等路由被ISIS撤销时，vPC管理器会再次被URIB通知，从而使MCT链路断开。

作为升级最佳实践的一部分，建议升级每个Pod中至少两个独立组的交换机，以使每个Pod中的一半枝叶和主干节点在任何给定时间都处于工作状态。例如，一个组具有偶数编号的枝叶和主干节点，另一个组在每个pod中具有奇数编号的枝叶和主干。通过配置vPC的设备，我们可以将至少一台设备置于不同的组中，以确保在升级过程中该设备处于工作状态。这可以防止升级期间出现任何中断，因为至少有一个设备在另一个设备升级期间保持运行状态。

缩写

ACI：以应用为中心的基础设施

vPC：虚拟端口通道

MCT：多机箱EtherChannel中继

CFS：思科交换矩阵服务

ZMQ：零消息队列

LACP：链路汇聚控制协议

PDU：协议数据单元

LAG：链路聚合

vPC端口通道故障排除的前提条件

有关vPC配置，请参阅

https://www.cisco.com/c/en/us/td/docs/switches/datacenter/aci/apic/sw/4-x/L2-configuration/Cisco-APIC-Layer2-Configuration-Guide-42x/Cisco-APIC-Layer2-Configuration-Guide-421_chapter_0111.html

https://www.cisco.com/c/en/us/td/docs/switches/datacenter/aci/apic/sw/2-x/L2_config/b_Cisco_APIC_Layer_2_Configuration_Guide/b_Cisco_APIC_Layer_2_Configuration_Guide_chapter_0100.html

vPC验证

1. vPC状态：show vpc

FAB3-L1# show vpc

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 101

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : Disabled

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : primary

Number of vPCs configured         : 1

Peer Gateway                      : Disabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

Operational Layer3 Peer           : Disabled

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1           up     -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

686  Po3    up     success     success                    86

FAB3-L2# show vpc

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 101

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : Disabled

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : secondary

Number of vPCs configured         : 1

Peer Gateway                      : Disabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

Operational Layer3 Peer           : Disabled

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1           up     -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

686  Po2    up     success     success                    86

输出显示，使用vPC域ID 101形成对等邻接关系，注意vPC保持活动状态在ACI中禁用，因为不需要专用链路。具有活动vlan 86的vPC中的Po3处于UP状态。请注意，vPC对交换机上的端口通道号可能不同。

2. vPC角色、vPC系统mac和LAG ID:show vpc role

FAB3-L1# show vpc role

vPC Role status

----------------------------------------------------

vPC role                        : primary, operational secondary

Dual Active Detection Status    : 0

vPC system-mac                  : 00:23:04:ee:be:65

vPC system-priority             : 32667

vPC local system-mac            : 00:81:c4:b1:25:4f

vPC local role-priority         : 101

FAB3-L2# show vpc role

vPC Role status

----------------------------------------------------

vPC role                        : secondary, operational primary

Dual Active Detection Status    : 0

vPC system-mac                  : 00:23:04:ee:be:65

vPC system-priority             : 32667

vPC local system-mac            : 00:5d:73:57:c4:2c

vPC local role-priority         : 102

此命令显示L1为主用，L2为次用。

由于终端设备连接到两台不同的vPC交换机，因此它们必须有一种机制将vPC对等设备标识为一个逻辑设备。这可以通过在对等体之间共享的LAG ID中使用vPC系统MAC来实现。这使终端设备将vPC对等设备视为一个逻辑单元。

N3K# show lacp interface ethernet 1/24

Interface Ethernet1/24 is up

Channel group is 1 port channel is Po1

PDUs sent: 31726

PDUs rcvd: 31634

Markers sent: 0

Markers rcvd: 0

Marker response sent: 0

Marker response rcvd: 0

Unknown packets rcvd: 0

Illegal packets rcvd: 0

Lag Id: [ [(7f9b, 0-23-4-ee-be-65, 82ae, 8000, 4121), (8000, 0-a6-ca-75-6f-c1, 8000, 8000, 15d)] ]

Operational as aggregated link since Fri Sep  2 08:05:52 2022

Local Port: Eth1/24   MAC Address= 0-a6-ca-75-6f-c1

System Identifier=0x8000,  Port Identifier=0x8000,0x15d

Operational key=32768

LACP_Activity=active

LACP_Timeout=Long Timeout (30s)

Synchronization=IN_SYNC

Collecting=true

Distributing=true

Partner information refresh timeout=Long Timeout (90s)

Actor Admin State=61

Actor Oper State=61

Neighbor: 0x4121

MAC Address= 0-23-4-ee-be-65

System Identifier=0x7f9b,  Port Identifier=0x8000,0x4121

Operational key=33454

LACP_Activity=active

LACP_Timeout=Long Timeout (30s)

Synchronization=IN_SYNC

Collecting=true

Distributing=true

Partner Admin State=61

Partner Oper State=61

Aggregate or Individual(True=1)= 1

N3K# show lacp interface ethernet 1/25

Interface Ethernet1/25 is up

Channel group is 1 port channel is Po1

PDUs sent: 31666

PDUs rcvd: 31651

Markers sent: 0

Markers rcvd: 0

Marker response sent: 0

Marker response rcvd: 0

Unknown packets rcvd: 0

Illegal packets rcvd: 0

Lag Id: [ [(7f9b, 0-23-4-ee-be-65, 82ae, 8000, 111), (8000, 0-a6-ca-75-6f-c1, 8000, 8000, 161)] ]

Operational as aggregated link since Fri Sep  2 08:00:34 2022

Local Port: Eth1/25   MAC Address= 0-a6-ca-75-6f-c1

System Identifier=0x8000,  Port Identifier=0x8000,0x161

Operational key=32768

LACP_Activity=active

LACP_Timeout=Long Timeout (30s)

Synchronization=IN_SYNC

Collecting=true

Distributing=true

Partner information refresh timeout=Long Timeout (90s)

Actor Admin State=61

Actor Oper State=61

Neighbor: 0x111

MAC Address= 0-23-4-ee-be-65

System Identifier=0x7f9b,  Port Identifier=0x8000,0x111

Operational key=33454

LACP_Activity=active

LACP_Timeout=Long Timeout (30s)

Synchronization=IN_SYNC

Collecting=true

Distributing=true

Partner Admin State=61

Partner Oper State=61

Aggregate or Individual(True=1)= 1

输出显示LAG ID(7f9b， 0-23-4-ee-be-65, 82ae， 8000, 4121)，它是作为系统ID的优先级(32667 in Hex)、vPC系统mac(00:23:04:ee:be:65)、操作密钥(33454 in Hex)和端口标识符的组合。

3. Port-channel Status : show port-channel extended

FAB3-L1# show port-channel extended

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-----------------------------------------------------------------------------

Group Port-       BundleGrp                Protocol  Member Ports

Channel

-----------------------------------------------------------------------------

3     Po3(SU)     101-102                  LACP      Eth1/33(P)

Show port-channel extended显示有关属于端口通道捆绑的物理链路状态的更多信息。

4. TEP详细信息和逻辑对等链路状态：show system internal epm vpc

FAB3-L1# show system internal epm vpc

Local TEP IP                  : 10.3.208.64

Peer TEP IP                   : 10.3.208.67

vPC configured                : Yes

vPC VIP                       : 10.3.16.67

MCT link status               : Up

Local vPC version bitmap      : 0x7

Peer vPC version bitmap       : 0x7

Negotiated vPC version        : 3

Peer advertisement received   : Yes

Tunnel to vPC peer            : Up

vPC# 686

if : port-channel3, if index : 0x16000002

local vPC state : MCEC_STATE_UP, peer vPC state : MCEC_STATE_UP

current link state : LOCAL_UP_PEER_UP

vPC fast conv : Off

5. ZMQ连接详细信息：show system internal vpcm zmq statistics

FAB3-L1# show system internal vpcm zmq statistics

--------------------------------------------

MCECM ZMQ counters

----------------------------------------------

ZMQ server                                        : 1

ZmQ: Registered ZmQ print callback

ZmQ: ====== Start ZMQ statistics printing ======

ZmQ: ZMQ socket type: 5, local ID: 40d0030a

ZmQ:     Socket base 0x1109c3b4, #endpoints 1

ZmQ:     Total 1 I/O pipes, CONNECT CNT: 0, DISCONNECT CNT: 0

ZmQ:     RX CNT: 66, BYTES: 124132, ERRORS: 0

ZmQ:     TX CNT: 66, BYTES: 125096, ERRORS: 0

ZmQ:         Pipe tcp://10.3.208.64:5001 (ID:  FD 54 flag 1 state 0): read 66 (124132 bytes) write 66 (125096 bytes) Peer I/O pipe: read  66 (125096 bytes) write 66 (124132 bytes)

ZmQ:         Stream engine 0xae90049c ZMQ SOCKET 0x1109c3b4 TCP FD: 54 @ 10.3.208.67:58740

ZmQ:             RX CNT: 72 BYTES: 124494 ERRORS: 0 TX CNT: 73 BYTES: 125458 ERRORS: 0

ZmQ:             CONNECT CNT: 0 DISCONNECT CNT: 0

ZmQ: ====== End ZMQ statistics printing ======

ZMQ统计信息显示ZMQ会话的状态、连接和断开的次数以及发生的任何错误。

排除VPC端口通道故障

1.物理端口关闭

FAB3-L1# show vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 101

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : Disabled

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : primary

Number of vPCs configured         : 1

Peer Gateway                      : Disabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

Operational Layer3 Peer           : Disabled

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1           up     -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

686  Po3    down*  success     success

输出鞋Po3下降。

FAB3-L1# show port-channel summary

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

-------------------------------------------------------------------------------

3     Po3(SD)     Eth      LACP      Eth1/33(D)

我们进一步查看属于port-channel一部分的接口状态。此时，Eth1/33处于Down（关闭）状态。LACP配置为捆绑协议。

FAB3-L1# show int e1/33

Ethernet1/33 is down (notconnect)

admin state is up, Dedicated Interface

Belongs to po3

Hardware: 100/1000/10000/auto Ethernet, address: 0081.c4b1.2521 (bia 0081.c4b1.2521)

MTU 9000 bytes, BW 0 Kbit, DLY 1 usec

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, medium is broadcast

Port mode is trunk

full-duplex, 10 Gb/s

FEC (forward-error-correction) : disable-fec

Beacon is turned off

Auto-Negotiation is turned on

Input flow-control is off, output flow-control is off

Auto-mdix is turned off

Switchport monitor is off

EtherType is 0x8100

EEE (efficient-ethernet) : n/a

Last link flapped 00:08:15

Last clearing of "show interface" counters never

9 interface resets

30 seconds input rate 0 bits/sec, 0 packets/sec

30 seconds output rate 0 bits/sec, 0 packets/sec

Load-Interval #2: 5 minute (300 seconds)

input rate 0 bps, 0 pps; output rate 0 bps, 0 pps

Show interface输出提供了有关接口e1/33的详细信息。我们可以看到E1/33处于notconnect状态。

建议操作：

确保端口连接正确并且配置正确。

2.由LACP暂停

FAB3-L1# show port-channel extended

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-----------------------------------------------------------------------------

Group Port-       BundleGrp                Protocol  Member Ports

Channel

-----------------------------------------------------------------------------

3     Po3(SD)     101-102                  LACP      Eth1/33(s)

输出显示Eth1/33处于挂起状态。接下来，我们查看show interface Eth1/33以了解更多详细信息。

FAB3-L1# show int e1/33

Ethernet1/33 is down (suspended-due-to-no-lacp-pdus)

admin state is up, Dedicated Interface

Belongs to po3

Hardware: 100/1000/10000/auto Ethernet, address: 0081.c4b1.2521 (bia 0081.c4b1.2521)

MTU 9000 bytes, BW 0 Kbit, DLY 1 usec

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, medium is broadcast

Port mode is trunk

full-duplex, 10 Gb/s

FEC (forward-error-correction) : disable-fec

Beacon is turned off

Auto-Negotiation is turned on

Input flow-control is off, output flow-control is off

Auto-mdix is turned off

Switchport monitor is off

EtherType is 0x8100

EEE (efficient-ethernet) : n/a

Last link flapped 00:00:13

Last clearing of "show interface" counters never

12 interface resets

30 seconds input rate 0 bits/sec, 0 packets/sec

30 seconds output rate 1640 bits/sec, 0 packets/sec

Show interface建议端口暂停，因为没有LACP PDU。我们可以进一步查看LACP计数器并确定是否正在发送和接收LACP PDU。

FAB3-L1# show lacp counters interface port-channel 3

LACPDUs         Marker      Marker Response    LACPDUs

Port              Sent   Recv     Sent   Recv     Sent   Recv      Pkts Err

---------------------------------------------------------------------

port-channel3

Ethernet1/33       314    264      0      0        0      0        0

FAB3-L1#

FAB3-L1#

FAB3-L1# show lacp counters interface port-channel 3

LACPDUs         Marker      Marker Response    LACPDUs

Port              Sent   Recv     Sent   Recv     Sent   Recv      Pkts Err

---------------------------------------------------------------------

port-channel3

Ethernet1/33       315    264      0      0        0      0        0

输出显示，计数器只递增发送的LACPDU，而接收计数器保持不变。这表明我们没有收到来自远程终端的LACP PDU。

我们还可以查看LACP协商参数、计数器等。对于特定接口，请使用“show lacp interface e1/33”。

FAB3-L1# show lacp interface e1/33

Interface Ethernet1/33 is suspended

Channel group is 3 port channel is Po3

PDUs sent: 317

PDUs rcvd: 264   received

Markers sent: 0

Markers rcvd: 0

Marker response sent: 0

Marker response rcvd: 0

Unknown packets rcvd: 0

Illegal packets rcvd: 0

Lag Id: [ [(7f9b, 00-23-04-ee-be-65, 82ae, 8000, 121), (0, 0-0-0-0-0-0, 0, 0, 0)] ]

Operational as aggregated link since  Mon Aug 22 09:29:53 2022

Local Port: Eth1/33   MAC Address= 00-81-c4-b1-25-4f

System Identifier=0x8000,00-81-c4-b1-25-4f

Port Identifier=0x8000,0x121

Operational key=33454

LACP_Activity=active

LACP_Timeout=Long Timeout (30s)

Synchronization=NOT_IN_SYNC

Collecting=false

Distributing=false

Partner information refresh timeout=Long Timeout (90s)

Actor Admin State=(Ac-1:To-0:Ag-1:Sy-0:Co-0:Di-0:De-1:Ex-0)

Actor Oper State=Ac-1:To-0:Ag-1:Sy-0:Co-0:Di-0:De-1:Ex-0

Neighbor: 0x0

MAC Address= 0-0-0-0-0-0

System Identifier=0x0,0x0

Port Identifier=0x0,0x0

Operational key=0

LACP_Activity=unknown

LACP_Timeout=Long Timeout (30s)

Synchronization=NOT_IN_SYNC

Collecting=false

Distributing=false

Partner Admin State=(Ac-0:To-0:Ag-0:Sy-0:Co-0:Di-0:De-0:Ex-0)

Partner Oper State=(Ac-0:To-0:Ag-0:Sy-0:Co-0:Di-0:De-0:Ex-0)

Aggregate or Individual(True=1)= 2

此外，还可以在枝叶上为LACP数据包捕获数据包，您可以使用特定过滤器过滤出有问题的接口。

tcpdump -vvvi kpm_inb ether proto 0x8809

建议操作：

确保在远程端正确配置了LACP，并且设备在正确的接口上发送了LACP PDU。

3.由vPC暂停

FAB3-L1# show vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 101

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : Disabled

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : primary

Number of vPCs configured         : 1

Peer Gateway                      : Disabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

Operational Layer3 Peer           : Disabled

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1           up     -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

686  Po3    down*  failed      vpc port channel

mis-config due to

vpc links in the 2

switches connected

to different

partners

此输出显示vPC端口通道因vPC配置错误而关闭。让我们进一步了解端口通道状态。

FAB3-L1# show port-channel summary

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

-------------------------------------------------------------------------------

3     Po3(SD)     Eth      LACP      Eth1/33(D)

此处Eth1/33处于Down状态，我们进一步查看“show interface e1/33”以了解更多详细信息。

FAB3-L1# show int e1/33

Ethernet1/33 is down (suspend-by-vpc)

admin state is up, Dedicated Interface

Belongs to po3

Hardware: 100/1000/10000/auto Ethernet, address: 0081.c4b1.2521 (bia 0081.c4b1.2521)

MTU 9000 bytes, BW 0 Kbit, DLY 1 usec

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, medium is broadcast

Port mode is trunk

full-duplex, 10 Gb/s

FEC (forward-error-correction) : disable-fec

Beacon is turned off

Auto-Negotiation is turned on

Input flow-control is off, output flow-control is off

Auto-mdix is turned off

Switchport monitor is off

EtherType is 0x8100

vPC使用LAG ID确定vPC对等体是否连接到同一主机，如果LAG ID不匹配，则接口由vPC挂起。

“Show vpc brief”显示vPC对等体上的端口通道中的物理链路未连接到同一远程设备。

可以使用“show vpc consistency-parameters interface port-channel 3”检查LAG ID比较。

FAB3-L1# show vpc consistency-parameters interface port-channel 3

Type 1 : vPC will be suspended in case of mismatch

Name                        Type  Local Value            Peer Value

-------------               ----  ---------------------- -----------------------

lag-id                      1     [(7f9b,                [(7f9b,

0-23-4-ee-be-65, 82ae, 0-23-4-ee-be-68, 82ae,

0, 0), (8000,          0, 0), (8000,

0-a6-ca-75-6f-c1,      0-a6-ca-75-6f-c1,

8000, 0, 0)]           8000, 0, 0)]

mode                        1     active                 active

Speed                       1     10 Gb/s                10 Gb/s

Duplex                      1     full                   full

Port Mode                   1     trunk                  trunk

Native Vlan                 1     0                      0

MTU                         1     9000                   9000

vPC card type               1     Empty                  Empty

Allowed VLANs               -     86                     86

Local suspended VLANs       -     -                      -

如果LAG-ID端口不匹配，则挂起。

建议操作：

确保port-channel中的物理链路连接到同一远程设备。

4. LACP暂停个人

LACP将端口设置为挂起状态（如果它未收到来自对等设备的LACP PDU）。这会导致某些服务器无法启动，因为它们需要LACP以逻辑方式启动端口。您可以通过禁用LACP挂起个体将行为调整为单独使用。为此，请在vPC策略组中创建一个端口通道策略，在将LACP活动模式设置为后，删除Suspend Individual Port。现在，vPC中的端口保持活动状态，并继续发送LACP数据包。

FAB3-L1# show port-channel extended

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

b - BFD Session Wait

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-----------------------------------------------------------------------------

Group Port-       BundleGrp                Protocol  Member Ports

Channel

-----------------------------------------------------------------------------

1     Po1(SD)     101-102                  LACP      Eth1/33(I)

输出显示，即使删除LACP Suspend-Individual标志后，我们未在Eth1/33上收到LACP PDU，但端口作为单个端口处于启用状态。请注意，我们仍然使用此配置从ACI枝叶发送LACP PDU，一旦收到LACP PDU，端口将回到捆绑模式。

其他错误

更多并非特定于vPC但仍适用于vPC接口的接口错误。有关详细信息，请参阅链接。

1. mcp-loop-err-disable

https://www.cisco.com/c/dam/en/us/solutions/collateral/data-center-virtualization/application-centric-infrastructure/aci-guide-using-mcp-mis-cabling-protocol.pdf

2. bpdu-guard-error-disable

https://www.cisco.com/c/en/us/td/docs/switches/datacenter/aci/aci_virtual_edge/configuration/1-x/b_Virtual_Edge_Config_Guide_1_2_1/b_Virtual_Edge_Config_Guide_1_2_1_chapter_0101.pdf