目录

简介

先决条件

要求

使用的组件

背景信息

配置

拓扑说明

网络图

验证

故障排除

电缆错误问题

检测到单个端口（按环路）

接口更改为运行关闭

LACP日志

相关信息

简介

本文档介绍确定ACI上的虚拟端口通道(vPC)通信问题所需的命令。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档不限于特定的软件和硬件版本。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您的网络处于活动状态，请确保您了解所有命令的潜在影响。

背景信息

以应用为中心的基础设施(ACI)和对等设备之间的vPC必须已启动且运行正常，且没有配置问题。

配置

拓扑说明

ACI枝叶1：接口Ethernet 1/1、端口通道5和vPC 343。

ACI枝叶2：接口Ethernet 1/2、端口通道5和vPC 343。

NX-OS 1：接口Ethernet 1/1和Ethernet 1/2、端口通道14和vPC 45。

连接:

枝叶1 Eth1/1 <-> NX-OS 1 Eth1/1

枝叶2 Eth1/2 <-> NX-OS 1 Eth1/2

网络图

验证

使用本部分可确认配置能否正常运行。

思科 CLI 分析器（仅适用于注册客户）支持某些 show 命令。使用Cisco CLI分析器查看show命令输出的分析。

使用命令show vpc brief vpc x您可以看到vPC的状态（打开/关闭）。

LEAF1#show vpc brief vpc 343

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                 Active vlans

--   ----   ------ ----------- ------                 ------------

343  Po5    up     success     success                100

LEAF2#show vpc brief vpc 343

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                 Active vlans

--   ----   ------ ----------- ------                 ------------

343  Po5    up     success     success                100

使用命令 show port-channel summary interface port-channel x  您可以看到端口通道的状态(Up/Down)、当前标志和配置它的物理接口。

LEAF1#show port-channel summary interface port-channel 5

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

-------------------------------------------------------------------------------

5     Po5(SU)     Eth      LACP      Eth1/1(P)

LEAF2#show port-channel summary interface port-channel 5

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

-------------------------------------------------------------------------------

5     Po5(SU)     Eth      LACP      Eth1/2(P)

故障排除

本节提供可用于对配置进行故障排除的信息。

电缆错误问题

在APIC GUI上，您必须看到以下故障：

Fault F0518: A configuration is not consistent with peer node. Misconfigured due to vPC link in the 2 switches connected to different partners.

ACI枝叶1：接口Ethernet 1/1、端口通道5和vPC 343。

ACI枝叶2：接口Ethernet 1/2、端口通道5和vPC 343。

NXOS 1：接口Ethernet 1/1和Ethernet 1/2，端口通道14和vPC 45。

连接:

枝叶1 Eth1/1 <-> NXOS 1 Eth1/1

枝叶2 Eth1/2 <-> NXOS 1 Eth1/2

如果遇到此问题，输出将如下所示：

LEAF1#show vpc brief vpc 343

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                 Active vlans

--   ----   ------ ----------- ------                 ------------

343  Po5    up     failed      vpc port               100

channel

mis-config

due to vpc

links in the

2 switches

connected to

different

partners

LEAF2#show vpc brief vpc 343

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                 Active vlans

--   ----   ------ ----------- ------                 ------------

343  Po5    up     failed      vpc port               100

channel

mis-config

due to vpc

links in the

2 switches

connected to

different

partners

LEAF1#show port-channel summary interface port-channel 5

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

-------------------------------------------------------------------------------

5     Po5(SD)     Eth      LACP      Eth1/1(D)

LEAF2#show port-channel summary interface port-channel 5

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

-------------------------------------------------------------------------------

5     Po5(SD)     Eth      LACP      Eth1/2(D)

LEAF1# show lacp interface ethernet 1/1 | grep Lag

Lag Id: [ [(7f9b, 0-11-1-aa-aa-aa, 8157, 8000, 10d), (8000, 0-22-2-bb-bb-bb, 65, 8000, 125)] ]

LEAF2# show lacp interface ethernet 1/2 | grep Lag

Lag Id: [ [(7f9b, 0-11-1-aa-aa-aa, 8157, 8000, 10d), (8000, 0-33-3-cc-cc-cc, 65, 8000, 125)] ]

连接的设备延迟信息（输出命令中的第二个矢量）在两个输出上必须相同。同样，矢量1在两者上必须相同。

下一步：

如果您有此行为，则必须检查物理连接，以确保端口上的连接尚未交换。

检测到单个端口（按环路）

在APIC GUI上，您必须看到以下故障：

Fault F2705: A vPC interface goes down while peer interface is up.

Fault F2533: A loop was detected by the MCP protocol on ACI.

此问题影响在对等设备上运行STP协议的vPC拓扑。

ACI枝叶1：接口Ethernet 1/1和Ethernet 1/2，端口通道5和vPC 343

NXOS 1：接口Ethernet 1/1、Port-Channel 14和vPC 45

NXOS 2：接口Ethernet 1/2、端口通道14和vPC 45

连接:

枝叶1 Eth1/1 <-> NXOS 1 Eth1/1

枝叶1 Eth1/2 <-> NXOS 2 Eth1/2

对于此故障排除步骤，了解MisCabling Protocol(MCP)的概念非常重要。

MCP检测来自外部源的环路(服务器、使用STP的外部网络设备的错误行为等)，并错误禁用ACI接收其自身数据包的接口。

要了解有关MCP的详细信息，请参阅：对ACI使用MCP。

如果存在此问题，输出如下所示：

LEAF2#show mcp internal info interface eth 1/2

------------------------------------------

Interface: Ethernet1/2

Native PI VLAN: 100

Native Encap VLAN: 1

BPDU Guard: disabled

BPDU Filter: disabled

Port State: down

Layer3 Port: false

Switching State: enabled

Mac Address: AA:AA:AA:AA:AA:01

Interface MCP enabled: true

------------------- STP STATS --------------------

MSTP Count: 0

RSTP Count: 4

MSTP TC Count: 0

RSTP TC Count: 4

PVRSTP TC Count: 4

TCN Count: 0

PVID Error BPDU Count: 5

Error Packet Count: 0

BPDU Guard Event Count: 0

--------------- LOOP-DETECTION STATS ---------------

MCP packets sent(Per-vlan): 1278

MCP packets received: 23

MCP invalid packets received: 19

MCP packets received with invalid digest: 0

MCP packets received when switching state is disabled: 0

Interface is a member of port-channel

Number of active VLANs: 1

Number of VLANS in MCP packets are sent: 1

MCP enabled vlans:

628

MCP loop detected at: Tue Jul 19 09:34:46 2022

MCP loop detected in VLAN: 100

-------------- MCP Remote Peer Info --------------

No remote peers exist

注：必须解决环路问题，以避免禁用接口才能继续使用vPC。

一旦解决了环路问题，并且物理接口处于工作状态，但vPC接口继续运行，其中有一个接口处于关闭状态，另一个接口处于单独状态：

LEAF1#show port-channel summary interface port-channel 5

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

-------------------------------------------------------------------------------

5     Po5(SD)     Eth      LACP      Eth1/1(I)

LEAF2#show port-channel summary interface port-channel 5

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

-------------------------------------------------------------------------------

5     Po5(SD)     Eth      LACP      Eth1/2(D)

下一步：

确保端口通道配置在两端正确，且通道捆绑正确。

如果两端配置正确并且在环路之前运行良好，请尝试以下操作：

导航至：

Fabric -> Inventory -> Pod -> Leaf x -> Interfaces -> VPC interfaces -> vpc -> Port-channel interface where is included the physical port 1/x -> right-click and select Disable.

然后等待10秒，右键单击并选择Enable.

这些步骤必须在受影响的接口上执行，以强制端口通道与对等设备同步，而且此过程之后必须正常运行。

接口更改为运行关闭

在APIC GUI上，您必须看到以下故障：

Fault F1296: A vPC interface goes down while peer interface is also down.

此示例说明接口必须如何显示信息：

Leaf1# show interface port-channel 5

port-channel5 is down (port-channel-members-down)

admin state is up

Hardware: Port-Channel, address: xxxx.xxxx.xx01 (bia xxxx.xxxx.xx01)

MTU 9000 bytes, BW 100000000 Kbit, DLY 1 usec

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, medium is broadcast

Port mode is trunk

full-duplex, 100 Gb/s

Input flow-control is off, output flow-control is off

Auto-mdix is turned on

EtherType is 0x8100

Members in this channel: eth1/1

您必须查看并放弃以下主题：

- 物理问题（收发器和电缆）必须是进行检查的第一步。

- 两端配置更改。

- 在枝叶接口上收到了链路汇聚控制协议(LACP)信息。

LACP日志

您可以使用命令show lacp internal event-history interface ethernet 1/x要获取与LACP状态相关的事件，如以下示例：

Leaf1#show lacp internal event-history interface ethernet 1/1

Output omitted

...

9) FSM:<Ethernet1/1> Transition at 2022-07-15T08:43:06.121732000+00:00

Previous state: [LACP_ST_DETACHED_LAG_NOT_DETERMINED]

Triggered event: [LACP_EV_RECEIVE_PARTNER_PDU_TIMED_OUT_II_INDIVIDUAL]

Next state: [LACP_ST_INDIVIDUAL_OR_DEFAULT]

Output omitted

...

18) FSM:<Ethernet1/1> Transition at 2022-07-15T08:46:24.298022000+00:00

Previous state: [LACP_ST_DETACHED_LAG_NOT_DETERMINED]

Triggered event: [LACP_EV_RECEIVE_PARTNER_PDU_TIMED_OUT]

Next state: [FSM_ST_NO_CHANGE]

Output omitted

...

23) FSM:<Ethernet1/1> Transition at 2022-07-15T08:46:27.299819000+00:00

Previous state: [LACP_ST_DETACHED_LAG_NOT_DETERMINED]

Triggered event: [LACP_EV_RECEIVE_PARTNER_PDU_TIMED_OUT_II_INDIVIDUAL]

Next state: [LACP_ST_INDIVIDUAL_OR_DEFAULT]

Output omitted

...

24) FSM:<Ethernet1/1> Transition at 2022-07-15T08:52:25.204611000+00:00

Previous state: [LACP_ST_INDIVIDUAL_OR_DEFAULT]

Triggered event: [LACP_EV_LACP_DOWN_OR_PORT_DOWN]

Next state: [LACP_ST_PORT_IS_DOWN_OR_LACP_IS_DISABLED]

示例日志显示ACI未收到来自对等设备的正确应答，在某些情况下，在保活计时器到期之前，对等设备不会发送PDU/LACP。

下一步：

现在，您需要检验对等设备的配置和状态。

思科 CLI 分析器（仅适用于注册客户）支持某些 show 命令。使用Cisco CLI分析器查看show命令输出的分析。

注意：使用debug命令前，请参阅有关Debug命令的重要信息。

相关信息

- 技术支持和文档 - Cisco Systems

- ACI中的虚拟端口通道(vPC)

- 对ACI使用MCP（MisCabling协议）