目录

简介

设计要求

解决方案

配置

验证

简介

从版本2.0开始，ACI交换矩阵支持第3层组播路由，并且需要EX交换机(即N9K-C93180YC-EX)。 在版本2.0之前，ACI仅支持网桥域内的L2组播。   在2.0中，此选项仍然有效，可用于非EX交换机。

在ACI版本2.0中，支持的组播路由功能包括：PIM ASM、PIM SSM、静态RP、PIM自动RP和PIM BSR。

在本文档中，我们将介绍适用于ACI交换矩阵上L3组播路由的实际客户部署方案的经验证的解决方案。所选ACI版本为2.1(1h)。 此版本不支持交换矩阵上的RP，因此PIM ASM需要外部RP。

设计要求

客户需要端到端解决方案来实现交换矩阵内外的第3层组播路由。部署方案具有以下要求：

- 为所有租户部署一个VRF。

注意：组播要求每个VRF使用专用L3out。如果交换矩阵中有多个VRF，则组播路由不支持共享L3out。

- 交换矩阵中具有外部源的接收器

- 具有外部接收器的交换矩阵中的源

- 交换矩阵中的源和接收器

- 静态RP或自动RP

解决方案

拓扑回顾

在拓扑中，有两个主要组件：ACI模块和分层LAN网络模块。两个模块通过运行OSPF和PIM的点对点L3链路连接到核心设备。在ACI模块中，外部路由网络称为与VRF common:default关联的L3out-to-Core。它包括从两个边界枝叶到核心设备的四条链路。分层LAN网络模块（称为交换矩阵外部）由传统接入层和带vPC的汇聚层组成。

L3组播流通过核心层在ACI交换矩阵和传统LAN网络中运行。对于静态RP场景，RP部署在广域网边缘设备上。

我们使用Spirent流量生成器(STC)来模拟内部和外部源和接收器。Spirent端口连接到ACI模块和分层LAN网络模块中的不同位置。接收方发送IGMP v2成员加入消息。

连接到Sleaf2的内部源：源IP地址为10.101.101.115~124，正在发送到组地址：228.0.0.1~10

连接到Bleaf1、Cleaf1和Cleaf2的内部接收器：启用组播的BD为BD90、BD91、BD31、BD32、感兴趣的组：228.0.0.1~10和229.0.0.1~10。

连接到LAN网络中接入层的外部源：源IP地址为10.103.103.40~49，发送到组地址：229.0.0.1~10。

连接到LAN网络接入层的外部接收器：vlan131、vlan132、感兴趣的组：228.0.0.1~10。

配置

第 0 步： 在连接到核心的模拟WAN设备上设置RP，在分层LAN网络设备上启用PIM稀疏模式。

!!!!! RP configuration

ip pim rp-address 99.99.99.99 group-list 224.0.0.0/4

ip pim ssm range 232.0.0.0/8

interface loopback99

ip address 99.99.99.99/32

ip router ospf 65017 area 0.0.0.0

ip pim sparse-mode

interface Ethernet2/1

ip pim sparse-mode

interface Ethernet2/2

ip pim sparse-mode

第1步：在VRF上启用组播。在租户空间中，导航到网络> VRFs>组播，在工作面板上，单击黄油以启用组播。

第2步：在BD和L3out级别启用组播，为接收方BD启用IGMP。导航至Networking > VRFs > VRF name > Multicast，在工作面板上，选择Configuration > Interface选项卡，单击“+”添加需要组播流量的网桥域。为启用组播的BD启用IMGP策略。

然后单击“+”为此VRF添加L3out。当为L3out启用组播时，它将在L3out下的所有接口上启用PIM，并且该L3out的所有边界枝叶都通过组播路由启用。为L3out接口组选择PIM策略。

此处假设已调配BD和L3out。

将IGMP策略附加到BD也使其成为IGMP查询器。IGMP策略在Tenant > Networking > Protocol Policies > IGMP Interface下配置。默认IGMP策略具有以下参数，您可以在其中定义查询间隔。如果未指定策略，接口将使用默认策略。

PIM策略也在Tenant > Networking > Protocol Policies > PIM下配置。

默认PIM策略具有以下参数，您可以在其中定义hello间隔。

边界枝叶上的L3Out必须配置为在节点配置文件中启用环回地址。

步骤 3：为PIM ASM配置RP。导航至Tenant > VRF > Multicast，在工作面板中选择Configuration > Rendezvous Points。在本例中，选择了静态RP。单击“+”添加RP。

对于自动RP配置，选中“Rendezvous Points”（交汇点）页面上的“Forward Auto-RP updates”（转发自动RP更新）和“Listen to Auto-RP Updates”（侦听自动RP更新）复选框。

在ACI交换矩阵外，NX-OS平台上的AUTO-RP配置保持不变。

!!! On RP candidate

ip pim send-rp-announce loopback99 group-list 224.0.0.0/4

ip pim send-rp-discovery loopback99 scope 32

!!! On RP listeners:

ip pim auto-rp listen forward

第4步：配置必要的PIM设置。导航至租户>VRF ->组播，在工作面板中，选择配置> PIM设置，注意VRF GIPo地址225.1.192.0/32，由APIC从组播组地址池分配。VRF GIPo将用作启用PIM的BD的组播流量的外部组IP地址。

启用快速融合模式（默认为禁用）后，启用PIM的所有边界枝叶将向外部网络发送加入，但只有一个边界枝叶会将流量转发到交换矩阵以防止重复。转发组流量的边界枝叶是组的指定转发器。启用快速融合有助于在边界枝叶关闭导致条带赢家更改时，减少具有外部源和内部接收器的组播流的丢包持续时间。从新条带赢家加入PIM树不会产生延迟。这是以非条带赢家的外部链路上额外带宽使用的成本计算的，因为所有边框都会从外部源中拉出流量。

关于条带优胜者 — 当前ACI使用BSR（引导路由器）哈希计算BL条带优胜者。  散列值使用枝叶的S、G和环回IP计算。  自ACI 3.0(1)起，无法影响用户的条带赢家选举。

第5步：创建所需的合同以允许组播流量：

— 交换矩阵内的源和接收方（不需要合同）

— 接收器内部交换矩阵，外部源（不需要合同）

— 源内部交换矩阵，外部接收器（需要合同）*

*如果BD部署在边界枝叶上，则不需要合同

在本例中，我们在交换矩阵外部有接收器，在EPG101中应用L3out_to_Core和mcast源之间的合同。

验证

PIM验证

当为组播路由启用VRF时，将为交换矩阵内的组播路由创建一个交换矩阵接口（隧道）。PIM控制平面数据包通过交换矩阵内的交换矩阵接口发送。隧道目标将是VRF GiPo组播地址。在边界枝叶交换机上，隧道源将是边界枝叶上的环回接口。在非边界枝叶交换机上，隧道源将是环回地址(127.0.0.100)。

边界枝叶在交换矩阵接口上发送PIM问候。 L3Out接口在正常模式下运行PIM，包括发送和接收问询、选举DR等。非边界枝叶在交换矩阵接口上以被动模式运行；它们会侦听来自边界枝叶的PIM问询，但不发送PIM问询。非边界枝叶不会显示在“show ip pim neighbor”的输出中。

!!!!! Border Leaf Node bleaf1 !!!!!

bleaf1# show ip pim neighbor

PIM Neighbor information for Dom:common:default

Neighbor             Interface            Uptime               Expires              DRPriority Bidir      BFDState

132.132.132.1/32     tunnel16             06:20:40             00:01:21             1          no         n/a

10.1.20.25/32        eth1/5               06:23:12             00:01:35             1          yes        n/a

10.1.20.1/32         eth1/4               06:23:12             00:01:24             1          yes        n/a

bleaf1# show interface tunnel 16

Tunnel16 is up

MTU 9000 bytes, BW 0 Kbit

Transport protocol is in VRF "common:default"

Tunnel protocol/transport is ivxlan

Tunnel source 131.131.131.1

Tunnel destination 225.1.192.0/32

Last clearing of "show interface" counters never

Tx

0 packets output, 1 minute output rate 0 packets/sec

Rx

0 packets input, 1 minute input rate 0 packets/sec

bleaf1#

!!!!! Border Leaf Node bleaf2 !!!!!

bleaf2# show ip pim neighbor

PIM Neighbor information for Dom:common:default

Neighbor             Interface            Uptime               Expires              DRPriority Bidir      BFDState

131.131.131.1/32     tunnel16             06:23:26             00:01:30             1          no         n/a

10.1.20.29/32        eth1/5               06:38:26             00:01:43             1          yes        n/a

10.1.20.5/32         eth1/4               06:38:27             00:01:20             1          yes        n/a

bleaf2# show interface tunnel 16

Tunnel16 is up

MTU 9000 bytes, BW 0 Kbit

Transport protocol is in VRF "common:default"

Tunnel protocol/transport is ivxlan

Tunnel source 132.132.132.1

Tunnel destination 225.1.192.0/32

Last clearing of "show interface" counters never

Tx

0 packets output, 1 minute output rate 0 packets/sec

Rx

0 packets input, 1 minute input rate 0 packets/sec

bleaf2#

!!!!! RP !!!!!

bleaf1# show ip pim rp vrf all

PIM RP Status Information for VRF:"common:default"

BSR: Not Operational

Auto-RP RPA: 192.168.1.2/32

RP: 99.99.99.99, uptime: 26d21h, expires: 00:02:38,

priority: 0, RP-source: 192.168.1.2 (A), group-map: None, group ranges:

224.0.0.0/4

bleaf1#

bleaf2# show ip pim rp vrf all

PIM RP Status Information for VRF:"common:default"

BSR: Not Operational

Auto-RP RPA: 192.168.1.2/32

RP: 99.99.99.99, uptime: 26d21h, expires: 00:02:38,

priority: 0, RP-source: 192.168.1.2 (A), group-map: None, group ranges:

224.0.0.0/4

bleaf2#

!!!!! Non border leaf Node !!!!!

cleaf1# show ip pim neighbor

PIM Neighbor information for Dom:common:default

Neighbor             Interface            Uptime               Expires              DRPriority Bidir      BFDState

132.132.132.1/32     tunnel16             06:32:43             00:01:37             1          no         n/a

131.131.131.1/32     tunnel16             06:32:43             00:01:17             1          no         n/a

cleaf1# show interface tunnel 16

Tunnel16 is up

MTU 9000 bytes, BW 0 Kbit

Transport protocol is in VRF "common:default"

Tunnel protocol/transport is ivxlan

Tunnel source 127.0.0.100/32

Tunnel destination 225.1.192.0/32

Last clearing of "show interface" counters never

Tx

0 packets output, 1 minute output rate 0 packets/sec

Rx

0 packets input, 1 minute input rate 0 packets/sec

cleaf1#

cleaf2# show ip pim neighbor vrf all

PIM Neighbor information for Dom:common:default

Neighbor             Interface            Uptime               Expires              DRPriority Bidir      BFDState

132.132.132.1/32     tunnel16             06:33:17             00:01:33             1          no         n/a

131.131.131.1/32     tunnel16             06:33:17             00:01:41             1          no         n/a

cleaf2# show interface tunnel 16

Tunnel16 is up

MTU 9000 bytes, BW 0 Kbit

Transport protocol is in VRF "common:default"

Tunnel protocol/transport is ivxlan

Tunnel source 127.0.0.100/32

Tunnel destination 225.1.192.0/32

Last clearing of "show interface" counters never

Tx

0 packets output, 1 minute output rate 0 packets/sec

Rx

0 packets input, 1 minute input rate 0 packets/sec

cleaf2#

!!!!!! Core Router !!!!!

N7K-core-1# show ip pim neighbor

PIM Neighbor Status for VRF "default"

Neighbor        Interface            Uptime    Expires   DR       Bidir-  BFD

Priority Capable State

10.1.20.2       Ethernet1/1          3d22h     00:01:43  1        no     n/a

10.1.20.6       Ethernet1/2          3d22h     00:01:36  1        no     n/a

10.1.20.10      Ethernet1/3          2w6d      00:01:30  1        yes     n/a

10.1.20.14      Ethernet1/4          2w6d      00:01:18  1        yes     n/a

10.1.20.42      Ethernet1/5          2w6d      00:01:28  1        yes     n/a

N7K-core-1#

N7K-core-2# sh ip pim neighbor

PIM Neighbor Status for VRF "default"

Neighbor        Interface            Uptime    Expires   DR       Bidir-  BFD

Priority Capable State

10.1.20.26      Ethernet1/1          3d22h     00:01:23  1        no     n/a

10.1.20.30      Ethernet1/2          3d22h     00:01:17  1        no     n/a

10.1.20.18      Ethernet1/3          2w6d      00:01:38  1        yes     n/a

10.1.20.22      Ethernet1/4          2w6d      00:01:41  1        yes     n/a

10.1.20.46      Ethernet1/5          2w6d      00:01:17  1        yes     n/a

N7K-core-2#

活动边界枝叶验证

如果使用组播路由启用了多个边界枝叶，APIC会为所有活动边界枝叶上的每个组地址选择一个条带赢家。作为组的条带赢家的边界枝叶负责代表交换矩阵发送PIM加入并将组播流量转发到交换矩阵。

组的条带赢家决定指定转发器。如果条带赢家具有到根的可达性，则条带赢家也是DF。如果条带赢家没有到根的外部连接，则BL通过交换矩阵接口发送PIM加入来选择DF。

!!!!! Enter into vsh mode to execute the command !!!!!

bleaf2# vsh

Cisco iNX-OS Debug Shell

This shell should only be used for internal commands and exists

for legacy reasons. User should use ibash infrastructure as this

will be deprecated.

bleaf2# show ip pim internal stripe-winner 228.0.0.1 vrf common:default

PIM Stripe Winner info for VRF "common:default" (BL count: 2)

(*, 228.0.0.1)

BLs: 132.132.132.1  hash: 2081913316 (local)

131.131.131.1  hash: 1024236260

Winner: 132.132.132.1 best_hash: 2081913316

bleaf2#

bleaf2#

bleaf2# show ip pim internal stripe-winner 229.0.0.1 vrf common:default

PIM Stripe Winner info for VRF "common:default" (BL count: 2)

(*, 229.0.0.1)

BLs: 132.132.132.1  hash: 1595374052 (local)

131.131.131.1  hash: 2047646436

Winner: 131.131.131.1 best_hash: 2047646436

bleaf2#

快速收敛验证

!!! Verify if fast convergence is enabled

bleaf1# show fabric multicast vrf common:default

Fabric Multicast Enabled VRFs

VRF Name              VRF      Vprime        VN-Seg     VRF    Conv   Tunnel

ID       If            ID         Role   Mode   IP

common:default        4        Tunnel16      2162688    BL     Fast   131.131.131.1

bleaf1#

!!! None-border leaf

cleaf1# show fabric multicast vrf common:default

Fabric Multicast Enabled VRFs

VRF Name              VRF      Vprime        VN-Seg     VRF    Conv   Tunnel

ID       If            ID         Role   Mode   IP

common:default        4        Tunnel16      2162688    Leaf   Fast   127.0.0.100

cleaf1#

IGMP验证

!!!!! Bleaf2 receiving IGMP membership join !!!!!

bleaf2# show ip igmp groups vrf common:default

Type: S - Static, D - Dynamic, L - Local, T - SSM Translated

Displaying Groups for vrf:common:default

Group Address        Type   Interface    Uptime               Expires              Last Reporter

228.0.0.1            D      vlan25       25d23h               00:02:20             10.90.90.71

229.0.0.1            D      vlan25       25d23h               00:02:24             10.90.90.71

228.0.0.2            D      vlan25       25d23h               00:02:27             10.90.90.72

229.0.0.2            D      vlan25       25d23h               00:02:20             10.90.90.72

228.0.0.3            D      vlan25       25d23h               00:02:25             10.90.90.73

229.0.0.3            D      vlan25       25d23h               00:02:25             10.90.90.73

228.0.0.4            D      vlan25       25d23h               00:02:26             10.90.90.74

229.0.0.4            D      vlan25       25d23h               00:02:25             10.90.90.74

228.0.0.5            D      vlan25       25d23h               00:02:28             10.90.90.75

229.0.0.5            D      vlan25       25d23h               00:02:20             10.90.90.75

228.0.0.6            D      vlan25       25d23h               00:02:22             10.90.90.76

229.0.0.6            D      vlan25       25d23h               00:02:26             10.90.90.76

228.0.0.7            D      vlan25       25d23h               00:02:25             10.90.90.77

229.0.0.7            D      vlan25       25d23h               00:02:19             10.90.90.77

228.0.0.8            D      vlan25       25d23h               00:02:22             10.90.90.78

229.0.0.8            D      vlan25       25d23h               00:02:25             10.90.90.78

228.0.0.9            D      vlan25       25d23h               00:02:27             10.90.90.79

229.0.0.9            D      vlan25       25d23h               00:02:20             10.90.90.79

228.0.0.10           D      vlan25       25d23h               00:02:20             10.90.90.80

229.0.0.10           D      vlan25       25d23h               00:02:21             10.90.90.80

bleaf2#

bleaf2# show ip igmp snooping groups vlan 25

Type: S - Static, D - Dynamic, R - Router port, F - Fabricpath core port

Vlan  Group Address      Ver  Type  Port list

25    */*                -    R     Vlan25

25    228.0.0.1          v2   D     Eth1/47

25    228.0.0.2          v2   D     Eth1/47

25    228.0.0.3          v2   D     Eth1/47

25    228.0.0.4          v2   D     Eth1/47

25    228.0.0.5          v2   D     Eth1/47

25    228.0.0.6          v2   D     Eth1/47

25    228.0.0.7          v2   D     Eth1/47

25    228.0.0.8          v2   D     Eth1/47

25    228.0.0.9          v2   D     Eth1/47

25    228.0.0.10         v2   D     Eth1/47

25    229.0.0.1          v2   D     Eth1/47

25    229.0.0.2          v2   D     Eth1/47

25    229.0.0.3          v2   D     Eth1/47

25    229.0.0.4          v2   D     Eth1/47

25    229.0.0.5          v2   D     Eth1/47

25    229.0.0.6          v2   D     Eth1/47

25    229.0.0.7          v2   D     Eth1/47

25    229.0.0.8          v2   D     Eth1/47

25    229.0.0.9          v2   D     Eth1/47

25    229.0.0.10         v2   D     Eth1/47

bleaf2#

!!!!! cleaf2 receivng IGMP membership join !!!!!

cleaf2# show ip igmp groups vrf common:default

Type: S - Static, D - Dynamic, L - Local, T - SSM Translated

Displaying Groups for vrf:common:default

Group Address        Type   Interface    Uptime               Expires              Last Reporter

228.0.0.1            D      vlan9        25d23h               00:03:37             10.32.32.120

228.0.0.1            D      vlan30       25d23h               00:04:17             10.91.91.71

228.0.0.1            D      vlan3        11d23h               00:03:18             10.31.31.123

229.0.0.1            D      vlan9        25d23h               00:03:41             10.32.32.121

229.0.0.1            D      vlan30       25d23h               00:02:22             10.91.91.71

229.0.0.1            D      vlan3        11d23h               00:03:16             10.31.31.120

228.0.0.2            D      vlan9        25d23h               00:03:38             10.32.32.123

228.0.0.2            D      vlan30       25d23h               00:02:15             10.91.91.72

228.0.0.2            D      vlan3        11d23h               00:03:16             10.31.31.122

229.0.0.2            D      vlan9        25d23h               00:03:37             10.32.32.123

229.0.0.2            D      vlan30       25d23h               00:02:16             10.91.91.72

229.0.0.2            D      vlan3        11d23h               00:03:16             10.31.31.124

228.0.0.3            D      vlan9        25d23h               00:03:41             10.32.32.120

228.0.0.3            D      vlan30       25d23h               00:04:18             10.91.91.73

228.0.0.3            D      vlan3        11d23h               00:03:18             10.31.31.120

229.0.0.3            D      vlan9        25d23h               00:03:38             10.32.32.121

229.0.0.3            D      vlan30       25d23h               00:04:17             10.91.91.73

229.0.0.3            D      vlan3        11d23h               00:03:18             10.31.31.122

<......>

cleaf2#

cleaf2# show ip igmp snooping vlan 3

IGMP Snooping information for vlan 3

IGMP snooping enabled

Lookup mode: IP

Optimised Multicast Flood (OMF) enabled

IGMP querier present, address: 10.31.31.1, version: 2, i/f Vlan3

Switch-querier disabled

IGMPv3 Explicit tracking enabled

IGMPv2 Fast leave disabled

IGMPv1/v2 Report suppression enabled

IGMPv3 Report suppression enabled

Link Local Groups suppression enabled

Router port detection using PIM Hellos, IGMP Queries

Number of router-ports: 1

Number of groups: 20

VLAN vPC function enabled

Active ports:

Eth1/2      Eth1/3      Po3         Po4

cleaf2# show ip igmp snooping groups vlan 3

Type: S - Static, D - Dynamic, R - Router port, F - Fabricpath core port

Vlan  Group Address      Ver  Type  Port list

3     */*                -    R     Vlan3

3     228.0.0.1          v2   D     Po4

3     228.0.0.2          v2   D     Po4

3     228.0.0.3          v2   D     Po4

3     228.0.0.4          v2   D     Po4

3     228.0.0.5          v2   D     Po4

3     228.0.0.6          v2   D     Po4

3     228.0.0.7          v2   D     Po4

3     228.0.0.8          v2   D     Po4

3     228.0.0.9          v2   D     Po4

3     228.0.0.10         v2   D     Po4

3     229.0.0.1          v2   D     Po4

3     229.0.0.2          v2   D     Po4

3     229.0.0.3          v2   D     Po4

3     229.0.0.4          v2   D     Po4

3     229.0.0.5          v2   D     Po4

3     229.0.0.6          v2   D     Po4

3     229.0.0.7          v2   D     Po4

3     229.0.0.8          v2   D     Po4

3     229.0.0.9          v2   D     Po4

3     229.0.0.10         v2   D     Po4

cleaf2#

MRIB验证

枝叶节点sleaf2（即FHR）具有直连组播源。其RPF邻居在spine1上为10.0.176.64。传入接口是通过PIM与边界枝叶对等的交换矩阵接口（隧道16）。

为简单起见，所示输出针对每个组范围的一个组播IP地址：内部源为228.0.0.1，外部源为229.0.0.1。

!!!!! FHR of mcast sources in fabric

sleaf2# show ip mroute vrf common:default

IP Multicast Routing Table for VRF "common:default"

(10.101.101.115/32, 228.0.0.1/32), uptime: 00:17:54, ip pim

Incoming interface: Tunnel16, RPF nbr: 10.0.176.64 (pervasive)

Outgoing interface list: (count: 0)

(10.101.101.116/32, 228.0.0.1/32), uptime: 00:17:54, ip pim

Incoming interface: Tunnel16, RPF nbr: 10.0.176.64 (pervasive)

Outgoing interface list: (count: 0)

(10.101.101.117/32, 228.0.0.1/32), uptime: 00:17:54, ip pim

Incoming interface: Tunnel16, RPF nbr: 10.0.176.64 (pervasive)

Outgoing interface list: (count: 0)

(……)

(*, 232.0.0.0/8), uptime: 4d00h, pim ip

Incoming interface: Null, RPF nbr: 0.0.0.0

Outgoing interface list: (count: 0)

sleaf2# show ip pim neighbor vrf common:default

PIM Neighbor information for Dom:common:default

Neighbor             Interface            Uptime               Expires              DRPriority Bidir      BFDState

131.131.131.1/32     tunnel16             04:01:06             00:01:23             1          no         n/a

132.132.132.1/32     tunnel16             04:01:06             00:01:32             1          no         n/a

sleaf2#

sleaf2# show interface tunnel 16

Tunnel16 is up

MTU 9000 bytes, BW 0 Kbit

Transport protocol is in VRF "common:default"

Tunnel protocol/transport is ivxlan

Tunnel source 127.0.0.100/32

Tunnel destination 225.1.192.0/32

Last clearing of "show interface" counters never

Tx

0 packets output, 1 minute output rate 0 packets/sec

Rx

0 packets input, 1 minute input rate 0 packets/sec

sleaf2#

用于228.0.0.1的接收器连接到bleaf2（节点132）、cleaf1（节点101）和cleaf2（节点102）。 Bleaf2通过隧道16将组播转发到组228.0.0.1，而外部接收器通过L3out转发到核心设备。

!!!!!! Bleaf2 !!!!!

bleaf2# show ip mroute 228.0.0.1 vrf common:default

IP Multicast Routing Table for VRF "common:default"

(*, 228.0.0.1/32), uptime: 3w5d, ngmvpn ip pim igmp

Incoming interface: Ethernet1/4, RPF nbr: 10.1.20.5

Outgoing interface list: (count: 2) (Fabric OIF)

Vlan25, uptime: 3w5d, igmp

Tunnel16, uptime: 3w5d, ngmvpn

(10.101.101.115/32, 228.0.0.1/32), uptime: 3w5d, pim mrib ip ngmvpn

Incoming interface: Tunnel16, RPF nbr: 10.0.176.64 (pervasive)

Outgoing interface list: (count: 2) (Fabric OIF)

Vlan25, uptime: 3w5d, mrib

Tunnel16, uptime: 3w5d, mrib, ngmvpn, (RPF)

(10.101.101.116/32, 228.0.0.1/32), uptime: 3w5d, ip mrib pim ngmvpn

Incoming interface: Tunnel16, RPF nbr: 10.0.176.64 (pervasive)

Outgoing interface list: (count: 3) (Fabric OIF)

Ethernet1/5, uptime: 00:04:36, pim

Vlan25, uptime: 3w5d, mrib

Tunnel16, uptime: 3w5d, mrib, ngmvpn, (RPF)

(10.101.101.117/32, 228.0.0.1/32), uptime: 3w5d, pim mrib ip ngmvpn

Incoming interface: Tunnel16, RPF nbr: 10.0.176.64 (pervasive)

Outgoing interface list: (count: 2) (Fabric OIF)

Vlan25, uptime: 3w5d, mrib

Tunnel16, uptime: 3w5d, mrib, ngmvpn, (RPF)

(10.101.101.118/32, 228.0.0.1/32), uptime: 3w5d, ip mrib pim ngmvpn

Incoming interface: Tunnel16, RPF nbr: 10.0.176.64 (pervasive)

Outgoing interface list: (count: 3) (Fabric OIF)

Ethernet1/5, uptime: 00:04:36, pim

Vlan25, uptime: 3w5d, mrib

Tunnel16, uptime: 3w5d, mrib, ngmvpn, (RPF)

(10.101.101.119/32, 228.0.0.1/32), uptime: 3w5d, pim mrib ip ngmvpn

Incoming interface: Tunnel16, RPF nbr: 10.0.176.64 (pervasive)

Outgoing interface list: (count: 2) (Fabric OIF)

Vlan25, uptime: 3w5d, mrib

Tunnel16, uptime: 3w5d, mrib, ngmvpn, (RPF)

(10.101.101.120/32, 228.0.0.1/32), uptime: 3w5d, mrib ip pim ngmvpn

Incoming interface: Tunnel16, RPF nbr: 10.0.176.64 (pervasive)

Outgoing interface list: (count: 2) (Fabric OIF)

Vlan25, uptime: 3w5d, mrib

Tunnel16, uptime: 3w5d, mrib, ngmvpn, (RPF)

(10.101.101.121/32, 228.0.0.1/32), uptime: 3w5d, mrib ip pim ngmvpn

Incoming interface: Tunnel16, RPF nbr: 10.0.176.64 (pervasive)

Outgoing interface list: (count: 2) (Fabric OIF)

Vlan25, uptime: 3w5d, mrib

Tunnel16, uptime: 3w5d, mrib, ngmvpn, (RPF)

(10.101.101.122/32, 228.0.0.1/32), uptime: 3w5d, pim mrib ip ngmvpn

Incoming interface: Tunnel16, RPF nbr: 10.0.176.64 (pervasive)

Outgoing interface list: (count: 2) (Fabric OIF)

Vlan25, uptime: 3w5d, mrib

Tunnel16, uptime: 3w5d, mrib, ngmvpn, (RPF)

(10.101.101.123/32, 228.0.0.1/32), uptime: 3w5d, ip mrib pim ngmvpn

Incoming interface: Tunnel16, RPF nbr: 10.0.176.64 (pervasive)

Outgoing interface list: (count: 3) (Fabric OIF)

Ethernet1/5, uptime: 00:04:36, pim

Vlan25, uptime: 3w5d, mrib

Tunnel16, uptime: 3w5d, mrib, ngmvpn, (RPF)

(10.101.101.124/32, 228.0.0.1/32), uptime: 3w5d, ip mrib pim ngmvpn

Incoming interface: Tunnel16, RPF nbr: 10.0.176.64 (pervasive)

Outgoing interface list: (count: 3) (Fabric OIF)

Ethernet1/5, uptime: 1d00h, pim

Vlan25, uptime: 3w5d, mrib

Tunnel16, uptime: 3w5d, mrib, ngmvpn, (RPF)

bleaf2#

bleaf2# show interface vlan25

Vlan25 is up, line protocol is up

Hardware EtherSVI, address is  0000.0c07.ac5a

Internet Address is 10.90.90.1/24

MTU 9000 bytes, BW 10000000 Kbit, DLY 1 usec

reliability 255/255, txload 1/255, rxload 1/255

Carrier delay is 10 sec

Encapsulation ARPA, loopback not set

Keepalive not supported

ARP type: ARPA

Last clearing of "show interface" counters never

30 seconds input rate 0 bits/sec, 0 packets/sec

30 seconds output rate 0 bits/sec, 0 packets/sec

Load-Interval #2: 5 minute (300 seconds)

input rate 0 bps, 0 pps; output rate 0 bps, 0 pps

L3 Switched:

input: 0 pkts, 0 bytes - output: 0 pkts, 0 bytes

L3 in Switched:

ucast: 0 pkts, 0 bytes - mcast: 0 pkts, 0 bytes

L3 out Switched:

ucast: 0 pkts, 0 bytes - mcast: 0 pkts, 0 bytes

bleaf2#

Bleaf1通过L3out接口将组228.0.0.1转发到外部，但它不通过交换矩阵接口转发到交换矩阵，因为它不是228.0.0.1的条带赢家

!!!!! Bleaf1 !!!!!

!!!!!

bleaf1# show ip mroute 228.0.0.1 vrf common:default

IP Multicast Routing Table for VRF "common:default"

(10.101.101.115/32, 228.0.0.1/32), uptime: 3w4d, mrib ip pim

Incoming interface: Tunnel14, RPF nbr: 10.0.176.64 (pervasive)

Outgoing interface list: (count: 1)

Ethernet1/5, uptime: 1d01h, pim

(10.101.101.116/32, 228.0.0.1/32), uptime: 3w5d, pim mrib ip

Incoming interface: Tunnel14, RPF nbr: 10.0.176.64 (pervasive)

Outgoing interface list: (count: 1)

Ethernet1/4, uptime: 1d01h, pim

(10.101.101.117/32, 228.0.0.1/32), uptime: 3w5d, pim mrib ip

Incoming interface: Tunnel14, RPF nbr: 10.0.176.64 (pervasive)

Outgoing interface list: (count: 1)

Ethernet1/5, uptime: 1d01h, pim

(10.101.101.118/32, 228.0.0.1/32), uptime: 3w5d, mrib ip pim

Incoming interface: Tunnel14, RPF nbr: 10.0.176.64 (pervasive)

Outgoing interface list: (count: 1)

Ethernet1/4, uptime: 1d01h, pim

(10.101.101.119/32, 228.0.0.1/32), uptime: 3w5d, mrib ip pim

Incoming interface: Tunnel14, RPF nbr: 10.0.176.64 (pervasive)

Outgoing interface list: (count: 1)

Ethernet1/5, uptime: 1d01h, pim

(10.101.101.120/32, 228.0.0.1/32), uptime: 3w5d, pim mrib ip

Incoming interface: Tunnel14, RPF nbr: 10.0.176.64 (pervasive)

Outgoing interface list: (count: 1)

Ethernet1/4, uptime: 1d01h, pim

(10.101.101.121/32, 228.0.0.1/32), uptime: 3w5d, pim mrib ip

Incoming interface: Tunnel14, RPF nbr: 10.0.176.64 (pervasive)

Outgoing interface list: (count: 1)

Ethernet1/4, uptime: 1d01h, pim

(10.101.101.122/32, 228.0.0.1/32), uptime: 1d01h, ip mrib pim

Incoming interface: Tunnel14, RPF nbr: 10.0.176.64 (pervasive)

Outgoing interface list: (count: 1)

Ethernet1/5, uptime: 1d01h, pim

(10.101.101.123/32, 228.0.0.1/32), uptime: 3w5d, pim mrib ip

Incoming interface: Tunnel14, RPF nbr: 10.0.176.64 (pervasive)

Outgoing interface list: (count: 1)

Ethernet1/4, uptime: 1d01h, pim

bleaf1#

Bleaf1是组229.0.0.1的活动边界枝叶/条带窗口。 bleaf1通过外部核心设备接收组播到组229.0.0.1，然后转发到BD90、BD91、BD31、BD32中的内部接收器。（请注意，仅VLAN ID内部到枝叶节点，即无处不在的GW）。

!!!!! bleaf1 !!!!!

bleaf1# show ip mroute 229.0.0.1 vrf common:default

IP Multicast Routing Table for VRF "common:default"

(*, 229.0.0.1/32), uptime: 3w5d, ngmvpn ip pim

Incoming interface: Ethernet1/5, RPF nbr: 10.1.20.25

Outgoing interface list: (count: 1) (Fabric OIF)

Tunnel14, uptime: 3w5d, ngmvpn

(10.103.103.40/32, 229.0.0.1/32), uptime: 1d01h, ip mrib pim

Incoming interface: Ethernet1/5, RPF nbr: 10.1.20.25

Outgoing interface list: (count: 1)

Tunnel14, uptime: 1d01h, mrib

(10.103.103.41/32, 229.0.0.1/32), uptime: 1d01h, ip mrib pim

Incoming interface: Ethernet1/4, RPF nbr: 10.1.20.1

Outgoing interface list: (count: 1)

Tunnel14, uptime: 1d01h, mrib

(10.103.103.42/32, 229.0.0.1/32), uptime: 1d01h, ip mrib pim

Incoming interface: Ethernet1/5, RPF nbr: 10.1.20.25

Outgoing interface list: (count: 1)

Tunnel14, uptime: 1d01h, mrib

(10.103.103.43/32, 229.0.0.1/32), uptime: 1d01h, ip mrib pim

Incoming interface: Ethernet1/5, RPF nbr: 10.1.20.25

Outgoing interface list: (count: 1)

Tunnel14, uptime: 1d01h, mrib

(10.103.103.44/32, 229.0.0.1/32), uptime: 1d01h, ip mrib pim

Incoming interface: Ethernet1/5, RPF nbr: 10.1.20.25

Outgoing interface list: (count: 1)

Tunnel14, uptime: 1d01h, mrib

(10.103.103.45/32, 229.0.0.1/32), uptime: 1d01h, ip mrib pim

Incoming interface: Ethernet1/5, RPF nbr: 10.1.20.25

Outgoing interface list: (count: 1)

Tunnel14, uptime: 1d01h, mrib

(10.103.103.46/32, 229.0.0.1/32), uptime: 1d01h, ip mrib pim

Incoming interface: Ethernet1/5, RPF nbr: 10.1.20.25

Outgoing interface list: (count: 1)

Tunnel14, uptime: 1d01h, mrib

(10.103.103.47/32, 229.0.0.1/32), uptime: 1d01h, ip mrib pim

Incoming interface: Ethernet1/4, RPF nbr: 10.1.20.1

Outgoing interface list: (count: 1)

Tunnel14, uptime: 1d01h, mrib

(10.103.103.48/32, 229.0.0.1/32), uptime: 1d01h, ip mrib pim

Incoming interface: Ethernet1/4, RPF nbr: 10.1.20.1

Outgoing interface list: (count: 1)

Tunnel14, uptime: 1d01h, mrib

(10.103.103.49/32, 229.0.0.1/32), uptime: 1d01h, ip mrib pim

Incoming interface: Ethernet1/4, RPF nbr: 10.1.20.1

Outgoing interface list: (count: 1)

Tunnel14, uptime: 1d01h, mrib

bleaf1#

!!!!! bleaf2 !!!!!

bleaf2# show ip mroute 229.0.0.1 vrf common:default

IP Multicast Routing Table for VRF "common:default"

(*, 229.0.0.1/32), uptime: 3w5d, ip pim igmp

Incoming interface: Ethernet1/4, RPF nbr: 10.1.20.5

Outgoing interface list: (count: 1)

Vlan25, uptime: 3w5d, igmp

(10.103.103.40/32, 229.0.0.1/32), uptime: 1d01h, ip mrib pim

Incoming interface: Ethernet1/4, RPF nbr: 10.1.20.5

Outgoing interface list: (count: 1) (Fabric Forwarding Loser)

Vlan25, uptime: 1d01h, mrib

(10.103.103.41/32, 229.0.0.1/32), uptime: 1d01h, ip mrib pim

Incoming interface: Ethernet1/4, RPF nbr: 10.1.20.5

Outgoing interface list: (count: 1) (Fabric Forwarding Loser)

Vlan25, uptime: 1d01h, mrib

(10.103.103.42/32, 229.0.0.1/32), uptime: 1d01h, ip mrib pim

Incoming interface: Ethernet1/5, RPF nbr: 10.1.20.29

Outgoing interface list: (count: 1) (Fabric Forwarding Loser)

Vlan25, uptime: 1d01h, mrib

(10.103.103.43/32, 229.0.0.1/32), uptime: 1d01h, ip mrib pim

Incoming interface: Ethernet1/5, RPF nbr: 10.1.20.29

Outgoing interface list: (count: 1) (Fabric Forwarding Loser)

Vlan25, uptime: 1d01h, mrib

(10.103.103.44/32, 229.0.0.1/32), uptime: 1d01h, ip mrib pim

Incoming interface: Ethernet1/5, RPF nbr: 10.1.20.29

Outgoing interface list: (count: 1) (Fabric Forwarding Loser)

Vlan25, uptime: 1d01h, mrib

(10.103.103.45/32, 229.0.0.1/32), uptime: 1d01h, ip mrib pim

Incoming interface: Ethernet1/4, RPF nbr: 10.1.20.5

Outgoing interface list: (count: 1) (Fabric Forwarding Loser)

Vlan25, uptime: 1d01h, mrib

(10.103.103.46/32, 229.0.0.1/32), uptime: 1d01h, ip mrib pim

Incoming interface: Ethernet1/5, RPF nbr: 10.1.20.29

Outgoing interface list: (count: 1) (Fabric Forwarding Loser)

Vlan25, uptime: 1d01h, mrib

(10.103.103.47/32, 229.0.0.1/32), uptime: 1d01h, ip mrib pim

Incoming interface: Ethernet1/4, RPF nbr: 10.1.20.5

Outgoing interface list: (count: 1) (Fabric Forwarding Loser)

Vlan25, uptime: 1d01h, mrib

(10.103.103.48/32, 229.0.0.1/32), uptime: 1d01h, ip mrib pim

Incoming interface: Ethernet1/5, RPF nbr: 10.1.20.29

Outgoing interface list: (count: 1) (Fabric Forwarding Loser)

Vlan25, uptime: 1d01h, mrib

(10.103.103.49/32, 229.0.0.1/32), uptime: 1d01h, ip mrib pim

Incoming interface: Ethernet1/4, RPF nbr: 10.1.20.5

Outgoing interface list: (count: 1) (Fabric Forwarding Loser)

Vlan25, uptime: 1d01h, mrib

bleaf2#

非边界枝叶Cleaf1和Cleaf2在BD31、BD32、BD91中连接了接收器。不支持仅安装(*,G)非边界枝叶节点(S，G)。

cleaf1# show ip mroute 228.0.0.1 vrf common:default

IP Multicast Routing Table for VRF "common:default"

(*, 228.0.0.1/32), uptime: 3w5d, igmp ip pim

Incoming interface: Tunnel14, RPF nbr: 10.0.80.91

Outgoing interface list: (count: 2)

Vlan4, uptime: 1w5d, igmp

Vlan7, uptime: 3w5d, igmp

cleaf1# show ip mroute 229.0.0.1 vrf common:default

IP Multicast Routing Table for VRF "common:default"

(*, 229.0.0.1/32), uptime: 3w5d, igmp ip pim

Incoming interface: Tunnel14, RPF nbr: 10.0.80.91

Outgoing interface list: (count: 2)

Vlan4, uptime: 1w5d, igmp

Vlan7, uptime: 3w5d, igmp

cleaf1#

cleaf1# show interface vlan 4

Vlan4 is up, line protocol is up

Hardware EtherSVI, address is  0000.0c07.ac1f

Internet Address is 10.31.31.1/24

MTU 9000 bytes, BW 10000000 Kbit, DLY 1 usec

reliability 255/255, txload 1/255, rxload 1/255

Carrier delay is 10 sec

Encapsulation ARPA, loopback not set

Keepalive not supported

ARP type: ARPA

Last clearing of "show interface" counters never

30 seconds input rate 0 bits/sec, 0 packets/sec

30 seconds output rate 0 bits/sec, 0 packets/sec

Load-Interval #2: 5 minute (300 seconds)

input rate 0 bps, 0 pps; output rate 0 bps, 0 pps

L3 Switched:

input: 0 pkts, 0 bytes - output: 0 pkts, 0 bytes

L3 in Switched:

ucast: 0 pkts, 0 bytes - mcast: 0 pkts, 0 bytes

L3 out Switched:

ucast: 0 pkts, 0 bytes - mcast: 0 pkts, 0 bytes

cleaf1# show interface vlan 7

Vlan7 is up, line protocol is up

Hardware EtherSVI, address is  0000.0c07.ac20

Internet Address is 10.32.32.1/24

MTU 9000 bytes, BW 10000000 Kbit, DLY 1 usec

reliability 255/255, txload 1/255, rxload 1/255

Carrier delay is 10 sec

Encapsulation ARPA, loopback not set

Keepalive not supported

ARP type: ARPA

Last clearing of "show interface" counters never

30 seconds input rate 0 bits/sec, 0 packets/sec

30 seconds output rate 0 bits/sec, 0 packets/sec

Load-Interval #2: 5 minute (300 seconds)

input rate 0 bps, 0 pps; output rate 0 bps, 0 pps

L3 Switched:

input: 0 pkts, 0 bytes - output: 0 pkts, 0 bytes

L3 in Switched:

ucast: 0 pkts, 0 bytes - mcast: 0 pkts, 0 bytes

L3 out Switched:

ucast: 0 pkts, 0 bytes - mcast: 0 pkts, 0 bytes

cleaf1#

!!!! Non-border leaf node has (*, G) only, (S,G) is not supported.

cleaf2# show ip mroute 228.0.0.1 vrf common:default

IP Multicast Routing Table for VRF "common:default"

(*, 228.0.0.1/32), uptime: 3w5d, igmp ip pim

Incoming interface: Tunnel16, RPF nbr: 10.0.80.91

Outgoing interface list: (count: 3)

Vlan3, uptime: 1w5d, igmp

Vlan30, uptime: 3w5d, igmp

Vlan9, uptime: 3w5d, igmp

cleaf2# show ip mroute 229.0.0.1 vrf common:default

IP Multicast Routing Table for VRF "common:default"

(*, 229.0.0.1/32), uptime: 3w5d, igmp ip pim

Incoming interface: Tunnel16, RPF nbr: 10.0.80.91

Outgoing interface list: (count: 3)

Vlan3, uptime: 1w5d, igmp

Vlan30, uptime: 3w5d, igmp

Vlan9, uptime: 3w5d, igmp

cleaf2#

cleaf2# show interface vlan 3

Vlan3 is up, line protocol is up

Hardware EtherSVI, address is  0000.0c07.ac1f

Internet Address is 10.31.31.1/24

MTU 9000 bytes, BW 10000000 Kbit, DLY 1 usec

reliability 255/255, txload 1/255, rxload 1/255

Carrier delay is 10 sec

Encapsulation ARPA, loopback not set

Keepalive not supported

ARP type: ARPA

Last clearing of "show interface" counters never

30 seconds input rate 0 bits/sec, 0 packets/sec

30 seconds output rate 0 bits/sec, 0 packets/sec

Load-Interval #2: 5 minute (300 seconds)

input rate 0 bps, 0 pps; output rate 0 bps, 0 pps

L3 Switched:

input: 0 pkts, 0 bytes - output: 0 pkts, 0 bytes

L3 in Switched:

ucast: 0 pkts, 0 bytes - mcast: 0 pkts, 0 bytes

L3 out Switched:

ucast: 0 pkts, 0 bytes - mcast: 0 pkts, 0 bytes

cleaf2# show interface vlan 30

Vlan30 is up, line protocol is up

Hardware EtherSVI, address is  0000.0c07.ac5b

Internet Address is 10.91.91.1/24

MTU 9000 bytes, BW 10000000 Kbit, DLY 1 usec

reliability 255/255, txload 1/255, rxload 1/255

Carrier delay is 10 sec

Encapsulation ARPA, loopback not set

Keepalive not supported

ARP type: ARPA

Last clearing of "show interface" counters never

30 seconds input rate 0 bits/sec, 0 packets/sec

30 seconds output rate 0 bits/sec, 0 packets/sec

Load-Interval #2: 5 minute (300 seconds)

input rate 0 bps, 0 pps; output rate 0 bps, 0 pps

L3 Switched:

input: 0 pkts, 0 bytes - output: 0 pkts, 0 bytes

L3 in Switched:

ucast: 0 pkts, 0 bytes - mcast: 0 pkts, 0 bytes

L3 out Switched:

ucast: 0 pkts, 0 bytes - mcast: 0 pkts, 0 bytes

cleaf2# show interface vlan 9

Vlan9 is up, line protocol is up

Hardware EtherSVI, address is  0000.0c07.ac20

Internet Address is 10.32.32.1/24

MTU 9000 bytes, BW 10000000 Kbit, DLY 1 usec

reliability 255/255, txload 1/255, rxload 1/255

Carrier delay is 10 sec

Encapsulation ARPA, loopback not set

Keepalive not supported

ARP type: ARPA

Last clearing of "show interface" counters never

30 seconds input rate 0 bits/sec, 0 packets/sec

30 seconds output rate 0 bits/sec, 0 packets/sec

Load-Interval #2: 5 minute (300 seconds)

input rate 0 bps, 0 pps; output rate 0 bps, 0 pps

L3 Switched:

input: 0 pkts, 0 bytes - output: 0 pkts, 0 bytes

L3 in Switched:

ucast: 0 pkts, 0 bytes - mcast: 0 pkts, 0 bytes

L3 out Switched:

ucast: 0 pkts, 0 bytes - mcast: 0 pkts, 0 bytes

cleaf2#

在核心路由器上，N7K-core-1和N7K-core-2为源自LAN网络的组播流分担负载，如果未启用快速收敛，则只有一个边界枝叶(bleaf1)向源发送加入。

!!!!! Sources in LAN network !!!!!

!!!!! N7K-core-1 !!!!!

N7K-core-1# show ip mroute 229.0.0.1

IP Multicast Routing Table for VRF "default"

(10.103.103.41/32, 229.0.0.1/32), uptime: 1d01h, pim mrib ip

Incoming interface: Ethernet1/3, RPF nbr: 10.1.20.10

Outgoing interface list: (count: 1)

Ethernet1/1, uptime: 1d01h, pim

(10.103.103.42/32, 229.0.0.1/32), uptime: 1d01h, pim mrib ip

Incoming interface: Ethernet1/5, RPF nbr: 10.1.20.42

Outgoing interface list: (count: 0)

(10.103.103.43/32, 229.0.0.1/32), uptime: 1d01h, pim mrib ip

Incoming interface: Ethernet1/5, RPF nbr: 10.1.20.42

Outgoing interface list: (count: 0)

(10.103.103.44/32, 229.0.0.1/32), uptime: 1d01h, pim mrib ip

Incoming interface: Ethernet1/5, RPF nbr: 10.1.20.42

Outgoing interface list: (count: 0)

(10.103.103.46/32, 229.0.0.1/32), uptime: 1d01h, pim mrib ip

Incoming interface: Ethernet1/5, RPF nbr: 10.1.20.42

Outgoing interface list: (count: 0)

(10.103.103.47/32, 229.0.0.1/32), uptime: 1d01h, pim mrib ip

Incoming interface: Ethernet1/4, RPF nbr: 10.1.20.14

Outgoing interface list: (count: 1)

Ethernet1/1, uptime: 1d01h, pim

(10.103.103.48/32, 229.0.0.1/32), uptime: 1d01h, pim mrib ip

Incoming interface: Ethernet1/3, RPF nbr: 10.1.20.10

Outgoing interface list: (count: 1)

Ethernet1/1, uptime: 1d01h, pim

(10.103.103.49/32, 229.0.0.1/32), uptime: 1d01h, pim mrib ip

Incoming interface: Ethernet1/3, RPF nbr: 10.1.20.10

Outgoing interface list: (count: 1)

Ethernet1/1, uptime: 1d01h, pim

N7K-core-1#

!!!!! N7K-core-2 !!!!!

N7K-core-2# show ip mroute 229.0.0.1

IP Multicast Routing Table for VRF "default"

(*, 229.0.0.1/32), uptime: 3w5d, pim ip

Incoming interface: Ethernet1/5, RPF nbr: 10.1.20.46

Outgoing interface list: (count: 1)

Ethernet1/1, uptime: 3w5d, pim

(10.103.103.40/32, 229.0.0.1/32), uptime: 1d01h, pim mrib ip

Incoming interface: Ethernet1/3, RPF nbr: 10.1.20.18

Outgoing interface list: (count: 1)

Ethernet1/1, uptime: 1d01h, pim

(10.103.103.41/32, 229.0.0.1/32), uptime: 1d01h, pim mrib ip

Incoming interface: Ethernet1/4, RPF nbr: 10.1.20.22

Outgoing interface list: (count: 0)

(10.103.103.42/32, 229.0.0.1/32), uptime: 1d01h, pim mrib ip

Incoming interface: Ethernet1/3, RPF nbr: 10.1.20.18

Outgoing interface list: (count: 1)

Ethernet1/1, uptime: 1d01h, pim

(10.103.103.43/32, 229.0.0.1/32), uptime: 1d01h, pim mrib ip

Incoming interface: Ethernet1/4, RPF nbr: 10.1.20.22

Outgoing interface list: (count: 1)

Ethernet1/1, uptime: 1d01h, pim

(10.103.103.44/32, 229.0.0.1/32), uptime: 1d01h, pim mrib ip

Incoming interface: Ethernet1/3, RPF nbr: 10.1.20.18

Outgoing interface list: (count: 1)

Ethernet1/1, uptime: 1d01h, pim

(10.103.103.45/32, 229.0.0.1/32), uptime: 1d01h, pim mrib ip

Incoming interface: Ethernet1/4, RPF nbr: 10.1.20.22

Outgoing interface list: (count: 1)

Ethernet1/1, uptime: 1d01h, pim

(10.103.103.46/32, 229.0.0.1/32), uptime: 1d01h, pim mrib ip

Incoming interface: Ethernet1/3, RPF nbr: 10.1.20.18

Outgoing interface list: (count: 1)

Ethernet1/1, uptime: 1d01h, pim

(10.103.103.47/32, 229.0.0.1/32), uptime: 1d01h, pim mrib ip

Incoming interface: Ethernet1/4, RPF nbr: 10.1.20.22

Outgoing interface list: (count: 0)

(10.103.103.48/32, 229.0.0.1/32), uptime: 00:53:01, pim mrib ip

Incoming interface: Ethernet1/5, RPF nbr: 10.1.20.46

Outgoing interface list: (count: 0)

(10.103.103.49/32, 229.0.0.1/32), uptime: 1d01h, pim mrib ip

Incoming interface: Ethernet1/4, RPF nbr: 10.1.20.22

Outgoing interface list: (count: 0)

N7K-core-2#

!!!!!! Sources in ACI !!!!!

!!!!! N7K-core-1 !!!!!

N7K-core-1# show ip mroute 228.0.0.1

IP Multicast Routing Table for VRF "default"

(*, 228.0.0.1/32), uptime: 3w5d, pim ip

Incoming interface: Ethernet1/5, RPF nbr: 10.1.20.42

Outgoing interface list: (count: 2)

Ethernet1/3, uptime: 3w5d, pim

Ethernet1/2, uptime: 3w5d, pim

(10.101.101.115/32, 228.0.0.1/32), uptime: 1d01h, pim mrib ip

Incoming interface: Ethernet1/2, RPF nbr: 10.1.20.6

Outgoing interface list: (count: 0)

(10.101.101.116/32, 228.0.0.1/32), uptime: 1d01h, pim mrib ip

Incoming interface: Ethernet1/1, RPF nbr: 10.1.20.2

Outgoing interface list: (count: 1)

Ethernet1/3, uptime: 1d01h, pim

(10.101.101.117/32, 228.0.0.1/32), uptime: 1d01h, pim mrib ip

Incoming interface: Ethernet1/5, RPF nbr: 10.1.20.42

Outgoing interface list: (count: 0)

(10.101.101.118/32, 228.0.0.1/32), uptime: 1d01h, pim mrib ip

Incoming interface: Ethernet1/1, RPF nbr: 10.1.20.2

Outgoing interface list: (count: 1)

Ethernet1/3, uptime: 1d01h, pim

(10.101.101.119/32, 228.0.0.1/32), uptime: 1d01h, pim mrib ip

Incoming interface: Ethernet1/2, RPF nbr: 10.1.20.6

Outgoing interface list: (count: 0)

(10.101.101.120/32, 228.0.0.1/32), uptime: 1d01h, pim mrib ip

Incoming interface: Ethernet1/1, RPF nbr: 10.1.20.2

Outgoing interface list: (count: 1)

Ethernet1/3, uptime: 1d01h, pim

(10.101.101.121/32, 228.0.0.1/32), uptime: 1d01h, pim mrib ip

Incoming interface: Ethernet1/1, RPF nbr: 10.1.20.2

Outgoing interface list: (count: 1)

Ethernet1/3, uptime: 1d01h, pim

(10.101.101.122/32, 228.0.0.1/32), uptime: 1d01h, pim mrib ip

Incoming interface: Ethernet1/2, RPF nbr: 10.1.20.6

Outgoing interface list: (count: 0)

(10.101.101.123/32, 228.0.0.1/32), uptime: 1d01h, pim mrib ip

Incoming interface: Ethernet1/1, RPF nbr: 10.1.20.2

Outgoing interface list: (count: 1)

Ethernet1/3, uptime: 1d01h, pim

(10.101.101.124/32, 228.0.0.1/32), uptime: 1d01h, pim mrib ip

Incoming interface: Ethernet1/5, RPF nbr: 10.1.20.42

Outgoing interface list: (count: 0)

N7K-core-1#

N7K-core-1#

!!!!! N7K-core-2 !!!!!

N7K-core-2# show ip mroute 228.0.0.1

IP Multicast Routing Table for VRF "default"

(*, 228.0.0.1/32), uptime: 3w5d, pim ip

Incoming interface: Ethernet1/5, RPF nbr: 10.1.20.46

Outgoing interface list: (count: 1)

Ethernet1/4, uptime: 3w5d, pim

(10.101.101.115/32, 228.0.0.1/32), uptime: 1d01h, pim mrib ip

Incoming interface: Ethernet1/1, RPF nbr: 10.1.20.26

Outgoing interface list: (count: 2)

Ethernet1/4, uptime: 00:02:03, pim

Ethernet1/3, uptime: 1d01h, pim

(10.101.101.116/32, 228.0.0.1/32), uptime: 00:01:28, pim mrib ip

Incoming interface: Ethernet1/2, RPF nbr: 10.1.20.30

Outgoing interface list: (count: 1)

Ethernet1/4, uptime: 00:00:57, pim

(10.101.101.117/32, 228.0.0.1/32), uptime: 1d01h, pim mrib ip

Incoming interface: Ethernet1/1, RPF nbr: 10.1.20.26

Outgoing interface list: (count: 2)

Ethernet1/4, uptime: 00:02:03, pim

Ethernet1/3, uptime: 1d01h, pim

(10.101.101.118/32, 228.0.0.1/32), uptime: 00:01:28, pim mrib ip

Incoming interface: Ethernet1/2, RPF nbr: 10.1.20.30

Outgoing interface list: (count: 1)

Ethernet1/4, uptime: 00:00:57, pim

(10.101.101.119/32, 228.0.0.1/32), uptime: 1d01h, pim mrib ip

Incoming interface: Ethernet1/1, RPF nbr: 10.1.20.26

Outgoing interface list: (count: 2)

Ethernet1/4, uptime: 00:02:03, pim

Ethernet1/3, uptime: 1d01h, pim

(10.101.101.122/32, 228.0.0.1/32), uptime: 1d01h, pim mrib ip

Incoming interface: Ethernet1/1, RPF nbr: 10.1.20.26

Outgoing interface list: (count: 2)

Ethernet1/4, uptime: 00:02:03, pim

Ethernet1/3, uptime: 1d01h, pim

(10.101.101.123/32, 228.0.0.1/32), uptime: 00:01:28, pim mrib ip

Incoming interface: Ethernet1/2, RPF nbr: 10.1.20.30

Outgoing interface list: (count: 1)

Ethernet1/4, uptime: 00:00:57, pim

(10.101.101.124/32, 228.0.0.1/32), uptime: 1d01h, pim mrib ip

Incoming interface: Ethernet1/2, RPF nbr: 10.1.20.30

Outgoing interface list: (count: 2)

Ethernet1/3, uptime: 1d01h, pim

Ethernet1/4, uptime: 1d01h, pim

N7K-core-2#

参考

ACI 2.0组播路由