目录

简介

拓扑

先决条件

要求

使用的组件

配置

在2台枝叶交换机之间设置vPC

使FEX在线

在FEX上配置主机接口

选项 1：将接口添加到每个FEX配置文件，并将其映射到同一vPC策略组。

选项2：为两个FEX分配相同的FEX配置文件并添加接入端口选择器。

简介

本文档介绍在以应用为中心的基础设施(ACI)环境中配置从主机到这些FEX的交换矩阵外部器(FEX)和虚拟端口通道(vPC)所使用的配置步骤。

拓扑

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档中的信息基于下列硬件和软件版本：

- 由两台主干交换机和两台枝叶交换机组成的ACI交换矩阵

- 2个支持的Cisco FEX，每个都插入到自己的枝叶中

- 应用策略基础设施控制器(APIC)

- 连接到每个FEX的主机

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

配置

在2台枝叶交换机之间设置vPC

此配置将指导您在ACI中的2个枝叶交换机之间设置vPC域。此部分中使用的枝叶交换机标有“101”和“102”

导航至交换矩阵>访问策略>交换机策略>策略>虚拟端口通道默认值，然后点击“显式VPC保护组”旁的“+”。 输入名称、您希望vPC之间的2个枝叶交换机和“逻辑对ID”（传统Nexus OS中的“域ID”）。

现在，我们可以在CLI上验证vPC域已配置。 通过SSH（安全外壳）连接到其中一台交换机并运行“show vpc brief”

fab1-leaf1# show vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 10

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : Disabled

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : primary

Number of vPCs configured         : 4

Peer Gateway                      : Disabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

Operational Layer3 Peer           : Disabled

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1           up     -

在ACI中，由于我们在内部使用主干 — 枝叶连接作为“对等链路”，因此保持连接状态被禁用。

使FEX在线

现在，我们可以在每台枝叶交换机上注册FEX。 我们不支持FEX和2个枝叶交换机之间的vPC连接，因此每个FEX只能连接到1个枝叶交换机。

导航至交换矩阵>访问策略>快速启动，然后单击“配置接口、PC和VPC”。单击绿色“+”添加交换机。 选择“高级”单选按钮。 输入连接到第一个FEX的枝叶的交换机ID。输入交换机配置文件的名称并添加FEX类型和编号。 最后，在FEX连接的枝叶上输入端口。

更新、所有字段、保存一次并提交。 此时，您应该看到FEX从交换机CLI联机。如果映像不同，它将从枝叶下载正确的映像。

fab1-leaf1# show fex detail

FEX: 101  Description: FEX0101   state: Online

FEX version: 11.1(1o) [Switch version: 11.1(1o)]

FEX Interim version: 11.1(1o)

Switch Interim version: 11.1(1o)

Extender Model: N2K-C2232PP-10GE,  Extender Serial: SSI1350063T

Part No: 68-3547-03

Card Id: 82, Mac Addr: 00:0d:ec:fa:4b, Num Macs: 75

Module Sw Gen: 22  [Switch Sw Gen: 21]

pinning-mode: static    Max-links: 1

Fabric port for control traffic: Eth1/36

Fabric interface state:

Eth1/36 - Interface Up. State: Active

Po5 - Interface Up. State: Active

对第二台FEX和枝叶交换机重复相同的过程。

NOTE: 查看连接到FEX的枝叶端口通道或物理接口时，您会看到“输入丢弃”递增。 这是正常的，应忽略。 由于链路层控制数据包的Broadcom ASIC（第1代Nexus 9000交换机）的限制，引发输入丢弃。 在正常操作下，您将看到输入丢弃，因此可能希望禁用这些接口的监控。

在FEX上配置主机接口

将每个FEX上的主机接口配置为位于vPC中有两种方法。

1)将接口添加到每个FEX配置文件，并将其映射到同一vPC策略组。

2)分配两个FEX的相同FEX配置文件并添加接入端口选择器。

完成向导后，您将看到每个FEX的“FEX”配置文件和“接口选择器”。

“FEX配置文件”是FEX也将关联的配置文件。 FEX配置文件类似于将接口链接到FEX的“交换机配置文件”。

接口选择器是为连接到FEX的枝叶接口创建的策略。

选项 1：将接口添加到每个FEX配置文件，并将其映射到同一vPC策略组。

导航至交换矩阵>访问策略>接口策略>配置文件，然后点击FEX 101的FEX配置文件。右键点击并选择“创建访问端口选择器”。 在本例中，主机已插入两个FEX的端口10。

命名选择器，输入要将接口映射到的接口ID和vPC策略组：

对枝叶102接口选择器完成相同操作，并确保使用接口策略组，以便将两者捆绑到vPC中。

然后，您可以通过从枝叶CLI运行命令“show port-channel summary”和“show vpc brief”来验证两台交换机上的接口是否都捆绑在一起。每台交换机可能都有自己的PC编号，但它们应映射回相同的vPC ID:

fab1-leaf1# show port-channel summary

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

-------------------------------------------------------------------------------

1     Po1(SU)     Eth      LACP      Eth1/16(P)

2     Po2(SU)     Eth      LACP      Eth1/17(P)

3     Po3(SD)     Eth      NONE      Eth1/48(D)

5     Po5(SU)     Eth      LACP      Eth1/4(P)

6     Po6(SU)     Eth      NONE      Eth1/36(P)

7     Po7(SU)     Eth      NONE      Eth101/1/10(P)

fab1-leaf3# show port-channel summary

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

-------------------------------------------------------------------------------

1     Po1(SU)     Eth      LACP      Eth1/4(P)

2     Po2(SU)     Eth      LACP      Eth1/17(P)

3     Po3(SU)     Eth      LACP      Eth1/16(P)

4     Po4(SD)     Eth      NONE      Eth1/48(D)

6     Po6(SU)     Eth      NONE      Eth1/36(P)

7     Po7(SU)     Eth      NONE      Eth102/1/10(P)

fab1-leaf1# show vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 13

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : Disabled

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : primary

Number of vPCs configured         : 5

Peer Gateway                      : Disabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

Operational Layer3 Peer           : Disabled

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1           up     -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

2    Po7    up     success     success                    -

fab1-leaf3# show vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 13

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : Disabled

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : secondary

Number of vPCs configured         : 5

Peer Gateway                      : Disabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

Operational Layer3 Peer           : Disabled

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1           up     -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

2    Po7    up     success     success                    -

选项2:分配两个FEX的同一FEX配置文件并添加接入端口选择器。

如果配置多台vPC，则进入每个FEX配置文件并添加接口的配置会变得繁琐。 为简化配置，您可以分配多个FEX的同一FEX配置文件，然后使用该配置文件在每个FEX上部署接入端口。

为此，请导航至交换矩阵>访问策略>接口策略>配置文件，右键单击并选择“创建FEX配置文件”。 将其命名并点击提交：

既然我们定义了FEX配置文件，我们需要将FEX 101和102映射到此唯一配置文件。 如果展开FEX接口选择器，您将看到从下拉列表中选择FEX配置文件的位置，确保选择创建的配置文件（本例中为101-102）：

对FEX 102接口选择器重复相同的步骤。

然后，我们可以将接入端口块添加到“101-102” FEX配置文件，以同时在两个FEX上部署这些接口。

右键点击“101-102” FEX配置文件并选择“创建接入端口选择器”。 将其命名，然后选择接口和策略组，如上部分所示：

然后，您可以通过从枝叶CLI运行命令“show port-channel summary”和“show vpc brief”来验证两台交换机上的接口是否都捆绑在一起。每台交换机可能都有自己的PC编号，但它们应映射回相同的vPC ID:

fab1-leaf1# show port-channel summary

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

-------------------------------------------------------------------------------

1     Po1(SU)     Eth      LACP      Eth1/16(P)

2     Po2(SU)     Eth      LACP      Eth1/17(P)

3     Po3(SD)     Eth      NONE      Eth1/48(D)

5     Po5(SU)     Eth      LACP      Eth1/4(P)

6     Po6(SU)     Eth      NONE      Eth1/36(P)

7     Po7(SU)     Eth      NONE      Eth101/1/10(P)

fab1-leaf3# show port-channel summary

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

-------------------------------------------------------------------------------

1     Po1(SU)     Eth      LACP      Eth1/4(P)

2     Po2(SU)     Eth      LACP      Eth1/17(P)

3     Po3(SU)     Eth      LACP      Eth1/16(P)

4     Po4(SD)     Eth      NONE      Eth1/48(D)

6     Po6(SU)     Eth      NONE      Eth1/36(P)

7     Po7(SU)     Eth      NONE      Eth102/1/10(P)

fab1-leaf1# show vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 13

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : Disabled

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : primary

Number of vPCs configured         : 5

Peer Gateway                      : Disabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

Operational Layer3 Peer           : Disabled

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1           up     -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

2    Po7    up     success     success                    -

fab1-leaf3# show vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 13

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : Disabled

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : secondary

Number of vPCs configured         : 5

Peer Gateway                      : Disabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

Operational Layer3 Peer           : Disabled

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1           up     -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

2    Po7    up     success     success                    -