Contents

Introdução

Procedimento para Coleta de Log do RCM

Introdução

Este documento descreve o procedimento geral para coleta de log do Redundancy Configuration Manager (RCM).

Procedimento para Coleta de Log do RCM

Estes são os componentes do RCM:

- Controlador

- Checkpointmgr

- BFDMGR

- OPScenter

- Configmgr

Com base no cenário do problema, é essencial identificar os elementos problemáticos que podem servir como base para a captura de logs.

O procedimento é o mesmo para todos os componentes, conforme descrito aqui.

- Se precisar revisar os registros recentes, como os das últimas 1 a 2 horas, você pode simplesmente reunir os registros do pod para esse componente específico.

kubectl get svc  -o wide -A -n rcm

With this command, you get all the pods with their IPs and name.

kubectl logs <pod name> -n rcm

Just mention the pod name for which logs are required.

- Se você precisar examinar logs com mais de 2 horas, o sistema RCM armazenará todos os logs gerados por um máximo de 4 dias. Você pode recuperá-los usando o procedimento descrito aqui.

1. Navegue até o caminho do diretório: /var/log/containers e use o comando  grep  para procurar os logs de componentes específicos necessários.

In this scenario, let's take the controller as an example. If you require logs for configmgr/checkpointmgr, you need to use the 'grep' command, while the rest of the procedure remains unchanged.

root@h10-126-83-128:/var/log/containers# ls -la | grep controller

lrwxrwxrwx  1 root root     107 Mar 29 07:07 rcm-controller-6547b466ff-zsrcd_rcm_rcm-controller-4c149c1e962992a241dd5201aadb07237f52947740724c1df2a01b1b6bfbc671.log -> /var/log/pods/rcm_rcm-controller-6547b466ff-zsrcd_ff74e5fc-9a07-4073-8956-90cd978ac98e/rcm-controller/0.log

2. Descubra o diretório da controladora.

From Step 1., you can see the controller directory as mentioned here:

/var/log/pods/rcm_rcm-controller-6547b466ff-zsrcd_ff74e5fc-9a07-4073-8956-90cd978ac98e/rcm-controller/0.log

Get into this path

root@h10-126-83-128:/var/log/containers# ls -la /var/log/pods/rcm_rcm-controller-6547b466ff-zsrcd_ff74e5fc-9a07-4073-8956-90cd978ac98e/rcm-controller/

total 12

drwxr-xr-x 2 root root 4096 Mar 29 07:07 .

drwxr-xr-x 3 root root 4096 Mar 29 07:07 ..

lrwxrwxrwx 1 root root  165 Mar 29 07:07 0.log -> /var/lib/docker/containers/4c149c1e962992a241dd5201aadb07237f52947740724c1df2a01b1b6bfbc671/4c149c1e962992a241dd5201aadb07237f52947740724c1df2a01b1b6bfbc671-json.log

3. Obtenha todos os .log  arquivos (tar/zip).

In Step 2, once you have obtained the path where log files are stored, navigate to that path and collect the .log/.gz files as needed.

root@h10-126-83-128:/var/log/containers# ls -la /var/lib/docker/containers/4c149c1e962992a241dd5201aadb07237f52947740724c1df2a01b1b6bfbc671/

total 6448

drwx------  4 root root    4096 Mar 29 07:07 .

drwx------ 69 root root   12288 Mar 29 07:07 ..

-rw-r-----  1 root root 6548746 Mar 29 10:08 4c149c1e962992a241dd5201aadb07237f52947740724c1df2a01b1b6bfbc671-json.log

drwx------  2 root root    4096 Mar 29 07:07 checkpoints

-rw-------  1 root root   23306 Mar 29 07:07 config.v2.json

-rw-r--r--  1 root root    2469 Mar 29 07:07 hostconfig.json

drwx------  2 root root    4096 Mar 29 07:07 mounts

root@h10-126-83-128:/var/log/containers#