Contents

Introduction

Pré-requisito

Verificar se os certificados expiraram

Renovar os certificados

Verificar novamente se os certificados foram renovados

Modificar o kubelet.conf

Copie admin.conf

Reinicialize o sistema

Verifique se o comando kubectl funciona

Introduction

Este documento descreve o procedimento para renovar certificados Kubernetes no Cisco 5G RCM (Redundancy Configuration Manager).

Pré-requisito

Se for a configuração de Alta Disponibilidade do RCM, o procedimento deverá ser executado primeiro no RCM em standby, em seguida, execute um switchover e execute o procedimento no novo RCM em standby. Se não houver alta disponibilidade de RCM disponível, a redundância de UP não estará disponível durante a reinicialização de RCM, que faz parte do processo de renovação de certificados.

Verificar se os certificados expiraram

Para certificar-se de que os certificados tenham expirado, execute sudo kubeadm alpha certs check-expiration.

ubuntu@rcm:~$ sudo kubeadm alpha certs check-expiration

CERTIFICATE               EXPIRES                  RESIDUAL TIME   EXTERNALLY MANAGED

admin.conf                Oct 31, 2024 03:34 UTC   <invalid>       no

apiserver                 Oct 31, 2024 03:34 UTC   <invalid>       no

apiserver-etcd-client     Oct 31, 2024 03:34 UTC   <invalid>       no

apiserver-kubelet-client  Oct 31, 2024 03:34 UTC   <invalid>       no

controller-manager.conf   Oct 31, 2024 03:34 UTC   <invalid>       no

etcd-healthcheck-client   Oct 31, 2024 03:34 UTC   <invalid>       no

etcd-peer                 Oct 31, 2024 03:34 UTC   <invalid>       no

etcd-server               Oct 31, 2024 03:34 UTC   <invalid>       no

front-proxy-client        Oct 31, 2024 03:34 UTC   <invalid>       no

scheduler.conf            Oct 31, 2024 03:34 UTC   <invalid>       no

Renovar os certificados

Execute sudo kubeadm alpha certs renew all para renovar os certificados.

ubuntu@rcm:~$ sudo kubeadm alpha certs renew all

certificate embedded in the kubeconfig file for the admin to use and for kubeadm itself renewed

certificate for serving the Kubernetes API renewed

certificate the apiserver uses to access etcd renewed

certificate for the API server to connect to kubelet renewed

certificate embedded in the kubeconfig file for the controller manager to use renewed

certificate for liveness probes to healtcheck etcd renewed

certificate for etcd nodes to communicate with each other renewed

certificate for serving etcd renewed

certificate for the front proxy client renewed

certificate embedded in the kubeconfig file for the scheduler manager to use renewed

Verificar novamente se os certificados foram renovados

Execute sudo kubeadm alpha certs check-expiration para verificar se os certificados são renovados.

ubuntu@rcm:~$ sudo kubeadm alpha certs check-expiration

CERTIFICATE               EXPIRES                  RESIDUAL TIME   EXTERNALLY MANAGED

admin.conf                Nov 01, 2025 03:34 UTC   364d            no

apiserver                 Nov 01, 2025 03:34 UTC   364d            no

apiserver-etcd-client     Nov 01, 2025 03:34 UTC   364d            no

apiserver-kubelet-client  Nov 01, 2025 03:34 UTC   364d            no

controller-manager.conf   Nov 01, 2025 03:34 UTC   364d            no

etcd-healthcheck-client   Nov 01, 2025 03:34 UTC   364d            no

etcd-peer                 Nov 01, 2025 03:34 UTC   364d            no

etcd-server               Nov 01, 2025 03:34 UTC   364d            no

front-proxy-client        Nov 01, 2025 03:34 UTC   364d            no

scheduler.conf            Nov 01, 2025 03:34 UTC   364d            no

Modificar o kubelet.conf

Antes da versão 1.17 do kubeadm, é necessário modificar manualmente o kubelet.conf. Substitua client-certificate-data e client-key-data por este.

/etc/kubernetes/kubelet.conf

client-certificate:/var/lib/kubelet/pki/kubelet-client-current.pem

client-key: /var/lib/kubelet/pki/kubelet-client-current.pem

Copie admin.conf

Copie admin.conf para substituir .kube/config.

sudo cp /etc/kubernetes/admin.conf ~/.kube/config

Reinicialize o sistema

sudo reboot

Verifique se o comando kubectl funciona

Após a reinicialização, verifique se o comando kubectl funciona bem.

ubuntu@rcm:~$ kubectl get node

NAME   STATUS   ROLES       AGE   VERSION

rcm    Ready    master,oam  16d   v1.15.12