Contents

Introdução

Problema

Análise

Registrar todos os pares inativos

Verificações SMF

VerificaçõesGrafana

Verificações do Nexus

Solução

Introdução

Este documento descreve como solucionar problemas de alerta de log da Session Management Function (SMF) relacionado ao All Peers are Dead, Setting status code to 0.

Problema

O impacto da sessão foi relatado no SMF.

Análise

Registrar todos os pares inativos

O log indica que todos os pares dentro de SeletedProfileName:CHF-OFF estão inativos.

O registro abrange todos os endpoints configurados no SMF e sempre que você vê que todos os peers estão inativos dentro do perfil, isso sempre leva ao impacto na sessão.

master-1 b26897bce81a[2516]:

master-1 c77834f772f7[2516]: ************* TRANSACTION: 2475167152 *************

master-1 c77834f772f7[2516]: ************* TRANSACTION: 2475167152 *************

master-1 c77834f772f7[2516]: TRANSACTION SUCCESS:

master-1 c77834f772f7[2516]: TRANSACTION SUCCESS:

master-1 c77834f772f7[2516]: GR Instance ID : 1

master-1 c77834f772f7[2516]: GR Instance ID : 1

master-1 c77834f772f7[2516]: Txn Type : N40ChargingDataReq(3585)

master-1 c77834f772f7[2516]: Txn Type : N40ChargingDataReq(3585)

master-1 c77834f772f7[2516]: Priority : 1

master-1 c77834f772f7[2516]: Priority : 1

master-1 c77834f772f7[2516]: Session Namespace : smf(1)

master-1 c77834f772f7[2516]: Session Namespace : smf(1)

master-1 c77834f772f7[2516]: CDL Slice Name : smf

master-1 c77834f772f7[2516]: CDL Slice Name : smf

master-1 c77834f772f7[2516]: LOG MESSAGES:

master-1 c77834f772f7[2516]: LOG MESSAGES:

master-1 c77834f772f7[2516]: 2023/09/10 15:00:00.007 [ERROR] [nrfClient.Discovery.nrf] All Peers are Dead, Setting status code to 0 (timeout)

master-1 c77834f772f7[2516]: 2023/09/10 15:00:00.007 [ERROR] [nrfClient.Discovery.nrf] All Peers are Dead, Setting status code to 0 (timeout)

master-1 c77834f772f7[2516]: 2023/09/10 15:00:00.007 [ERROR] [nrfClient.Discovery.nrf] Message send failed, response [Type:CHF ServiceName:nchf-convergedcharging SelectedProfileName:"CHF-OFF" FailureProfile:"Fail-H-CHF-OFF" GroupID:"CHF-*" ]

master-1 c77834f772f7[2516]: 2023/09/10 15:00:00.007 [ERROR] [nrfClient.Discovery.nrf] Message send failed, response [Type:CHF ServiceName:nchf-convergedcharging SelectedProfileName:"CHF-OFF" FailureProfile:"Fail-H-CHF-OFF" GroupID:"CHF-*" ]

master-1 c77834f772f7[2516]: ***********************************************

master-1 c77834f772f7[2516]: ***********************************************

Com base na configuração, o SMF tenta alcançar o servidor primário com prioridade mais alta, caso haja um sistema de código HTTP 504 (timeout), e então o SMF tenta alcançar o servidor secundário. Se isso falhar, assim como nesse caso, o sistema também definirá a sessão no modo de continuação.

No exemplo, a função de cobrança secundária (CHF) para Off-line é 10.10.10.2. O SMF recebeu o erro 504 e a ação é FailureContinueAction.

master-2 42013075464a[2621]: 2023/09/10 15:00:00.063 rest-ep [ERROR] [RestClient.go:175] [infra.rest_client.core] Error in rest call err Post "http://10.10.10.2:1090/OFFLINE/nchf-convergedcharging/v2/chargingdata": context deadline exceeded

master-2 42013075464a[2621]: 2023/09/10 15:00:00.063 rest-ep [ERROR] [Config.go:1721] [nrfClient.Discovery.nrf] Send to NF rpcName[CHF], method:[DataRequest] EndPoint[http://10.10.10.2:1090/OFFLINE/nchf-convergedcharging/v2] failed

master-2 42013075464a[2621]: ************* TRANSACTION: 2252879781 *************

master-2 42013075464a[2621]: TRANSACTION SUCCESS:

master-2 42013075464a[2621]: GR Instance ID : 1

master-2 42013075464a[2621]: Txn Type : N40ChargingDataReq(3521)

master-2 42013075464a[2621]: Priority : 1

master-2 42013075464a[2621]: Session Namespace : smf(1)

master-2 42013075464a[2621]: CDL Slice Name : smf

master-2 42013075464a[2621]: LOG MESSAGES:

master-2 42013075464a[2621]: 2023/09/10 15:00:00.063 [ERROR] [rest_ep.app.ChargingIntf] {imsi-1234567891011121:21} Received Charging Data Response error with timediff 10001557123 - Request message {{"invocationSequenceNumber":1,"invocationTimeStamp":"2025-11-10T14:29:29Z","nfConsumerIdentification":{"nFIPv4Address":"10.10.10.12","nFName":"dce0c1d7-aa37-4f2c-870b-6f7c1be10af1","nFPLMNID":{"mcc":"123","mnc":"456"},"nodeFunctionality":"SMF"},"notifyUri":"http://10.10.10.12:8195/callbacks/v2/notifyUri/1909959397/chargingNotification","pDUSessionChargingInformation":{"chargingId":1909959397,"pduSessionInformation":{"authorizedQoSInformation":{"5qi":1,"arp":{"preemptCap":"NOT_PREEMPT","preemptVuln":"PREEMPTABLE","priorityLevel":1}},"authorizedSessionAMBR":{"downlink":"2048000 bps","uplink":"2048000 bps"},"chargingCharacteristicsSelectionMode":"VISITING_DEFAULT","dnnId":"data","hPlmnId":{"mcc":"123","mnc":"456"},"networkSlicingInfo":{"sNSSAI":{"sst":1}},"pduAddress":{"iPv6dynamicPrefixFlag":true,"pduIPv6AddresswithPrefix":"x:x:x:x::"},"pduSessionID":21,"pduType":"IPV6","ratType":"WLAN","servingCNPlmnId":{"mcc":"123","mnc":"456"},"sscMode":"SSC_MODE_1","startTime":"2025-11-10T14:29:29Z"},"userInformation":{"roamerInOut":"IN_BOUND","servedGPSI":"msisdn-12345678901"},"userLocationinfo":{"n3gaLocation":{"portNumber":4505,"ueIpv4Addr":"x.x.x.x"}}},"subscriberIdentifier":{"subscriberIdentityType":"SUPI","supi":"imsi-1234567891011121"}}}

master-2 42013075464a[2621]: 2023/09/10 15:00:00.063 [ERROR] [nrfClient.SendMesg.NRF] FHI status 504 timediff 1000332537, Uri: http://10.10.10.2:1090/OFFLINE/nchf-convergedcharging/v2, retryCount = 0 loopMaxRetry = 0, maxRetry = 0

master-2 42013075464a[2621]: 2023/09/10 15:00:00.063 [ERROR] [nrfClient.Discovery.nrf] Message send failed, response [Type:CHF Http2_Status:504 FailAction:FailureContinueAction MsgType:3587 ServiceName:nchf-convergedcharging SelectedProfileName:"CHF-OFF" FailureProfile:"Fail-H-CHF-OFF" GroupID:"CHF-*" ]

master-2 42013075464a[2621]: ***********************************************

Verificações SMF

No SMF, verifique os peers e seu tempo conectado em relação ao endpoint que relatou o problema.

smf# show peers

GR                                                                                POD              CONNECTED              ADDITIONAL

INSTANCE  ENDPOINT        LOCAL ADDRESS         PEER ADDRESS           DIRECTION  INSTANCE   TYPE  TIME           RPC     DETAILS     INTERFACE NAME     VRF

--------------------------------------------------------------------------------------------------------------------------------------------------------------

1         <none>          192.168.1.1        10.10.10.2:1090      Outbound   rest-ep-0  Rest  4 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.2        10.10.10.2:1090      Outbound   rest-ep-1  Rest  4 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.3        10.10.10.1:1090     Outbound   rest-ep-2  Rest  4 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.3        10.10.10.2:1090      Outbound   rest-ep-2  Rest  4 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.4        10.10.10.1:1090     Outbound   rest-ep-3  Rest  4 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.2        10.10.10.1:1090     Outbound   rest-ep-1  Rest  4 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.4        10.10.10.2:1090      Outbound   rest-ep-3  Rest  2 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.1        10.10.10.1:1090     Outbound   rest-ep-0  Rest  4 hours        CHF     <none>      n40                NA

// CHF related profiles

profile network-element chf CHF-OFFLINE

nf-client-profile        CHF-OFF

failure-handling-profile Fail-H-CHF-OFF

discovery local

exit

// Here is configuration for CHF profile where all peers are dead

profile nf-client nf-type chf

chf-profile CHF-OFF

locality LOC1

priority 1

service name type nchf-convergedcharging

responsetimeout 1000

endpoint-profile epprof

capacity   10

api-root   OFFLINE

uri-scheme http

version

uri-version v2

exit

exit

endpoint-name ep1

priority 1

capacity 10

primary ip-address ipv4 10.10.10.1

primary ip-address port 1090

exit

endpoint-name ep2

priority 2

capacity 10

primary ip-address ipv4 10.10.10.2

primary ip-address port 1090

exit

exit

exit

exit

exit

// Failure handling that in case of timeout (HTTP code 504) then try secondary server one time and then proceed with continuing the session

profile nf-client-failure nf-type chf

profile failure-handling Fail-H-CHF-OFF

service name type nchf-convergedcharging

responsetimeout 1000

message type ChfConvergedchargingCreate

status-code httpv2 504

retry  1

action continue

exit

exit

message type ChfConvergedchargingUpdate

status-code httpv2 504

retry  1

action continue

exit

exit

message type ChfConvergedchargingDelete

status-code httpv2 504

retry  1

action continue

exit

exit

exit

Cheques Grafana

A correlação direta entre o HTTP 504 Timeout e a hora do problema foi observada.

query: sum(increase(smf_restep_http_msg_total{nf_type="chf", namespace=~"$namespace"}[15m])) by (api_name, response_cause, response_status)

Verificações do Nexus

Verifique se houve flaps.

Nexus# show logging last 500 | include BFD

Solução

A solução para esse problema varia nesse caso porque SMF é o cliente e CHF é o servidor.

A perda de conexão não foi causada pelo SMF.