Contents

Introduction

Exemplo de log CLI do roteador

Conteúdo da flash do roteador

Reformatando a flash do AP

Conectar ao AP802

Copiar o IOS do AP na flash do roteador

Extrair IOS AP

Configurar o AP para inicializar a nova imagem do IOS

Limpe a memória flash do roteador e configure para o modo autônomo

Como saber se um ISR tem AP801 ou AP802

Introduction

Este documento mostra como executar a recuperação de imagem de ponto de acesso em um ISR (Integrated Services Router) com um AP802 incorporado.  O método descrito aqui baseia-se no fato de que a partição flash do AP802 é diretamente acessível a partir do roteador do host.  Esta técnica não pode ser usada de um roteador com um AP801 incorporado; nessas plataformas, você precisará executar a recuperação de imagem do AP (access point) a partir do console do AP801 (bootloader.) (Como saber se você tem um AP801 ou AP802).

Exemplo de log CLI do roteador

O exemplo abaixo foi executado em um 819HWD executando IOS (Sistema Operacional de Internetwork) 15.2(4)M5.

Conteúdo da flash do roteador

819HWD#dir all-filesystems

[ ... ]

Directory of flash:1:/

2 -rw- 100041 Aug 1 2014 19:37:46 +00:00 event.log

25 -rw- 215 Sep 15 2014 17:17:38 +00:00 env_vars

4 -rw- 125729 Aug 1 2014 12:29:16 +00:00 event.capwap

5 -rw- 281 Jun 9 2014 23:28:12 +00:00 info

6 -rw- 8216 Sep 15 2014 17:17:50 +00:00 private-multiple-fs

7 drw- 0 Dec 26 2013 19:52:46 +00:00 ap802-rcvk9w8-mx

17 -rw- 3072 Dec 26 2013 20:02:30 +00:00 cpconfig-ap802.cfg

3 -rw- 0 Sep 15 2014 17:18:02 +00:00 config.txt

18 -rw- 5 Jun 25 2014 21:06:00 +00:00 private-config

19 -rw- 64 Jun 24 2014 23:12:10 +00:00 sensord_CSPRNG1

20 -rw- 64 Jun 24 2014 23:21:44 +00:00 sensord_CSPRNG0

21 drw- 0 Jul 31 2014 18:29:32 +00:00 configs

Reformatando a flash do AP

O flash:1: filesystem é a partição usada pelo AP802.  Em nosso teste, formataremos esse sistema de arquivos para limpá-lo e, em seguida, reinicializaremos o AP802 para que ele seja inicializado no carregador de inicialização do AP. (Nota: não reformate a flash do AP a menos que necessário - isso é feito aqui para fins ilustrativos.)

819HWD#format flash:1:/

Format operation may take a while. Continue? [confirm]y

Format operation will destroy all data in "flash:1:". Continue? [confirm]y

Format: All system sectors written. OK...

Format: Total sectors in formatted partition: 80801

Format: Total bytes in formatted partition: 41370112

Format: Operation completed successfully.

Format of flash:1: complete

819HWD#service-module wlan-ap 0 reset

Use reset only to recover from shutdown or failed state

AP config will not be saved

Do you want to reset?[confirm]y

Trying to reload Service Module wlan-ap0.

Pause - wait for open files to finish...

819HWD#

*Sep 15 17:28:30.232: %SECONDCORE-5-BOOTSTAGE: ROMMON on 2nd core UP

*Sep 15 17:28:30.248: %SECONDCORE-5-BOOTSTAGE: AP-BOOTLOADER on 2nd core UP

Conectar ao AP802

Conecte-se ao console do AP802 para verificar se sua memória flash agora está vazia.

819HWD#service-module wlan-ap 0 session

Trying 192.168.148.8, 2002 ... Open

Connecting to AP console, enter Ctrl-^ followed by x,

then "disconnect" to return to router prompt

ap: dir flash:

Directory of flash:/

41168896 bytes available (139264 bytes used)

ap:

Ctrl-^x

819HWD#disco

Closing connection to 192.168.148.8 [confirm]y

Copiar o IOS do AP na flash do roteador

Copie o tronco IOS desejado de um servidor TFTP (Trivial File Transfer Protocol) na partição flash principal do roteador.  Nesse caso, usamos ap802-k9w7-tar.152-4.JB5.tar, que é IOS autônomo 15.2(4)JB5.  (Consulte o artigo Understanding Access Point IOS Images.)

819HWD#copy tftp flash:

Address or name of remote host [192.168.148.1]?

Source filename [/192.168.148.1/ap802-k9w7-tar.152-4.JB5.tar]? ap802-k9w7-tar.152-4.JB5.tar

Destination filename [ap802-k9w7-tar.152-4.JB5.tar]?

Accessing tftp://192.168.148.1/ap802-k9w7-tar.152-4.JB5.tar...

Loading ap802-k9w7-tar.152-4.JB5.tar from 192.168.148.1 (via GigabitEthernet0): !!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

[OK - 13834240 bytes]

13834240 bytes copied in 46.368 secs (298357 bytes/sec)

Extrair IOS AP

Desagrupe o tronco na flash do AP (flash:1:), usando o comando archive tar /xtract.

819HWD#archive tar /xtract ap802-k9w7-tar.152-4.JB5.tar flash:1:

extracting info (282 bytes)

ap802-k9w7-mx.152-4.JB5/ (directory)

ap802-k9w7-mx.152-4.JB5/html/ (directory)

[ ... ]

extracting info.ver (282 bytes)

819HWD#dir flash:1:

Directory of flash:1:/

4 -rw- 282 Sep 15 2014 17:31:40 +00:00 info

5 drw- 0 Sep 15 2014 17:31:42 +00:00 ap802-k9w7-mx.152-4.JB5

199 -rw- 282 Sep 15 2014 17:33:38 +00:00 info.ver

41308160 bytes total (26963968 bytes free)

Configurar o AP para inicializar a nova imagem do IOS

Use o console para acessar o carregador de inicialização do AP802 e configure-o para inicializar a imagem do IOS.  Observe que a imagem do IOS do AP é normalmente chamada de flash:/platform-featureset-mx.version/platform-featureset-mx-version.  Em seguida, inicialize o AP IOS.

819HWD#service-module wlan-ap 0 session

Trying 192.168.148.8, 2002 ... Open

ap: dir flash:

Directory of flash:/

4 -rw- 282

info

5 drw- 0

ap802-k9w7-mx.152-4.JB5

199 -rw- 282

info.ver

26963968 bytes available (14344192 bytes used)

ap:

set BOOT flash:/ap802-k9w7-mx.152-4.JB5/ap802-k9w7-mx.152-4.JB5

ap: reset

Are you sure you want to reset the system (y/n)?y

System resetting...

*Sep 15 17:35:12.758: %SECONDCORE-5-BOOTSTAGE: AP-IOS on 2nd core SAFE FOR RESET

IOS Bootloader - Starting system.

[ ... ]

*Sep 15 17:35:25.329: %SECONDCORE-5-BOOTSTAGE: ROMMON on 2nd core UP

*Sep 15 17:35:25.345: %SECONDCORE-5-BOOTSTAGE: AP-BOOTLOADER on 2nd core UPLoading "flash:/ap802-k9w7-mx.152-4.JB5/ap802-k9w7-mx.152-4.JB5"...###############################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################

File "flash:/ap802-k9w7-mx.152-4.JB5/ap802-k9w7-mx.152-4.JB5" uncompressed and installed, entry point: 0x18003000

[ ... ]

Cisco IOS Software, AP802 Software (AP802-K9W7-M), Version 15.2(4)JB5, RELEASE SOFTWARE (fc1)

[ ... ]

*Sep 15 17:37:29.371: %SECONDCORE-5-BOOTSTAGE: AP-IOS on 2nd core UP

*Sep 15 17:37:37.435: %WLAN_AP_SM-6-UNIFIED_IMAGE: Embedded AP will change boot image to mini-IOS also called LWAPP recovery

Please check router config to ensure connectivity between WLC and AP

Use service-module wlan-ap 0 reload to boot up mini-IOS image on AP

Save the autonomous configuration file with a file name other than

flash:[config.txt] as it will be erased upon AP reload

Press RETURN to get started!

ap>

Ctrl-^x 819HWD#disco

Closing connection to 192.168.148.8 [confirm]y

819HWD#

Limpe a memória flash do roteador e configure para o modo autônomo

Agora, exclua o tronco da memória flash do roteador, pois ele não é mais necessário.  Enderece também a mensagem "WLAN_AP_SM-6-UNIFIED_IMAGE", que indica que o roteador acha que o AP deve estar executando o IOS leve, então precisamos usar o comando service-module-wlan n botimage para informar ao roteador que o AP está executando autônomo (ou leve).

819HWD#del flash:/ap802-k9w7-tar.152-4.JB5.tar

Delete filename [ap802-k9w7-tar.152-4.JB5.tar]?

Delete flash:/ap802-k9w7-tar.152-4.JB5.tar? [confirm]

819HWD#conf t

Enter configuration commands, one per line. End with CNTL/Z.

819HWD(config)#service-module wlan-ap 0 bootimage autonomous

819HWD(config)#end

819HWD#wri

Building configuration...[OK]

Como saber se um ISR tem AP801 ou AP802

P: Como você sabe se um ISR tem um AP801 ou um AP802?

A1. Faça um show version no AP.

A2. http://www.cisco.com/c/en/us/products/routers/800-series-routers/brochure-listing.html > Quadro comparativo do ISR Cisco 800 Series