Contents

Introdução

Pré-requisitos

Requisitos

Componentes Utilizados

Informações de Apoio

Configurar

Diagrama de Rede

Objetivo

Verificação inicial

Configurações

Validação

Summary

Informações Relacionadas

Introdução

Este documento descreve o procedimento para configurar os Refletores de Rota do Protocolo de Gateway de Borda (BGP) no Nexus 9000 Series.

Pré-requisitos

Requisitos

A Cisco recomenda que você tenha conhecimento destes tópicos:

- Switches Nexus

- BGP

Componentes Utilizados

Este documento não se restringe a versões de software e hardware específicas.

As informações neste documento foram criadas a partir de dispositivos em um ambiente de laboratório específico. Todos os dispositivos utilizados neste documento foram iniciados com uma configuração (padrão) inicial. Se sua rede estiver em produção, certifique-se de que você compreende o impacto potencial de qualquer comando que você planeja aplicar.

Informações de Apoio

O mecanismo que o BGP usa para evitar loops de roteamento é adicionando seu próprio número de sistema autônomo (ASN) ao atributo AS PATH. Para uma topologia IBGP, as atualizações não modificam o atributo AS-PATH, pois pertencem ao mesmo ASN, o que pode causar um loop de roteamento.

Se o prefixo de BGP for recebido de um peer de IBGP, esse prefixo não poderá ser anunciado para outro vizinho de IBGP. O BGP usa sua regra de split horizon para evitar loops dentro do mesmo ASN.

Essa regra força você a ter uma topologia full-mesh para trocar prefixos com cada vizinho IBGP. Para grandes redes, ter um cenário de malha completa não é escalável, pois usa recursos excessivos para criar os peers.

As alternativas para uma topologia de malha completa para iBGP são:

- Reflexão de rota

- Confederações

Este documento concentra-se no uso apenas do Refletor de Rota BGP.

O uso de refletores de rota supera a limitação de malha completa. Um Refletor de Rota é um dispositivo designado dentro do AS (Sistema Autônomo) que reflete os prefixos iBGP para outros roteadores no mesmo AS.

Configurar

Para verificar o guia de configuração dos Refletores de Rota BGP, consulte Configuração de BGP Avançado

Diagrama de Rede

Nesta figura, o Nexus R2, Nexus R3, Nexus 4, Nexus R5 e Nexus R6 estabelecem uma vizinhança iBGP. Além disso, o Nexus R1 e o Nexus R5 estabelecem uma vizinhança eBGP.

Objetivo

Troque as redes geradas pelo Nexus R1 para todos os Nexus dentro do mesmo 65000 ASN.

Verificação inicial

O Nexus R1 executa o anúncio dos prefixos:

R1# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 78, Local Router ID is 192.168.1.1

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-i

njected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - b

est2

Network            Next Hop            Metric     LocPrf     Weight Path

*>r192.168.1.0/30     0.0.0.0                  0        100      32768 ?

*>r192.168.2.0/30     0.0.0.0                  0        100      32768 ?

*>r192.168.3.0/30     0.0.0.0                  0        100      32768 ?

*>r192.168.4.0/30     0.0.0.0                  0        100      32768 ?

*>r192.168.5.0/30     0.0.0.0                  0        100      32768 ?

R1#

O Nexus R5 recebe o anúncio do Nexus R1 que é uma sessão eBGP.

Nexus R5

R5# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 123, Local Router ID is 172.16.1.2

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

*>r10.1.1.4/30        0.0.0.0                  0        100      32768 ?

*>r10.1.1.8/30        0.0.0.0                  0        100      32768 ?

*>r172.16.1.0/30      0.0.0.0                  0        100      32768 ?

*>e192.168.1.0/30     172.16.1.1               0                     0 64512 ?

*>e192.168.2.0/30     172.16.1.1               0                     0 64512 ?

*>e192.168.3.0/30     172.16.1.1               0                     0 64512 ?

*>e192.168.4.0/30     172.16.1.1               0                     0 64512 ?

*>e192.168.5.0/30     172.16.1.1               0                     0 64512 ?

R5#

O Nexus R5 anuncia os prefixos para seus pares iBGP Nexus R2 e R6.

R2# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 33, Local Router ID is 10.1.1.6

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-i

njected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - b

est2

Network            Next Hop            Metric     LocPrf     Weight Path

*>i10.1.1.4/30        10.1.1.5                 0        100          0 ?

*>i10.1.1.8/30        10.1.1.5                 0        100          0 ?

*>i172.16.1.0/30      10.1.1.5                 0        100          0 ?

*>i192.168.1.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.2.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.3.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.4.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.5.0/30     172.16.1.1               0        100          0 64512 ?

R2#

R6# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 33, Local Router ID is 10.1.1.10

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

*>i10.1.1.4/30        10.1.1.9                 0        100          0 ?

*>i10.1.1.8/30        10.1.1.9                 0        100          0 ?

*>i172.16.1.0/30      10.1.1.9                 0        100          0 ?

*>i192.168.1.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.2.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.3.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.4.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.5.0/30     172.16.1.1               0        100          0 64512 ?

R6#

Pela regra de prevenção de loop, o BGP não anuncia nenhum prefixo aprendido por um peer iBGP para outros peers iBGP.

R2# show ip bgp neighbors 10.1.2.2 advertised-routes

Peer 10.1.2.2 routes for address family IPv4 Unicast:

BGP table version is 88, Local Router ID is 10.150.0.1

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-i

njected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - b

est2

Network            Next Hop            Metric     LocPrf     Weight Path

*>r10.1.1.4/30        0.0.0.0                  0        100      32768 ?

*>r10.1.2.0/30        0.0.0.0                  0        100      32768 ?

*>r10.1.2.4/30        0.0.0.0                  0        100      32768 ?

*>r10.1.2.8/30        0.0.0.0                  0        100      32768 ?

*>r10.150.0.0/30      0.0.0.0                  0        100      32768 ?

R2#

Nexus R3 e Nexus R4 não recebem os prefixos gerados pelo Nexus R1.

R3# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 28, Local Router ID is 10.100.100.1

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

*>l10.100.100.0/24    0.0.0.0                           100      32768 i

R4# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 6, Local Router ID is 10.200.200.1

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

*>l10.200.200.0/24    0.0.0.0                           100      32768 i

R4#

Configurações

Para a topologia acima, os dispositivos selecionados a serem transformados em um refletor de rota são o Nexus R2 e o Nexus R6, pois esses dispositivos têm conexão com todos os peers iBGP dentro do mesmo ASN.

Observação: a configuração do refletor de rota causa uma redefinição para cada par bgp modificado. Essa configuração deve ser feita em uma janela de manutenção.

Observação: pelo projeto de topologia, os Nexus R2 e R6 são convertidos em refletores de rota para 65000 ASN.

Nexus R1

R1# show run bgp

!Command: show running-config bgp

!Running configuration last done at: Wed Jan 31 02:43:31 2024

!Time: Wed Jan 31 23:24:28 2024

version 10.2(5) Bios:version 05.47

feature bgp

router bgp 64512

address-family ipv4 unicast

redistribute direct route-map REDISTRIBUTE_LOCAL

neighbor 172.16.1.2

remote-as 65000

address-family ipv4 unicast

R1#

Nexus R2

R2# show run bgp

!Command: show running-config bgp

!Running configuration last done at: Wed Jan 31 03:10:49 2024

!Time: Wed Jan 31 23:24:15 2024

version 10.2(5) Bios:version 05.47

feature bgp

router bgp 65000

cluster-id 10.150.0.1

address-family ipv4 unicast

redistribute direct route-map ALLOW

neighbor 10.1.1.5

remote-as 65000

address-family ipv4 unicast

route-reflector-client

neighbor 10.1.2.2

remote-as 65000

address-family ipv4 unicast

route-reflector-client

neighbor 10.1.2.6

remote-as 65000

address-family ipv4 unicast

route-reflector-client

neighbor 10.1.2.10

remote-as 65000

address-family ipv4 unicast

route-reflector-client

R2#

Nexus R3

R3# show run bgp

!Command: show running-config bgp

!Running configuration last done at: Wed Jan 31 02:49:05 2024

!Time: Wed Jan 31 23:10:07 2024

version 10.2(5) Bios:version 05.47

feature bgp

router bgp 65000

address-family ipv4 unicast

network 10.100.100.0/24

neighbor 10.1.2.5

remote-as 65000

address-family ipv4 unicast

neighbor 10.1.3.5

remote-as 65000

address-family ipv4 unicast

R3#

Nexus R4

R4# show run bgp

!Command: show running-config bgp

!Running configuration last done at: Wed Jan 31 02:56:11 2024

!Time: Wed Jan 31 23:00:44 2024

version 10.2(5) Bios:version 05.47

feature bgp

router bgp 65000

address-family ipv4 unicast

network 10.200.200.0/24

neighbor 10.1.2.1

remote-as 65000

address-family ipv4 unicast

neighbor 10.1.3.1

remote-as 65000

address-family ipv4 unicast

R4#

Nexus R5

R5# show run bgp

!Command: show running-config bgp

!Running configuration last done at: Wed Jan 31 02:48:38 2024

!Time: Wed Jan 31 23:24:15 2024

version 10.2(5) Bios:version 05.47

feature bgp

router bgp 65000

address-family ipv4 unicast

redistribute direct route-map ALLOW

neighbor 10.1.1.6

remote-as 65000

address-family ipv4 unicast

neighbor 10.1.1.10

remote-as 65000

address-family ipv4 unicast

neighbor 172.16.1.1

remote-as 64512

address-family ipv4 unicast

R5#

Nexus R6

R6# show run bgp

!Command: show running-config bgp

!Running configuration last done at: Wed Jan 31 03:12:40 2024

!Time: Wed Jan 31 23:24:18 2024

version 10.2(5) Bios:version 05.47

feature bgp

router bgp 65000

cluster-id 10.160.0.1

address-family ipv4 unicast

redistribute direct route-map ALLOW

neighbor 10.1.1.9

remote-as 65000

address-family ipv4 unicast

route-reflector-client

neighbor 10.1.2.9

remote-as 65000

address-family ipv4 unicast

route-reflector-client

neighbor 10.1.3.2

remote-as 65000

address-family ipv4 unicast

route-reflector-client

neighbor 10.1.3.6

remote-as 65000

address-family ipv4 unicast

route-reflector-client

R6#

Validação

Depois de transformar o Nexus R2 e o Nexus R6 como refletor de rota, os prefixos são anunciados aos peers do iBGP.  .

R2# show ip bgp neighbors 10.1.2.2 advertised-routes

Peer 10.1.2.2 routes for address family IPv4 Unicast:

BGP table version is 22, Local Router ID is 10.150.0.1

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-i

njected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - b

est2

Network            Next Hop            Metric     LocPrf     Weight Path

*>r10.1.1.4/30        0.0.0.0                  0        100      32768 ?

*>i10.1.1.8/30        10.1.1.5                 0        100          0 ?

*>r10.1.2.0/30        0.0.0.0                  0        100      32768 ?

*>r10.1.2.4/30        0.0.0.0                  0        100      32768 ?

*>r10.1.2.8/30        0.0.0.0                  0        100      32768 ?

*>i10.100.100.0/24    10.1.2.6                          100          0 i

*>r10.150.0.0/30      0.0.0.0                  0        100      32768 ?

*>i172.16.1.0/30      10.1.1.5                 0        100          0 ?

*>i192.168.1.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.2.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.3.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.4.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.5.0/30     172.16.1.1               0        100          0 64512 ?

R2#

Nexus R3 e Nexus R4 recebem os prefixos gerados pelo Nexus R1.

R3# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 108, Local Router ID is 10.100.100.1

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

* i10.1.1.4/30        10.1.2.9                 0        100          0 ?

*>i                   10.1.2.5                 0        100          0 ?

*>i10.1.1.8/30        10.1.3.5                 0        100          0 ?

* i                   10.1.2.10                0        100          0 ?

* i10.1.2.0/30        10.1.2.9                 0        100          0 ?

*>i                   10.1.2.5                 0        100          0 ?

* i10.1.2.4/30        10.1.2.9                 0        100          0 ?

*>i                   10.1.2.5                 0        100          0 ?

* i10.1.2.8/30        10.1.3.5                 0        100          0 ?

*>i                   10.1.2.5                 0        100          0 ?

* i10.1.3.0/30        10.1.2.10                0        100          0 ?

*>i                   10.1.3.5                 0        100          0 ?

* i10.1.3.4/30        10.1.2.10                0        100          0 ?

*>i                   10.1.3.5                 0        100          0 ?

*>l10.100.100.0/24    0.0.0.0                           100      32768 i

* i10.150.0.0/30      10.1.2.9                 0        100          0 ?

*>i                   10.1.2.5                 0        100          0 ?

* i10.160.0.0/30      10.1.2.10                0        100          0 ?

*>i                   10.1.3.5                 0        100          0 ?

* i10.200.200.0/24    10.1.3.2                          100          0 i

*>i                   10.1.2.2                          100          0 i

* i172.16.1.0/30      10.1.1.9                 0        100          0 ?

*>i                   10.1.1.5                 0        100          0 ?

* i192.168.1.0/30     172.16.1.1               0        100          0 64512 ?

*>i                   172.16.1.1               0        100          0 64512 ?

* i192.168.2.0/30     172.16.1.1               0        100          0 64512 ?

*>i                   172.16.1.1               0        100          0 64512 ?

* i192.168.3.0/30     172.16.1.1               0        100          0 64512 ?

*>i                   172.16.1.1               0        100          0 64512 ?

* i192.168.4.0/30     172.16.1.1               0        100          0 64512 ?

*>i                   172.16.1.1               0        100          0 64512 ?

* i192.168.5.0/30     172.16.1.1               0        100          0 64512 ?

*>i                   172.16.1.1               0        100          0 64512 ?

R3#

R4# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 78, Local Router ID is 10.200.200.1

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

* i10.1.1.4/30        10.1.2.9                 0        100          0 ?

*>i                   10.1.2.1                 0        100          0 ?

*>i10.1.1.8/30        10.1.3.1                 0        100          0 ?

* i                   10.1.2.10                0        100          0 ?

* i10.1.2.0/30        10.1.2.9                 0        100          0 ?

*>i                   10.1.2.1                 0        100          0 ?

* i10.1.2.4/30        10.1.2.9                 0        100          0 ?

*>i                   10.1.2.1                 0        100          0 ?

* i10.1.2.8/30        10.1.3.1                 0        100          0 ?

*>i                   10.1.2.1                 0        100          0 ?

* i10.1.3.0/30        10.1.2.10                0        100          0 ?

*>i                   10.1.3.1                 0        100          0 ?

* i10.1.3.4/30        10.1.2.10                0        100          0 ?

*>i                   10.1.3.1                 0        100          0 ?

* i10.100.100.0/24    10.1.3.6                          100          0 i

*>i                   10.1.2.6                          100          0 i

* i10.150.0.0/30      10.1.2.9                 0        100          0 ?

*>i                   10.1.2.1                 0        100          0 ?

* i10.160.0.0/30      10.1.2.10                0        100          0 ?

*>i                   10.1.3.1                 0        100          0 ?

*>l10.200.200.0/24    0.0.0.0                           100      32768 i

* i172.16.1.0/30      10.1.1.9                 0        100          0 ?

*>i                   10.1.1.5                 0        100          0 ?

* i192.168.1.0/30     172.16.1.1               0        100          0 64512 ?

*>i                   172.16.1.1               0        100          0 64512 ?

* i192.168.2.0/30     172.16.1.1               0        100          0 64512 ?

*>i                   172.16.1.1               0        100          0 64512 ?

* i192.168.3.0/30     172.16.1.1               0        100          0 64512 ?

*>i                   172.16.1.1               0        100          0 64512 ?

* i192.168.4.0/30     172.16.1.1               0        100          0 64512 ?

*>i                   172.16.1.1               0        100          0 64512 ?

* i192.168.5.0/30     172.16.1.1               0        100          0 64512 ?

*>i                   172.16.1.1               0        100          0 64512 ?

R4#

Os prefixos aprendidos pelo Refletor de Rota exibem o IP do par BGP e o ID do cluster.

R4# show ip bgp 192.168.2.0

BGP routing table information for VRF default, address family IPv4 Unicast

BGP routing table entry for 192.168.2.0/30, version 63

Paths: (2 available, best #2)

Flags: (0x8000001a) (high32 00000000) on xmit-list, is in urib, is best urib route, is in HW

Path type: internal, path is valid, not best reason: Neighbor Address, no labeled nexthop

AS-Path: 64512 , path sourced external to AS

172.16.1.1 (metric 0) from 10.1.3.1 (10.160.0.1)      >>>>>>> Peer IP (Cluster ID)

Origin incomplete, MED 0, localpref 100, weight 0

Originator: 172.16.1.2 Cluster list: 10.160.0.1

Advertised path-id 1

Path type: internal, path is valid, is best path, no labeled nexthop, in rib

AS-Path: 64512 , path sourced external to AS

172.16.1.1 (metric 0) from 10.1.2.1 (10.150.0.1)

Origin incomplete, MED 0, localpref 100, weight 0

Originator: 172.16.1.2 Cluster list: 10.150.0.1

Path-id 1 not advertised to any peer

R4#

Observação: as rotas recebidas pelo Nexus R3 e Nexus R4 pelo Refletor de Rota não são anunciadas para outro peer iBGP como parte da regra de prevenção de Loop.

Summary

A configuração do Refletor de Rota não requer uma configuração complexa para refletir as rotas para seus clientes iBGP, basta adicionar sob a família de endereços a palavra-chave "route-refletor-client", isso notifica o sistema para agir como um Refletor de Rota para esse vizinho.

Observação: para revisar confederações BGP no Nexus, consulte Configurar confederações BGP no Nexus 9000

Informações Relacionadas

- Suporte técnico e downloads da Cisco