Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Troubleshoot

Raiz STP

Interface STP

Investigação de BPDU com Ethanalyzer

Convergência de STP

Mapeamento externo de VLAN

Depurações de STP

O Nexus 5000 não processou BPDUs

Introduction

Este documento descreve vários métodos para solucionar problemas comuns relacionados ao Spanning Tree Protocol (STP).

Prerequisites

Requirements

A Cisco recomenda que você tenha conhecimento destes tópicos:

- CLI do sistema operacional Nexus

- STP

Componentes Utilizados

Este documento não se restringe a versões de software e hardware específicas.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Troubleshoot

Esta seção aborda alguns métodos para solucionar problemas comuns com o STP.

Raiz STP

Para solucionar um problema de STP, é fundamental saber qual switch é atualmente a raiz. O comando para mostrar a raiz do STP em um switch Nexus 5000 Series é:

Nexus-5000# show spanning-tree vlan 1

VLAN0001

Spanning tree enabled protocol rstp

Root ID    Priority    32769

Address     c84c.75fa.6000

This bridge is the root

Hello Time  2  sec  Max Age 20 sec  Forward Delay 15 sec

Bridge ID  Priority    32769  (priority 32768 sys-id-ext 1)

Address     c84c.75fa.6000

Hello Time  2  sec  Max Age 20 sec  Forward Delay 15 sec

Aqui estão alguns outros comandos relevantes:

Nexus-5000# show spanning-tree vlan 1 detail

Nexus-5000# show spanning-tree vlan 1 summary

Depois de determinar quem é a raiz atual, você pode verificar o histórico de eventos para ver se ele foi alterado e de onde as Notificações de alteração de topologia se originam.

Nexus-5000# show spanning-tree internal event-history tree 1 brief

2012:11:06 13h:44m:20s:528204us T_EV_UP

VLAN0001 [0000.0000.0000.0000 C 0 A  0 R none P none]

2012:11:06 13h:44m:21s:510394us T_UT_SBPDU

VLAN0001 [8001.547f.ee18.e441 C 0 A  0 R none P Po1]

2012:11:06 13h:44m:21s:515129us T_EV_M_FLUSH_L

VLAN0001 [1001.001b.54c2.5a42 C 6 A  5 R Po1 P none]

2012:11:06 13h:44m:23s:544632us T_EV_M_FLUSH_R

VLAN0001 [1001.001b.54c2.5a42 C 6 A  5 R Po1 P Po1]

2012:11:06 13h:44m:24s:510352us T_EV_M_FLUSH_R

VLAN0001 [1001.001b.54c2.5a42 C 6 A  5 R Po1 P Po1]

Tip: Aqui estão algumas definições para acrônimos que aparecem na saída dos comandos. SBPDU: Unidade de dados de protocolo de ponte superior recebida; FLUSH_L: descarga local; FLUSH_R: Liberar do switch remoto.

Note: As versões do NX-OS anteriores à versão 5.1(3)N1(1) não registram mais de 149 eventos e o log não é executado.

Interface STP

Esse comando é usado para exibir os eventos de uma interface.

Nexus-5000# show spanning-tree internal event-history tree 1 interface

ethernet 1/3 brief

2012:11:05 13h:42m:20s:508027us P_EV_UP   Eth1/3   [S DIS  R Unkw  A  0  Inc no]

2012:11:05 13h:42m:20s:508077us P_STATE   Eth1/3   [S BLK  R Desg  A  0  Inc no]

2012:11:05 13h:42m:20s:508294us P_STATE   Eth1/3   [S LRN  R Desg  A  0  Inc no]

2012:11:05 13h:42m:20s:508326us P_STATE   Eth1/3   [S FWD  R Desg  A  0  Inc no]

Esse comando é usado para investigar alterações de STP em uma interface. Esta saída oferece muitos detalhes:

Nexus-5000# show spanning-tree internal info tree 1 interface port-channel 11

------- STP Port Info (vdc 1, tree 1, port Po11) ---------

dot1d info: port_num=4106, ifi=0x1600000a (port-channel11)

ISSU FALSE non-disr, prop 0, ag 0, flush 0 peer_not_disputed_count 0

if_index               0x1600000a

namestring             port-channel11

....................        cut to save space        ............

stats

fwd_transition_count   1       bpdus_in      40861   bpdus_out    40861

config_bpdu_in         0       rstp_bpdu_in  40861   tcn_bpdu_in  0

config_bpdu_out        0       rstp_bpdu_out 40861   tcn_bpdu_out 0

bpdufilter_drop_in     0

bpduguard_drop_in      0

err_dropped_in         0

sw_flood_in            0

....................        cut to save space        ............

Investigação de BPDU com Ethanalyzer

Esta seção descreve como usar o Ethanalyzer para capturar BPDUs:

Ethanalyzer local interface inbound-hi display-filter "vlan.id == 1 && stp"

Example:

Nexus-5000# ethanalyzer local interface inbound-hi display-filter "vlan.id

== 1 && stp"

Capturing on eth4

2013-05-11 13:55:39.280951 00:05:73:f5:d6:27 -> 01:00:0c:cc:cc:cd STP RST.

Root = 33768/00:05:73:ce:a9:7c  Cost = 1  Port = 0x900a

2013-05-11 13:55:40.372434 00:05:73:ce:a9:46 -> 01:00:0c:cc:cc:cd STP RST.

Root = 33768/00:05:73:ce:a9:7c  Cost = 0  Port = 0x900a

2013-05-11 13:55:41.359803 00:05:73:f5:d6:27 -> 01:00:0c:cc:cc:cd STP RST.

Root = 33768/00:05:73:ce:a9:7c  Cost = 1  Port = 0x900a

2013-05-11 13:55:42.372405 00:05:73:ce:a9:46 -> 01:00:0c:cc:cc:cd STP RST.

Root = 33768/00:05:73:ce:a9:7c  Cost = 0  Port = 0x900a

Para ver pacotes detalhados, use o comando detail:

Nexus-5000# ethanalyzer local interface inbound-hi detail display-filter

"vlan.id == 1 && stp"

Capturing on eth4

Frame 7 (68 bytes on wire, 68 bytes captured)

Arrival Time: May 11, 2013 13:57:02.382227000

[Time delta from previous captured frame: 0.000084000 seconds]

[Time delta from previous displayed frame: 1368280622.382227000 seconds]

[Time since reference or first frame: 1368280622.382227000 seconds]

Frame Number: 7

Frame Length: 68 bytes

Capture Length: 68 bytes

[Frame is marked: False]

[Protocols in frame: eth:vlan:llc:stp]

Ethernet II, Src: 00:05:73:ce:a9:46 (00:05:73:ce:a9:46), Dst: 01:00:0c:cc:cc:cd

(01:00:0c:cc:cc:cd)

Destination: 01:00:0c:cc:cc:cd (01:00:0c:cc:cc:cd)

Address: 01:00:0c:cc:cc:cd (01:00:0c:cc:cc:cd)

.... ...1 .... .... .... .... = IG bit: Group address (multicast/broadcast)

.... ..0. .... .... .... .... = LG bit: Globally unique address

(factory default)

Source: 00:05:73:ce:a9:46 (00:05:73:ce:a9:46)

Address: 00:05:73:ce:a9:46 (00:05:73:ce:a9:46)

.... ...0 .... .... .... .... = IG bit: Individual address (unicast)

.... ..0. .... .... .... .... = LG bit: Globally unique address

(factory default)

Type: 802.1Q Virtual LAN (0x8100)

802.1Q Virtual LAN

111. .... .... .... = Priority: 7

...0 .... .... .... = CFI: 0

.... 0000 0000 0001 = ID: 1

Length: 50

Logical-Link Control

DSAP: SNAP (0xaa)

IG Bit: Individual

SSAP: SNAP (0xaa)

CR Bit: Command

Control field: U, func=UI (0x03)

000. 00.. = Command: Unnumbered Information (0x00)

.... ..11 = Frame type: Unnumbered frame (0x03)

Organization Code: Cisco (0x00000c)

PID: PVSTP+ (0x010b)

Spanning Tree Protocol

Protocol Identifier: Spanning Tree Protocol (0x0000)

Protocol Version Identifier: Rapid Spanning Tree (2)

BPDU Type: Rapid/Multiple Spanning Tree (0x02)

BPDU flags: 0x3c (Forwarding, Learning, Port Role: Designated)

0... .... = Topology Change Acknowledgment: No

.0.. .... = Agreement: No

..1. .... = Forwarding: Yes

...1 .... = Learning: Yes

.... 11.. = Port Role: Designated (3)

.... ..0. = Proposal: No

.... ...0 = Topology Change: No

Root Identifier: 33768 / 00:05:73:ce:a9:7c

Root Path Cost: 0

Bridge Identifier: 33768 / 00:05:73:ce:a9:7c

Port identifier: 0x900a

Message Age: 0

Max Age: 20

Hello Time: 2

Forward Delay: 15

Version 1 Length: 0

Para gravar essas informações em um arquivo PCAP, use este comando:

Nexus-5000# ethanalyzer local interface inbound-hi display-filter

"vlan.id == 1 && stp" write bootflash:bpdu.pcap

Capturing on eth4

3  << Lists how many packets were captured.

Nas capturas de BPDU, o endereço MAC origem é o endereço MAC da interface do dispositivo da extremidade oposta.

Na captura do Ethanalyzer, a porta aparece em um formato hexadecimal. Para identificar o número da porta, é necessário primeiro converter o número em hexadecimal:

0x900a (do rastreamento anterior) = 36874

Este é o comando que decodifica esse número em uma porta:

Nexus-5000# show spanning-tree internal info all  |

grep -b 50 "port_id                36874" | grep "Port Info"

------- STP Port Info (vdc 1, tree 1, port Po11) ----------

------- STP Port Info (vdc 1, tree 300, port Po11) ---------

------- STP Port Info (vdc 1, tree 800, port Po11) ---------

------- STP Port Info (vdc 1, tree 801, port Po11) ---------

------- STP Port Info (vdc 1, tree 802, port Po11) ---------

------- STP Port Info (vdc 1, tree 803, port Po11) ---------

------- STP Port Info (vdc 1, tree 999, port Po11) ---------

Nesse caso, é o canal de porta 11.

Convergência de STP

Se precisar investigar a convergência do STP, use o comando show spanning-tree internal interactions. Esse comando fornece informações sobre os eventos que dispararam as alterações do STP. É importante coletar essas informações assim que o problema ocorrer, pois os registros são grandes e são finalizados com o tempo.

Nexus-5000#show spanning-tree internal interactions

- Event:(null), length:123, at 81332 usecs after Sat May 11 12:01:47 2013

Success: pixm_send_set_mult_cbl_vlans_for_multiple_ports, num ports 1

VDC 1, state FWD, rr_token 0x21b9c3 msg_size 584

- Event:(null), length:140, at 81209 usecs after Sat May 11 12:01:47 2013

vb_vlan_shim_set_vlans_multi_port_state(2733): Req (type=12) to PIXM

vdc 1, inst 0, num ports 1, state FWD

[Po17 v 800-803,999-1000]

- Event:(null), length:123, at 779644 usecs after Sat May 11 12:01:46 2013

Success: pixm_send_set_mult_cbl_vlans_for_multiple_ports, num ports 1

VDC 1, state FWD, rr_token 0x21b99a msg_size 544<

- Event:(null), length:127, at 779511 usecs after Sat May 11 12:01:46 2013

vb_vlan_shim_set_vlans_multi_port_state(2733): Req (type=12) to PIXM

vdc 1, inst 0, num ports 1, state FWD

[Po17 v 300]

- Event:(null), length:123, at 159142 usecs after Sat May 11 12:01:32 2013

Success: pixm_send_set_mult_cbl_vlans_for_multiple_ports, num ports 1

VDC 1, state LRN, rr_token 0x21b832 msg_size 584

- Event:(null), length:140, at 159023 usecs after Sat May 11 12:01:32 2013

vb_vlan_shim_set_vlans_multi_port_state(2733): Req (type=12) to PIXM

vdc 1, inst 0, num ports 1, state LRN

[Po17 v 800-803,999-1000]

- Event:(null), length:123, at 858895 usecs after Sat May 11 12:01:31 2013

Success: pixm_send_set_mult_cbl_vlans_for_multiple_ports, num ports 1

VDC 1, state LRN, rr_token 0x21b80b msg_size 544

- Event:(null), length:127, at 858772 usecs after Sat May 11 12:01:31 2013

vb_vlan_shim_set_vlans_multi_port_state(2733): Req (type=12) to PIXM

vdc 1, inst 0, num ports 1, state LRN

[Po17 v 300]

.................... cut to save space ............

Mapeamento externo de VLAN

Os switches Nexus 5000 Series usam VLANs internas para mapear para números de VLAN externos para encaminhamento. Às vezes, o ID da VLAN é o ID da VLAN interna. Para obter o mapeamento para uma VLAN externa, insira:

Nexus-5000# show platform afm info global

Gatos Hardware version 0

Hardware instance mapping

-------------------------

Hardware instance:  0  asic id: 0  slot num: 0

-------------- cut to save space  --------------------------

Hardware instance: 12  asic id: 1  slot num: 3

AFM Internal Status

-------------------

[unknown label                                     ]: 324

[no free statistics counter                        ]: 2

[number of verify                                  ]: 70

[number of commit                                  ]: 70

[number of request                                 ]: 785

[tcam stats full                                   ]: 2

Vlan mapping table

------------------

Ext-vlan: 1     -  Int-vlan: 65

Depurações de STP

Outra maneira de solucionar problemas do STP é usar depurações. No entanto, o uso de depurações STP pode causar um pico no uso da CPU, o que causa preocupações em alguns ambientes. Para reduzir drasticamente o uso da CPU durante a execução de depurações, use um filtro de depuração e uma atividade de log para um arquivo de log.

1. Crie o arquivo de log, que é salvo no log do diretório.

Nexus-5000#debug logfile spanning-tree.txt

Nexus-5548P-L3# dir log:

31 Nov 06 12:46:35 2012 dmesg

----- cut to save space----

7626 Nov 08 22:41:58 2012 messages

0 Nov 08 23:05:40 2012 spanning-tree.txt

4194304 Nov 08 22:39:05 2012 startupdebug

2. Execute a depuração.

Nexus-5000# debug spanning-tree bpdu_rx interface e1/30

<<< setup your spanning-tree for bpdus

Nexus-5000# copy log:spanning-tree.txt bootflash:

Exemplo do arquivo de log:

2012 Nov 8 23:08:24.238953 stp: BPDU RX: vb 1 vlan 300, ifi 0x1a01d000

(Ethernet1/30)

2012 Nov 8 23:08:24.239095 stp: BPDU Rx: Received BPDU on vb 1 vlan 300

port Ethernet1/30 pkt_len 60 bpdu_len 36 netstack flags 0x00ed enc_type ieee

2012 Nov 8 23:08:35.968453 stp: RSTP(300): Ethernet1/30 superior msg

2012 Nov 8 23:08:35.968466 stp: RSTP(300): Ethernet1/30 rcvd info remaining 6

2012 Nov 8 23:08:36.928415 stp: BPDU RX: vb 1 vlan 300, ifi 0x1a01d000

(Ethernet1/30)

2012 Nov 8 23:08:36.928437 stp: BPDU Rx: Received BPDU on vb 1 vlan 300

port Ethernet1/30 pkt_len 60 bpdu_len 36 netstack flags 0x00ed enc_type ieee

2012 Nov 8 23:08:36.928476 stp: RSTP(300): msg on Ethernet1/30

....................        cut to save space        ............

O Nexus 5000 não processou BPDUs

Para solucionar esse problema, verifique o histórico de eventos para determinar se o switch Nexus 5000 Series assumiu a raiz. O Nexus 5000 assume a raiz se ele não processou BPDUs ou não os recebeu. Para investigar qual é a causa, você deve determinar se há outros switches conectados à ponte designada que também tenham esse problema. Se nenhuma outra ponte tiver o problema, é mais provável que o Nexus 5000 não tenha processado as BPDUs. Se outras bridges tiverem o problema, é mais provável que a bridge não tenha enviado as BPDUs.

Note: Coisas a serem lembradas ao solucionar problemas de STP e de canal de porta virtual (vPC). Somente o vPC Primary envia BPDUs. Quando o secundário do vPC é a raiz do STP, o Primário ainda envia as BPDUs. Se a raiz estiver conectada por meio de um vPC, somente os contadores de BPDU Rx serão incrementados primários, mesmo quando o Secundário os receber.