Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Conventions

Configurar

Diagrama de Rede

Instalar e configurar o novo supervisor

Verificar

Troubleshoot

Incompatibilidade de software entre os Supervisor Engines

Informações Relacionadas

Introduction

Este documento fornece um procedimento passo a passo para substituir um supervisor inválido em um Cisco Catalyst 6500 Virtual Switching System.

Um Sistema de Comutação Virtual (VSS - Virtual Switching System) consiste em dois chassis Catalyst 6500. Cada chassi é equipado com um único mecanismo supervisor. Se um dos supervisores morrer devido a uma falha de hardware, o supervisor substituto que vem com uma configuração padrão não se torna um membro do VSS automaticamente. Esse novo supervisor inicializa inicialmente no modo autônomo e requer a configuração do VSS para inicializar no modo VSS.

Prerequisites

Requirements

Certifique-se de atender a estes requisitos antes de tentar esta configuração:

- Copie a imagem válida do supervisor VSS ativo para um dispositivo compacto flash.

- Copie a configuração ativa do VSS para um dispositivo flash compacto (pode ser o mesmo).

Componentes Utilizados

As informações neste documento são baseadas nestas versões de software e hardware:

Cisco Catalyst 6500 Virtual Switching System 1440 no Cisco IOS® Software Release 12.2(33)SXH1 ou posterior

The information in this document was created from the devices in a specific lab environment. If your network is live, make sure that you understand the potential impact of any command.

Conventions

Consulte as Convenções de Dicas Técnicas da Cisco para obter mais informações sobre convenções de documentos.

Configurar

Nesta seção, você encontrará informações para configurar os recursos descritos neste documento.

Nota: Use a Command Lookup Tool (somente clientes registrados) para obter mais informações sobre os comandos usados nesta seção.

O novo supervisor exige que você inicialize com uma imagem e uma configuração válidas. A imagem pode ser copiada com TFTP ou um dispositivo compacto flash. Se a compact flash não estiver disponível, a imagem do software e o arquivo de configuração também poderão ser copiados com TFTP.

1. Copie a imagem válida do supervisor VSS ativo para um dispositivo compacto flash.

VSS#dir sup-bootdisk:

Directory of sup-bootdisk:/

1 -rwx 117668516 Jan 22 2008 11:53:58 +00:00 s72033-

ipservices_wan-vz.122-33.SXH1

2 -rwx 33554432 Aug 16 2007 12:40:22 +00:00 sea_log.dat

3 -rwx 7366 Aug 22 2007 20:05:42 +00:00 default-config

Observe que no modo VSS, os supervisores ativo e standby executam a mesma versão da imagem do software.

VSS#copy sup-bootdisk:s72033-ipservices_wan-vz.122-33.SXH1 disk0:

Destination filename [s72033-ipservices_wan-vz.122-33.SXH1]?

Copy in progress...CCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCC

CCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCC

!--- Output suppressed.

2. Copie a configuração atual do supervisor VSS ativo para um dispositivo compacto flash.

VSS#copy running-config disk0:

Destination filename [startup-config]?

11196 bytes copied in 0.712 secs (15725 bytes/sec)

Diagrama de Rede

Este documento utiliza a seguinte configuração de rede:

Falha do Supervisor do Switch 2

Instalar e configurar o novo supervisor

Conclua estes passos para instalar e configurar o novo supervisor:

1. Instale o novo supervisor no chassi e, caso os uplinks do supervisor sejam usados para VSL, conecte-os fisicamente. Inicialize a imagem a partir da flash compacta.

2. Apague o arquivo de configuração inicial do novo supervisor. Essa etapa é necessária para garantir que não haja nenhuma configuração obsoleta no novo supervisor.

3. Copie a imagem do software que foi copiada anteriormente para o dispositivo compact flash para o novo supervisor sup-bootdisk:

Router#copy disk0:s72033-ipservices_wan-vz.122-33.SXH1 sup-bootdisk:

Destination filename [s72033-ipservices_wan-vz.122-33.SXH1]?

Copy in progress ..CCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCC

CCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCC

117668516 bytes copied in 332.283 secs (354121 bytes/sec)

!--- Output suppressed.

!--- If you choose to download software image from a tftp server, connect one of the switch interfaces to the network in order to have connectivity to the tftp server. Configure IP address to the management interface; verify the connectivity between the switch and the tftp server.

!--- The management IP address should be different from what is already assigned to active VSS switch. !--- Configure management IP address

Router(config)#interface gig 1/3

Router(config-if)#ip address 10.10.10.100 255.255.255.0

Router(config-if)#no shutdown

!--- verify Management interface status and configuration

Router#show interface gig 1/3

GigabitEthernet1/3 is up, line protocol is up (connected)

Hardware is C6k 1000Mb 802.3, address is 0005.dce7.8180

(bia 0005.dce7.8180)

Internet address is 10.10.10.100/24

!--- Output omitted !--- If the TFTP server and switch management interface are not in the same layer-3 subnet, add a (default) route.

Router(config)#ip route 0.0.0.0 0.0.0.0 10.10.10.1

!--- verify IP connectivity between switch and TFTP server

Router#ping 10.20.20.200

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.20.20.200, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/1/4 ms

!---Copy the new software image into supervisor bootflash:

Router#copy tftp: sup-bootdisk:

Address or name of remote host []? 10.20.20.200

Source filename []? s72033-ipservices_wan-vz.122-33.SXH1

Destination filename [s72033-ipservices_wan-vz.122-33.SXH1]?

Copy in progress ..CCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCC

CCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCC

!--- Output omitted

4. Copie a configuração do supervisor ativo, que anteriormente tinha sido salva no dispositivo compact flash, para o novo arquivo de configuração de inicialização do supervisor.

Router#copy disk0:VSS.cfg startup-config

Destination filename [startup-config]?

11196 bytes copied in 7.460 secs (1501 bytes/sec)

Router#

Observação: essa etapa é crítica porque a configuração do VSS e todas as variáveis de inicialização necessárias para inicializar a imagem correta do software IOS são adicionadas.

!--- Highlighted VSS configuration commands are critical to boot up the supervisor in VSS mode. !--- Verify VSS configuration in the startup-config file

Router#more nvram:startup-config

!

hostname VSS

boot system flash sup-bootdisk:s72033-ipservices_wan-vz.122-33.SXH1

!--- Switch Virtual domain

is configured with respective switch priorities

switch virtual domain 1

switch mode virtual

!--- this command gets populated upon converting standalone switch to VSS mode. Make sure this command is part the configuration.

switch 1 priority 110

switch 2 priority 100

!--- Verify Virtual Switch Link (VSL) configuration

interface Port-channel1

no switchport

no ip address

switch virtual link 1

mls qos trust cos

no mls qos channel-consistency

!

interface Port-channel2

no switchport

no ip address

switch virtual link 2

mls qos trust cos

no mls qos channel-consistency

!--- Physical interfaces that are part of VSL

interface TenGigabitEthernet1/1/4

no switchport

no ip address

mls qos trust cos

channel-group 1 mode on

interface TenGigabitEthernet1/1/5

no switchport

no ip address

mls qos trust cos

channel-group 1 mode on

interface TenGigabitEthernet2/1/4

no switchport

no ip address

mls qos trust cos

channel-group 2 mode on

interface TenGigabitEthernet2/1/5

no switchport

no ip address

mls qos trust cos

channel-group 2 mode on

5. Configure o VSS Switch_ID que identifica um switch Catalyst 6500 em um domínio de switching virtual. Como o VSS pode consistir em apenas dois switches, você precisa escolher 1 ou 2 dependendo de quais valores estão definidos no switch ativo. Você não pode usar nenhum valor diferente de 1 ou 2.

!--- Verify active Switch_ID on the active switch

Router#switch read switch_num local

Read switch_num from Active rommon is 1

!--- Note that since Switch_ID=1 is used for active switch, we would define Switch_ID=2 in the new supervisor.

!--- Configure the Switch_ID on the supervisor.

!--- Below command sets a Switch_ID ROMMON variable. It is used during VSS boot up to identify a switch within a VSS domain. !--- Note that the Switch_ID doesn’t dictate the state (active vs. standby) of the supervisor.

Router#switch set switch_num 2 local

Set rommon's switch_num to 2

!--- Verify the Switch_ID configuration on the new supervisor.

Router#switch read switch_num local

Read switch_num from Active rommon is 2

6. Recarregue o switch de modo que, quando você recarregar, ele inicialize no modo VSS.

Cuidado: não salve sua configuração atual em startup-config neste momento. Se você fizer isso, o startup-config será substituído pela configuração padrão e o switch não inicializará no modo VSS.

Exemplo de saída CLI:

Router# reload

System configuration has been modified. Save? [yes/no]: no

Proceed with reload? [confirm]

00:25:07: %SYS-5-RELOAD: Reload requested by console.

Reload Reason: Reload Command.

00:26:49: %SYS-SP-3-LOGGER_FLUSHING:

System pausing to ensure console debugging output.

00:26:49: %OIR-SP-6-CONSOLE:

Changing console ownership to switch processor

!--- Output omitted !--- SP booting up, pay attention to the name of the image being loaded by SP

System Bootstrap, Version 8.5(1)

Copyright (c) 1994-2006 by cisco Systems, Inc.

Cat6k-Sup720/SP processor with 1048576 Kbytes of main memory

Autoboot executing command: “ boot system flash

sup-bootflash:s72033-ipservices_wan-vz.122-33.SXH1”

Loading image, please wait ...

Initializing ATA monitor library...

Self decompressing the image :

######################################

#####################################

Restricted Rights Legend

Use, duplication, or disclosure by the Government is

subject to restrictions as set forth in subparagraph

(c) of the Commercial Computer Software - Restricted

Rights clause at FAR sec. 52.227-19 and subparagraph

(c) (1) (ii) of the Rights in Technical Data and Computer

Software clause at DFARS sec. 252.227-7013.

cisco Systems, Inc.

170 West Tasman Drive

San Jose, California 95134-1706

Cisco IOS Software, s72033_sp Software

(s72033_sp-IPSERVICES_WAN-VM),

Version 12.2(33)SXH1, RELEASE SOFTWARE (fc3)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2008 by Cisco Systems, Inc.

Compiled Thu 17-Jan-08 04:38 by prod_rel_team

Image text-base: 0x01020150, data-base: 0x01021000

!--- VSS configuration pre-parsed during bootup

System detected Virtual Switch configuration...

Interface TenGigabitEthernet 2/8/4 is member of Portchannel 2

!--- output omitted

Initializing as Virtual Switch STANDBY processor

!--- VSL module ( supervisor in this scenario) brought up and role is resolved as standby since there is already a active VSS switch.

00:00:30: %VSL_BRINGUP-6-MODULE_UP:

VSL module in slot 8 switch 2 brought up

00:00:57: %VSLP-5-VSL_UP:

Ready for Role Resolution with Switch=1,

MAC=0014.1bc6.1c00 over 8/4

00:01:01: %VSLP-5-RRP_ROLE_RESOLVED:

Role resolved as STANDBY by VSLP

00:01:01: %VSL-5-VSL_CNTRL_LINK: New VSL Control Link 8/4

!--- RP is booting up

System Bootstrap, Version 12.2(17r)SX5, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 2006 by cisco Systems, Inc.

Cat6k-Sup720/RP platform with 1048576 Kbytes of main memory

Download Start

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

Restricted Rights Legend

Use, duplication, or disclosure by the Government is

subject to restrictions as set forth in subparagraph

(c) of the Commercial Computer Software - Restricted

Rights clause at FAR sec. 52.227-19 and subparagraph

(c) (1) (ii) of the Rights in Technical Data and Computer

Software clause at DFARS sec. 252.227-7013.

cisco Systems, Inc.

170 West Tasman Drive

San Jose, California 95134-1706

Cisco IOS Software, s72033_rp Software (s72033_rp-IPSERVICES_WAN-VM),

Version 12.2(33)SXH1, RELEASE SOFTWARE (fc3)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2008 by Cisco Systems, Inc.

Compiled Thu 17-Jan-08 04:04 by prod_rel_team

Image text-base: 0x01020150, data-base: 0x01021000

!--- output omitted

Press RETURN to get started!

!--- Look out for –- “%PFREDUN-SW2_SPSTBY-6-STANDBY: Initializing for SSO mode” in the active console to make sure stadby is running in SSO mode. !--- After standby boots up it’s console is locked

VSS-sdby>

Standby console disabled

VSS-sdby>

Standby console disabled

Observação: para configurar o VSS em várias sub-redes, a configuração em standby não é necessária no VSS. Os roteadores de gateway devem ser configurados como a SVI da VLAN.

Verificar

No momento, não há procedimento de verificação disponível para esta configuração.

A Output Interpreter Tool ( somente clientes registrados) (OIT) oferece suporte a determinados comandos show. Use a OIT para exibir uma análise da saída do comando show.

Troubleshoot

Esta seção fornece informações que podem ser usadas para o troubleshooting da sua configuração.

Incompatibilidade de software entre os Supervisor Engines

Se houver uma incompatibilidade de software entre os mecanismos de supervisor, o supervisor de standby é ativado no modo de redundância RPR (não no modo de redundância SSO) e o VSS não é totalmente inicializado.

Para resolver o problema, verifique se o software necessário está presente na memória flash do supervisor de standby e se as instruções de inicialização apontam para o software correto. Recarregue o supervisor de standby para que ele inicialize com o software correto e ingresse no VSS.

Informações Relacionadas

- Sistema de switching virtual Cisco Catalyst 6500 1440

- Suporte a Produtos de LAN

- Suporte de tecnologia de switching de LAN

- Suporte Técnico e Documentação - Cisco Systems