Contents

Introdução

Pré-requisitos

Requisitos

Componentes Utilizados

Informações de Apoio

Componentes do Catalyst

Material de Suporte

Configurar

Diagrama de Rede

Configurações

Verificar

Exemplo de saída do comando show

Catalyst 3560 Switch

Catalyst 6500 Switch

Informações Relacionadas

Introdução

Este documento descreve a diferença de entroncamento IEEE 802.1Q (dot1q) entre os switches Cisco Catalyst que executam o software Cisco IOS®.

Pré-requisitos

Requisitos

Certifique-se de atender a estes requisitos antes de tentar esta configuração:

- Conhecimento do entroncamento IEEE 802.1Q

- Conhecimento da configuração dos switches das séries Catalyst 3560 e Catalyst 6500 com o uso da Interface de Linha de Comando (CLI - Command Line Interface)

Componentes Utilizados

As informações neste documento são baseadas nestas versões de software e hardware:

- Switch Catalyst 3560 que executa o software Cisco IOS versão 12.2(25)SEA

- Switch Catalyst 6509 que executa o software Cisco IOS versão 12.1(26)E1

As informações neste documento foram criadas a partir de dispositivos em um ambiente de laboratório específico. Todos os dispositivos utilizados neste documento foram iniciados com uma configuração (padrão) inicial. Se a rede estiver ativa, certifique-se de que você entenda o impacto potencial de qualquer comando.

Informações de Apoio

Este documento fornece uma configuração de exemplo de entroncamento IEEE 802.1Q (dot1q) entre um switch Cisco Catalyst 3560 que executa o Cisco IOS® Software e um switch Catalyst 6500 Series. O entroncamento é um modo de conduzir o tráfego de vários VLANs por um link ponto a ponto entre dois dispositivos.

Em plataformas legadas, havia dois métodos para implementar o entroncamento Ethernet:

1. Inter-Switch Link Protocol (ISL) — Um protocolo proprietário da Cisco

2. 802.1Q — Um padrão IEEE

Componentes do Catalyst

A configuração do Catalyst 3560 e 6500 neste documento também se aplica a outros switches Catalyst que executam o Cisco IOS Software.

Observação: consulte este próximo documento para aprender sobre os métodos de entroncamento suportados por vários switches Catalyst:

- Requisitos do sistema para implementar o entroncamento em switches Catalyst

Observação: este documento inclui somente os arquivos de configuração dos switches e a saída dos  show   comandos de exemplo relacionados. Para obter detalhes sobre como configurar um tronco 802.1Q entre switches Catalyst, consulte estes próximos documentos:

- Seção Configuração de troncos de VLAN de Configuração de VLANs — Switches Catalyst 3560 Series

- Seção Noções básicas sobre troncos de VLAN de Interfaces Ethernet de Camada 2 — Switches Catalyst 4500 Series que executam o software Cisco IOS

Material de Suporte

O IEEE 802.1Q usa um mecanismo de marcação interno. O dispositivo de entroncamento insere uma marca de 4 bytes para identificar a VLAN à qual um quadro pertence e recalcula a sequência de verificação de quadro (FCS). Para obter mais informações, consulte estes documentos:

- Formato da estrutura do link interSwitch e do IEEE 802.1Q

Observação: a seguir, há observações importantes a serem lembradas para esta configuração:

- Qualquer interface Ethernet em um switch Catalyst 3560/3750 Series pode aceitar encapsulamento 802.1Q e ISL. A interface Ethernet em um switch Catalyst 3550 é uma porta de Camada 2 (L2), por padrão.

- Qualquer porta Ethernet em um switch Catalyst 6500/6000 Series pode aceitar 802.1Q e encapsulamento ISL.

- Por padrão, o switch Catalyst 4500 Series que executa o software Cisco IOS é compatível com os modos de entroncamento ISL e 802.1Q. O suporte é em todas as interfaces, exceto no bloqueio de portas Gigabit nos módulos WS-X4418-GB e WS-X4412-2GB-T. Essas portas não suportam ISL, mas apenas entroncamento 802.1q. As portas de 3 a 18 estão bloqueando as portas Gigabit no módulo WS-X4418-GB. As portas de 1 a 12 estão bloqueando as portas Gigabit no módulo WS-X4412-2GB-T.

Observação: uma porta será de bloqueio se a conexão com o backplane estiver com excesso de assinaturas.

- A principal diferença entre as plataformas Catalyst 6500 e Catalyst 4500 é a configuração de interface padrão. O switch Catalyst 6500 que executa o Cisco IOS Software tem interfaces no modo de desligamento que são portas roteadas de Camada 3 (L3) por padrão. O switch Catalyst 4500 que executa o Cisco IOS Software tem todas as interfaces ativadas. As interfaces são portas do switch L2 por padrão.

- Quando o encapsulamento 802.1Q é usado em uma interface de tronco nos Switches Catalyst 3750, os runts podem ser vistos na  show interface saída porque os pacotes encapsulados 802.1Q válidos que têm de 61 a 64 bytes e incluem o q-tag são contados pelo Switch Catalyst 3750 como quadros subdimensionados, mesmo que esses pacotes sejam encaminhados corretamente.

Observação: Observe que os switches Catalyst mais recentes que executam o Cisco IOS XE, como o 3650/3850 e posterior, não suportam mais o protocolo ISL.

Configurar

Nesta seção, você encontrará informações para configurar os recursos descritos neste documento.

Diagrama de Rede

Este documento utiliza a seguinte configuração de rede:

Observação: a interface Gigabit Ethernet no Catalyst 3560 é uma interface Ethernet negociada de 10/100/1000 Mbps. Portanto, a porta Gigabit no Catalyst 3560 está conectada a uma porta Fast Ethernet (100 Mbps) no Catalyst 6500 neste diagrama de rede.

Diagrama de Rede

Configurações

Este documento utiliza as seguintes configurações:

- Catalyst 3560 Switch

- Catalyst 6500 Switch

Catalyst 3560 Switch

!--- Notice: This example creates VLAN 1 and VLAN 2

!--- and sets the VLAN Trunk Protocol (VTP) mode to transparent. Use your

!--- network as a basis and set the VTP mode accordingly. For more details,

!--- refer to Configuring VLANs.

version 12.2

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 3560

!

!--- This is the privileged mode password for the example.

enable password mysecret

!

ip subnet-zero

!

vtp mode transparent

!

!--- VLAN 2 is created. This is visible only when you set VTP mode

!--- to transparent.

vlan 2

!

!--- The Gigabit Ethernet interface on the Catalyst 3560 is a 10/100/1000 Mbps

!--- negotiated Ethernet interface. Therefore, the Gigabit port on the

!--- Catalyst 3560 is connected to a Fast Ethernet port on the Catalyst 6500.

!--- Configure the trunk on the Gigabit Ethernet 0/1 interface.

interface GigabitEthernet0/1

!--- Configure trunk encapsulation as dot1q.

!--- For details on trunking, refer to Configuring VLANs.

switchport trunk encapsulation dot1q

!--- Enable trunking on the interface.

switchport mode trunk

no ip address

snmp trap link-status

!

!

!--- Interfaces Gigabit Ethernet 0/2 through 0/5 are placed in VLAN 1.

!--- In order to configure the interface as an L2 port,

!--- refer to the Configuring Ethernet Interfaces section

!--- of Configuring Interface Characteristics. All L2 ports are placed

!--- in VLAN 1, by default.

interface GigabitEthernet0/2

switchport mode access

no ip address

snmp trap link-status

!

interface GigabitEthernet0/3

switchport mode access

no ip address

snmp trap link-status

!

!

interface GigabitEthernet0/4

switchport mode access

no ip address

snmp trap link-status

!

interface GigabitEthernet0/5

switchport mode access

no ip address

snmp trap link-status

!

!

!--- Interfaces Gigabit Ethernet 0/6 through 0/12 are placed in VLAN 2.

interface GigabitEthernet0/6

switchport access vlan 2

switchport mode access

no ip address

snmp trap link-status

!

!--- Output suppressed.

!

interface GigabitEthernet0/12

switchport access vlan 2

switchport mode access

no ip address

snmp trap link-status

!

interface Vlan1

!--- This is the IP address for management.

ip address 10.1.1.1 255.255.255.0

!

ip classless

ip http server

!

!

line con 0

transport input none

line vty 0 4

!--- This is the privileged mode password for the example.

password mysecret

login

line vty 5 15

login

!

end

Catalyst 6500 Switch

!--- Notice: This example creates VLAN 1 and VLAN 2 and sets

!--- the VTP mode to transparent. Use your network as a basis and set the VTP

!--- mode accordingly. For more details, refer to Configuring VLANs.

Current configuration : 4812 bytes

version 12.1

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname Cat6500

!

vtp mode transparent

ip subnet-zero

!

!

mls flow ip destination

mls flow ipx destination

!

!--- This is the privileged mode password for the example.

enable password mysecret

!

redundancy

mode rpr-plus

main-cpu

auto-sync running-config

auto-sync standard

!

!

!--- This enables VLAN 2.

vlan 2

!

interface GigabitEthernet1/1

no ip address

shutdown

!

interface GigabitEthernet1/2

no ip address

shutdown

!

!--- The Gigabit Ethernet interface on the Catalyst 3560 is a 10/100/1000 Mbps

!--- negotiated Ethernet interface. Therefore, the Gigabit port on the Catalyst 3560

!--- is connected to a Fast Ethernet port on the Catalyst 6500.

interface FastEthernet3/1

no ip address

!--- You must issue the switchport command once,

!--- without any keywords, in order to configure the interface as an L2 port for the

!--- Catalyst 6500 series switch that runs Cisco IOS Software.

!--- On a Catalyst 4500 series switch that runs Cisco IOS Software, all ports are L2

!--- ports by default. Therefore, if you do not change the default configuration,

!--- you do not need to issue the switchport command.

switchport

!--- Configure trunk encapsulation as dot1q.

!--- For more details on trunking, refer to

!--- Configuring LAN Ports for Layer 2 Switching for the Catalyst 6500 series switch

!--- that runs Cisco IOS Software, or  Configuring Layer 2 Ethernet Interfaces

!--- for the Catalyst 4500/4000 series switch that runs Cisco IOS Software.

switchport trunk encapsulation dot1q

!--- Enable trunking on the interface.

switchport mode trunk

!

!--- Configure interfaces Fast Ethernet 3/2 through 3/24 to be in access mode.

!--- By default, all access ports are configured in VLAN 1.

interface FastEthernet3/2

no ip address

switchport

switchport mode access

!

!--- Output suppressed.

!

interface FastEthernet3/24

no ip address

switchport

switchport mode access

!

!--- Fast Ethernet 3/25 through 3/48 are placed in VLAN 2.

interface FastEthernet3/25

no ip address

switchport

switchport access vlan 2

switchport mode access

!

!--- Output suppressed.

!

interface FastEthernet3/48

no ip address

switchport

switchport access vlan 2

switchport mode access

!

!

interface Vlan1

!--- This is the IP address for management.

ip address 10.1.1.2 255.255.255.0

!

!

ip classless

no ip http server

!

!

ip classless

ip http server

!

line con 0

exec-timeout 0 0

transport input none

line vty 0 4

!--- This is the Telnet password for the example.

password mysecret

login

!

end

Observação: se você atribuir uma interface a uma VLAN que não existe, a interface será desativada até que você crie a VLAN no banco de dados de VLAN. Para obter mais detalhes, consulte a seção Criando ou Modificando um VLAN Ethernet de VLANs de Configuração.

Verificar

Use esta seção para confirmar se a sua configuração funciona corretamente. Nos switches Catalyst 3560/3750/6500/4500, use estes comandos:

- show interfaces <interface_type module/port> trunk

- show interfaces <interface_type module/port> switchport

- show vlan

- show vtp status

Exemplo de saída do comando show

Catalyst 3560 Switch

- show interfaces <interface_type module/port> trunk — Esse comando exibe a configuração de tronco da interface juntamente com os números de VLAN para os quais o tráfego pode ser transportado pelo tronco.

3560#show interface gigabitethernet 0/1 trunk

Port      Mode         Encapsulation  Status        Native vlan

Gi0/1     on           802.1q         trunking      1

Port      Vlans allowed on trunk

Gi0/1     1 4094

Port      Vlans allowed and active in management domain

Gi0/1     1-2

Port      Vlans in spanning tree forwarding state and not pruned

Gi0/1     1-2

- show interfaces <interface_type module/port> switchport — Este comando exibe a configuração da porta do switch da interface.

Na exibição, verifique os campos Operational Mode e Operational Trunking Encapsulation .

3560#show interface gigabitethernet 0/1 switchport

Name: Gi0/1

Switchport: Enabled

Administrative Mode: trunk

Operational Mode: trunk

Administrative Trunking Encapsulation: dot1q

Operational Trunking Encapsulation: dot1q

Negotiation of Trunking: On

Access Mode VLAN: 1 (default)

Trunking Native Mode VLAN: 1 (default)

Voice VLAN: none

Administrative private-vlan host-association: none

Administrative private-vlan mapping: none

Administrative private-vlan trunk native VLAN: none

Administrative private-vlan trunk encapsulation: dot1q

Administrative private-vlan trunk normal VLANs: none

Administrative private-vlan trunk private VLANs: none

Operational private-vlan: none

Trunking VLANs Enabled: ALL

Pruning VLANs Enabled: 2-1001

Capture Mode Disabled

Capture VLANs Allowed: ALL

Protected: false

Unknown unicast blocked: disabled

Unknown multicast blocked: disabled

Appliance trust : none

- show vlan — Este comando fornece informações sobre as VLANs e as portas que pertencem a uma VLAN específica.

3560#show vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Gi0/2, Gi0/3, Gi0/4, Gi0/5

2    VLAN0002                         active    Gi0/6, Gi0/7, Gi0/8, Gi0/9

Gi0/10, Gi0/11, Gi0/12

1002 fddi-default                     act/unsup

1003 token-ring-default               act/unsup

1004 fddinet-default                  act/unsup

1005 trnet-default                    act/unsup

!--- Output suppressed.

Observação: as portas exibidas na saída são apenas portas de acesso. Mas as portas configuradas como trunk e que estão no status notconnected também aparecem na saída de  show vlan.

- show vtp status — Este comando exibe informações gerais sobre o domínio de gerenciamento VTP, status e contadores.

3560#show vtp status

VTP Version : 2

Configuration Revision : 0

Maximum VLANs supported locally : 1005

Number of existing VLANs : 6

VTP Operating Mode : Transparent

VTP Domain Name :

VTP Pruning Mode : Disabled

VTP V2 Mode : Disabled

VTP Traps Generation : Disabled

MD5 digest : 0x4A 0x55 0x17 0x84 0xDB 0x99 0x3F 0xD1

Configuration last modified by 10.1.1.1 at 0-0-00 00:00:00

3560#ping 10.1.1.2

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/1/4 ms

3560#

Catalyst 6500 Switch

- show interfaces <interface_type module/port> trunk— Este comando exibe a configuração de tronco da interface juntamente com os números de VLAN para os quais o tráfego pode ser transportado pelo tronco.

Cat6500#show interfaces fastethernet 3/1 trunk

Port      Mode         Encapsulation  Status        Native vlan

Fa3/1     on           802.1q         trunking      1

Port      Vlans allowed on trunk

Fa3/1     1 4094

Port      Vlans allowed and active in management domain

Fa3/1     1-2

Port      Vlans in spanning tree forwarding state and not pruned

Fa3/1     1-2

- show interfaces <interface_type module/port> switchport — Este comando exibe a configuração da porta do switch da interface. Na exibição, verifique os campos Operational Mode e Operational Trunking Encapsulation .

cat6500#show interface fastethernet 3/1 switchport

Name: Fa3/1

Switchport: Enabled

Administrative Mode: trunk

Operational Mode: trunk

Administrative Trunking Encapsulation: dot1q

Operational Trunking Encapsulation: dot1q

Negotiation of Trunking: On

Access Mode VLAN: 1 (default)

Trunking Native Mode VLAN: 1 (default)

Voice VLAN: none

Administrative private-vlan host-association: none

Administrative private-vlan mapping: none

Administrative private-vlan trunk native VLAN: none

Administrative private-vlan trunk encapsulation: dot1q

Administrative private-vlan trunk normal VLANs: none

Administrative private-vlan trunk private VLANs: none

Operational private-vlan: none

Trunking VLANs Enabled: ALL

Pruning VLANs Enabled: 2-1001

Capture Mode Disabled

Capture VLANs Allowed: ALL

- show vlan — Esse comando fornece informações sobre as VLANs e as portas que pertencem a uma VLAN específica.

Cat6500#show vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Fa3/2, Fa3/3, Fa3/4, Fa3/5

Fa3/6, Fa3/7, Fa3/8, Fa3/9

Fa3/10, Fa3/11, Fa3/12, Fa3/13

Fa3/14, Fa3/15, Fa3/16, Fa3/17

Fa3/18, Fa3/19, Fa3/20, Fa3/21

Fa3/22, Fa3/23, Fa3/24

2    VLAN0002                         active    Fa3/25, Fa3/26, Fa3/27, Fa3/28

Fa3/29, Fa3/30, Fa3/31, Fa3/32

Fa3/33, Fa3/34, Fa3/35, Fa3/36

Fa3/37, Fa3/38, Fa3/39, Fa3/40

Fa3/41, Fa3/42, Fa3/43, Fa3/44

Fa3/45, Fa3/46, Fa3/47, Fa3/48

1002 fddi-default                      act/unsup

1003 token-ring-default                act/unsup

1004 fddinet-default                   act/unsup

1005 trnet-default                     act/unsup

Observação: as portas exibidas são apenas as portas que você configurou como portas sem tronco (acesso) de Camada 2. As portas configuradas como trunk e que estão no status notconnected também são exibidas na saída show vlan. Para obter detalhes, consulte a seção Configurando Interfaces LAN para Switching de Camada 2 de  Configurando Portas LAN para Switching de Camada 2.

- show vtp status — Este comando exibe informações gerais sobre o domínio de gerenciamento VTP, status e contadores.

Cat6500#show vtp status

VTP Version                     : 2

Configuration Revision          : 0

Maximum VLANs supported locally : 1005

Number of existing VLANs        : 6

VTP Operating Mode              : Transparent

VTP Domain Name                 :

VTP Pruning Mode                : Disabled

VTP V2 Mode                     : Disabled

VTP Traps Generation            : Disabled

MD5 digest                      : 0xBF 0x86 0x94 0x45 0xFC 0xDF 0xB5 0x70

Configuration last modified by 10.1.1.2 at 0-0-00 00:00:00

- ping

Cat6500#ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/1/4 ms

Informações Relacionadas

- Guias de configuração de switches Catalyst 3560 Series

- Guias de instalação de switches Catalyst 4500 Series

- Guias de instalação de Switches Catalyst 6500 Series

- Suporte técnico e downloads da Cisco