Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Conventions

Material de Suporte

Configurar

Configurando o analisador de FC local

Configurando o Remote FC Analyzer

Configurando para SPAN local

Configuração de SPAN remoto

Notas para dispositivos de adaptador do analisador de porta

Verificar

Troubleshoot

Informações Relacionadas

Introduction

Semelhante ao recurso de depuração da linha de produtos do roteador Cisco, os switches de armazenamento Cisco MDS têm um analisador Fibre Channel (FC) para examinar pacotes. O analisador de FC examina pacotes de e para as entidades que o switch fornece. O analisador de FC é capaz de depurar quadros que o switch é responsável por receber ou enviar para um dispositivo de armazenamento. Os quadros entre estações finais não podem ser examinados pelo analisador FC.

Para examinar o fluxo da sessão, deve ser usada a funcionalidade do Switched Port Analyzer (SPAN) dos switches MDS. Assim como a função de SPAN em um switch Cisco Ethernet, o SPAN na linha de produtos MDS replica dados em portas de destino de SPAN, para que possam ser coletados por um dispositivo de terceiros.

Prerequisites

Requirements

Não existem requisitos específicos para este documento.

Componentes Utilizados

As informações neste documento são baseadas nestas versões de software e hardware:

- Switch Cisco MDS 9216

- Switch Cisco MDS 9509

- Ambos executam o Storage Area Networking Operating System (SAN-OS) 1.2.1a.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Conventions

For more information on document conventions, refer to the Cisco Technical Tips Conventions.

Material de Suporte

Você deve saber quando usar a ferramenta analisador FC e quando usar o recurso SPAN.

O analisador de FC é uma ferramenta que coleta quadros destinados ou originados do supervisor MDS. O tráfego de nó para switch ou de switch para switch pode ser visto com essa ferramenta.

O SPAN é um recurso que permite que quadros que são transitórios para o switch sejam copiados para uma segunda porta para análise. O tráfego de nó para nó pode ser visto com este método.

Consulte este diagrama para obter uma ilustração:

As setas verdes mostram o tráfego que pode ser rastreado com a ferramenta analisador FC, enquanto a seta rosa mostra o tráfego que pode ser capturado com o método SPAN. O tráfego do host para o armazenamento não pode ser observado pelo analisador FC. Somente o tráfego do host para o switch ou do switch à direita pode ser visto quando você executa o analisador FC no switch à esquerda.

O SPAN pode ser usado para rastrear o tráfego de entrada (entrada) e saída (saída) de qualquer porta no switch. A SPAN remota (RSPAN), como mostrado no diagrama anterior, pode ser usada para coletar quadros dentro e fora da porta do host no switch esquerdo, com o analisador conectado ao switch do lado direito.

Configurar

Nesta seção, você encontrará informações para configurar os recursos descritos neste documento.

Observação: para encontrar informações adicionais sobre os comandos usados neste documento, use a ferramenta Command Lookup Tool (somente clientes registrados).

Configurando o analisador de FC local

Observação: a intenção é coletar quadros FC originados ou destinados ao supervisor 9612. Os quadros do host para o JBOD não são coletados com a ferramenta analisador FC.

O local do analisador FC é executado a partir da interface de linha de comando (CLI) através do anexo do console ou Telnet. Você pode executar uma breve exibição para mostrar apenas uma pequena parte de cada quadro ou pode executar um rastreamento detalhado para mostrar o quadro inteiro.

O rastreamento é iniciado no modo de configuração e é interrompido quando você pressiona Ctrl-C. Por padrão, somente 100 quadros são capturados. Para capturar mais de 100 quadros, adicione a opção de comando limit-captured-frames ao comando que você usa para iniciar o rastreamento.

Você também pode usar um filtro de exibição para limitar a saída do rastreamento somente a quadros específicos.

!--- VSAN 13 (0xd) is used here as example.

MDS9216# show fcdomain domain-list vsan 13

Number of domains: 2

Domain ID              WWN

---------    -----------------------

0x66(102)    20:0d:00:05:30:00:47:9f [Local] [Principal]

0x6b(107)    20:0d:00:05:30:00:51:1f

MDS9216# show fcns data vsan 13

VSAN 13:

--------------------------------------------------------------------------

FCID        TYPE  PWWN                    (VENDOR)        FC4-TYPE:FEATURE

--------------------------------------------------------------------------

0x6600dc    NL    21:00:00:20:37:15:a2:49 (Seagate)       scsi-fcp:target

0x6600e0    NL    21:00:00:04:cf:6e:4a:8c (Seagate)       scsi-fcp:target

0x6600e1    NL    21:00:00:04:cf:6e:37:8b (Seagate)       scsi-fcp:target

0x660101    NL    10:00:00:01:73:00:81:82 (JNI)

0x660201    N     10:00:00:05:30:00:47:9f (Cisco)         ipfc

0x6b0001    N     10:00:00:05:30:00:51:23 (Cisco)         ipfc

Total number of entries = 6

!--- Configure FC analyzer for brief output.

MDS9216# config t

Enter configuration commands, one per line.  End with CNTL/Z.

MDS9216(config)# fcanalyzer local brief display-filter mdshdr.vsan==0xd

Capturing on eth2

0.000000     ff.ff.fd -> ff.ff.fd     SW_ILS HLO

0.000095     ff.ff.fd -> ff.ff.fd     FC Link Ctl, ACK1

18.721559     ff.ff.fd -> ff.ff.fd     SW_ILS HLO

18.721879     ff.ff.fd -> ff.ff.fd     FC Link Ctl, ACK1

19.970287     ff.ff.fd -> ff.ff.fd     SW_ILS HLO

19.970368     ff.ff.fd -> ff.ff.fd     FC Link Ctl, ACK1

38.941558     ff.ff.fd -> ff.ff.fd     SW_ILS HLO

38.941849     ff.ff.fd -> ff.ff.fd     FC Link Ctl, ACK1

39.940546     ff.ff.fd -> ff.ff.fd     SW_ILS HLO

39.940628     ff.ff.fd -> ff.ff.fd     FC Link Ctl, ACK1

No próximo exemplo, você tem os mesmos dados. Desta vez, no entanto, a breve opção é omitida do comando para fornecer uma visão detalhada de cada pacote.

MDS9216(config)# fcanalyzer local display-filter mdshdr.vsan==0xd

Capturing on eth2

Frame 1 (100 bytes on wire, 100 bytes captured)

Arrival Time: Jul  4, 2003 12:31:18.310251000

Time delta from previous packet: 0.000000000 seconds

Time relative to first packet: 0.000000000 seconds

Frame Number: 1

Packet Length: 100 bytes

Capture Length: 100 bytes

Ethernet II, Src: 00:00:00:00:00:0a, Dst: 00:00:00:00:ee:00

Destination: 00:00:00:00:ee:00 (00:00:00:00:ee:00)

Source: 00:00:00:00:00:0a (00:00:00:00:00:0a)

Type: Unknown (0xfcfc)

Vegas (FC, SOFf/EOFn)

Vegas Header

.000 .... = Version: 0

.... 0000 = Andiamo Type: Normal FC frame (0)

#MPLS Labels: 0

Packet Len: 70

TTL: 255

0111 .... = User Priority: 7

.... 0000 0010 11.. = Dst Index: 0x000b

.... ..00 1111 1111 = Src Index: 0x00ff

Ctrl Bits: Index Directed frame (0x01)

Timestamp: 42678

.... .000 = Status: 0 (0)

0000 0... = Reason Code: 0 (0x00)

.... 0000 0000 1101 = VSAN: 13

Checksum: 0

Vegas Trailer

EOF: EOFn (3)

CRC: 4022250974

Fibre Channel

R_CTL: 0x02

Dest Addr: ff.ff.fd

CS_CTL: 0x00

Src Addr: ff.ff.fd

Type: SW_ILS (0x22)

F_CTL: 0x380000 (Exchange Originator, Seq Initiator, Exchg First,

Exchg Last, Seq Last, CS_CTL, Last Data Frame - No Info,

ABTS - Abort/MS, )

SEQ_ID: 0xe7

DF_CTL: 0x00

SEQ_CNT: 0

OX_ID: 0x1eb4

RX_ID: 0xffff

Parameter: 0x00000000

SW_ILS

Cmd Code: HLO (0x14)

FSPF Header

Version: 0x02

AR Number: 0x00

Authentication Type: 0x00

Originating Domain ID: 102

Authentication: 0000000000000000

Options: 00000000

Hello Interval (secs): 20

Dead Interval (secs): 80

Recipient Domain ID: 107

Originating Port Idx: 0x01000b

Frame 2 (60 bytes on wire, 60 bytes captured)

Arrival Time: Jul  4, 2003 12:31:18.310563000

Time delta from previous packet: 0.000312000 seconds

Time relative to first packet: 0.000312000 seconds

Frame Number: 2

Packet Length: 60 bytes

Capture Length: 60 bytes

Ethernet II, Src: 00:00:00:00:00:00, Dst: 00:00:00:00:00:00

Destination: 00:00:00:00:00:00 (00:00:00:00:00:00)

Source: 00:00:00:00:00:00 (00:00:00:00:00:00)

Type: Unknown (0x0000)

Vegas (FC, SOFf/EOFt)

Vegas Header

.000 .... = Version: 0

.... 0000 = Andiamo Type: Normal FC frame (0)

#MPLS Labels: 0

Packet Len: 30

TTL: 255

0111 .... = User Priority: 7

.... 0011 1111 11.. = Dst Index: 0x00ff

.... ..00 0000 1011 = Src Index: 0x000b

Ctrl Bits: 0 (0x00)

Timestamp: 42679

.... .000 = Status: 0 (0)

0000 0... = Reason Code: 0 (0x00)

.... 0000 0000 1101 = VSAN: 13

Checksum: 241

Vegas Trailer

EOF: EOFt (1)

CRC: 1019832848

Fibre Channel

R_CTL: 0xc0(ACK1)

Dest Addr: ff.ff.fd

CS_CTL: 0x00

Src Addr: ff.ff.fd

Type: Unknown (0x00)

F_CTL: 0xf80000 (Exchange Responder, Seq Recipient, Exchg First,

Exchg Last, Seq Last, CS_CTL, Last Data Frame - No Info,

ABTS - Cont, )

SEQ_ID: 0xe7

DF_CTL: 0x00

SEQ_CNT: 0

OX_ID: 0x1eb4

RX_ID: 0x1e66

Parameter: 0x00000001

Frame 3 (100 bytes on wire, 100 bytes captured)

Arrival Time: Jul  4, 2003 12:31:19.309559000

Time delta from previous packet: 0.998996000 seconds

Time relative to first packet: 0.999308000 seconds

Frame Number: 3

Packet Length: 100 bytes

Capture Length: 100 bytes

Ethernet II, Src: 00:00:00:00:00:00, Dst: 00:00:00:00:00:00

Destination: 00:00:00:00:00:00 (00:00:00:00:00:00)

Source: 00:00:00:00:00:00 (00:00:00:00:00:00)

Type: Unknown (0x0000)

Vegas (FC, SOFf/EOFn)

Vegas Header

.000 .... = Version: 0

.... 0000 = Andiamo Type: Normal FC frame (0)

#MPLS Labels: 0

Packet Len: 70

TTL: 255

0111 .... = User Priority: 7

.... 0011 1111 11.. = Dst Index: 0x00ff

.... ..00 0000 1011 = Src Index: 0x000b

Ctrl Bits: 0 (0x00)

Timestamp: 42779

.... .000 = Status: 0 (0)

0000 0... = Reason Code: 0 (0x00)

.... 0000 0000 1101 = VSAN: 13

Checksum: 101

Vegas Trailer

EOF: EOFn (3)

CRC: 4200187557

Fibre Channel

R_CTL: 0x02

Dest Addr: ff.ff.fd

CS_CTL: 0x00

Src Addr: ff.ff.fd

Type: SW_ILS (0x22)

F_CTL: 0x380000 (Exchange Originator, Seq Initiator, Exchg First,

Exchg Last, Seq Last, CS_CTL, Last Data Frame - No Info,

ABTS - Abort/MS, )

SEQ_ID: 0xe7

DF_CTL: 0x00

SEQ_CNT: 0

OX_ID: 0x1e67

RX_ID: 0xffff

Parameter: 0x00000000

SW_ILS

Cmd Code: HLO (0x14)

FSPF Header

Version: 0x02

AR Number: 0x00

Authentication Type: 0x00

Originating Domain ID: 107

Authentication: 0000000000000000

Options: 00000000

Hello Interval (secs): 20

Dead Interval (secs): 80

Recipient Domain ID: 102

Originating Port Idx: 0x01011c

Frame 4 (60 bytes on wire, 60 bytes captured)

Arrival Time: Jul  4, 2003 12:31:19.309646000

Time delta from previous packet: 0.000087000 seconds

Time relative to first packet: 0.999395000 seconds

Frame Number: 4

Packet Length: 60 bytes

Capture Length: 60 bytes

Ethernet II, Src: 00:00:00:00:00:0a, Dst: 00:00:00:00:ee:00

Destination: 00:00:00:00:ee:00 (00:00:00:00:ee:00)

Source: 00:00:00:00:00:0a (00:00:00:00:00:0a)

Type: Unknown (0xfcfc)

Vegas (FC, SOFf/EOFt)

Vegas Header

.000 .... = Version: 0

.... 0000 = Andiamo Type: Normal FC frame (0)

#MPLS Labels: 0

Packet Len: 30

TTL: 255

0111 .... = User Priority: 7

.... 0000 0010 11.. = Dst Index: 0x000b

.... ..00 1111 1111 = Src Index: 0x00ff

Ctrl Bits: Index Directed frame (0x01)

Timestamp: 42778

.... .000 = Status: 0 (0)

0000 0... = Reason Code: 0 (0x00)

.... 0000 0000 1101 = VSAN: 13

Checksum: 0

Vegas Trailer

EOF: EOFt (1)

CRC: 4022250974

Fibre Channel

R_CTL: 0xc0(ACK1)

Dest Addr: ff.ff.fd

CS_CTL: 0x00

Src Addr: ff.ff.fd

Type: Unknown (0x00)

F_CTL: 0xf80000 (Exchange Responder, Seq Recipient, Exchg First,

Exchg Last, Seq Last, CS_CTL, Last Data Frame - No Info,

ABTS - Cont, )

SEQ_ID: 0xe7

DF_CTL: 0x00

SEQ_CNT: 0

OX_ID: 0x1e67

RX_ID: 0x1eb5

Parameter: 0x00000001

Novamente, o breve rastreamento é mostrado. Desta vez, no entanto, o PC na porta 1/16 é desconectado e reconectado para forçar o login. Você vê quadros de e para o outro switch FC e para e do nó local conectado (o PC).

MDS9216(config)# fcanalyzer local brief display-filter mdshdr.vsan==0xd

Capturing on eth2

0.000000     ff.ff.fd -> ff.ff.fd     SW_ILS HLO

0.000310     ff.ff.fd -> ff.ff.fd     FC Link Ctl, ACK1

0.999598     ff.ff.fd -> ff.ff.fd     SW_ILS HLO

0.999684     ff.ff.fd -> ff.ff.fd     FC Link Ctl, ACK1

19.990040     ff.ff.fd -> ff.ff.fd     SW_ILS HLO

19.990295     ff.ff.fd -> ff.ff.fd     FC Link Ctl, ACK1

20.990602     ff.ff.fd -> ff.ff.fd     SW_ILS HLO

20.990682     ff.ff.fd -> ff.ff.fd     FC Link Ctl, ACK1

26.028780     ff.fc.66 -> ff.fc.6b     SW_ILS SW_RSCN

26.029087     ff.fc.6b -> ff.fc.66     FC Link Ctl, ACK1

26.029541     ff.fc.6b -> ff.fc.66     SW_ILS SW_ACC (SW_RSCN)

26.029596     ff.fc.66 -> ff.fc.6b     FC Link Ctl, ACK1

31.151197     00.00.01 -> ff.ff.fe     FC ELS FLOGI

31.162809     ff.ff.fe -> 66.01.01     FC ELS ACC (FLOGI)

31.162841     ff.ff.fe -> 66.01.01     FC ELS ACC (FLOGI)

31.163139     66.01.01 -> ff.ff.fd     FC ELS SCR

31.163583     ff.ff.fd -> 66.01.01     FC ELS ACC (SCR)

31.163603     ff.ff.fd -> 66.01.01     FC ELS ACC (SCR)

31.163835     66.01.01 -> ff.ff.fc     FC ELS PLOGI

31.163965     ff.ff.fc -> 66.01.01     FC ELS ACC (PLOGI)

31.163985     ff.ff.fc -> 66.01.01     FC ELS ACC (PLOGI)

31.164186     66.01.01 -> ff.ff.fc     dNS GA_NXT

31.164305     ff.fc.66 -> ff.fc.6b     SW_ILS SW_RSCN

31.164479     ff.fc.6b -> ff.fc.66     FC Link Ctl, ACK1

31.164628     ff.fc.6b -> ff.fc.66     SW_ILS SW_ACC (SW_RSCN)

31.164670     ff.fc.66 -> ff.fc.6b     FC Link Ctl, ACK1

31.165030     ff.ff.fc -> 66.01.01     dNS ACC (GA_NXT)

31.165050     ff.ff.fc -> 66.01.01     dNS ACC (GA_NXT)

31.165125     ff.fc.6b -> ff.fc.66     dNS GE_ID

31.165193     ff.fc.66 -> ff.fc.6b     FC Link Ctl, ACK1

31.165419     66.01.01 -> ff.ff.fc     dNS GA_NXT

31.165577     ff.fc.66 -> ff.fc.6b     dNS ACC (GE_ID)

31.165781     ff.ff.fc -> 66.01.01     dNS ACC (GA_NXT)

31.165804     ff.ff.fc -> 66.01.01     dNS ACC (GA_NXT)

31.165943     ff.fc.6b -> ff.fc.66     FC Link Ctl, ACK1

31.166063     66.01.01 -> ff.ff.fc     dNS GA_NXT

31.166870     ff.ff.fc -> 66.01.01     dNS ACC (GA_NXT)

31.166892     ff.ff.fc -> 66.01.01     dNS ACC (GA_NXT)

31.167268     66.01.01 -> ff.ff.fc     dNS GA_NXT

31.167529     ff.ff.fc -> 66.01.01     dNS ACC (GA_NXT)

31.167549     ff.ff.fc -> 66.01.01     dNS ACC (GA_NXT)

31.168704     66.01.01 -> ff.ff.fc     dNS GA_NXT

31.169272     ff.ff.fc -> 66.01.01     dNS ACC (GA_NXT)

31.169294     ff.ff.fc -> 66.01.01     dNS ACC (GA_NXT)

31.169568     66.01.01 -> ff.ff.fc     dNS GA_NXT

31.170453     ff.ff.fc -> 66.01.01     dNS ACC (GA_NXT)

31.170473     ff.ff.fc -> 66.01.01     dNS ACC (GA_NXT)

31.170756     66.01.01 -> ff.ff.fc     dNS GA_NXT

31.170975     ff.ff.fc -> 66.01.01     dNS ACC (GA_NXT)

31.170994     ff.ff.fc -> 66.01.01     dNS ACC (GA_NXT)

31.171400     66.01.01 -> 66.02.01     FC ELS PLOGI

31.171562     66.02.01 -> 66.01.01     FC ELS ACC (PLOGI)

31.171581     66.02.01 -> 66.01.01     FC ELS ACC (PLOGI)

31.171752     66.01.01 -> 66.02.01     FC ELS PRLI

31.171812     66.02.01 -> 66.01.01     FC ELS LS_RJT (PRLI)

31.171832     66.02.01 -> 66.01.01     FC ELS LS_RJT (PRLI)

31.173863     66.01.01 -> ff.ff.fc     FC ELS LOGO

31.175020     ff.ff.fc -> 66.01.01     FC ELS ACC (LOGO)

31.175047     ff.ff.fc -> 66.01.01     FC ELS ACC (LOGO)

31.175182     66.01.01 -> ff.ff.fc     FC ELS PLOGI

31.175290     ff.ff.fc -> 66.01.01     FC ELS ACC (PLOGI)

31.175310     ff.ff.fc -> 66.01.01     FC ELS ACC (PLOGI)

31.175632     66.01.01 -> ff.ff.fa     FC ELS PLOGI

31.175753     ff.ff.fa -> 66.01.01     FC ELS ACC (PLOGI)

31.175777     ff.ff.fa -> 66.01.01     FC ELS ACC (PLOGI)

32.460020     ff.fc.66 -> 66.01.01     FC ELS PLOGI

32.460050     ff.fc.66 -> 66.01.01     FC ELS PLOGI

32.460207     66.01.01 -> ff.fc.66     FC ELS ACC (PLOGI)

32.460246     66.01.01 -> ff.fc.66     FC ELS ACC (PLOGI)

32.460340     ff.fc.66 -> 66.01.01     FC ELS PRLI

32.460362     ff.fc.66 -> 66.01.01     FC ELS PRLI

32.460492     66.01.01 -> ff.fc.66     FC ELS LS_RJT (PRLI)

32.460525     66.01.01 -> ff.fc.66     FC ELS LS_RJT (PRLI)

32.461839     ff.fc.66 -> 66.01.01     FC ELS LOGO

32.461866     ff.fc.66 -> 66.01.01     FC ELS LOGO

32.462046     66.01.01 -> ff.fc.66     FC ELS ACC (LOGO)

32.462080     66.01.01 -> ff.fc.66     FC ELS ACC (LOGO)

MDS9216(config)# ^C

MDS9216(config)# exit

Configurando o Remote FC Analyzer

Observação: a intenção é coletar quadros FC originados ou destinados ao supervisor 9612. Os quadros do host para o JBOD não são coletados com a ferramenta analisador FC.

O controle remoto do analisador FC é executado em um PC que esteja usando Ethereal 0.9(9) ou mais recente e WinPcap . O endereço IP do PC é especificado no comando emitido para iniciar o rastreamento do analisador FC na CLI MDS. No PC, Ethereal também deve ser iniciado a partir da linha de comando e o endereço IP da interface de gerenciamento MDS deve ser especificado no comando.

1. Para interromper o rastreamento do analisador MDS FC, você deve pressionar Ctrl-C a partir da CLI.

MDS9216# config t

Enter configuration commands, one per line.  End with CNTL/Z.

MDS9216(config)# fcanalyzer remote 64.102.58.114

MDS9216(config)# ^C

Não especifique a opção ativa no comando anterior, ou você precisará adicionar opções adicionais à linha de comando em seu PC quando iniciar o Ethernet. Adicionar a palavra-chave ativa geralmente significa que você também precisa configurar o número da porta TCP. Recomenda-se que você use os padrões.

2. No PC, verifique o endereço IP e inicie o programa de captura remota Ethernet.

d:\> ipconfig

Windows 2000 IP Configuration

Ethernet adapter wireless:

Connection-specific DNS Suffix  . : cisco.com

IP Address. . . . . . . . . . . . : 64.102.58.114

Subnet Mask . . . . . . . . . . . : 255.255.255.128

Default Gateway . . . . . . . . . : 64.102.58.1

Ethernet adapter builtinE:

Connection-specific DNS Suffix  . : cisco.com

Autoconfiguration IP Address. . . : 169.254.219.141

Subnet Mask . . . . . . . . . . . : 255.255.0.0

Default Gateway . . . . . . . . . :

d:\> cd ethereal099

D:\Ethereal099> ethereal099 -i rpcap://172.18.172.56/eth2

3. Quando o programa iniciar, escolha Capture e clique em OK para iniciar a coleta de pacotes.

Os pacotes FC coletados aparecem como Outros na exibição de resumo.

4. Clique em Parar para interromper a coleta de pacotes e iniciar a parte da exibição de rastreamento do programa.

Você pode usar filtros para limitar a exibição a um fluxo de tráfego específico.

5. Se houver um problema com a iniciação da captura remota, você poderá ver uma tela de erro semelhante à da próxima imagem. O analisador FC não está ativo no MDS ou a palavra-chave ativa foi usada sem uma porta especificada.

Configurando para SPAN local

Observação: o objetivo é coletar quadros FC—com o analisador FC na porta 1/15—FC de e para o host na porta 1/16 do 9216.

Um analisador de FC na porta 1/15 mostra conjuntos ordenados, mas não os conjuntos ordenados que ocorrem no link que está sendo SPANed. O dispositivo analisador FC pode ser um Adaptador analisador de portas (PAA - Port Analyzer Adapter) e um PC que esteja executando o Ethereal, semelhante a um dispositivo Finisar.

Configuração do MDS 9216

MDS9216# show run

vsan 13

vsan 13 interface fc1/16

vsan 13 interface fc2/16

boot system bootflash:/m9200-ek9-mzg.1.2.0.77.bin

boot kickstart bootflash:/m9200-ek9-kickstart-mzg.1.2.0.77.bin

interface fc1/15

switchport mode SD

switchport speed 2000

no shutdown

interface fc1/16

no shutdown

interface mgmt0

ip address 172.18.172.56 255.255.255.0

span session 1

destination interface fc1/15

source interface fc1/16 rx

source interface fc1/16 tx

Exibições do MDS 9216

MDS9216# show interface fc 1/15

fc1/15 is up

Hardware is Fibre Channel

Port WWN is 20:0f:00:05:30:00:47:9e

Admin port mode is SD

Port mode is SD

Port vsan is 1

Speed is 2 Gbps

Beacon is turned off

5 minutes input rate 73704 bits/sec, 9213 bytes/sec, 13 frames/sec

5 minutes output rate 2275584 bits/sec, 284448 bytes/sec, 430 frames/sec

2839098 frames input, 1883173240 bytes

0 discards, 0 errors

0 CRC,  0 unknown class

0 too long, 0 too short

3049460 frames output, 2038253240 bytes

0 discards, 0 errors

0 input OLS, 0 LRR, 0 NOS, 0 loop inits

0 output OLS, 0 LRR, 0 NOS, 0 loop inits

MDS9216# show interface fc 1/16

fc1/16 is up

Hardware is Fibre Channel

Port WWN is 20:10:00:05:30:00:47:9e

Admin port mode is auto, trunk mode is on

Port mode is FL, FCID is 0x660100

Port vsan is 13

Speed is 2 Gbps

Transmit B2B Credit is 0

Receive B2B Credit is 16

Receive data field Size is 2112

Beacon is turned off

5 minutes input rate 771568 bits/sec, 96446 bytes/sec, 171 frames/sec

5 minutes output rate 1503144 bits/sec, 187893 bytes/sec, 258 frames/sec

1238843 frames input, 691853044 bytes

0 discards, 0 errors

0 CRC,  0 unknown class

0 too long, 0 too short

1864744 frames output, 1357707740 bytes

0 discards, 0 errors

0 input OLS, 0 LRR, 0 NOS, 49 loop inits

10 output OLS, 0 LRR, 10 NOS, 14 loop inits

MDS9216# show interface fc 2/16

fc2/16 is up

Hardware is Fibre Channel

Port WWN is 20:50:00:05:30:00:47:9e

Admin port mode is FX

Port mode is FL, FCID is 0x660000

Port vsan is 13

Speed is 1 Gbps

Transmit B2B Credit is 0

Receive B2B Credit is 12

Receive data field Size is 2112

Beacon is turned off

5 minutes input rate 1647552 bits/sec, 205944 bytes/sec, 283 frames/sec

5 minutes output rate 845624 bits/sec, 105703 bytes/sec, 188 frames/sec

1867680 frames input, 1361393600 bytes

0 discards, 0 errors

0 CRC,  0 unknown class

0 too long, 0 too short

1241179 frames output, 694505284 bytes

0 discards, 0 errors

0 input OLS, 0 LRR, 0 NOS, 2 loop inits

0 output OLS, 0 LRR, 0 NOS, 2 loop inits

MDS9216# show fcns data vsan 13

VSAN 13:

--------------------------------------------------------------------------

FCID        TYPE  PWWN                    (VENDOR)        FC4-TYPE:FEATURE

--------------------------------------------------------------------------

0x6600dc    NL    21:00:00:20:37:15:a2:49 (Seagate)       scsi-fcp:target

0x6600e0    NL    21:00:00:04:cf:6e:4a:8c (Seagate)       scsi-fcp:target

0x6600e1    NL    21:00:00:04:cf:6e:37:8b (Seagate)       scsi-fcp:target

0x660101    NL    10:00:00:01:73:00:81:82 (JNI)

Total number of entries = 4

MDS9216# show span session brief

--------------------------------------------------------

Session  Admin          Oper           Destination

State          State          Interface

--------------------------------------------------------

1        no suspend     active         fc1/15

MDS9216# show span session 1

Session 1 (active)

Destination is fc1/15

No session filters configured

Ingress (rx) sources are

fc1/16,

Egress (tx) sources are

fc1/16,

MDS9216# show span internal info session 1

====================================

Admin Configuration for session [1]

====================================

Name:

Destination port: [100e000] [fc1/15] Flags [1]

State: [0] not suspended

Session Flags: [0] <>

Session Filter rx:  none

Session Filter tx:  none

Source interface - rx: fc1/16

Source interface - tx: fc1/16

Source vsan (rx):  none

Session [1] is UNLOCKED txn[0] cfg[0] rid[80000000]

====================================

Runtime Data for session [1]

====================================

Status <active: 0 inactive 1> : [0] active

State reason:[0] Flags [6]rx_span_bit [0] tx_span_bit[1] ( 4s invalid)

oper configured PHYSICAL ports

fc1/16

PHYSICAL ports undergoing configuration

none

PHYSICAL ports in error state

none

PHYSICAL ports (incl. dest) link status

fc1/15, fc1/16

Configuração de SPAN remoto

Observação: a intenção é coletar—com o analisador FC conectado aos quadros 9509—FC de e para o host no 9216. A interface ST deve ter um conversor de interface Gigabit (GBIC - Gigabit Interface Converter) instalado e a velocidade deve corresponder à porta de destino de expansão (SD - Span Destination) no 9509.

Antes de tentar configurar o RSPAN, certifique-se de que estes pontos sejam abordados:

- Todos os switches devem estar executando o código MDS 1.2 ou posterior.

- Nenhum cabo deve ser conectado à SFP (Small Form Fator Pluggable) na porta do Terminal de Abrangência (ST).

- Certifique-se de que o túnel FC esteja UP antes de começar a coletar quadros.

- O analisador de FC pode ser um PAA e um PC que esteja executando Ethereal, semelhante a um dispositivo Finisar.

Se houver algum switch intermediário entre a origem de SPAN e o switch de destino de SPAN, siga este procedimento:

1. Crie uma interface VSAN ativa na mesma sub-rede que a origem e o destino do túnel.

2. Ative o roteamento IP.

3. Ative o encapsulamento FC.

4. Usar SAN-OS 1.2 ou posterior.

Configuração do MDS 9216

MDS9216# show version

Cisco Storage Area Networking Operating System (SAN-OS) Software

TAC support: http://www.cisco.com/tac

Copyright (c) 2002-2003 by Cisco Systems, Inc. All rights reserved.

The copyright for certain works contained herein are owned by

Andiamo Systems, Inc. and/or other third parties and are used and

distributed under license.

Software

BIOS:      version 1.0.7

loader:    version 1.0(3a)

kickstart: version 1.2(1) [build 1.2(0.77)] [gdb]

system:    version 1.2(1) [build 1.2(0.77)] [gdb]

BIOS compile time:       03/20/03

kickstart image file is: bootflash:/m9200-ek9-kickstart-mzg.1.2.0.77.bin

kickstart compile time:  6/29/2003 0:00:00

system image file is:    bootflash:/m9200-ek9-mzg.1.2.0.77.bin

system compile time:     6/29/2003 0:00:00

Hardware

RAM 963108 kB

bootflash: 503808 blocks (block size 512b)

slot0:          0 blocks (block size 512b)

MDS9216 uptime is 0 days 21 hours 28 minute(s) 20 second(s)

Last reset at 50030 usecs after Thu Jul  3 13:09:31 2003

Reason: Reset Requested by CLI command reload

System version: 1.2(0.45c)

MDS9216# show run

Building Configuration ...

interface fc-tunnel 13

destination 10.0.0.2

source 10.0.0.1

no shutdown

vsan database

vsan 13

interface vsan13

ip address 10.0.0.1 255.255.255.0

no shutdown

vsan 13 interface fc1/16

vsan 13 interface fc2/16

boot system bootflash:/m9200-ek9-mzg.1.2.0.77.bin

boot kickstart bootflash:/m9200-ek9-kickstart-mzg.1.2.0.77.bin

fc-tunnel enable

ip routing

zone default-zone permit vsan 13

interface fc1/12

no shutdown

interface fc1/15

switchport mode ST

switchport speed 1000

rspan-tunnel interface fc-tunnel 13

no shutdown

interface fc1/16

no shutdown

interface fc2/16

no shutdown

interface mgmt0

ip address 172.18.172.56 255.255.255.0

span session 1

destination interface fc-tunnel 13

source interface fc1/16 rx

source interface fc1/16 tx

!--- Output suppressed.

Exibições do MDS 9216

MDS9216# show interface fc 1/16

fc1/16 is up

Hardware is Fibre Channel

Port WWN is 20:10:00:05:30:00:47:9e

Admin port mode is auto, trunk mode is on

Port mode is FL, FCID is 0x660100

Port vsan is 13

Speed is 2 Gbps

Transmit B2B Credit is 0

Receive B2B Credit is 16

Receive data field Size is 2112

Beacon is turned off

5 minutes input rate 1480080 bits/sec, 185010 bytes/sec, 331 frames/sec

5 minutes output rate 2907712 bits/sec, 363464 bytes/sec, 498 frames/sec

574444 frames input, 320246452 bytes

0 discards, 0 errors

0 CRC,  0 unknown class

0 too long, 0 too short

865170 frames output, 629303788 bytes

0 discards, 0 errors

0 input OLS, 0 LRR, 0 NOS, 10 loop inits

5 output OLS, 0 LRR, 5 NOS, 9 loop inits

MDS9216# show interface fc 2/16

fc2/16 is up

Hardware is Fibre Channel

Port WWN is 20:50:00:05:30:00:47:9e

Admin port mode is FX

Port mode is FL, FCID is 0x660000

Port vsan is 13

Speed is 1 Gbps

Transmit B2B Credit is 0

Receive B2B Credit is 12

Receive data field Size is 2112

Beacon is turned off

5 minutes input rate 2905056 bits/sec, 363132 bytes/sec, 498 frames/sec

5 minutes output rate 1480184 bits/sec, 185023 bytes/sec, 330 frames/sec

867932 frames input, 632889576 bytes

0 discards, 0 errors

0 CRC,  0 unknown class

0 too long, 0 too short

576681 frames output, 322771132 bytes

0 discards, 0 errors

0 input OLS, 0 LRR, 0 NOS, 2 loop inits

0 output OLS, 0 LRR, 0 NOS, 2 loop inits

MDS9216# show interface fc 1/15

fc1/15 is up

Hardware is Fibre Channel

Port WWN is 20:0f:00:05:30:00:47:9e

Admin port mode is ST

Port mode is ST

Port vsan is 1

Speed is 1 Gbps

Rspan tunnel is fc-tunnel 13

Beacon is turned off

5 minutes input rate 4391896 bits/sec, 548987 bytes/sec, 827 frames/sec

5 minutes output rate 4391896 bits/sec, 548987 bytes/sec, 820 frames/sec

1431232 frames input, 941079708 bytes

0 discards, 0 errors

0 CRC,  0 unknown class

0 too long, 0 too short

1406853 frames output, 941079708 bytes

0 discards, 0 errors

0 input OLS, 0 LRR, 0 NOS, 0 loop inits

0 output OLS, 0 LRR, 0 NOS, 0 loop inits

MDS9216# show interface fc 1/12

fc1/12 is trunking

Hardware is Fibre Channel

Port WWN is 20:0c:00:05:30:00:47:9e

Peer port WWN is 20:5d:00:05:30:00:51:1e

Admin port mode is auto, trunk mode is on

Port mode is TE

Port vsan is 1

Speed is 2 Gbps

Transmit B2B Credit is 12

Receive B2B Credit is 255

Receive data field Size is 2112

Beacon is turned off

Trunk vsans (admin allowed and active) (1-5,13,20,777)

Trunk vsans (up)                       (1,13)

Trunk vsans (isolated)                 (2-5,20,777)

Trunk vsans (initializing)             ()

5 minutes input rate 384 bits/sec, 48 bytes/sec, 0 frames/sec

5 minutes output rate 4458296 bits/sec, 557287 bytes/sec, 827 frames/sec

19865 frames input, 2220112 bytes

0 discards, 0 errors

0 CRC,  0 unknown class

0 too long, 0 too short

1468709 frames output, 971064244 bytes

0 discards, 0 errors

0 input OLS, 2 LRR, 0 NOS, 0 loop inits

2 output OLS, 2 LRR, 0 NOS, 2 loop inits

MDS9216# show interface fc-tunnel 13

fc-tunnel 13 is up

Dest   IP Addr: 10.0.0.2   Tunnel ID: 13

Source IP Addr: 10.0.0.1   LSP ID: 1

Explicit Path Name:

Outgoing interface: fc1/12

Outgoing Label(s) to Insert: 10005:0:1:ff'h

Record Routes:

10.0.0.2

MDS9216# show interface vsan 13

vsan13 is up, line protocol is up

WWPN is 10:00:00:05:30:00:47:9f, FCID is 0x660201

Internet address is 10.0.0.1/24

MTU 1500 bytes, BW 1000000 Kbit

2207 packets input, 170332 bytes, 0 errors, 0 multicast

14952 packets output, 2225444 bytes, 0 errors, 0 dropped

MDS9216# show span session 1

Session 1 (active)

Destination is fc-tunnel 13

No session filters configured

Ingress (rx) sources are

fc1/16,

Egress (tx) sources are

fc1/16,

MDS9216# show fc-tunnel internal states

number of sessions : 1

Sess: 10.0.0.2 Tunnel-ID 13 Ext-Tunnel-ID 10.0.0.1

MDS9216# show fc-tunnel internal data

vsan interfaces:

vsan 13: 10.0.0.1/255.255.255.0  [2]

vsan 2: 15.0.0.4/255.255.255.0  [2]

next hop switch information:

10.0.0.2 {vsan (13), 0x6b0001/8}: [4] fc1/12

layer 2 interfaces:

fc1/12: Trunking, Up

Configuração do MDS 9509

RTP-9509-1# show run

Building Configuration ...

vsan database

vsan 13

interface vsan13

ip address 10.0.0.2 255.255.255.0

no shutdown

vsan 13 interface fc2/16

boot system bootflash:/m9500-sf1ek9-mzg.1.2.0.77.bin sup-1

boot kickstart bootflash:/m9500-sf1ek9-kickstart-mzg.1.2.0.77.bin sup-1

boot system bootflash:/m9500-sf1ek9-mzg.1.2.0.77.bin sup-2

boot kickstart bootflash:/m9500-sf1ek9-kickstart-mzg.1.2.0.77.bin sup-2

fc-tunnel enable

fc-tunnel tunnel-id-map 13 interface fc2/6

ip routing

switchname RTP-9509-1

interface fc2/6

switchport mode SD

switchport speed 1000

no shutdown

interface fc2/29

switchport mode E

no shutdown

interface mgmt0

ip address 172.18.172.57 255.255.255.0

Exibições do MDS 9509

RTP-9509-1# show interface fc 2/29

fc2/29 is trunking

Hardware is Fibre Channel

Port WWN is 20:5d:00:05:30:00:51:1e

Peer port WWN is 20:0c:00:05:30:00:47:9e

Admin port mode is E, trunk mode is on

Port mode is TE

Port vsan is 501

Speed is 2 Gbps

Transmit B2B Credit is 255

Receive B2B Credit is 12

Receive data field Size is 2112

Beacon is turned off

Trunk vsans (admin allowed and active) (1,13,86,100,501)

Trunk vsans (up)                       (1,13)

Trunk vsans (isolated)                 (86,100,501)

Trunk vsans (initializing)             ()

5 minutes input rate 4497752 bits/sec, 562219 bytes/sec, 835 frames/sec

5 minutes output rate 344 bits/sec, 43 bytes/sec, 0 frames/sec

1934604 frames input, 1285716656 bytes

0 discards, 0 errors

0 CRC,  0 unknown class

0 too long, 0 too short

16903 frames output, 932076 bytes

0 discards, 0 errors

1 input OLS, 1 LRR, 2 NOS, 0 loop inits

3 output OLS, 1 LRR, 2 NOS, 0 loop inits

RTP-9509-1# show interface fc 2/6

fc2/6 is up

Hardware is Fibre Channel

Port WWN is 20:46:00:05:30:00:51:1e

Admin port mode is SD

Port mode is SD

Port vsan is 1

Speed is 1 Gbps

Beacon is turned off

5 minutes input rate 0 bits/sec, 0 bytes/sec, 0 frames/sec

5 minutes output rate 4421448 bits/sec, 552681 bytes/sec, 835 frames/sec

0 frames input, 0 bytes

0 discards, 0 errors

0 CRC,  0 unknown class

0 too long, 0 too short

1912319 frames output, 1263982444 bytes

0 discards, 0 errors

0 input OLS, 0 LRR, 0 NOS, 0 loop inits

0 output OLS, 0 LRR, 0 NOS, 0 loop inits

RTP-9509-1# show interface fc-tunnel 13

^

% invalid interface range detected at '^' marker.

!--- This is because the tunnel is not defined on the 9509.

RTP-9509-1# show interface vsan 13

vsan13 is up, line protocol is up

WWPN is 10:00:00:05:30:00:51:23, FCID is 0x6b0001

Internet address is 10.0.0.2/24

MTU 1500 bytes, BW 1000000 Kbit

15071 packets input, 2243728 bytes, 0 errors, 1 multicast

2342 packets output, 185864 bytes, 0 errors, 0 dropped

RTP-9509-1# show fc-tunnel tunnel-id-map

tunnel id  egress interface

13             fc2/6

14

RTP-9509-1# show fc-tunnel internal states

number of sessions : 1

Sess: 10.0.0.2 Tunnel-ID 13 Ext-Tunnel-ID 10.0.0.1

RTP-9509-1# show fc-tunnel internal data

vsan interfaces:

vsan 13: 10.0.0.2/255.255.255.0  [2]

next hop switch information:

layer 2 interfaces:

fc2/6: Non-Trunking, Up

Notas para dispositivos de adaptador do analisador de porta

A porta Ethernet é de cobre e detecta automaticamente velocidades de 1 Gbps ou 100 Mbps. Ethereal 0.9(9) ou posterior e WinPcap devem ser instalados no PC.

A porta FC requer um SFP e um cabo LC-to-LC para conexão ao MDS.

Estas são as configurações do switch no PAA:

- As posições do switch são numeradas de 1, 2, 3 e 4 da esquerda para a direita.

- Na próxima lista, um 1 indica que o interruptor dip está LIGADO ou UP. A 0 indica que o interruptor dip está desativado ou desligado.

0001 1G  NTM

1001 1G  ETM

0101 1G  STM

0011 1G  DTM

0000 2G  NTM

1000 2G  ETM

0100 2G  STM

0010 2G  DTM

1111 1G  MNM

!--- Used for diagnostics only.

- O switch 4 determina a velocidade (on = 1G, off = 2G). Os switches 1, 2 e 3 ditam o modo de truncamento. Qualquer alteração exige um ciclo de energia.

Estes são os modos:

- No Truncate Mode (NTM)—Os quadros FC são passados sem nenhuma modificação.

- Ethernet Truncate Mode (ETM)—Reduz o tamanho da carga útil de 528 linhas para 368 linhas, para truncar o quadro FC para um máximo de 1.496 bytes.

- Shallow Truncate Mode (STM)—Reduz o tamanho da carga útil de 528 linhas para 58 linhas, para truncar o quadro FC para um máximo de 256 bytes.

- Deep Truncate Mode (DTM)—Reduz o tamanho da carga útil de 528 linhas para 10 linhas, para truncar o quadro FC para um máximo de 64 bytes.

Verificar

No momento, não há procedimento de verificação disponível para esta configuração.

Troubleshoot

Atualmente, não existem informações disponíveis específicas sobre Troubleshooting para esta configuração.

Informações Relacionadas

- Suporte de hardware para switches multicamada MDS 9000

- Suporte a produtos de rede de armazenamento

- Suporte Técnico - Cisco Systems