Introdução

Este documento descreve o processo para executar uma atualização de firmware para clusters HCI Cisco Nutanix através da Cisco Intersight.

Informações de Apoio

Embora seja recomendável usar o Life Cycle Manager (LCM) ao corrigir o firmware para clusters ISM/IMM, cenários específicos, como encontrar um bug ou Field Notice (FN), podem exigir a seleção de uma versão específica para um upgrade ou downgrade. Nesses casos, as alterações de firmware podem ser aplicadas por meio da Intersight.

Diferentemente do processo LCM, uma atualização off-line requer a edição e o patch do firmware manualmente por host. É obrigatório entender a carga de trabalho e a capacidade do cluster antes da execução dessas ações.

O usuário coloca manualmente o host no Modo de Manutenção, aplica a alteração de firmware via Intersight e, em seguida, sai do Modo de Manutenção. Isso é repetido para cada nó no cluster.

Tip: Para saber mais detalhes sobre o número de nós ausentes simultâneos que um cluster pode suportar, consulte a documentação da Nutanix Cluster Fault Tolerance.

Visão geral das etapas de atualização manual

1. Edite cada uma das Políticas de Firmware com a nova versão de firmware.

2. Implante todos os perfis sem reinicialização imediata para preparar o firmware.

3. Coloque um único nó no Modo de Manutenção através do Prism Element ou do Prism Central.

4. Ative o perfil do servidor no Modo de Manutenção para desligar e religar o servidor e aplicar o firmware.

5. Repita as etapas 3 e 4 para todos os nós no cluster.

6. Verifique se a atualização foi concluída e se o cluster está íntegro

Modificar políticas de firmware

A Intersight envia firmware através de uma política de firmware. Cada nó tem sua própria política e novas versões são selecionadas editando-se essas políticas.

A sintaxe do nome da política de firmware é: ntnx_firmware_<Número de série>_<UUID de implantação>

Localizar e editar políticas

Navegue até Policies > Click Filters > Check Firmware.

Selecione a política a ser modificada e clique em editar.

Selecione a versão de firmware desejada na lista suspensa e clique em Save & Deploy.

Preparar o firmware

Quando o perfil do servidor for reimplantado, verifique se a opção Reinicializar imediatamente está desmarcada. Isso prepara o novo firmware no blade; a alteração só é executada após o próximo ciclo de energia.

Assim que a implantação for iniciada:

- Um novo fluxo de trabalho é exibido na guia Solicitações.

- O download do firmware é iniciado.

- Depois que o servidor é implantado sem uma reinicialização imediata, o Server Profile mostra um status Inconsistente. Isso é esperado até que o perfil seja ativado.

Continue a editar todas as outras políticas de firmware e implante sem reinicialização imediata.

Coloque os servidores no modo de manutenção através do Prism Central ou do Prism Element

Para evitar interrupções, os servidores devem ser colocados no Modo de manutenção para migrar cargas de trabalho antes da reinicialização.

Através do elemento prisma

1. Navegue até Hardware > Diagrama.

2. Selecione o AHV#.

3. Selecione Entrar no modo de manutenção.

Através do Prism Central

1. Navegue até Infraestrutura > Hardware > Clusters.

2. Selecione o Cluster.

3. Selecione o nó específico para colocá-lo no modo Manutenção.

Ative perfis e envie o firmware

Quando o host estiver no Modo de Manutenção, o firmware poderá ser enviado para o Nó

1. Navegue até a guia Profiles.

2. Localize o perfil do servidor no Modo de Manutenção pelo Número de Série.

3. Selecione Ações > Ativar.

(Opcional) Monitore o progresso da atualização do firmware através do console KVM.

Verificar Atualização e Sair do Modo de Manutenção

Quando a ativação for concluída, o status do Server Profile mudará para OK.

O nó agora pode ser retirado do Modo de Manutenção.

Repita o processo para os nós restantes até que todos os perfis mostrem um Status OK.

Verificar Integridade do Cluster

No Prism, verifique se a Resiliência do Cluster está OK.

Informações Relacionadas

Lista de compatibilidade de hardware do Cisco UCS

Matriz de interoperabilidade e compatibilidade de plataforma Nutanix

Pré-verificação do LCM KB-15110: test_cisco_validate_credentials_and_setup

Perform Cisco Nutanix HCI Cluster Offline Upgrade Through Intersight

## Introduction

This document describes the process to manually perform an offline firmware upgrade for Cisco Nutanix HCI clusters using Cisco Intersight when LCM is not used.

## Background Information

While it is recommended to use Life Cycle Manager (LCM) when remediating firmware for ISM/IMM Clusters, specific scenarios—such as hitting a bug or Field Notice (FN)—may require selecting a specific version for an upgrade or downgrade. In these cases, firmware changes can be applied through Intersight.

Unlike the LCM process, an offline upgrade requires editing and patching firmware on a per-host basis. It is mandatory to understand the workload and capacity of the cluster before performing these actions. During this process, the user manually places the host in Maintenance Mode, applies the firmware change via Intersight, and then exits Maintenance Mode. This is repeated for each node in the cluster.

## Manual Upgrade Steps at a Glance

1. Edit the Firmware Policy with the new firmware version.

2. Deploy all profiles without an immediate reboot to stage the firmware.

3. Place the node in Maintenance Mode via Prism Element or Prism Central.

4. Activate the profile for the server in Maintenance Mode to power cycle the server and apply firmware.

5. Repeat steps 3 and 4 for all nodes in the cluster.

## Modify Firmware Policies

Intersight pushes firmware through a Firmware Policy. Each node has its own policy, and new versions are selected by editing these policies.

The syntax for the firmware policy name is: `ntnx_firmware_

_

`

### Locate and Edit Policies

1. Navigate to **Policies** > Click **Filters** > **Type** > Check **Firmware**.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image.png)

2. Select the Policy and click **Edit**.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%201.png)

3. Select the desired firmware version from the drop-down list and click **Save & Deploy**.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%202.png)

### Stage the Firmware

When redeploying the server profile, ensure the **Reboot Immediately** option is **unchecked**. This stages the new firmware on the blade; the change is only executed after the next power cycle. This method saves time by staging firmware across all nodes simultaneously.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%203.png)

Once deployment starts:

* A new workflow appears in the **Requests** tab.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%204.png)

* The firmware download is initiated.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%205.png)

* After the server is deployed without an immediate reboot, the Server Profile will show an **Inconsistent** status. This is expected until the profile is activated.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%206.png)

## Place Servers in Maintenance Mode Through Prism Central or Prism Element

To avoid disruption, servers must be placed into Maintenance Mode to migrate workloads before the reboot.

### Using Prism Element

1. Navigate to **Hardware** > **Diagram**.

2. Select the **AHV#**.

3. Select **Enter Maintenance Mode**.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%207.png)

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%208.png)

### Using Prism Central

1. Navigate to **Infrastructure** > **Hardware** > **Clusters**.

2. Select the **Cluster**.

3. Select the specific **Node** to place it in Maintenance Mode.

## Activate Profiles and Push Firmware

Once the host is in Maintenance Mode, you can push the firmware.

1. Navigate to the **Profiles** tab.

2. Locate the profile of the server in Maintenance Mode using its Serial Number.

3. Select **Actions** > **Activate**.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%209.png)

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2010.png)

4. (Optional) Monitor the firmware upgrade progress through the KVM console.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2011.png)

## Verify Upgrade and Exit Maintenance Mode

Once the activation is complete:

1. The Server Profile status transitions to **OK**.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2012.png)

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2013.png)

2. The node can now be taken out of Maintenance Mode.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2014.png)

3. Repeat the process for the remaining nodes until all profiles show an **OK** status.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2015.png)

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2016.png)