Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Tarefa 1. Verificar Condições

Tarefa 2. Configurar FTD HA em FPR9300

Condições

Tarefa 3. Verificar a HA e a Licença do FTD

Tarefa 4. Alternar as Funções de Failover

Tarefa 5. Quebrar o par de alta disponibilidade

Tarefa 6. Desabilitar par HA

Tarefa 7. Suspender HA

Perguntas frequentes

Informações Relacionadas

Introduction

Este documento descreve como configurar e verificar a alta disponibilidade (HA) do Firepower Threat Defense (FTD) (failover ativo/standby) no FPR9300.

Prerequisites

Requirements

Não existem requisitos específicos para este documento.

Componentes Utilizados

As informações neste documento são baseadas nestas versões de software e hardware:

- 2x dispositivo de segurança Cisco Firepower 9300 – FXOS SW 2.0(1.23)

- FTD versão 10.10.1.1 (build 1023)

- Firepower Management Center (FMC) – SW 10.10.1.1 (build 1023)

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. Se a rede estiver ativa, certifique-se de que você entenda o impacto potencial de qualquer comando.

Note: Em um dispositivo FPR9300 com FTD, você pode configurar somente HA entre chassis. As duas unidades em uma configuração de HA devem atender às condições mencionadas neste documento.

Tarefa 1. Verificar Condições

Requisito da tarefa:

Verifique se ambos os dispositivos FTD atendem aos requisitos da nota e podem ser configurados como unidades HA.

Solução:

Etapa 1. Conecte-se ao IP de gerenciamento FPR9300 e verifique o hardware do módulo.

Verifique o hardware do FPR9300-1.

KSEC-FPR9K-1-A# show server inventory

Server Equipped PID Equipped VID Equipped Serial (SN) Slot Status      Ackd Memory (MB) Ackd Cores

------- ------------ ------------ -------------------- ---------------- ---------------- ----------

1/1     FPR9K-SM-36  V01          FLM19216KK6          Equipped                   262144         36

1/2     FPR9K-SM-36  V01          FLM19206H71          Equipped                   262144         36

1/3     FPR9K-SM-36  V01          FLM19206H7T          Equipped                   262144         36

KSEC-FPR9K-1-A#

Verifique o hardware do FPR9300-2.

KSEC-FPR9K-2-A# show server inventory

Server  Equipped PID Equipped VID Equipped Serial (SN) Slot Status      Ackd Memory (MB) Ackd Cores

------- ------------ ------------ -------------------- ---------------- ---------------- ----------

1/1     FPR9K-SM-36  V01          FLM19206H9T          Equipped                   262144         36

1/2     FPR9K-SM-36  V01          FLM19216KAX          Equipped                   262144         36

1/3     FPR9K-SM-36  V01          FLM19267A63          Equipped                   262144         36

KSEC-FPR9K-2-A#

Etapa 2. Efetue login no Gerenciador de chassi do FPR9300-1 e navegue até Dispositivos lógicos.

Verifique a versão do software, o número e o tipo de interfaces conforme mostrado nas imagens.

FPR9300-1

FPR9300-2

Tarefa 2. Configurar FTD HA em FPR9300

Requisito da tarefa:

Configure failover ativo/standby (HA) de acordo com este diagrama.

Solução:

Ambos os dispositivos do FTD já estão registrados no FMC, conforme mostrado na imagem.

Etapa 1. Para configurar o failover de FTD, navegue para Devices > Device Management e selecione Add High Availability como mostrado na imagem.

Etapa 2. Insira o Correspondente primário e o Correspondente secundário e selecione Continuar como mostrado na imagem.

aviso: Certifique-se de selecionar a unidade correta como a unidade primária. Todas as configurações na unidade primária selecionada são replicadas na unidade FTD secundária selecionada. Como resultado da replicação, a configuração atual na unidade secundária pode ser substituída.

Condições

Para criar uma HA entre os dois dispositivos do FTD, estas condições devem ser atendidas:

- O mesmo modelo

- A mesma versão; isso se aplica ao FXOS e ao FTD – o principal (primeiro número), o secundário (segundo número) e o de manutenção (terceiro número) devem ser iguais

- O mesmo número de interfaces

- O mesmo tipo de interfaces

- Ambos os dispositivos como parte do mesmo grupo/domínio no FMC

- Ter a configuração idêntica do Network Time Protocol (NTP)

- Ser totalmente implantados no FMC, sem alterações não confirmadas

- Estar no mesmo modo de firewall: roteado ou transparente.

- Observe que isso deve ser verificado nos dispositivos do FTD e na GUI do FMC, pois houve casos em que os FTDs tinham o mesmo modo, mas o FMC não refletia isso.

- Não tem DHCP/Point-to-Point Protocol over Ethernet (PPPoE) configurado em nenhuma das interfaces

- Nome de host diferente (nome de domínio totalmente qualificado -FQDN) para ambos os chassis. Para verificar o nome de host do chassi, navegue até a CLI do FTD e execute este comando:

firepower# show chassis-management-url

https://KSEC-FPR9K-1.cisco.com:443//

Note: A partir do FTD 6.3, use o comando 'show chassis detail'

firepower# show chassis detail

Chassis URL              : https://KSEC-FPR4100-1:443//

Chassis IP               : 192.0.2.1

Chassis Serial Number    : JMX12345678

Security Module          : 1

Se os dois chassis tiverem o mesmo nome, altere o nome em um deles usando estes comandos:

KSEC-FPR9K-1-A# scope system

KSEC-FPR9K-1-A /system # set name FPR9K-1new

Warning: System name modification changes FC zone name and redeploys them non-disruptively

KSEC-FPR9K-1-A /system* # commit-buffer

FPR9K-1-A /system # exit

FPR9K-1new-A#

Depois de alterar o nome do chassi, cancele o registro do FTD no FMC e registre-o novamente. Em seguida, continue a criação do par de HA.

Etapa 3. Configurar o HA e definir as configurações dos links.

No seu caso, o link de estado tem as mesmas configurações do link de alta disponibilidade.

Selecione Adicionar e aguarde alguns minutos para que o par de HA seja implantado, conforme mostrado na imagem.

Etapa 4. Configurar as interfaces de dados (endereços IP principal e standby)

Na GUI do FMC, selecione Editar da HA, conforme mostrado na imagem.

Etapa 5. Configure as definições da interface conforme mostrado nas imagens.

Interface Ethernet 1/5.

Interface Ethernet 1/6.

Etapa 6. Navegue até High Availability e selecione o nome da interface Edit para adicionar os endereços IP de standby como mostrado na imagem.

Etapa 7. Para a interface interna, conforme mostrado na imagem.

Etapa 8. Faça o mesmo para a interface externa.

Etapa 9. Verifique o resultado conforme mostrado na imagem.

Etapa 10. Fique na guia High Availability (Alta disponibilidade) e configure os endereços MAC virtuais conforme mostrado na imagem.

Etapa 11. Para a interface interna, veja a imagem.

Etapa 12. Faça o mesmo para a interface externa.

Etapa 13. Verifique o resultado conforme mostrado na imagem.

Etapa 14. Depois de configurar as alterações, selecione Salvar e Implantar.

Tarefa 3. Verificar a HA e a Licença do FTD

Requisito da tarefa:

Verifique as configurações de HA do FTD e licenças ativadas na GUI do FMC e na CLI do FTD.

Solução:

Etapa 1. Navegue até Resumo e verifique as configurações de HA e as licenças ativadas conforme mostrado na imagem.

Etapa 2. Na CLI FTD CLISH, execute estes comandos:

> show high-availability config

Failover On

Failover unit Primary

Failover LAN Interface: fover_link Ethernet1/4 (up)

Reconnect timeout 0:00:00

Unit Poll frequency 1 seconds, holdtime 15 seconds

Interface Poll frequency 5 seconds, holdtime 25 seconds

Interface Policy 1

Monitored Interfaces 1 of 1041 maximum

MAC Address Move Notification Interval not set

failover replication http

Version: Ours 9.6(1), Mate 9.6(1)

Serial Number: Ours FLM19267A63, Mate FLM19206H7T

Last Failover at: 18:32:38 EEST Jul 21 2016

This host: Primary - Active

Active time: 3505 (sec)

slot 0: UCSB-B200-M3-U hw/sw rev (0.0/9.6(1)) status (Up Sys)

Interface diagnostic (0.0.0.0): Normal (Waiting)

slot 1: snort rev (1.0)  status (up)

slot 2: diskstatus rev (1.0)  status (up)

Other host: Secondary - Standby Ready

Active time: 172 (sec)

slot 0: UCSB-B200-M3-U hw/sw rev (0.0/9.6(1)) status (Up Sys)

Interface diagnostic (0.0.0.0): Normal (Waiting)

slot 1: snort rev (1.0)  status (up)

slot 2: diskstatus rev (1.0)  status (up)

Stateful Failover Logical Update Statistics

Link : fover_link Ethernet1/4 (up)

Stateful Obj  xmit       xerr       rcv        rerr

General 417        0          416        0

sys cmd   416        0          416        0

up time   0          0          0          0

RPC services   0          0          0          0

TCP conn  0          0          0          0

UDP conn  0          0          0          0

ARP tbl   0          0          0          0

Xlate_Timeout   0          0          0          0

IPv6 ND tbl   0          0          0          0

VPN IKEv1 SA  0          0          0          0

VPN IKEv1 P2  0          0          0          0

VPN IKEv2 SA  0          0          0          0

VPN IKEv2 P2  0          0          0          0

VPN CTCP upd  0          0          0          0

VPN SDI upd  0          0          0          0

VPN DHCP upd  0          0          0          0

SIP Session  0          0          0          0

SIP Tx  0          0          0          0

SIP Pinhole  0          0          0          0

Route Session  0          0          0          0

Router ID  0          0          0          0

User-Identity  1          0          0          0

CTS SGTNAME  0          0          0          0

CTS PAC  0          0          0          0

TrustSec-SXP  0          0          0          0

IPv6 Route  0          0          0          0

STS Table  0          0          0          0

Logical Update Queue Information

Cur  Max  Total

Recv Q:  0  10  416

Xmit Q:  0  11  2118

>

Etapa 3. Faça o mesmo no dispositivo secundário.

Etapa 4. Executar o comando show failover state na CLI LINA:

firepower# show failover state

State          Last Failure Reason      Date/Time

This host  -   Primary

Active         None

Other host -   Secondary

Standby Ready  Comm Failure             18:32:56 EEST Jul 21 2016

====Configuration State===

Sync Done

====Communication State===

Mac set

firepower#

Etapa 5. Verifique a configuração a partir da unidade Primária (LINA CLI):

firepower# show running-config failover

failover

failover lan unit primary

failover lan interface fover_link Ethernet1/4

failover replication http

failover mac address Ethernet1/5 aaaa.bbbb.1111 aaaa.bbbb.2222

failover mac address Ethernet1/6 aaaa.bbbb.3333 aaaa.bbbb.4444

failover link fover_link Ethernet1/4

failover interface ip fover_link 10.10.1.1 255.255.255.0 standby 10.10.1.2

firepower#

firepower# show running-config interface

!

interface Ethernet1/2

management-only

nameif diagnostic

security-level 0

no ip address

!

interface Ethernet1/4

description LAN/STATE Failover Interface

!

interface Ethernet1/5

nameif Inside

security-level 0

ip address 192.168.75.10 255.255.255.0 standby 192.168.75.11

!

interface Ethernet1/6

nameif Outside

security-level 0

ip address 192.168.76.10 255.255.255.0 standby 192.168.76.11

firepower#

Tarefa 4. Alternar as Funções de Failover

Requisito da tarefa:

No FMC, alterne as funções de failover de primária/ativa, secundária/standby para primária/standby, secundária/ativa

Solução:

Etapa 1. Selecione o ícone conforme mostrado na imagem.

Etapa 2. Confirme a ação na janela pop-up conforme mostrado na imagem.

Etapa 3. Verifique o resultado conforme mostrado na imagem.

Na CLI do LINA, você pode ver que o comando no failover active foi executado na unidade primária/ativa:

Jul 22 2016 10:39:26: %ASA-5-111008: User 'enable_15' executed the 'no failover active' command.

Jul 22 2016 10:39:26: %ASA-5-111010: User 'enable_15', running 'N/A' from IP 0.0.0.0, executed 'no failover active'

Você também pode verificar isso na saída do comando show failover history:

firepower# show failover history

==========================================================================

From State                 To State                   Reason

10:39:26 EEST Jul 22 2016

Active                     Standby Ready              Set by the config command

Passo 4. Após a verificação, torne a unidade Primária Ativa novamente.

Tarefa 5. Quebrar o par de alta disponibilidade

Requisito da tarefa:

No FMC, interrompa o par de failover.

Solução:

Etapa 1. Selecione o ícone conforme mostrado na imagem.

Etapa 2. Verifique a notificação conforme mostrado na imagem.

Etapa 3. Anote a mensagem conforme mostrado na imagem.

Etapa 4. Verifique o resultado da GUI do FMC conforme mostrado na imagem.

show running-config na unidade primária antes e depois da interrupção da HA:

Antes da interrupção da HA

Depois da interrupção da HA

firepower# sh run

: Saved

:

: Serial Number: FLM19267A63

: Hardware:   FPR9K-SM-36, 135839 MB RAM, CPU Xeon E5 series 2294 MHz, 2 CPUs (72 cores)

:

NGFW Version 10.10.1.1

!

hostname firepower

enable password 8Ry2YjIyt7RRXU24 encrypted

names

!

interface Ethernet1/2

management-only

nameif diagnostic

security-level 0

no ip address

!

interface Ethernet1/4

description LAN/STATE Failover Interface

!

interface Ethernet1/5

nameif Inside

security-level 0

ip address 192.168.75.10 255.255.255.0 standby 192.168.75.11

!

interface Ethernet1/6

nameif Outside

security-level 0

ip address 192.168.76.10 255.255.255.0 standby 192.168.76.11

!

ftp mode passive

ngips conn-match vlan-id

access-list CSM_FW_ACL_ remark rule-id 268447744: ACCESS POLICY: FTD9300 - Mandatory/1

access-list CSM_FW_ACL_ remark rule-id 268447744: L4 RULE: Allow_ICMP

access-list CSM_FW_ACL_ advanced permit icmp any any rule-id 268447744 event-log both

access-list CSM_FW_ACL_ remark rule-id 268441600: ACCESS POLICY: FTD9300 - Default/1

access-list CSM_FW_ACL_ remark rule-id 268441600: L4 RULE: DEFAULT ACTION RULE

access-list CSM_FW_ACL_ advanced permit ip any any rule-id 268441600

!

tcp-map UM_STATIC_TCP_MAP

tcp-options range 6 7 allow

tcp-options range 9 255 allow

urgent-flag allow

!

no pager

logging enable

logging timestamp

logging standby

logging buffer-size 100000

logging buffered debugging

logging flash-minimum-free 1024

logging flash-maximum-allocation 3076

mtu diagnostic 1500

mtu Inside 1500

mtu Outside 1500

failover

failover lan unit primary

failover lan interface fover_link Ethernet1/4

failover replication http

failover mac address Ethernet1/5 aaaa.bbbb.1111 aaaa.bbbb.2222

failover mac address Ethernet1/6 aaaa.bbbb.3333 aaaa.bbbb.4444

failover link fover_link Ethernet1/4

failover interface ip fover_link 10.10.1.1 255.255.255.0 standby 10.10.1.2

icmp unreachable rate-limit 1 burst-size 1

no asdm history enable

arp timeout 14400

no arp permit-nonconnected

access-group CSM_FW_ACL_ global

timeout xlate 3:00:00

timeout pat-xlate 0:00:30

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 sctp 0:02:00 icmp 0:00:02

timeout sunrpc 0:10:00 h323 0:05:00 h225 1:00:00 mgcp 0:05:00 mgcp-pat 0:05:00

timeout sip 0:30:00 sip_media 0:02:00 sip-invite 0:03:00 sip-disconnect 0:02:00

timeout sip-provisional-media 0:02:00 uauth 0:05:00 absolute

timeout tcp-proxy-reassembly 0:00:30

timeout floating-conn 0:00:00

aaa proxy-limit disable

no snmp-server location

no snmp-server contact

no snmp-server enable traps snmp authentication linkup linkdown coldstart warmstart

crypto ipsec security-association pmtu-aging infinite

crypto ca trustpool policy

telnet timeout 5

ssh stricthostkeycheck

ssh timeout 5

ssh key-exchange group dh-group1-sha1

console timeout 0

dynamic-access-policy-record DfltAccessPolicy

!

class-map inspection_default

match default-inspection-traffic

!

!

policy-map type inspect dns preset_dns_map

parameters

message-length maximum client auto

message-length maximum 512

policy-map type inspect ip-options UM_STATIC_IP_OPTIONS_MAP

parameters

eool action allow

nop action allow

router-alert action allow

policy-map global_policy

class inspection_default

inspect dns preset_dns_map

inspect ftp

inspect h323 h225

inspect h323 ras

inspect rsh

inspect rtsp

inspect sqlnet

inspect skinny

inspect sunrpc

inspect xdmcp

inspect sip

inspect netbios

inspect tftp

inspect icmp

inspect icmp error

inspect dcerpc

inspect ip-options UM_STATIC_IP_OPTIONS_MAP

class class-default

set connection advanced-options UM_STATIC_TCP_MAP

!

service-policy global_policy global

prompt hostname context

call-home

profile CiscoTAC-1

no active

destination address http https://tools.cisco.com/its/service/oddce/services/DDCEService

destination address email callhome@cisco.com

destination transport-method http

subscribe-to-alert-group diagnostic

subscribe-to-alert-group environment

subscribe-to-alert-group inventory periodic monthly

subscribe-to-alert-group configuration periodic monthly

subscribe-to-alert-group telemetry periodic daily

Cryptochecksum:933c594fc0264082edc0f24bad358031

: end

firepower#

firepower# sh run

: Saved

:

: Serial Number: FLM19267A63

: Hardware:   FPR9K-SM-36, 135839 MB RAM, CPU Xeon E5 series 2294 MHz, 2 CPUs (72 cores)

:

NGFW Version 10.10.1.1

!

hostname firepower

enable password 8Ry2YjIyt7RRXU24 encrypted

names

!

interface Ethernet1/2

management-only

nameif diagnostic

security-level 0

no ip address

!

interface Ethernet1/4

no nameif

no security-level

no ip address

!

interface Ethernet1/5

nameif Inside

security-level 0

ip address 192.168.75.10 255.255.255.0 standby 192.168.75.11

!

interface Ethernet1/6

nameif Outside

security-level 0

ip address 192.168.76.10 255.255.255.0 standby 192.168.76.11

!

ftp mode passive

ngips conn-match vlan-id

access-list CSM_FW_ACL_ remark rule-id 268447744: ACCESS POLICY: FTD9300 - Mandatory/1

access-list CSM_FW_ACL_ remark rule-id 268447744: L4 RULE: Allow_ICMP

access-list CSM_FW_ACL_ advanced permit icmp any any rule-id 268447744 event-log both

access-list CSM_FW_ACL_ remark rule-id 268441600: ACCESS POLICY: FTD9300 - Default/1

access-list CSM_FW_ACL_ remark rule-id 268441600: L4 RULE: DEFAULT ACTION RULE

access-list CSM_FW_ACL_ advanced permit ip any any rule-id 268441600

!

tcp-map UM_STATIC_TCP_MAP

tcp-options range 6 7 allow

tcp-options range 9 255 allow

urgent-flag allow

!

no pager

logging enable

logging timestamp

logging standby

logging buffer-size 100000

logging buffered debugging

logging flash-minimum-free 1024

logging flash-maximum-allocation 3076

mtu diagnostic 1500

mtu Inside 1500

mtu Outside 1500

no failover

no monitor-interface service-module

icmp unreachable rate-limit 1 burst-size 1

no asdm history enable

arp timeout 14400

no arp permit-nonconnected

access-group CSM_FW_ACL_ global

timeout xlate 3:00:00

timeout pat-xlate 0:00:30

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 sctp 0:02:00 icmp 0:00:02

timeout sunrpc 0:10:00 h323 0:05:00 h225 1:00:00 mgcp 0:05:00 mgcp-pat 0:05:00

timeout sip 0:30:00 sip_media 0:02:00 sip-invite 0:03:00 sip-disconnect 0:02:00

timeout sip-provisional-media 0:02:00 uauth 0:05:00 absolute

timeout tcp-proxy-reassembly 0:00:30

timeout floating-conn 0:00:00

aaa proxy-limit disable

no snmp-server location

no snmp-server contact

no snmp-server enable traps snmp authentication linkup linkdown coldstart warmstart

crypto ipsec security-association pmtu-aging infinite

crypto ca trustpool policy

telnet timeout 5

ssh stricthostkeycheck

ssh timeout 5

ssh key-exchange group dh-group1-sha1

console timeout 0

dynamic-access-policy-record DfltAccessPolicy

!

class-map inspection_default

match default-inspection-traffic

!

!

policy-map type inspect dns preset_dns_map

parameters

message-length maximum client auto

message-length maximum 512

policy-map type inspect ip-options UM_STATIC_IP_OPTIONS_MAP

parameters

eool action allow

nop action allow

router-alert action allow

policy-map global_policy

class inspection_default

inspect dns preset_dns_map

inspect ftp

inspect h323 h225

inspect h323 ras

inspect rsh

inspect rtsp

inspect sqlnet

inspect skinny

inspect sunrpc

inspect xdmcp

inspect sip

inspect netbios

inspect tftp

inspect icmp

inspect icmp error

inspect dcerpc

inspect ip-options UM_STATIC_IP_OPTIONS_MAP

class class-default

set connection advanced-options UM_STATIC_TCP_MAP

!

service-policy global_policy global

prompt hostname context

call-home

profile CiscoTAC-1

no active

destination address http https://tools.cisco.com/its/service/oddce/services/DDCEService

destination address email callhome@cisco.com

destination transport-method http

subscribe-to-alert-group diagnostic

subscribe-to-alert-group environment

subscribe-to-alert-group inventory periodic monthly

subscribe-to-alert-group configuration periodic monthly

subscribe-to-alert-group telemetry periodic daily

Cryptochecksum:fb6f5c369dee730b9125650517dbb059

: end

firepower#

show running-config na unidade secundária antes e depois da interrupção da HA, conforme mostrado na tabela aqui.

Antes da interrupção da HA

Depois da interrupção da HA

firepower# sh run

: Saved

:

: Serial Number: FLM19206H7T

: Hardware:   FPR9K-SM-36, 135841 MB RAM, CPU Xeon E5 series 2294 MHz, 2 CPUs (72 cores)

:

NGFW Version 10.10.1.1

!

hostname firepower

enable password 8Ry2YjIyt7RRXU24 encrypted

names

!

interface Ethernet1/2

management-only

nameif diagnostic

security-level 0

no ip address

!

interface Ethernet1/4

description LAN/STATE Failover Interface

!

interface Ethernet1/5

nameif Inside

security-level 0

ip address 192.168.75.10 255.255.255.0 standby 192.168.75.11

!

interface Ethernet1/6

nameif Outside

security-level 0

ip address 192.168.76.10 255.255.255.0 standby 192.168.76.11

!

ftp mode passive

ngips conn-match vlan-id

access-list CSM_FW_ACL_ remark rule-id 268447744: ACCESS POLICY: FTD9300 - Mandatory/1

access-list CSM_FW_ACL_ remark rule-id 268447744: L4 RULE: Allow_ICMP

access-list CSM_FW_ACL_ advanced permit icmp any any rule-id 268447744 event-log both

access-list CSM_FW_ACL_ remark rule-id 268441600: ACCESS POLICY: FTD9300 - Default/1

access-list CSM_FW_ACL_ remark rule-id 268441600: L4 RULE: DEFAULT ACTION RULE

access-list CSM_FW_ACL_ advanced permit ip any any rule-id 268441600

!

tcp-map UM_STATIC_TCP_MAP

tcp-options range 6 7 allow

tcp-options range 9 255 allow

urgent-flag allow

!

no pager

logging enable

logging timestamp

logging standby

logging buffer-size 100000

logging buffered debugging

logging flash-minimum-free 1024

logging flash-maximum-allocation 3076

mtu diagnostic 1500

mtu Inside 1500

mtu Outside 1500

failover

failover lan unit secondary

failover lan interface fover_link Ethernet1/4

failover replication http

failover mac address Ethernet1/5 aaaa.bbbb.1111 aaaa.bbbb.2222

failover mac address Ethernet1/6 aaaa.bbbb.3333 aaaa.bbbb.4444

failover link fover_link Ethernet1/4

failover interface ip fover_link 10.10.1.1 255.255.255.0 standby 10.10.1.2

icmp unreachable rate-limit 1 burst-size 1

no asdm history enable

arp timeout 14400

no arp permit-nonconnected

access-group CSM_FW_ACL_ global

timeout xlate 3:00:00

timeout pat-xlate 0:00:30

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 sctp 0:02:00 icmp 0:00:02

timeout sunrpc 0:10:00 h323 0:05:00 h225 1:00:00 mgcp 0:05:00 mgcp-pat 0:05:00

timeout sip 0:30:00 sip_media 0:02:00 sip-invite 0:03:00 sip-disconnect 0:02:00

timeout sip-provisional-media 0:02:00 uauth 0:05:00 absolute

timeout tcp-proxy-reassembly 0:00:30

timeout floating-conn 0:00:00

user-identity default-domain LOCAL

aaa proxy-limit disable

no snmp-server location

no snmp-server contact

no snmp-server enable traps snmp authentication linkup linkdown coldstart warmstart

crypto ipsec security-association pmtu-aging infinite

crypto ca trustpool policy

telnet timeout 5

ssh stricthostkeycheck

ssh timeout 5

ssh key-exchange group dh-group1-sha1

console timeout 0

dynamic-access-policy-record DfltAccessPolicy

!

class-map inspection_default

match default-inspection-traffic

!

!

policy-map type inspect dns preset_dns_map

parameters

message-length maximum client auto

message-length maximum 512

policy-map type inspect ip-options UM_STATIC_IP_OPTIONS_MAP

parameters

eool action allow

nop action allow

router-alert action allow

policy-map global_policy

class inspection_default

inspect dns preset_dns_map

inspect ftp

inspect h323 h225

inspect h323 ras

inspect rsh

inspect rtsp

inspect sqlnet

inspect skinny

inspect sunrpc

inspect xdmcp

inspect sip

inspect netbios

inspect tftp

inspect icmp

inspect icmp error

inspect dcerpc

inspect ip-options UM_STATIC_IP_OPTIONS_MAP

class class-default

set connection advanced-options UM_STATIC_TCP_MAP

!

service-policy global_policy global

prompt hostname context

call-home

profile CiscoTAC-1

no active

destination address http https://tools.cisco.com/its/service/oddce/services/DDCEService

destination address email callhome@cisco.com

destination transport-method http

subscribe-to-alert-group diagnostic

subscribe-to-alert-group environment

subscribe-to-alert-group inventory periodic monthly

subscribe-to-alert-group configuration periodic monthly

subscribe-to-alert-group telemetry periodic daily

Cryptochecksum:e648f92dd7ef47ee611f2aaa5c6cbd84

: end

firepower#

firepower# sh run

: Saved

:

: Serial Number: FLM19206H7T

: Hardware:   FPR9K-SM-36, 135841 MB RAM, CPU Xeon E5 series 2294 MHz, 2 CPUs (72 cores)

:

NGFW Version 10.10.1.1

!

hostname firepower

enable password 8Ry2YjIyt7RRXU24 encrypted

names

!

interface Ethernet1/2

management-only

nameif diagnostic

security-level 0

no ip address

!

interface Ethernet1/4

shutdown

no nameif

no security-level

no ip address

!

interface Ethernet1/5

shutdown

no nameif

no security-level

no ip address

!

interface Ethernet1/6

shutdown

no nameif

no security-level

no ip address

!

ftp mode passive

ngips conn-match vlan-id

access-list CSM_FW_ACL_ remark rule-id 268447744: ACCESS POLICY: FTD9300 - Mandatory/1

access-list CSM_FW_ACL_ remark rule-id 268447744: L4 RULE: Allow_ICMP

access-list CSM_FW_ACL_ advanced permit icmp any any rule-id 268447744 event-log both

access-list CSM_FW_ACL_ remark rule-id 268441600: ACCESS POLICY: FTD9300 - Default/1

access-list CSM_FW_ACL_ remark rule-id 268441600: L4 RULE: DEFAULT ACTION RULE

access-list CSM_FW_ACL_ advanced permit ip any any rule-id 268441600

!

tcp-map UM_STATIC_TCP_MAP

tcp-options range 6 7 allow

tcp-options range 9 255 allow

urgent-flag allow

!

no pager

no logging message 106015

no logging message 313001

no logging message 313008

no logging message 106023

no logging message 710003

no logging message 106100

no logging message 302015

no logging message 302014

no logging message 302013

no logging message 302018

no logging message 302017

no logging message 302016

no logging message 302021

no logging message 302020

mtu diagnostic 1500

no failover

no monitor-interface service-module

icmp unreachable rate-limit 1 burst-size 1

no asdm history enable

arp timeout 14400

no arp permit-nonconnected

access-group CSM_FW_ACL_ global

timeout xlate 3:00:00

timeout pat-xlate 0:00:30

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 sctp 0:02:00 icmp 0:00:02

timeout sunrpc 0:10:00 h323 0:05:00 h225 1:00:00 mgcp 0:05:00 mgcp-pat 0:05:00

timeout sip 0:30:00 sip_media 0:02:00 sip-invite 0:03:00 sip-disconnect 0:02:00

timeout sip-provisional-media 0:02:00 uauth 0:05:00 absolute

timeout tcp-proxy-reassembly 0:00:30

timeout floating-conn 0:00:00

aaa proxy-limit disable

no snmp-server location

no snmp-server contact

no snmp-server enable traps snmp authentication linkup linkdown coldstart warmstart

crypto ipsec security-association pmtu-aging infinite

crypto ca trustpool policy

telnet timeout 5

ssh stricthostkeycheck

ssh timeout 5

ssh key-exchange group dh-group1-sha1

console timeout 0

dynamic-access-policy-record DfltAccessPolicy

!

class-map inspection_default

match default-inspection-traffic

!

!

policy-map type inspect dns preset_dns_map

parameters

message-length maximum client auto

message-length maximum 512

policy-map type inspect ip-options UM_STATIC_IP_OPTIONS_MAP

parameters

eool action allow

nop action allow

router-alert action allow

policy-map global_policy

class inspection_default

inspect dns preset_dns_map

inspect ftp

inspect h323 h225

inspect h323 ras

inspect rsh

inspect rtsp

inspect sqlnet

inspect skinny

inspect sunrpc

inspect xdmcp

inspect sip

inspect netbios

inspect tftp

inspect icmp

inspect icmp error

inspect dcerpc

inspect ip-options UM_STATIC_IP_OPTIONS_MAP

class class-default

set connection advanced-options UM_STATIC_TCP_MAP

!

service-policy global_policy global

prompt hostname context

call-home

profile CiscoTAC-1

no active

destination address http https://tools.cisco.com/its/service/oddce/services/DDCEService

destination address email callhome@cisco.com

destination transport-method http

subscribe-to-alert-group diagnostic

subscribe-to-alert-group environment

subscribe-to-alert-group inventory periodic monthly

subscribe-to-alert-group configuration periodic monthly

subscribe-to-alert-group telemetry periodic daily

Cryptochecksum:08ed87194e9f5cd9149fab3c0e9cefc3

: end

firepower#

Os principais pontos a serem observados na interrupção da HA:

Unidade primária

Unidade secundária

Todas as configurações de failover foram removidas

Os endereços IP em standby permanecem

Todas as configurações foram removidas

Etapa 5. Após concluir esta tarefa, recrie o par HA.

Tarefa 6. Desabilitar par HA

Requisito da tarefa:

No FMC, desative o par de failover.

Solução:

Etapa 1. Selecione o ícone conforme mostrado na imagem.

Etapa 2. Verifique a notificação e confirme conforme mostrado na imagem.

Etapa 3. Depois de excluir o HA, os dois dispositivos não são registrados (removidos) do FMC.

O resultado do show running-config na CLI do LINA, conforme mostrado na tabela aqui:

Unidade primária

Unidade secundária

firepower# sh run

: Saved

:

: Serial Number: FLM19267A63

: Hardware:   FPR9K-SM-36, 135839 MB RAM, CPU Xeon E5 series 2294 MHz, 2 CPUs (72 cores)

:

NGFW Version 10.10.1.1

!

hostname firepower

enable password 8Ry2YjIyt7RRXU24 encrypted

names

!

interface Ethernet1/2

management-only

nameif diagnostic

security-level 0

no ip address

!

interface Ethernet1/4

description LAN/STATE Failover Interface

!

interface Ethernet1/5

nameif Inside

security-level 0

ip address 192.168.75.10 255.255.255.0 standby 192.168.75.11

!

interface Ethernet1/6

nameif Outside

security-level 0

ip address 192.168.76.10 255.255.255.0 standby 192.168.76.11

!

ftp mode passive

ngips conn-match vlan-id

access-list CSM_FW_ACL_ remark rule-id 268447744: ACCESS POLICY: FTD9300 - Mandatory/1

access-list CSM_FW_ACL_ remark rule-id 268447744: L4 RULE: Allow_ICMP

access-list CSM_FW_ACL_ advanced permit icmp any any rule-id 268447744 event-log both

access-list CSM_FW_ACL_ remark rule-id 268441600: ACCESS POLICY: FTD9300 - Default/1

access-list CSM_FW_ACL_ remark rule-id 268441600: L4 RULE: DEFAULT ACTION RULE

access-list CSM_FW_ACL_ advanced permit ip any any rule-id 268441600

!

tcp-map UM_STATIC_TCP_MAP

tcp-options range 6 7 allow

tcp-options range 9 255 allow

urgent-flag allow

!

no pager

logging enable

logging timestamp

logging standby

logging buffer-size 100000

logging buffered debugging

logging flash-minimum-free 1024

logging flash-maximum-allocation 3076

mtu diagnostic 1500

mtu Inside 1500

mtu Outside 1500

failover

failover lan unit primary

failover lan interface fover_link Ethernet1/4

failover replication http

failover mac address Ethernet1/5 aaaa.bbbb.1111 aaaa.bbbb.2222

failover mac address Ethernet1/6 aaaa.bbbb.3333 aaaa.bbbb.4444

failover link fover_link Ethernet1/4

failover interface ip fover_link 10.10.1.1 255.255.255.0 standby 10.10.1.2

icmp unreachable rate-limit 1 burst-size 1

no asdm history enable

arp timeout 14400

no arp permit-nonconnected

access-group CSM_FW_ACL_ global

timeout xlate 3:00:00

timeout pat-xlate 0:00:30

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 sctp 0:02:00 icmp 0:00:02

timeout sunrpc 0:10:00 h323 0:05:00 h225 1:00:00 mgcp 0:05:00 mgcp-pat 0:05:00

timeout sip 0:30:00 sip_media 0:02:00 sip-invite 0:03:00 sip-disconnect 0:02:00

timeout sip-provisional-media 0:02:00 uauth 0:05:00 absolute

timeout tcp-proxy-reassembly 0:00:30

timeout floating-conn 0:00:00

aaa proxy-limit disable

no snmp-server location

no snmp-server contact

no snmp-server enable traps snmp authentication linkup linkdown coldstart warmstart

crypto ipsec security-association pmtu-aging infinite

crypto ca trustpool policy

telnet timeout 5

ssh stricthostkeycheck

ssh timeout 5

ssh key-exchange group dh-group1-sha1

console timeout 0

dynamic-access-policy-record DfltAccessPolicy

!

class-map inspection_default

match default-inspection-traffic

!

!

policy-map type inspect dns preset_dns_map

parameters

message-length maximum client auto

message-length maximum 512

policy-map type inspect ip-options UM_STATIC_IP_OPTIONS_MAP

parameters

eool action allow

nop action allow

router-alert action allow

policy-map global_policy

class inspection_default

inspect dns preset_dns_map

inspect ftp

inspect h323 h225

inspect h323 ras

inspect rsh

inspect rtsp

inspect sqlnet

inspect skinny

inspect sunrpc

inspect xdmcp

inspect sip

inspect netbios

inspect tftp

inspect icmp

inspect icmp error

inspect dcerpc

inspect ip-options UM_STATIC_IP_OPTIONS_MAP

class class-default

set connection advanced-options UM_STATIC_TCP_MAP

!

service-policy global_policy global

prompt hostname context

call-home

profile CiscoTAC-1

no active

destination address http https://tools.cisco.com/its/service/oddce/services/DDCEService

destination address email callhome@cisco.com

destination transport-method http

subscribe-to-alert-group diagnostic

subscribe-to-alert-group environment

subscribe-to-alert-group inventory periodic monthly

subscribe-to-alert-group configuration periodic monthly

subscribe-to-alert-group telemetry periodic daily

Cryptochecksum:933c594fc0264082edc0f24bad358031

: end

firepower#

firepower# sh run

: Saved

:

: Serial Number: FLM19206H7T

: Hardware:   FPR9K-SM-36, 135841 MB RAM, CPU Xeon E5 series 2294 MHz, 2 CPUs (72 cores)

:

NGFW Version 10.10.1.1

!

hostname firepower

enable password 8Ry2YjIyt7RRXU24 encrypted

names

!

interface Ethernet1/2

management-only

nameif diagnostic

security-level 0

no ip address

!

interface Ethernet1/4

description LAN/STATE Failover Interface

!

interface Ethernet1/5

nameif Inside

security-level 0

ip address 192.168.75.10 255.255.255.0 standby 192.168.75.11

!

interface Ethernet1/6

nameif Outside

security-level 0

ip address 192.168.76.10 255.255.255.0 standby 192.168.76.11

!

ftp mode passive

ngips conn-match vlan-id

access-list CSM_FW_ACL_ remark rule-id 268447744: ACCESS POLICY: FTD9300 - Mandatory/1

access-list CSM_FW_ACL_ remark rule-id 268447744: L4 RULE: Allow_ICMP

access-list CSM_FW_ACL_ advanced permit icmp any any rule-id 268447744 event-log both

access-list CSM_FW_ACL_ remark rule-id 268441600: ACCESS POLICY: FTD9300 - Default/1

access-list CSM_FW_ACL_ remark rule-id 268441600: L4 RULE: DEFAULT ACTION RULE

access-list CSM_FW_ACL_ advanced permit ip any any rule-id 268441600

!

tcp-map UM_STATIC_TCP_MAP

tcp-options range 6 7 allow

tcp-options range 9 255 allow

urgent-flag allow

!

no pager

logging enable

logging timestamp

logging standby

logging buffer-size 100000

logging buffered debugging

logging flash-minimum-free 1024

logging flash-maximum-allocation 3076

mtu diagnostic 1500

mtu Inside 1500

mtu Outside 1500

failover

failover lan unit secondary

failover lan interface fover_link Ethernet1/4

failover replication http

failover mac address Ethernet1/5 aaaa.bbbb.1111 aaaa.bbbb.2222

failover mac address Ethernet1/6 aaaa.bbbb.3333 aaaa.bbbb.4444

failover link fover_link Ethernet1/4

failover interface ip fover_link 10.10.1.1 255.255.255.0 standby 10.10.1.2

icmp unreachable rate-limit 1 -size 1

no asdm history enable

arp timeout 14400

no arp permit-nonconnected

access-group CSM_FW_ACL_ global

timeout xlate 3:00:00

timeout pat-xlate 0:00:30

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 sctp 0:02:00 icmp 0:00:02

timeout sunrpc 0:10:00 h323 0:05:00 h225 1:00:00 mgcp 0:05:00 mgcp-pat 0:05:00

timeout sip 0:30:00 sip_media 0:02:00 sip-invite 0:03:00 sip-disconnect 0:02:00

timeout sip-provisional-media 0:02:00 uauth 0:05:00 absolute

timeout tcp-proxy-reassembly 0:00:30

timeout floating-conn 0:00:00

user-identity default-domain LOCAL

aaa proxy-limit disable

no snmp-server location

no snmp-server contact

no snmp-server enable traps snmp authentication linkup linkdown coldstart warmstart

crypto ipsec security-association pmtu-aging infinite

crypto ca trustpool policy

telnet timeout 5

ssh stricthostkeycheck

ssh timeout 5

ssh key-exchange group dh-group1-sha1

console timeout 0

dynamic-access-policy-record DfltAccessPolicy

!

class-map inspection_default

match default-inspection-traffic

!

!

policy-map type inspect dns preset_dns_map

parameters

message-length maximum client auto

message-length maximum 512

policy-map type inspect ip-options UM_STATIC_IP_OPTIONS_MAP

parameters

eool action allow

nop action allow

router-alert action allow

policy-map global_policy

class inspection_default

inspect dns preset_dns_map

inspect ftp

inspect h323 h225

inspect h323 ras

inspect rsh

inspect rtsp

inspect sqlnet

inspect skinny

inspect sunrpc

inspect xdmcp

inspect sip

inspect netbios

inspect tftp

inspect icmp

inspect icmp error

inspect dcerpc

inspect ip-options UM_STATIC_IP_OPTIONS_MAP

class class-default

set connection advanced-options UM_STATIC_TCP_MAP

!

service-policy global_policy global

prompt hostname context

call-home

profile CiscoTAC-1

no active

destination address http https://tools.cisco.com/its/service/oddce/services/DDCEService

destination address email callhome@cisco.com

destination transport-method http

subscribe-to-alert-group diagnostic

subscribe-to-alert-group environment

subscribe-to-alert-group inventory periodic monthly

subscribe-to-alert-group configuration periodic monthly

subscribe-to-alert-group telemetry periodic daily

Cryptochecksum:e648f92dd7ef47ee611f2aaa5c6cbd84

: end

firepower#

Etapa 4. Ambos os dispositivos FTD não foram registrados no FMC:

> show managers

No managers configured.

Os principais pontos a serem observados para a opção Desativar HA no FMC:

Unidade primária

Unidade secundária

O dispositivo foi removido do FMC.

Nenhuma configuração foi removida do dispositivo do FTD

O dispositivo foi removido do FMC.
Nenhuma configuração foi removida do dispositivo do FTD

Etapa 5. Execute este comando para remover a configuração de failover dos dispositivos de FTD:

> configure high-availability disable

High-availability will be disabled. Do you really want to continue?

Please enter 'YES' or 'NO': yes

Successfully disabled high-availability.

Note: Você precisa executar o comando nas duas unidades

O resultado:

Unidade primária

Unidade secundária

> show failover

Failover Off

Failover unit Secondary

Failover LAN Interface: not Configured

Reconnect timeout 0:00:00

Unit Poll frequency 1 seconds, holdtime 15 seconds

Interface Poll frequency 5 seconds, holdtime 25 seconds

Interface Policy 1

Monitored Interfaces 2 of 1041 maximum

MAC Address Move Notification Interval not set

>

> show failover

Failover Off (pseudo-Standby)

Failover unit Secondary

Failover LAN Interface: FOVER Ethernet1/3.205 (up)

Reconnect timeout 0:00:00

Unit Poll frequency 1 seconds, holdtime 15 seconds

Interface Poll frequency 5 seconds, holdtime 25 seconds

Interface Policy 1

Monitored Interfaces 0 of 1041 maximum

MAC Address Move Notification Interval not set

failover replication http

>

Preliminar

Secundário

firepower# show run

!

hostname firepower

enable password 8Ry2YjIyt7RRXU24 encrypted

names

arp timeout 14400

no arp permit-nonconnected

arp rate-limit 16384

!

interface GigabitEthernet1/1

nameif outside

cts manual

propagate sgt preserve-untag

policy static sgt disabled trusted

security-level 0

ip address 10.1.1.1 255.255.255.0   <-- standby IP was removed

!

interface GigabitEthernet1/2

nameif inside

cts manual

propagate sgt preserve-untag

policy static sgt disabled trusted

security-level 0

ip address 192.168.1.1 255.255.255.0   <-- standby IP was removed

!

interface GigabitEthernet1/3

description LAN Failover Interface

!

interface GigabitEthernet1/4

description STATE Failover Interface

!

interface GigabitEthernet1/5

shutdown

no nameif

no security-level

no ip address

!

interface GigabitEthernet1/6

shutdown

no nameif

no security-level

no ip address

!

interface GigabitEthernet1/7

shutdown

no nameif

no security-level

no ip address

!

interface GigabitEthernet1/8

shutdown

no nameif

no security-level

no ip address

!

interface Management1/1

management-only

nameif diagnostic

cts manual

propagate sgt preserve-untag

policy static sgt disabled trusted

security-level 0

no ip address

!

ftp mode passive

ngips conn-match vlan-id

access-list CSM_FW_ACL_ remark rule-id 9998: PREFILTER POLICY: Default Tunnel and Priority Policy

access-list CSM_FW_ACL_ remark rule-id 9998: RULE: DEFAULT TUNNEL ACTION RULE

access-list CSM_FW_ACL_ advanced permit ipinip any any rule-id 9998

access-list CSM_FW_ACL_ advanced permit 41 any any rule-id 9998

access-list CSM_FW_ACL_ advanced permit gre any any rule-id 9998

access-list CSM_FW_ACL_ advanced permit udp any any eq 3544 rule-id 9998

access-list CSM_FW_ACL_ remark rule-id 268435456: ACCESS POLICY: FTD_HA - Default/1

access-list CSM_FW_ACL_ remark rule-id 268435456: L4 RULE: DEFAULT ACTION RULE

access-list CSM_FW_ACL_ advanced permit ip any any rule-id 268435456

!

tcp-map UM_STATIC_TCP_MAP

tcp-options range 6 7 allow

tcp-options range 9 18 allow

tcp-options range 20 255 allow

tcp-options md5 clear

urgent-flag allow

!

no pager

logging enable

logging timestamp

logging buffered debugging

logging flash-minimum-free 1024

logging flash-maximum-allocation 3076

no logging message 106015

no logging message 313001

no logging message 313008

no logging message 106023

no logging message 710005

no logging message 710003

no logging message 106100

no logging message 302015

no logging message 302014

no logging message 302013

no logging message 302018

no logging message 302017

no logging message 302016

no logging message 302021

no logging message 302020

mtu outside 1500

mtu inside 1500

mtu diagnostic 1500

no failover

icmp unreachable rate-limit 1 burst-size 1

no asdm history enable

access-group CSM_FW_ACL_ global

timeout xlate 3:00:00

timeout pat-xlate 0:00:30

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 sctp 0:02:00 icmp 0:00:02

timeout sunrpc 0:10:00 h323 0:05:00 h225 1:00:00 mgcp 0:05:00 mgcp-pat 0:05:00

timeout sip 0:30:00 sip_media 0:02:00 sip-invite 0:03:00 sip-disconnect 0:02:00

timeout sip-provisional-media 0:02:00 uauth 0:05:00 absolute

timeout tcp-proxy-reassembly 0:00:30

timeout floating-conn 0:00:00

timeout conn-holddown 0:00:15

aaa proxy-limit disable

snmp-server host outside 192.168.1.100 community ***** version 2c

no snmp-server location

no snmp-server contact

snmp-server community *****

service sw-reset-button

crypto ipsec security-association pmtu-aging infinite

crypto ca trustpool policy

telnet timeout 5

console timeout 0

dynamic-access-policy-record DfltAccessPolicy

!

class-map inspection_default

match default-inspection-traffic

!

!

policy-map type inspect dns preset_dns_map

parameters

message-length maximum client auto

message-length maximum 512

no tcp-inspection

policy-map type inspect ip-options UM_STATIC_IP_OPTIONS_MAP

parameters

eool action allow

nop action allow

router-alert action allow

policy-map global_policy

class inspection_default

inspect dns preset_dns_map

inspect ftp

inspect h323 h225

inspect h323 ras

inspect rsh

inspect rtsp

inspect esmtp

inspect sqlnet

inspect skinny

inspect sunrpc

inspect xdmcp

inspect sip

inspect netbios

inspect tftp

inspect icmp

inspect icmp error

inspect dcerpc

inspect ip-options UM_STATIC_IP_OPTIONS_MAP

class class-default

set connection advanced-options UM_STATIC_TCP_MAP

!

service-policy global_policy global

prompt hostname context

call-home

profile CiscoTAC-1

no active

destination address http https://tools.cisco.com/its/service/oddce/services/DDCEService

destination address email callhome@cisco.com

destination transport-method http

subscribe-to-alert-group diagnostic

subscribe-to-alert-group environment

subscribe-to-alert-group inventory periodic monthly

subscribe-to-alert-group configuration periodic monthly

subscribe-to-alert-group telemetry periodic daily

Cryptochecksum:768a03e90b9d3539773b9d7af66b3452

firepower# show run

!

hostname firepower

enable password 8Ry2YjIyt7RRXU24 encrypted

names

arp timeout 14400

no arp permit-nonconnected

arp rate-limit 16384

!

interface GigabitEthernet1/1

shutdown

no nameif

no security-level

no ip address

!

interface GigabitEthernet1/2

shutdown

no nameif

no security-level

no ip address

!

interface GigabitEthernet1/3

description LAN Failover Interface

!

interface GigabitEthernet1/4

description STATE Failover Interface

!

interface GigabitEthernet1/5

shutdown

no nameif

no security-level

no ip address

!

interface GigabitEthernet1/6

shutdown

no nameif

no security-level

no ip address

!

interface GigabitEthernet1/7

shutdown

no nameif

no security-level

no ip address

!

interface GigabitEthernet1/8

shutdown

no nameif

no security-level

no ip address

!

interface Management1/1

management-only

nameif diagnostic

cts manual

propagate sgt preserve-untag

policy static sgt disabled trusted

security-level 0

no ip address

!

ftp mode passive

ngips conn-match vlan-id

access-list CSM_FW_ACL_ remark rule-id 9998: PREFILTER POLICY: Default Tunnel and Priority Policy

access-list CSM_FW_ACL_ remark rule-id 9998: RULE: DEFAULT TUNNEL ACTION RULE

access-list CSM_FW_ACL_ advanced permit ipinip any any rule-id 9998

access-list CSM_FW_ACL_ advanced permit 41 any any rule-id 9998

access-list CSM_FW_ACL_ advanced permit gre any any rule-id 9998

access-list CSM_FW_ACL_ advanced permit udp any any eq 3544 rule-id 9998

access-list CSM_FW_ACL_ remark rule-id 268435456: ACCESS POLICY: FTD_HA - Default/1

access-list CSM_FW_ACL_ remark rule-id 268435456: L4 RULE: DEFAULT ACTION RULE

access-list CSM_FW_ACL_ advanced permit ip any any rule-id 268435456

!

tcp-map UM_STATIC_TCP_MAP

tcp-options range 6 7 allow

tcp-options range 9 18 allow

tcp-options range 20 255 allow

tcp-options md5 clear

urgent-flag allow

!

no pager

logging enable

logging timestamp

logging buffered debugging

logging flash-minimum-free 1024

logging flash-maximum-allocation 3076

no logging message 106015

no logging message 313001

no logging message 313008

no logging message 106023

no logging message 710005

no logging message 710003

no logging message 106100

no logging message 302015

no logging message 302014

no logging message 302013

no logging message 302018

no logging message 302017

no logging message 302016

no logging message 302021

no logging message 302020

mtu outside 1500

mtu inside 1500

mtu diagnostic 1500

no failover

failover lan unit secondary

failover lan interface FOVER GigabitEthernet1/3

failover replication http

failover link STATE GigabitEthernet1/4

failover interface ip FOVER 10.10.1.1 255.255.255.0 standby 10.10.1.2

failover interface ip STATE 10.10.2.1 255.255.255.0 standby 10.10.2.2

icmp unreachable rate-limit 1 burst-size 1

no asdm history enable

access-group CSM_FW_ACL_ global

timeout xlate 3:00:00

timeout pat-xlate 0:00:30

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 sctp 0:02:00 icmp 0:00:02

timeout sunrpc 0:10:00 h323 0:05:00 h225 1:00:00 mgcp 0:05:00 mgcp-pat 0:05:00

timeout sip 0:30:00 sip_media 0:02:00 sip-invite 0:03:00 sip-disconnect 0:02:00

timeout sip-provisional-media 0:02:00 uauth 0:05:00 absolute

timeout tcp-proxy-reassembly 0:00:30

timeout floating-conn 0:00:00

timeout conn-holddown 0:00:15

user-identity default-domain LOCAL

aaa proxy-limit disable

snmp-server host outside 192.168.1.100 community ***** version 2c

no snmp-server location

no snmp-server contact

snmp-server community *****

service sw-reset-button

crypto ipsec security-association pmtu-aging infinite

crypto ca trustpool policy

telnet timeout 5

console timeout 0

dynamic-access-policy-record DfltAccessPolicy

!

class-map inspection_default

match default-inspection-traffic

!

!

policy-map type inspect dns preset_dns_map

parameters

message-length maximum client auto

message-length maximum 512

no tcp-inspection

policy-map type inspect ip-options UM_STATIC_IP_OPTIONS_MAP

parameters

eool action allow

nop action allow

router-alert action allow

policy-map global_policy

class inspection_default

inspect dns preset_dns_map

inspect ftp

inspect h323 h225

inspect h323 ras

inspect rsh

inspect rtsp

inspect esmtp

inspect sqlnet

inspect skinny

inspect sunrpc

inspect xdmcp

inspect sip

inspect netbios

inspect tftp

inspect icmp

inspect icmp error

inspect dcerpc

inspect ip-options UM_STATIC_IP_OPTIONS_MAP

class class-default

set connection advanced-options UM_STATIC_TCP_MAP

!

service-policy global_policy global

prompt hostname context

call-home

profile CiscoTAC-1

no active

destination address http https://tools.cisco.com/its/service/oddce/services/DDCEService

destination address email callhome@cisco.com

destination transport-method http

subscribe-to-alert-group diagnostic

subscribe-to-alert-group environment

subscribe-to-alert-group inventory periodic monthly

subscribe-to-alert-group configuration periodic monthly

subscribe-to-alert-group telemetry periodic daily

Cryptochecksum:ac9b8f401e18491fee653f4cfe0ce18f

Os principais pontos a serem observados para a opção Desativar HA na CLI do FTD:

Unidade primária

Unidade secundária

A configuração de failover e os IPs em standby foram removidos

- As configurações de interface foram removidas

- O dispositivo entrará no modo Pseudo-Standby

Etapa 6. Após concluir a tarefa, registre os dispositivos no FMC e ative o par HA.

Tarefa 7. Suspender HA

Requisito da tarefa:

Suspender a HA na CLI CLISH do FTD

Solução:

Etapa 1. No FTD Principal, execute o comando e confirme (digite YES).

> configure high-availability suspend

Please ensure that no deployment operation is in progress before suspending high-availability.

Please enter 'YES' to continue if there is no deployment operation in progress and 'NO' if you wish to abort: YES

Successfully suspended high-availability.

Etapa 2. Verifique as alterações na unidade Primária:

> show high-availability config

Failover Off

Failover unit Primary

Failover LAN Interface: fover_link Ethernet1/4 (up)

Reconnect timeout 0:00:00

Unit Poll frequency 1 seconds, holdtime 15 seconds

Interface Poll frequency 5 seconds, holdtime 25 seconds

Interface Policy 1

Monitored Interfaces 1 of 1041 maximum

MAC Address Move Notification Interval not set

failover replication http

Etapa 3. O resultado na unidade Secundária:

> show high-availability config

Failover Off (pseudo-Standby)

Failover unit Secondary

Failover LAN Interface: fover_link Ethernet1/4 (up)

Reconnect timeout 0:00:00

Unit Poll frequency 1 seconds, holdtime 15 seconds

Interface Poll frequency 5 seconds, holdtime 25 seconds

Interface Policy 1

Monitored Interfaces 1 of 1041 maximum

MAC Address Move Notification Interval not set

failover replication http

Etapa 4. Retomar HA na unidade primária:

> configure high-availability resume

Successfully resumed high-availablity.

> .

No Active mate detected

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

Beginning configuration replication: Sending to mate.

End Configuration Replication to mate

>

> show high-availability config

Failover On

Failover unit Primary

Failover LAN Interface: fover_link Ethernet1/4 (up)

Reconnect timeout 0:00:00

Unit Poll frequency 1 seconds, holdtime 15 seconds

Interface Poll frequency 5 seconds, holdtime 25 seconds

Interface Policy 1

Monitored Interfaces 1 of 1041 maximum

MAC Address Move Notification Interval not set

failover replication http

Etapa 5. O resultado na unidade Secundária depois de retomar o HA:

> ..

Detected an Active mate

Beginning configuration replication from mate.

WARNING: Failover is enabled but standby IP address is not configured for this interface.

WARNING: Failover is enabled but standby IP address is not configured for this interface.

End configuration replication from mate.

>

> show high-availability config

Failover On

Failover unit Secondary

Failover LAN Interface: fover_link Ethernet1/4 (up)

Reconnect timeout 0:00:00

Unit Poll frequency 1 seconds, holdtime 15 seconds

Interface Poll frequency 5 seconds, holdtime 25 seconds

Interface Policy 1

Monitored Interfaces 1 of 1041 maximum

MAC Address Move Notification Interval not set

failover replication http

>

Perguntas frequentes

Quando a configuração é replicada, ela é salva imediatamente (linha por linha) ou ao final da replicação?

Ao final da replicação. A comprovação está no final da saída do comando debug fover sync, que mostra a replicação de configuração/comando:

cli_xml_server: frep_write_cmd: Cmd: access-list CSM_FW_ACL_ line 1506 remark rule-id 268442578: L7 RULE: ACP_Rule_500

cli_xml_server: frep_write_cmd: Cmd: access-list CSM_FW_ACL_ line 1507 advanced permit tcp object-group group_10 eq 48894 object-group group_10 eq 23470 vlan eq 1392 rule-id 268442578

cli_xml_server: frep_write_cmd: Cmd: access-list CSM_FW_ACL_ line 1508 remark rule-id 268442078: ACCESS POLICY: mzafeiro_500 - Default

cli_xml_server: frep_write_cmd: Cmd: access-list CSM_FW_ACL_ line 1509 remark rule-id 268442078: L4 RULE: DEFAULT ACTION RULE

...

cli_xml_server: frep_write_cmd: Cmd: no access-list CSM_FW_ACL_ advanced permit tcp object-group group_2 eq 32881 object-group group_433 eq 39084 vlan eq 1693 rule-id 268442076

cli_xml_server: frep_write_cmd: Cmd: no access-list CSM_FW_ACL_ line 1510 remark rule-id 268442077: ACCESS POLICY: mzafeiro_ACP1500 - Mandatory

cli_xml_server: frep_write_cmd: Cmd: no access-list CSM_FW_ACL_ line 1510 remark rule-id 268442077: L7 RULE: ACP_Rule_1500

cli_xml_server: frep_write_cmd: Cmd: no access-list CSM_FW_ACL_ advanced permit tcp object-group group_6 eq 8988 object-group group_311 eq 32433 vlan eq 619 rule-id 268442077

cli_xml_server: frep_write_cmd: Cmd: no access-list CSM_FW_ACL_ line 1510 remark rule-id 268440577: ACCESS POLICY: mzafeiro_ACP1500 - Default

cli_xml_server: frep_write_cmd: Cmd: no access-list CSM_FW_ACL_ line 1510 remark rule-id 268440577: L4 RULE: DEFAULT ACTION RULE

cli_xml_server: frep_write_cmd: Cmd: access-list CSM_FW_ACL_ advanced deny ip any any rule-id 268442078 event-log flow-start

cli_xml_server: frep_write_cmd: Cmd: crypto isakmp nat-traversal

cli_xml_server: frep_write_cmd: Cmd: no object-group network group_311

cli_xml_server: frep_write_cmd: Cmd: no object-group network group_433

cli_xml_server: frep_write_cmd: Cmd: no object-group network group_6

cli_xml_server: frep_write_cmd: Cmd: no object-group network group_2

cli_xml_server: frep_write_cmd: Cmd: write memory <--

O que acontece se uma unidade estiver em um estado pseudo-Standby (failover desabilitado) e você recarregá-la enquanto a outra unidade estiver com o failover habilitado e Ativo?

Você acaba em um cenário ativo/ativo (embora tecnicamente seja um cenário ativo/failover desativado). Especificamente, quando a unidade se torna ATIVA, o failover é desativado, mas a unidade usa os mesmos IPs que a unidade ativa. Então, de fato, você tem:

- Unit-1: Ativo

- Unit-2: o failover está desativado. A unidade usa os mesmos IPs de dados que a Unidade-1, mas endereços MAC diferentes.

O que acontecerá com a configuração de failover se você desativar manualmente o failover (configurar a suspensão de alta disponibilidade) e recarregar o dispositivo?

Quando você desativa o failover, não é uma alteração permanente (não é salva em startup-config, a menos que você decida fazer isso explicitamente). Observe que você pode reiniciar/recarregar a unidade de duas maneiras diferentes e, com a segunda maneira, você deve ter cuidado:

Caso 1. Reinicializar do CLISH

A reinicialização no CLISH não solicita confirmação. Assim, a alteração de configuração não é salva em startup-config:

> configure high-availability suspend

Please ensure that no deployment operation is in progress before suspending high-availability.

Please enter 'YES' to continue if there is no deployment operation in progress and 'NO' if you wish to abort: YES

Successfully suspended high-availability.

A configuração atual tem o failover desabilitado. Nesse caso, a unidade estava em Standby e entrou no estado pseudo-Standby como esperado para evitar um cenário Ativo/Ativo:

firepower# show failover | include Failover

Failover Off (pseudo-Standby)

Failover unit Secondary

Failover LAN Interface: FOVER Ethernet1/1 (up)

A configuração de inicialização ainda tem o failover habilitado:

firepower# show startup | include failover

failover

failover lan unit secondary

failover lan interface FOVER Ethernet1/1

failover replication http

failover link FOVER Ethernet1/1

failover interface ip FOVER 192.0.2.1 255.255.255.0 standby 192.0.2.2

failover ipsec pre-shared-key *****

Reinicialize o dispositivo no CLISH (comando reboot):

> reboot

This command will reboot the system.  Continue?

Please enter 'YES' or 'NO': YES

Broadcast message from root@

Threat Defense System: CMD=-stop, CSP-ID=cisco-ftd.6.2.2.81__ftd_001_JMX2119L05CYRIBVX1, FLAG=''

Cisco FTD stopping ...

Quando a unidade está em ATIVA e o failover está ativado, o dispositivo entra na fase de negociação de failover e tenta detectar o par remoto:

User enable_1 logged in to firepower

Logins over the last 1 days: 1.

Failed logins since the last login: 0.

Type help or '?' for a list of available commands.

firepower> .

Detected an Active mate

Caso 2. Reinicializar a partir do LINA CLI

A reinicialização no LINA (comando reload) solicita a confirmação. Assim, se você selecionar [Y]es, a alteração de configuração não será salva em startup-config:

firepower# reload

System config has been modified. Save? [Y]es/[N]o: Y <-- Be careful. This will disable the failover in the startup-config

Cryptochecksum: 31857237 8658f618 3234be7c 854d583a

8781 bytes copied in 0.940 secs

Proceed with reload? [confirm]

firepower# show startup | include failover

no failover

failover lan unit secondary

failover lan interface FOVER Ethernet1/1

failover replication http

failover link FOVER Ethernet1/1

failover interface ip FOVER 192.0.2.1 255.255.255.0 standby 192.0.2.2

failover ipsec pre-shared-key *****

Depois que a unidade estiver ATIVA, o failover será desativado:

firepower# show failover | include Fail

Failover Off

Failover unit Secondary

Failover LAN Interface: FOVER Ethernet1/1 (up)

Note: Para evitar esse cenário, certifique-se de não salvar as alterações na configuração de inicialização quando for solicitado.

Informações Relacionadas

- Todas as versões do guia de configuração do Cisco Firepower Management Center podem ser encontradas aqui

https://www.cisco.com/c/en/us/td/docs/security/firepower/roadmap/firepower-roadmap.html#id_47280

- Todas as versões do gerenciador de chassi do FXOS e dos guias de configuração da CLI podem ser encontradas aqui

https://www.cisco.com/c/en/us/td/docs/security/firepower/fxos/roadmap/fxos-roadmap.html#pgfId-121950

- O Cisco Global Technical Assistance Center (TAC) recomenda enfaticamente este guia visual para conhecimento prático aprofundado sobre as tecnologias de segurança de próxima geração Cisco Firepower:

http://www.ciscopress.com/title/9781587144806

- Para todas as Notas técnicas de configuração e solução de problemas que pertencem às tecnologias Firepower

https://www.cisco.com/c/en/us/support/security/defense-center/tsd-products-support-series-home.html

- Suporte Técnico e Documentação - Cisco Systems