Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Conventions

Configurar

Diagrama de Rede

Configurações

Verificar

Troubleshoot

Comandos para Troubleshooting

Informações Relacionadas

Introduction

Este documento fornece uma configuração de exemplo para Dynamic Multipoint VPN (DMVPN) que usa Generic Routing Encapsulation (GRE) sobre a IPsec com Open Shortest Path First (OSPF), Tradução de Endereço de Rede (NAT) e Cisco IOS® Firewall.

Prerequisites

Requirements

Antes que um GRE multiponto (mGRE) e um túnel de IPSec possam ser estabelecidos, é necessário definir uma política de Intercâmbio de chave de Internet (IKE) utilizando o comando crypto isakmp policy.

Nota: Use a Command Lookup Tool (somente clientes registrados) para obter mais informações sobre os comandos usados nesta seção.

Componentes Utilizados

As informações neste documento são baseadas nestas versões de software e hardware:

- Software Cisco IOS® versão 12.2(15)T1 no roteador do hub e Software Cisco IOS versão 12.3(1.6) nos roteadores spoke

- Cisco 3620 como roteador de hub, dois Cisco 1720 Routers e um Cisco 3620 Router como roteadores spoke

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Conventions

Consulte as Convenções de Dicas Técnicas da Cisco para obter mais informações sobre convenções de documentos.

Configurar

Nesta seção, você encontrará informações para configurar os recursos descritos neste documento.

Nota: Use a Command Lookup Tool (somente clientes registrados) para obter mais informações sobre os comandos usados nesta seção.

Diagrama de Rede

Este documento utiliza a seguinte configuração de rede.

Configurações

Este documento utiliza estas configurações.

- Hub - 3620-B

- Spoke 1 - 3620-A

- Spoke 2 - 1720-b

- Pontos remotos 3 - 1720-A

Hub - 3620-B

W2N-6.16-3620-B#write terminal

Building configuration...

Current configuration : 2613 bytes

!

version 12.2

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname W2N-6.16-3620-B

!

logging queue-limit 100

!

memory-size iomem 10

ip subnet-zero

!

!

ip cef

no ip domain lookup

!

!--- This is the Cisco IOS Firewall configuration and what to inspect. !--- This is applied outbound on the external interface.

ip inspect name in2out rcmd

ip inspect name in2out ftp

ip inspect name in2out tftp

ip inspect name in2out tcp timeout 43200

ip inspect name in2out http

ip inspect name in2out udp

ip audit po max-events 100

!

!

!

!--- Create an Internet Security Association and Key Management !--- Protocol (ISAKMP) policy for Phase 1 negotiations.

crypto isakmp policy 5

authentication pre-share

group 2

!--- Add dynamic pre-shared key.

crypto isakmp key dmvpnkey address 0.0.0.0 0.0.0.0

crypto isakmp nat keepalive 20

!

!

!--- Create the Phase 2 policy for actual data encryption.

crypto ipsec transform-set dmvpnset esp-3des esp-sha-hmac

!

!--- Create an IPsec profile to be applied dynamically !--- to the GRE over IPsec tunnels.

crypto ipsec profile dmvpnprof

set transform-set dmvpnset

!

!

!

!

!

!

!

!

!

!

!

no voice hpi capture buffer

no voice hpi capture destination

!

!

mta receive maximum-recipients 0

!

!

!

!--- This is the inbound interface.

interface Loopback1

ip address 192.168.117.1 255.255.255.0

ip nat inside

!

!--- Create a GRE tunnel template to be applied !--- to all the dynamically created GRE tunnels.

interface Tunnel1

description MULTI-POINT GRE TUNNEL for BRANCHES

bandwidth 1000

ip address 172.16.0.1 255.255.255.0

no ip redirects

ip mtu 1416

ip nhrp authentication dmvpn

ip nhrp map multicast dynamic

ip nhrp network-id 99

ip nhrp holdtime 300

no ip route-cache

ip ospf network broadcast

no ip mroute-cache

delay 1000

tunnel source FastEthernet0/0

tunnel mode gre multipoint

tunnel key 100000

tunnel protection ipsec profile dmvpnprof

!

!--- This is the outbound interface.

interface FastEthernet0/0

ip address 14.24.117.1 255.255.0.0

ip nat outside

ip access-group 100 in

ip inspect in2out out

no ip mroute-cache

duplex auto

speed auto

!

interface Serial0/0

no ip address

shutdown

clockrate 2000000

no fair-queue

!

interface FastEthernet0/1

no ip address

no ip mroute-cache

duplex auto

speed auto

!

!--- Enable a routing protocol to send/receive dynamic !--- updates about the private networks.

router ospf 1

log-adjacency-changes

network 172.16.0.0 0.0.0.255 area 0

network 192.168.117.0 0.0.0.255 area 0

!

!--- Except the private network traffic from the NAT process.

ip nat inside source route-map nonat interface FastEthernet0/0 overload

ip http server

no ip http secure-server

ip classless

ip route 0.0.0.0 0.0.0.0 14.24.1.1

ip route 2.0.0.0 255.0.0.0 14.24.121.1

!

!

!

!--- Allow ISAKMP, ESP, and GRE traffic inbound. !--- Cisco IOS Firewall opens other inbound access as needed.

access-list 100 permit udp any host 14.24.117.1 eq 500

access-list 100 premit esp any host 14.24.117.1

access-list 100 permit gre any host 14.24.117.1

access-list 100 deny ip any any

!--- Except the private network traffic from the NAT process.

access-list 110 deny   ip 192.168.117.0 0.0.0.255 192.168.118.0 0.0.0.255

access-list 110 deny   ip 192.168.117.0 0.0.0.255 192.168.116.0 0.0.0.255

access-list 110 deny   ip 192.168.117.0 0.0.0.255 192.168.120.0 0.0.0.255

access-list 110 permit ip 192.168.117.0 0.0.0.255 any

!

!--- Except the private network traffic from the NAT process.

route-map nonat permit 10

match ip address 110

!

call rsvp-sync

!

!

mgcp profile default

!

dial-peer cor custom

!

!

!

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

!

end

W2N-6.16-3620-B#

Spoke 1 - 3620-A

W2N-6.16-3620-A#write terminal

Building configuration...

Current configuration : 2678 bytes

!

version 12.2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname W2N-6.16-3620-A

!

boot system flash slot0:c3620-ik9o3s7-mz.122-15.T1.bin

logging queue-limit 100

!

memory-size iomem 15

ip subnet-zero

!

!

ip cef

no ip domain lookup

!

!--- This is the Cisco IOS Firewall configuration and what to inspect. !--- This is applied outbound on the external interface.

ip inspect name in2out rcmd

ip inspect name in2out tftp

ip inspect name in2out udp

ip inspect name in2out tcp timeout 43200

ip inspect name in2out realaudio

ip inspect name in2out vdolive

ip inspect name in2out netshow

ip audit po max-events 100

!

!

!

!--- Create an ISAKMP policy for !--- Phase 1 negotiations.

crypto isakmp policy 5

authentication pre-share

group 2

!--- Add dynamic pre-shared key.

crypto isakmp key dmvpnkey address 0.0.0.0 0.0.0.0

!

!

!--- Create the Phase 2 policy for actual data encryption.

crypto ipsec transform-set dmvpnset esp-3des esp-sha-hmac

!

!--- Create an IPsec profile to be applied dynamically !--- to the GRE over IPsec tunnels.

crypto ipsec profile dmvpnprof

set transform-set dmvpnset

!

!

!

!

!

!

!

!

!

!

!

no voice hpi capture buffer

no voice hpi capture destination

!

!

mta receive maximum-recipients 0

!

!

!

!--- This is the inbound interface.

interface Loopback1

ip address 192.168.118.1 255.255.255.0

ip nat inside

!

!--- Create a GRE tunnel template to be applied to !--- all the dynamically created GRE tunnels.

interface Tunnel1

description HOST DYNAMIC TUNNEL

bandwidth 1000

ip address 172.16.0.2 255.255.255.0

no ip redirects

ip mtu 1416

ip nhrp authentication dmvpn

ip nhrp map multicast dynamic

ip nhrp map 172.16.0.1 14.24.117.1

ip nhrp map multicast 14.24.117.1

ip nhrp network-id 99

ip nhrp holdtime 300

ip nhrp nhs 172.16.0.1

no ip route-cache

ip ospf network broadcast

no ip mroute-cache

delay 1000

tunnel source Ethernet0/0

tunnel mode gre multipoint

tunnel key 100000

tunnel protection ipsec profile dmvpnprof

!

!--- This is the outbound interface.

interface Ethernet0/0

ip address 14.24.118.1 255.255.0.0

ip nat outside

ip access-group 100 in

ip inspect in2out out

no ip mroute-cache

half-duplex

!

interface Ethernet0/1

no ip address

half-duplex

!

interface Ethernet0/2

no ip address

shutdown

half-duplex

!

interface Ethernet0/3

no ip address

shutdown

half-duplex

!

!--- Enable a routing protocol to send/receive dynamic !--- updates about the private networks.

router ospf 1

log-adjacency-changes

redistribute connected

network 172.16.0.0 0.0.0.255 area 0

network 192.168.118.0 0.0.0.255 area 0

!

!--- Except the private network traffic from the NAT process.

ip nat inside source route-map nonat interface Ethernet0/0 overload

ip http server

no ip http secure-server

ip classless

ip route 0.0.0.0 0.0.0.0 14.24.1.1

ip route 2.0.0.0 255.0.0.0 14.24.121.1

!

!

!

!--- Allow ISAKMP, ESP, and GRE traffic inbound. !--- Cisco IOS Firewall opens inbound access as needed.

access-list 100 permit udp any host 14.24.118.1 eq 500

access-list 100 premit esp any host 14.24.118.1

access-list 100 permit gre any host 14.24.118.1

access-list 100 deny ip any any

!--- Except the private network traffic from the NAT process.

access-list 110 deny   ip 192.168.118.0 0.0.0.255 192.168.117.0 0.0.0.255

access-list 110 deny   ip 192.168.118.0 0.0.0.255 192.168.116.0 0.0.0.255

access-list 110 deny   ip 192.168.118.0 0.0.0.255 192.168.120.0 0.0.0.255

access-list 110 permit ip 192.168.118.0 0.0.0.255 any

!

!--- Except the private network traffic from the NAT process.

route-map nonat permit 10

match ip address 110

!

call rsvp-sync

!

!

mgcp profile default

!

dial-peer cor custom

!

!

!

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

!

end

W2N-6.16-3620-A#

Spoke 2 - 1720-b

1720-b#write terminal

Building configuration...

Current configuration : 2623 bytes

!

version 12.2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 1720-b

!

logging queue-limit 100

enable password cisco

!

username 7206-B password 0 cisco

ip subnet-zero

!

!

no ip domain lookup

!

ip cef

!--- This is the Cisco IOS Firewall configuration and what to inspect. !--- This is applied outbound on the external interface.

ip inspect name in2out rcmd

ip inspect name in2out tftp

ip inspect name in2out udp

ip inspect name in2out tcp timeout 43200

ip inspect name in2out realaudio

ip inspect name in2out vdolive

ip inspect name in2out netshow

ip audit po max-events 100

vpdn-group 1

request-dialin

protocol pppoe

!

!

!

!

!

!--- Create an ISAKMP policy for !--- Phase 1 negotiations.

crypto isakmp policy 5

authentication pre-share

group 2

!--- Add dynamic pre-shared key.

crypto isakmp key dmvpnkey address 0.0.0.0 0.0.0.0

!

!

!--- Create the Phase 2 policy for actual data encryption.

crypto ipsec transform-set dmvpnset esp-3des esp-sha-hmac

!

!--- Create an IPsec profile to be applied dynamically !--- to the GRE over IPsec tunnels.

crypto ipsec profile dmvpnprof

set transform-set dmvpnset

!

!

!

!

!

!--- This is the inbound interface.

interface Loopback1

ip address 192.168.116.1 255.255.255.0

ip nat inside

!

!--- Create a GRE tunnel template to be applied to !--- all the dynamically created GRE tunnels.

interface Tunnel1

description HOST DYNAMIC TUNNEL

bandwidth 1000

ip address 172.16.0.3 255.255.255.0

no ip redirects

ip mtu 1416

ip nhrp authentication dmvpn

ip nhrp map multicast dynamic

ip nhrp map 172.16.0.1 14.24.117.1

ip nhrp map multicast 14.24.117.1

ip nhrp network-id 99

ip nhrp holdtime 300

ip nhrp nhs 172.16.0.1

no ip route-cache

ip ospf network broadcast

no ip mroute-cache

delay 1000

tunnel source Dialer1

tunnel mode gre multipoint

tunnel key 100000

tunnel protection ipsec profile dmvpnprof

!

interface Ethernet0

no ip address

half-duplex

!

interface FastEthernet0

no ip address

no ip mroute-cache

speed auto

pppoe enable

pppoe-client dial-pool-number 1

!

!--- This is the outbound interface.

interface Dialer1

ip address 2.2.2.10 255.255.255.0

ip inspect in2out out

ip access-group 100 in encapsulation ppp

dialer pool 1

dialer-group 1

ppp authentication pap chap callin

!

!--- Enable a routing protocol to send/receive dynamic !--- updates about the private networks.

router ospf 1

log-adjacency-changes

redistribute connected

network 172.16.0.0 0.0.0.255 area 0

network 192.168.116.0 0.0.0.255 area 0

!

!--- Except the private network traffic from the NAT process.

ip nat inside source route-map nonat interface Dialer1 overload

ip classless

ip route 0.0.0.0 0.0.0.0 14.24.1.1

ip route 0.0.0.0 0.0.0.0 Dialer1

no ip http server

no ip http secure-server

!

!

!

!--- Allow ISAKMP, ESP, and GRE traffic inbound. !--- Cisco IOS Firewall opens inbound access as needed.

access-list 100 permit udp any host 14.24.116.1 eq 500

access-list 100 premit esp any host 14.24.116.1

access-list 100 permit gre any host 14.24.116.1

access-list 100 deny ip any any

!--- Except the private network traffic from the NAT process.

access-list 110 deny   ip 192.168.116.0 0.0.0.255 192.168.117.0 0.0.0.255

access-list 110 deny   ip 192.168.116.0 0.0.0.255 192.168.118.0 0.0.0.255

access-list 110 deny   ip 192.168.116.0 0.0.0.255 192.168.120.0 0.0.0.255

access-list 110 permit ip 192.168.116.0 0.0.0.255 any

dialer-list 1 protocol ip permit

!

!--- Except the private network traffic from the NAT process.

route-map nonat permit 10

match ip address 110

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

no scheduler allocate

end

1720-b#

Pontos remotos 3 - 1720-A

W2N-6.16-1720-A#write terminal

Building configuration...

Current configuration : 2303 bytes

!

version 12.2

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname W2N-6.16-1720-A

!

logging queue-limit 100

!

memory-size iomem 25

ip subnet-zero

!

!

no ip domain lookup

!

ip cef

!--- This is the Cisco IOS Firewall configuration and what to inspect. !--- This is applied outbound on the external interface.

ip inspect name in2out rcmd

ip inspect name in2out tftp

ip inspect name in2out udp

ip inspect name in2out tcp timeout 43200

ip inspect name in2out realaudio

ip inspect name in2out vdolive

ip inspect name in2out netshow

ip audit notify log

ip audit po max-events 100

!

!

!

!

!--- Create an ISAKMP policy for !--- Phase 1 negotiations.

crypto isakmp policy 5

authentication pre-share

group 2

!--- Add dynamic pre-shared key.

crypto isakmp key dmvpnkey address 0.0.0.0 0.0.0.0

!

!

!--- Create the Phase 2 policy for actual data encryption.

crypto ipsec transform-set dmvpnset esp-3des esp-sha-hmac

!

!--- Create an IPsec profile to be applied dynamically !--- to the GRE over IPsec tunnels.

crypto ipsec profile dmvpnprof

set transform-set dmvpnset

!

!

!

!

!

!--- This is the inbound interface.

interface Loopback1

ip address 192.168.120.1 255.255.255.0

ip nat inside

!

!--- Create a GRE tunnel template to be applied to !--- all the dynamically created GRE tunnels.

interface Tunnel1

description HOST DYNAMIC TUNNEL

bandwidth 1000

ip address 172.16.0.4 255.255.255.0

no ip redirects

ip mtu 1416

ip nhrp authentication dmvpn

ip nhrp map multicast dynamic

ip nhrp map 172.16.0.1 14.24.117.1

ip nhrp map multicast 14.24.117.1

ip nhrp network-id 99

ip nhrp holdtime 300

ip nhrp nhs 172.16.0.1

ip ospf network broadcast

no ip mroute-cache

delay 1000

tunnel source FastEthernet0

tunnel mode gre multipoint

tunnel key 100000

tunnel protection ipsec profile dmvpnprof

!

interface Ethernet0

no ip address

no ip mroute-cache

half-duplex

!

!--- This is the outbound interface.

interface FastEthernet0

ip address 14.24.120.1 255.255.0.0

ip nat outside

ip inspect in2out out

ip access-group 100 in

no ip mroute-cache

speed auto

!

!--- Enable a routing protocol to send/receive dynamic !--- updates about the private networks.

router ospf 1

log-adjacency-changes

redistribute connected

network 172.16.0.0 0.0.0.255 area 0

network 192.168.120.0 0.0.0.255 area 0

!

!--- Except the private network traffic from the NAT process.

ip nat inside source route-map nonat interface FastEthernet0 overload

ip classless

ip route 0.0.0.0 0.0.0.0 14.24.1.1

ip route 2.0.0.0 255.0.0.0 14.24.121.1

no ip http server

no ip http secure-server

!

!

!

!--- Allow ISAKMP, ESP, and GRE traffic inbound. !--- Cisco IOS Firewall opens inbound access as needed.

access-list 100 permit udp any host 14.24.116.1 eq 500

access-list 100 premit esp any host 14.24.116.1

access-list 100 permit gre any host 14.24.116.1

access-list 100 deny ip any any

access-list 110 permit ip 192.168.120.0 0.0.0.255 any

!--- Except the private network traffic from the NAT process.

access-list 110 deny   ip 192.168.120.0 0.0.0.255 192.168.116.0 0.0.0.255

access-list 110 deny   ip 192.168.120.0 0.0.0.255 192.168.117.0 0.0.0.255

access-list 110 deny   ip 192.168.120.0 0.0.0.255 192.168.118.0 0.0.0.255

access-list 110 permit ip 192.168.120.0 0.0.0.255 any

!

!--- Except the private network traffic from the NAT process.

route-map nonat permit 10

match ip address 110

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

end

W2N-6.16-1720-A#

Verificar

Use esta seção para confirmar se a sua configuração funciona corretamente.

A Output Interpreter Tool ( somente clientes registrados) (OIT) oferece suporte a determinados comandos show. Use a OIT para exibir uma análise da saída do comando show.

- show crypto isakmp sa — Exibe o estado da associação de segurança ISAKMP (SA).

- show crypto engine connections ative — Exibe o total de criptografia/descriptografia por SA.

- show crypto ipsec sa — Exibe as estatísticas nos túneis ativos.

- show ip route - Exibe a tabela de roteamento .

- show ip ospf neighbor —Exibe informações de vizinhos OSPF em uma base por interface.

- show ip nhrp — Exibe o cache Next Hop Resolution Protocol (NHRP) de IP, opcionalmente limitado a entradas de cache dinâmico ou estático para uma interface específica.

Troubleshoot

Esta seção fornece informações que podem ser usadas para o troubleshooting da sua configuração.

Comandos para Troubleshooting

Nota:Consulte Informações Importantes sobre Comandos de Depuração antes de usar os comandos debug.

- debug crypto ipsec — Exibe eventos de IPSec.

- debug crypto isakmp — Exibe mensagens sobre eventos de IKE.

- debug crypto engine — Exibe informações a partir do cripto mecanismo.

Informações adicionais sobre Troubleshooting de IPSec podem ser encontradas em Troubleshooting de Segurança de IP - Compreendendo e Utilizando os comandos debug.

Informações Relacionadas

- Troubleshooting de Configurações do Cisco IOS Firewall

- Visão geral de DMVPN e Cisco IOS

- Negociação IPsec/Protocolos IKE

- Suporte Técnico e Documentação - Cisco Systems