Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Informações de Apoio

Configurar

Diagrama de Rede

ASR1K

ASR9K

Verificar

Troubleshoot

Comando para Verificar a Configuração do ASR9K

Verificar XCs L2VPN

Verifique a lista de interface

Verificar PWHE usado por uma lista de interface

Verifique se o MA tem o PWHE com informações corretas

Verificar informações de resumo PWHE

Verificar Rótulos

Queda de tráfego/Sessões não surgem

Comandos show relacionados ao BNG

Depurações a serem habilitadas

Escalonamento

Introduction

Este documento descreve as etapas para configurar sessões IP over Ethernet (IPoE) sobre Pseudowire Headend (PWHE) no ASR9K.

Prerequisites

Requirements

A Cisco recomenda que você tenha conhecimento destes tópicos:

- VPN de Camada 2 MPLS

- Funcionalidade BNG no ASR9K

Dica: consulte o artigo Guia de Configuração do Gateway de Rede de Banda Larga para Cisco ASR 9000 Series Cisco para obter familiaridade com a funcionalidade do BNG.

Dica: consulte o artigo MPLS Layer 2 VPNs Configuration Guide da Cisco para obter familiaridade com VPNs de Camada 2 do MPLS.

Componentes Utilizados

Este documento não está restrito à versão de software específica, mas a placa de linha que usamos no ASR9K é A9K-MPA-20X1GE.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Informações de Apoio

O BNG fornece suporte ao assinante sobre PWHE. O PWHE fornece conectividade de L3 para nós de borda do cliente através de uma conexão pseudofio. O PWHE termina os circuitos L2VPN que existem entre os nós de borda do provedor de acesso (A-PE), para uma interface virtual e executa o roteamento no pacote IP nativo. Cada interface virtual pode usar uma ou mais interfaces físicas em direção à nuvem de acesso para acessar os roteadores do cliente através dos nós A-PE.

Observação: esse recurso é suportado para assinantes PPPoE PTA, PPPoE LAC Subscriber Over PWHE e IPoE.

Configurar

Diagrama de Rede

Para realizar este teste, um ASR1K com a versão 154-3.S2 é empregado e o ASR9K com a versão IOS-XR 5.2.2. O OSPF é usado como protocolo de roteamento para acessar os endereços de loopback um do outro.

Endereço de loopback ASR9K: 10.1.1.1/32

Endereço de loopback ASR1K: 10.2.2.2/32

ASR1K

pseudowire-class MPLS

encapsulation mpls

interface GigabitEthernet1/0/0

no ip address

media-type rj45

negotiation auto

cdp enable

xconnect 10.1.1.1 2020 encapsulation mpls pw-class MPLS

end

ASR1K#show etherchannel summary

Flags:  D - down        P/bndl - bundled in port-channel

I - stand-alone s/susp - suspended

H - Hot-standby (LACP only)

R - Layer3      S - Layer2

U - in use      f - failed to allocate aggregator

M - not in use, minimum links not met

u - unsuitable for bundling

w - waiting to be aggregated

d - default port

Number of channel-groups in use: 1

Number of aggregators:           1

Group  Port-channel  Protocol    Ports

------+-------------+-----------+-----------------------------------------------

20 Po20(RU) LACP  Gi1/0/1(bndl) Gi1/1/1(bndl)

RU - L3 port-channel UP State

SU - L2 port-channel UP state

P/bndl -  Bundled

S/susp  - Suspended

interface Port-channel20

ip address 192.168.20.2 255.255.255.0

no negotiation auto

mpls ip

end

ASR9K

Aqui está a configuração do ASR9K, que atua como BNG PWHE.

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show bundle bundle-ether 20

Thu May 21 06:35:39.294 UTC

Bundle-Ether20

Status:                                    Up

Local links

: 2 / 0 / 2 Local bandwidth

: 2000000 (2000000) kbps MAC address (source): 10f3.1172.02c8 (Chassis pool) Inter-chassis link: No Minimum active links / bandwidth: 1 / 1 kbps Maximum active links: 64 Wait while timer: 2000 ms Load balancing: Default LACP: Operational Flap suppression timer: Off Cisco extensions: Disabled mLACP: Not configured IPv4 BFD: Not configured Port Device State Port ID B/W, kbps -------------------- --------------- ----------- -------------- ---------- Gi0/0/1/18 Local Active 0x8000, 0x0007 1000000 Link is Active Gi0/0/1/19 Local Active 0x8000, 0x0008 1000000 Link is Active interface Bundle-Ether20 ipv4 address 192.168.20.1 255.255.255.0 load-interval 30 !

Agora, configure o xconnect entre ASR1K e ASR9K. Especifique o endereço de loopback de ASR1K (10.2.2.2/32) como vizinho xconnect.

l2vpn

router-id 10.1.1.1

pw-class ASR1K

encapsulation mpls

transport-mode ethernet

!

!

xconnect group PWHE

p2p ASR1K

interface PW-Ether20

neighbor ipv4 10.2.2.2 pw-id 2020

pw-class ASR1K

!

!

!

!

generic-interface-list BE20_ONLY

interface Bundle-Ether20

interface GigabitEthernet0/0/1/18

interface GigabitEthernet0/0/1/19

!

interface PW-Ether20

ipv4 address 192.168.1.1 255.255.255.0

attach generic-interface-list BE20_ONLY

!

Agora, configure a política de controle do assinante e aplique na interface PW-Ethernet onde o assinante é terminado.

dynamic-template

type ipsubscriber WDAAR_PWHE_DT

ipv4 verify unicast source reachable-via rx

ipv4 unnumbered Loopback44

ipv4 unreachables disable

!

!

policy-map type control subscriber IPoE_WDAAR_PWHE

event session-start match-first

class type control subscriber DHCPv4 do-until-failure

5 authorize aaa list WDAAR identifier source-address-mac password cisco

10 activate dynamic-template WDAAR_PWHE_DT

!

!

end-policy-map

interface PW-Ether20.250

ipv4 address 192.168.10.1 255.255.255.252

service-policy type control subscriber IPoE_WDAAR_PWHE

encapsulation dot1q 250

ipsubscriber ipv4 l2-connected

initiator dhcp

!

!

Verificar

Esta seção fornece informações que você pode usar para verificar se sua configuração funciona corretamente. Estes são os comandos que você pode empregar para verificar se o xconnect está UP/UP no ASR9K.

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn xconnect

Legend: ST = State, UP = Up, DN = Down, AD = Admin Down, UR = Unresolved,

SB = Standby, SR = Standby Ready, (PP) = Partially Programmed

XConnect                   Segment 1                       Segment 2

Group      Name       ST   Description            ST       Description            ST

------------------------   -----------------------------   -----------------------------

PWHE       ASR1K      UP   PE20                   UP       10.2.2.2         2020   UP

----------------------------------------------------------------------------------------

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn xconnect brief

AToM

Like-to-Like                        UP       DOWN        UNR

PW-Ether                           1          0          0

Total                              1          0          0

Total                                1          0          0

Total: 1 UP, 0 DOWN, 0 UNRESOLVED

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show subscriber session filter ipv4-address 192.168.44.254

Codes: IN - Initialize, CN - Connecting, CD - Connected, AC - Activated,

ID - Idle, DN - Disconnecting, ED - End

Type         Interface                State     IP Address (Vrf)

--------------------------------------------------------------------------------

IP:DHCP      PE20.250.ip1             AC        192.168.44.254 (default)

Uma vez que o xconnect é UP e a sessão IPoE fica on-line no ASR9K, você pode ver que a interface de acesso é PW-Ether.

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show subscriber session filter ipv4-address 192.168.44.254 detail

Interface:                PW-Ether20.250.ip1

Circuit ID:               Unknown

Remote ID:                Unknown

Type:                     IP: DHCP-trigger

IPv4 State:               Up, Mon Apr 20 19:32:51 2015

IPv4 Address:             192.168.44.254, VRF: default

Mac Address:              001f.ca3f.7924

Account-Session Id:       00000068

Nas-Port:                 Unknown

User name:                001f.ca3f.7924

Formatted User name:      unknown

Client User name:         unknown

Outer VLAN ID:            250

Subscriber Label:         0x000001db

Created:                  Mon Apr 20 19:32:49 2015

State:                    Activated

Authentication:           unauthenticated

Authorization:            authorized

Access-interface: PW-Ether20.250 Policy Executed:

policy-map type control subscriber IPoE_WDAAR_PWHE

event Session-Start match-first [at Mon Apr 20 19:32:49 2015]

class type control subscriber DHCPv4 do-until-failure [Succeeded]

5 authorize aaa list WDAAR [Succeeded]

10 activate dynamic-template WDAAR_PWHE_DT [Succeeded]

Session Accounting: disabled

Last COA request received: unavailable

Agora, verifique a conectividade da camada 3 do assinante BNG sobre PWHE.

RP/0/RSP0/CPU0:ACDC-ASR9000-1#ping 192.168.44.254

Mon Feb 23 19:37:58.188 UTC

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.44.254, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/1/2 ms

RP/0/RSP0/CPU0:ACDC-ASR9000-1#

Troubleshoot

Esta seção fornece informações que você pode usar para solucionar problemas de sua configuração e verificar o status do xconnect no ASR9K.

Comando para Verificar a Configuração do ASR9K

Esses comandos podem ser usados para verificar se a configuração está correta no ASR9K.

- show running-configuration l2vpn

- show running-configuration int PW-Ether<Interface-Number>

- show running-configuration mpls ldp

- show running-configuration generic-interface-list

Verificar L2VPN XCs

Verifique o xconnect. O xconnect (e, portanto, o AC e o PW) deve estar ativo. Você pode empregar esses comandos para verificar o status.

- show l2vpn xconnect summary

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn xconnect summary

Thu May 21 05:40:05.068 UTC

Number of groups: 1

Number of xconnects: 1

Up: 1  Down: 0  Unresolved: 0 Partially-programmed: 0

AC-PW: 1  AC-AC: 0  PW-PW: 0 Monitor-Session-PW: 0

Number of Admin Down segments: 0

Number of MP2MP xconnects: 0

Up 0 Down 0

Advertised: 0 Non-Advertised: 0

Number of CE Connections: 0

Advertised: 0 Non-Advertised: 0

Backup PW:

Configured   : 0

UP           : 0

Down         : 0

Admin Down   : 0

Unresolved   : 0

Standby      : 0

Standby Ready: 0

Backup Interface:

Configured   : 0

UP           : 0

Down         : 0

Admin Down   : 0

Unresolved   : 0

Standby      : 0

show l2vpn xconnect interface <Interface> detail

OR

show l2vpn xconnect detai

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn xconnect interface pw-eth20 detail

Thu May 21 05:40:55.789 UTC

Group PWHE, XC ASR1K, state is up; Interworking none

AC: PW-Ether20, state is up

Type PW-Ether

Interface-list: BE20_ONLY

Replicate status:

BE20: success

Gi0/0/1/18: success

Gi0/0/1/19: success

MTU 1500; interworking none

Internal label: 16001

Statistics:

packets: received 52970, sent 0

bytes: received 3485714, sent 0

PW: neighbor 10.2.2.2, PW ID 2020, state is up ( established )

PW class asr1k, XC ID 0xc0000001

Encapsulation MPLS, protocol LDP

Source address 10.1.1.1

PW type Ethernet, control word disabled, interworking none

PW backup disable delay 0 sec

Sequencing not set

PW Status TLV in use

MPLS         Local                          Remote

------------ ------------------------------ -----------------------------

Label        16002                          17

Group ID     0x920                          unknown

Interface    PW-Ether20                     unknown

MTU          1500                           1500

Control word disabled                       disabled

PW type      Ethernet                       Ethernet

VCCV CV type 0x2                            0x2

(LSP ping verification)        (LSP ping verification)

VCCV CC type 0x6                            0x6

(router alert label)           (router alert label)

(TTL expiry)                   (TTL expiry)

------------ ------------------------------ -----------------------------

Incoming Status (PW Status TLV):

Status code: 0x0 (Up) in Notification message

Outgoing Status (PW Status TLV):

Status code: 0x0 (Up) in Notification message

MIB cpwVcIndex: 3221225473

Create time: 21/05/2015 02:52:43 (02:48:12 ago)

Last time status changed: 21/05/2015 05:21:17 (00:19:38 ago)

Last time PW went down: 21/05/2015 03:10:45 (02:30:10 ago)

Statistics:

packets: received 52970, sent 0

bytes: received 3485714, sent 0

Verifique a lista de interface

Exiba a lista de interface usada pelo PWHE: ela deve existir e ter as interfaces apropriadas.

- show generic-interface-list name <NAME>

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show generic-interface-list name BE20_ONLY

Thu May 21 05:43:26.649 UTC

generic-interface-list: BE20_ONLY (ID: 1, interfaces: 3)

Bundle-Ether20 - items pending 0, downloaded to FIB

GigabitEthernet0/0/1/18 - items pending 0, downloaded to FIB

GigabitEthernet0/0/1/19 - items pending 0, downloaded to FIB

Number of items: 1

List is downloaded to FIB

Verificar PWHE usado por uma lista de interface

A saída privada abaixo indica quais interfaces de membro estão "ativas", ou seja, quais foram baixadas para a FIB.

- show l2vpn generic-interface-list name <NAME>

- show l2vpn generic-interface-list private

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn generic-interface-list name BE20_ONLY detail

Thu May 21 05:39:04.983 UTC

Generic-interface-list: BE20_ONLY (ID: 1, interfaces: 3)

Bundle-Ether20 - items pending 0

GigabitEthernet0/0/1/18 - items pending 0

GigabitEthernet0/0/1/19 - items pending 0

Number of items: 1

PW-Ether: 20

Verifique se o MA tem o PWHE com informações corretas

As informações da lista de interface, CW, VC-type etc. devem ser definidas corretamente em MA.

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn ma pwhe interface PW-Ether 20 private

Thu May 21 05:36:28.170 UTC

Interface: PW-Ether20   Interface State: Up, Admin state: Up

Interface handle 0x920

MTU:  1514

BW:   10000 Kbit

Interface MAC addresses (1 address):

10f3.1172.02c5

IDB is not in Replicate Linked List

IDB is not in Create Linked List

IDB is not in Attr Linked List

Opaque flags: 0xe

Flags: 0x3c

Valid  : IFH, MTU, MAC, BW

MA trace history [Num events: 32]

---------------------------------------------------

Time                Event                     Value      Sticky Many

====                =====                     ========== ====== ====

05/21/2015 02:56:05 Remove retry list         0x3        No     No

05/21/2015 02:56:05 IDB Set flag              0x3c       No     No

05/21/2015 03:08:26 IDB Set State             0x1        No     No

05/21/2015 03:08:26 IM publish attr           0x45       No     No

05/21/2015 03:08:26 IM update init-data       0x1e       No     No

05/21/2015 03:08:26 IDB Set flag              0x3c       No     No

05/21/2015 03:08:26 Remove retry list         0x3        No     No

05/21/2015 03:08:26 IDB Set flag              0x3c       No     No

05/21/2015 03:09:54 IDB Set State             0          No     No

05/21/2015 03:09:54 IM publish attr           0x45       No     No

05/21/2015 03:09:54 IM publish attr           0x52       No     No

05/21/2015 03:09:54 IM update init-data       0x1e       No     No

05/21/2015 03:09:54 IDB Set flag              0x3c       No     No

05/21/2015 03:09:54 Remove retry list         0x3        No     No

05/21/2015 03:09:54 IDB Set flag              0x3c       No     No

05/21/2015 03:09:54 Remove retry list         0x3        No     No

05/21/2015 03:09:54 IDB Set flag              0x3c       No     No

05/21/2015 03:10:45 IDB Set State             0x1        No     No

05/21/2015 03:10:45 IM publish attr           0x45       No     No

05/21/2015 03:10:45 IM update init-data       0x1e       No     No

05/21/2015 03:10:45 IDB Set flag              0x3c       No     No

05/21/2015 03:10:45 Remove retry list         0x3        No     No

05/21/2015 03:10:45 IDB Set flag              0x3c       No     No

05/21/2015 05:21:17 IDB Set State             0          No     No

05/21/2015 05:21:17 IM publish attr           0x45       No     No

05/21/2015 05:21:17 IM publish attr           0x52       No     No

05/21/2015 05:21:17 IM update init-data       0x1e       No     No

05/21/2015 05:21:17 IDB Set flag              0x3c       No     No

05/21/2015 05:21:17 Remove retry list         0x3        No     No

05/21/2015 05:21:17 IDB Set flag              0x3c       No     No

05/21/2015 05:21:17 Remove retry list         0x3        No     No

05/21/2015 05:21:17 IDB Set flag              0x3c       No     No

CLIENT MA trace history [Num events: 27]

---------------------------------------------------

Time                Event                     Value      Sticky Many

====                =====                     ========== ====== ====

05/21/2015 02:54:01 IM Notify Up              0x50049e10 No     No

05/21/2015 02:54:01 FSM state change          0x200      No     No

05/21/2015 02:54:01 FSM state change          0x2030d    No     No

05/21/2015 02:54:02 Double restart detected   0x5        No     No

05/21/2015 02:55:00 I/f created/added         0x4000540  No     No

05/21/2015 02:55:00 I/f created/added         0x4000580  No     No

05/21/2015 02:55:00 I/f created/added         0x4000540  No     No

05/21/2015 02:55:00 I/f created/added         0x4000580  No     No

05/21/2015 02:55:00 Intf list change          0x3000300  No     No

05/21/2015 02:55:00 Intf add error            0x4000540  No     No

05/21/2015 02:55:00 Intf add error            0x4000580  No     No

05/21/2015 02:55:00 FSM state change          0x30505    No     No

05/21/2015 02:55:01 Replicate result          0x13fe     No     No

05/21/2015 02:55:01 FSM state change          0x5060b    No     No

05/21/2015 02:55:01 I/f up                    0x4000580  No     No

05/21/2015 02:55:01 I/f up                    0x4000580  No     No

05/21/2015 02:55:02 I/f up                    0x4000540  No     No

05/21/2015 02:55:02 I/f up                    0x4000540  No     No

05/21/2015 02:56:05 Added to peer             0x6060606  No     No

05/21/2015 02:56:05 FSM state change          0x60704    No     No

05/21/2015 02:56:05 Fill VIMI attr            0x20002    No     No

05/21/2015 03:08:26 FSM state change          0x70605    No     No

05/21/2015 03:09:54 FSM state change          0x60704    No     No

05/21/2015 03:09:54 Fill VIMI attr            0x20002    No     No

05/21/2015 03:10:45 FSM state change          0x70605    No     No

05/21/2015 05:21:17 FSM state change          0x60704    No     No

05/21/2015 05:21:17 Fill VIMI attr            0x20002    No     No

PW-HE IDB client data

---------------------

IDB handle 0x5016db2c

Dot1q vlan: 0x81000000

Label: 16001

Remote VC label: 17

Remote PE: 10.2.2.2

Use flow-label on tx: N

L2-overhead: 0

VC-type: 5

CW: N

FSM state: 'Up'(7)

Fwding is up: Y, got route update: Y

Use OWNED_RESOURCE fwding: N

OWNED_RESOURCE fwding is up: N

OWNED_RESOURCE data&colon; 0

Replication error msg has been printed: N

VIF MA reg_handle: 50049e10

PIC array:

(nil)

Replicate retry count: 0

Configured i/f list name: 'BE20_ONLY'

From L2VPN i/f list name: 'BE20_ONLY', i/f list id: 1

L3 i/f:'Bundle-Ether20', idx=0, repl_status 1, fwding up:N, active:Y

L3 i/f:'GigabitEthernet0/0/1/18', idx=1, repl_status 1, fwding up:Y, active:Y

L3 i/f:'GigabitEthernet0/0/1/19', idx=2, repl_status 1, fwding up:Y, active:Y

List intf: 0x5016e154, PLs size:4, num in use:2

I/f:'Gi0/0/1/18', ifh:0x4000540, bundle: 0xb20, ifl idx:1, in-use:Y, misconfig:Y, in peer route:Y, VIMI active:Y

Repl:Y pending:N failed:N not supp:N, unrepl pending:N failed:N, up:Y us:3

I/f:'Gi0/0/1/19', ifh:0x4000580, bundle: 0xb20, ifl idx:2, in-use:Y, misconfig:Y, in peer route:Y, VIMI active:Y

Repl:Y pending:N failed:N not supp:N, unrepl pending:N failed:N, up:Y us:3

I/f:'', ifh:0x0, bundle: 0x0, ifl idx:0, in-use:N, misconfig:N, in peer route:N, VIMI active:N

Repl:N pending:N failed:N not supp:N, unrepl pending:N failed:N, up:N us:0

I/f:'', ifh:0x0, bundle: 0x0, ifl idx:0, in-use:N, misconfig:N, in peer route:N, VIMI active:N

Repl:N pending:N failed:N not supp:N, unrepl pending:N failed:N, up:N us:0

---------------------------------------------------

Verificar informações de resumo PWHE

Verifique se os contadores na saída estão corretos:

- show l2vpn pwhe summary

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn pwhe summary

Thu May 21 05:35:59.381 UTC

Number of PW-HE interfaces: 1

Up: 1  Down: 0  Admindown: 0

PW-Ether: 1

Up: 1  Down: 0  Admindown: 0

PW-IW: 0

Up: 0  Down: 0  Admindown: 0

Verificar Rótulos

Verifique o rótulo na tabela de rótulos. Você precisa primeiro obter os rótulos internos das informações do xconnect com este comando.

- show l2vpn xconnect detail

em seguida, procure internal Label na saída e execute este comando show para verificar a associação de rótulo e interface no ASR9K.

- show mpls label table label <internal_label> detail

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn xconnect detail

Thu May 21 05:27:11.762 UTC

Group PWHE, XC ASR1K, state is up; Interworking none

AC: PW-Ether20, state is up

Type PW-Ether

Interface-list: BE20_ONLY

Replicate status:

BE20: success

Gi0/0/1/18: success

Gi0/0/1/19: success

MTU 1500; interworking none

Internal label: 16001

Statistics:

packets: received 27293, sent 0

bytes: received 1996176, sent 0

PW: neighbor 10.2.2.2, PW ID 2020, state is up ( established )

PW class asr1k, XC ID 0xc0000001

Encapsulation MPLS, protocol LDP

Source address 10.1.1.1

PW type Ethernet, control word disabled, interworking none

PW backup disable delay 0 sec

Sequencing not set

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show mpls label table label 16001 detail

Thu May 21 05:27:55.760 UTC

Table Label   Owner                        State  Rewrite

----- ------- ---------------------------- ------ -------

0     16001   L2VPN:Active                 InUse  Yes

(PW-HE, vers:0, intf=PE20)

Queda de tráfego/Sessões não surgem

Se a sessão não aparecer, verifique se os pacotes foram descartados em NP. Você pode usar esses comandos para ver o pacote cair em NP no ASR9K.

- clear counters

- show l2vpn xconnect detail pacote de inclusão |

- clear controllers np counters all

- show controller np counters all

Comandos show relacionados ao BNG

Use estes comandos para verificar as informações relacionadas ao BNG no ASR9K.

- show subscriber session all summary

- show subscriber manager disconnect-history unique summary

- total de show subscriber manager statistics debug

- total de show subscriber manager statistics summary

- show subscriber manager trace event/error

Depurações a serem habilitadas

Se a sessão não surgiu no ASR9K e você não encontrou nenhum pacote descartado no NP, então você pode habilitar essas depurações no ASR9K para ver por que a sessão não está surgindo no ASR9K.

- debug l2vpn ea pwhe platform verbose

- debug l2vpn forwarding platform common all

- debug pm api location <location>

- debug pm error location <location>

- debug uidb api errors location <location>

Escalonamento

Se ainda tiver algum problema, entre em contato com o TAC da Cisco e obtenha o Show tech do ASR9K.

- show tech-support subscriber

- show tech-support l2vpn