Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Configurar

Determine a versão atual do firmware no roteador

Atualize o firmware do VDSL

Verificar

Troubleshoot

Introduction

Este documento descreve como atualizar o firmware de Linha de Assinante Digital (VDSL - Digital Subscriber Line) de Taxa de Bits Muito Alta no Cisco 800 Series Router.

Prerequisites

Requirements

A Cisco recomenda que você verifique as Notas de versão da sua versão de firmware antes de concluir este procedimento de atualização.

Componentes Utilizados

As informações neste documento são baseadas em um roteador Cisco 897VAB. No entanto, este documento não está restrito a versões específicas de software e hardware.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Configurar

Note: Use a Command Lookup Tool ( somente clientes registrados) para obter mais informações sobre os comandos usados nesta seção.

Determine a versão atual do firmware no roteador

Insira o comando show controller vdsl para determinar a versão de firmware atualmente no Cisco 800 Series Router. Procure as entradas de saída mostradas em negrito nesta saída de exemplo:

Router# show controller vdsl 0

Controller VDSL 0 is UP

Daemon Status: Up

XTU-R (DS) XTU-C (US)

Chip Vendor ID: 'BDCM' 'BDCM'

Chip Vendor Specific: 0x0000 0xA31E

Chip Vendor Country: 0xB500 0xB500

Modem Vendor ID: 'CSCO' ' '

Modem Vendor Specific: 0x4602 0x0000

Modem Vendor Country: 0xB500 0x0000

Serial Number Near: FHK144672GQ 886VA-K 15.2(4)M

Serial Number Far:

Modem Version Near: 15.2(4)M

Modem Version Far: 0xa31e

Modem Status: TC Sync (Showtime!)

DSL Config Mode: AUTO

Trained Mode: G.992.5 (ADSL2+) Annex J

TC Mode: ATM

Selftest Result: 0x00

DELT configuration: disabled

DELT state: not running

Trellis: ON ON

SRA: disabled disabled

SRA count: 0 0

Bit swap: enabled enabled

Bit swap count: 0 1

Line Attenuation: 0.0 dB 4.9 dB

Signal Attenuation: 3.3 dB 4.4 dB

Noise Margin: 9.8 dB 6.3 dB

Attainable Rate: 26332 kbits/s 2952 kbits/s

Actual Power: 7.1 dBm 11.9 dBm

Total FECC: 0 0

Total ES: 9721 42

Total SES: 9714 4

Total LOSS: 1086 0

Total UAS: 2670101 2670101

Total LPRS: 0 0

Total LOFS: 8342 0

Total LOLS: 0 0

Full inits: 2511

Failed full inits: 815

Short inits: 174

Failed short inits: 1353

Firmware Source File Name (version)

-------- --------- ------------------

VDSL user config flash:VA_A_39h_B_38h3_24h_j.bin (10)

Modem FW Version: 140305_1531-4.02L.03.B2pvC038h3_J.d24h

Modem PHY Version: B2pvC038h3_J.d24h

Vendor Version: Bpv38h3.24h 68

DS Channel1 DS Channel0 US Channel1 US Channel0

Speed (kbps): 0 25346 0 2832

SRA Previous Speed: 0 0 0 0

Previous Speed: 0 25866 0 1264

Total Cells: 0 35481077 0 3942410

User Cells: 0 0 0 0

Reed-Solomon EC: 0 0 0 0

CRC Errors: 0 220155 0 0

Header Errors: 0 0 0 0

Interleave (ms): 0.00 0.08 0.00 11.11

Actual INP: 0.00 0.00 0.00 0.69

Training Log: Stopped

Training Log Filename: flash:vdsllog.bin

Note: O firmware padrão é colocado na flash:/firmware/<filename>. Se nenhum caminho de firmware for fornecido sob a controladora VDSL, e a controladora VDSL for redefinida (shut/ no-shut) ou o roteador for recarregado; o controlador VDSL assume este firmware padrão. Não exclua o firmware base da flash:/firmware/<filename>.

Atualize o firmware do VDSL

1. Baixe o novo firmware VDSL2 do Cisco.com Software Center.

2. Escolha Roteadores > Roteadores de Filial > Roteadores Cisco 800 Series > Roteador de Serviços Integrados Cisco 887V > Firmware DSL de Taxa de Bits Muito Alta (VDSL).

3. Copie o firmware para um local designado. Por exemplo, a memória flash do roteador ou um servidor TFTP.
Este exemplo mostra como copiar o firmware VDSL2 de um servidor TFTP em 10.76.76.160 para a memória flash do roteador:

Router#copy tftp flash:

Address or name of remote host []? 10.76.76.160 [Addres of the TFTP Server]

Source filename []? vdsl_bond.bin_39p1 [Name of the downloaded VDSL Firmware]

Destination filename [vdsl_bond.bin_39p1]? [Name of the VDSL firmware on the router flash]

Como alternativa, você pode inserir o comando copy ftp://usernamepassword@TFTP-Server-IPAddress flash:VDSL-Firmware-Name. Esta saída fornece um exemplo:

Router#copy ftp://test:test@10.76.76.160 flash:vdsl_bond.bin_39p1

Source filename []? vdsl_bond.bin_39p1

Destination filename [vdsl_bond.bin_39p1]?

Accessing ftp://test:test@10.76.76.160/vdsl_bond.bin_39p1...

Loading vdsl_bond.bin_39p1 !!!!!!!!!!!

[OK - 2660422/4096 bytes]

4. Configure o roteador para carregar o novo firmware VDSL2 de um local designado.
Router#conf t

Enter configuration commands, one per line. End with CNTL/Z.

Router(config)#controller vdsl 0

Router(config-controller)#firmware filename ?

archive: Download fw file name

cns: Download fw file name

flash: Download fw file name

ftp: Download fw file name

http: Download fw file name

https: Download fw file name

null: Download fw file name

nvram: Download fw file name

rcp: Download fw file name

scp: Download fw file name

system: Download fw file name

tar: Download fw file name

tftp: Download fw file name

tmpsys: Download fw file name

xmodem: Download fw file name

ymodem: Download fw file name

Router(config-controller)#firmware filename flash:vdsl_bond.bin_39p1

5. Reinicie a interface do controlador para que o novo firmware tenha efeito:
Router#conf t

Enter configuration commands, one per line. End with CNTL/Z.

Router(config)#controller vdsl 0

Router(config-controller)#shut

Router(config-controller)#no shut

Router(config-controller)#end

Verificar

Use esta seção para confirmar se a sua configuração funciona corretamente.

A ferramenta Output Interpreter (exclusiva para clientes registrados) é compatível com alguns comandos de exibição.. Use a ferramenta Output Interpreter para visualizar uma análise do resultado gerado pelo comando show..

Router#show controller vdsl 0

Controller VDSL 0 is DOWN

Daemon Status:           Establishing Link

XTU-R (DS)              XTU-C (US)

Chip Vendor ID:         'BDCM'                   'BDCM'

Chip Vendor Specific:   0x0000                   0xA39A

Chip Vendor Country:    0xB500                   0xB500

Modem Vendor ID:        'CSCO'                   'BDCM'

Modem Vendor Specific:  0x4602                   0xA39A

Modem Vendor Country:   0xB500                   0xB500

Serial Number Near:    FGL18212393 C897VAB- 15.4(201503

Serial Number Far:

Modem Version Near:    15.4(20150325:160033) [ragvasud

Modem Version Far:     0xa39a

Modem Status:          Unknown

DSL Config Mode:         ADSL2+

Trained Mode:

TC Mode:                 UNKNOWN

Selftest Result:         0x00

DELT configuration:      disabled

DELT state:              not running

Bonded Status:           PTM Bonded<

Number of Ports:         2

Port ID:                 0               1

Link Status:             DOWN            DOWN

Aggr US Rate(kbps):      0

Aggr DS Rate(kbps):      0

Full inits:             3

Failed full inits:      14

Short inits:            2

Failed short inits:     2

Firmware        Source          File Name

--------        ------          ----------

VDSL            user config     flash:vdsl_bond.bin_39p1

Modem FW  Version:      4.14L.04

Modem PHY Version:      A2pv6F039p1.d24m

Line:

XTU-R (DS)              XTU-C (US)

Trellis:                 OFF                      OFF

SRA:                     disabled                disabled

SRA count:              0                       0

Bit swap:                enabled                 enabled

Training Log :  Stopped

Training Log Filename : flash:vdsllog.bin

Troubleshoot

Atualmente, não existem informações disponíveis específicas sobre Troubleshooting para esta configuração.