Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Conventions

Configurar

Diagrama de Rede

Configurações

Verificar

Troubleshoot

Informações Relacionadas

Introduction

Este documento discute como configurar um tronco de protocolo Inter-Switch Link (ISL) entre um Cisco Catalyst 2948G-L3 e os Catalyst 2900/3500XL ou 2970 Series Switches. Quando você conecta um Catalyst 2948G-L3 a um switch, as tarefas de configuração são as mesmas para conectar um roteador a um switch. O exemplo de configuração neste documento usa o Catalyst 2948G-L3 como um roteador e usa o Catalyst 3500XL como o switch de Camada 2 (L2). Você pode substituir o Catalyst 2900XL ou 2970 pelo 3500XL, para os fins deste documento.

Para usar o conceito de VLANs no Catalyst 2948G-L3, você deve usar grupos de bridge. Cada grupo de ligação é considerado um VLAN separado. These bridge groups correspond to the VLAN number of the connected Switch.

Prerequisites

Requirements

Antes de tentar esta configuração, certifique-se de conectar um cabo cruzado entre o 2900/3500XL ou 2970 e o 2948G-L3. Normalmente, você usa um cabo direto entre um roteador e um switch; mas com o Catalyst 2948G-L3, você usa um cabo cruzado para se conectar a outro switch. Esse é o mesmo cabo cruzado que você usaria para uma conexão de switch a switch.

Os leitores deste documento devem estar cientes destes tópicos:

- Os switches das séries Catalyst 2940 e 2950/2955 não suportam encapsulamento ISL. Para obter informações sobre suporte de encapsulamento ISL e outros requisitos de entroncamento para Catalyst Switches, consulte Requisitos do Sistema para Implementar o Entroncamento.

- O Catalyst 2948G-L3 atingiu o fim da vida útil (EoL). Para obter detalhes e produtos de substituição recomendados, consulte EoL / EoS para Cisco Catalyst 2948G-L3 e 4908G-L3 Switches.

Componentes Utilizados

As informações neste documento são baseadas nestas versões de software:

- Software Cisco IOS® versão 12.0(25)W5(27) para switch/roteador de camada 3 (L3) (CAT2948G-IN-M)

- Software Cisco IOS versão 12.0(5)WC9 (C3500XL-C3H2S-M) (fc1)

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Conventions

For more information on document conventions, refer to the Cisco Technical Tips Conventions.

Configurar

Esta seção fornece informações para configurar os recursos descritos neste documento.

Observação: para encontrar informações adicionais sobre os comandos neste documento, use a Command Lookup Tool (somente clientes registrados) .

Diagrama de Rede

Este documento utiliza a seguinte configuração de rede:

Se você quiser que todos os três PCs possam fazer ping entre si e ter um gateway padrão, você deve usar bridging com IRB (Integrated Routing and Bridging - roteamento e bridging integrados).

O Catalyst 2948G-L3 é o dispositivo L3 nesse cenário. Como é um dispositivo L3, ele não pode ter duas interfaces L3 na mesma sub-rede. É por isso que você precisa usar grupos de bridge nas interfaces e conectá-los a uma interface virtual de bridge (BVI), BVI 2.

O endereço IP BVI 2 é o gateway padrão para todos os PCs e dispositivos na VLAN 2 ou no grupo de bridge 2.

Configurações

Este documento utiliza as seguintes configurações:

- 2948G-L3

- 2900/3500XL ou 2970

2948G-L3

Building configuration...

Current configuration:

!

version 12.0

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 2948G-L3

!

!

ip subnet-zero

bridge irb

!

!

!

interface FastEthernet1

!--- This interface is the ISL trunk to the switch.

no ip address

no ip directed-broadcast

!

interface FastEthernet1.1

encapsulation isl 1

no ip redirects

no ip directed-broadcast

bridge-group 1

!--- Use bridge-group 1 for the trunk subinterface. !--- You can not use an IP address here because of the subnet !--- overlap that would occur due to BVI 1, which is in the !--- same subnet.

!

interface FastEthernet1.2

encapsulation isl 2

no ip redirects

no ip directed-broadcast

bridge-group 2

!

interface FastEthernet2

no ip address

no ip directed-broadcast

bridge-group 2

!--- This port belongs to VLAN 2.

!

interface FastEthernet3

no ip address

no ip directed-broadcast

bridge-group 2

!--- This port belongs to VLAN 2.

!

interface FastEthernet4

no ip address

no ip directed-broadcast

bridge-group 1

!--- This port belongs to VLAN 1.

!

interface BVI1

ip address 10.1.1.1 255.255.0.0

!--- This is the IP address of BVI 1.

no ip directed-broadcast

no ip route-cache cef

!

interface BVI2

!--- This is the IP address of BVI 2.

ip address 10.2.2.2 255.255.0.0

no ip directed-broadcast

no ip route-cache cef

!

ip classless

!

bridge 1 protocol ieee

!--- Choose IEEE as the Spanning Tree Protocol.

bridge 1 route ip

!--- Allow routing to occur for IP.

bridge 2 protocol ieee

bridge 2 route ip

!

line con 0

transport input none

line aux 0

line vty 0 4

login

!

end

2900/3500XL ou 2970

!--- First, add VLAN 2 to the VLAN database for a 2900/3500XL !--- switch:

3500XL# vlan database

3500XL(vlan)# vlan 2

VLAN 2 added:

Name: VLAN0002

3500XL(vlan)# exit

APPLY completed.

Exiting....

3500XL#

!--- The Catalyst 2970 gives you the option to configure VLANs !--- from the VLAN database or from global configuration mode:

2970# configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

2970(config)# vlan 2

2970(config-vlan)# end

2970#

!--- The switchport configurations on the Catalyst 2900/3500XL !--- and on the 2970 are identical, for the purposes of this !--- document. Remember that the Catalyst 2970 has 10/100/1000 !--- ports (1000Base-T), so the interfaces in this output !--- would instead be labeled Gigabit Ethernet 0/1, 0/2, !--- and so forth.

Current configuration:

!

version 12.0

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 3500XL

!

interface FastEthernet0/1

switchport mode trunk

!--- This port is an ISL trunk.

!

interface FastEthernet0/2

switchport access vlan 2

!--- This port is in VLAN 2.

!

interface FastEthernet0/3

!--- This port is in the default VLAN 1.

!

interface FastEthernet0/4

!

!

interface VLAN1

ip address 10.1.1.100 255.255.0.0

!--- This is the IP address of the management interface.

no ip directed-broadcast

no ip route-cache

!

snmp-server engineID local 000000090200000AF484CC80

snmp-server community public RO

!

line con 0

exec-timeout 0 0

transport input none

stopbits 1

line vty 0 4

login

line vty 5 15

login

!

end

Verificar

Esta seção fornece informações para confirmar se sua configuração está funcionando corretamente.

A Output Interpreter Tool (somente clientes registrados) oferece suporte a determinados comandos show, o que permite exibir uma análise da saída do comando show.

- show interface fa0/1 switchport — Verifique o status do tronco no 2900/3500XL ou 2970 e veja quais VLANs estão ativas.

3500XL# show interface fa0/1 switchport

Name: Fa0/1

Switchport: Enabled

Administrative mode: trunk

Operational Mode: trunk

Administrative Trunking Encapsulation: isl

Operational Trunking Encapsulation: isl

Negotiation of Trunking: Disabled

Access Mode VLAN: 0 ((Inactive))

Trunking Native Mode VLAN: 1 (default)

Trunking VLANs Enabled: ALL

Trunking VLANs Active: 1,2

Pruning VLANs Enabled: 2-1001

Priority for untagged frames: 0

Override vlan tag priority: FALSE

Voice VLAN: none

Appliance trust: none

Self Loopback: No

3500XL#

- show vlan — Verifique se as portas no 2900/3500XL ou 2970 estão atribuídas às VLANs corretas.

3500XL# show vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Fa0/3, Fa0/4, Fa0/5, Fa0/6,

Fa0/7, Fa0/8, Fa0/9, Fa0/10,

Fa0/11, Fa0/12, Fa0/13, Fa0/14,

Fa0/15, Fa0/16, Fa0/17, Fa0/18,

Fa0/19, Fa0/20, Fa0/21, Fa0/22,

Fa0/23, Fa0/24, Gi0/1, Gi0/2

2    VLAN0002                         active    Fa0/2

1002 fddi-default                     active

1003 token-ring-default               active

1004 fddinet-default                  active

1005 trnet-default                    active

VLAN Type  SAID       MTU   Parent RingNo BridgeNo Stp  BrdgMode Trans1 Trans2

---- ----- ---------- ----- ------ ------ -------- ---- -------- ------ ------

1    enet  100001     1500  -      -      -        -    -        0      0

2    enet  100002     1500  -      -      -        -    -        0      0

1002 fddi  101002     1500  -      -      -        -    -        0      0

1003 tr    101003     1500  -      -      -        -    -        0      0

1004 fdnet 101004     1500  -      -      -        ieee -        0      0

1005 trnet 101005     1500  -      -      -        ibm  -        0      0

3500XL#

- show interface bvi 1 —Verifique se as interfaces 2948G-L3 BVI e o protocolo de linha estão ativados no 2948G-L3.

2948G-L3# show interface bvi 1

BVI1 is up, line protocol is up

Hardware is BVI, address is 0001.c75c.680a (bia 0000.0000.0000)

Internet address is 10.1.1.1/16

MTU 1500 bytes, BW 10000 Kbit, DLY 5000 usec, rely 255/255, load 1/255

Encapsulation ARPA, loopback not set

ARP type: ARPA, ARP Timeout 04:00:00

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue 0/0 (size/max)

2948G-L3#

- show bridge 1 —Verifique se a bridge 1 está encaminhando. Você pode também verificar se o protocolo Spanning Tree está habilitado e sendo encaminhado com um comando show spanning-tree.

2948G-L3# show bridge 1

Total of 300 station blocks, 299 free

Codes: P - permanent, S - self

Bridge Group 1:

Address       Action   Interface

00ee.1e9f.50c0   forward   Fa1.1

2948G-L3#

Troubleshoot

Esta seção fornece dicas e saídas de exemplo para ajudar a solucionar problemas de sua configuração.

- Verifique se você pode executar ping para o outro dispositivo.

- Verifique se os PCs podem executar o ping em outros PCs nas VLANs.

- Verifique se o gateway padrão está correto. Neste cenário, o gateway padrão são os respectivos BIVs no 2948G-L3.

2948G-L3# ping 10.1.1.100

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.100, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/6/12 ms

2948G-L3# show arp

Protocol  Address          Age (min)  Hardware Addr   Type   Interface

Internet  10.2.2.2                -   0030.40d6.4008  ARPA   BVI2

Internet  10.1.1.1                -   0030.40d6.400a  ARPA   BVI1

Internet  10.1.1.100              1   00ee.1e9f.50c0  ARPA   BVI1

2948G-L3#

Informações Relacionadas

- Páginas de Suporte de Produtos de LAN

- Página de suporte da switching de LAN

- Suporte Técnico e Documentação - Cisco Systems