Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Conventions

Informações de Apoio

Configurar

Diagrama de Rede

Configurações

Verificar

Exemplo de saída do comando show

Catalyst 2900XL/3500XL Switch

Catalyst 6506 Switch

Troubleshoot

Informações Relacionadas

Introduction

Esta é uma configuração de exemplo de EtherChannel entre um Cisco Catalyst 6500 que executa o Catalyst OS (CatOS) e um switch Catalyst 3500XL. O EtherChannel pode ser chamado de Fast EtherChannel (FEC) ou Gigabit EtherChannel (GEC). O nome depende da velocidade das interfaces ou das portas que você usa para formar o EtherChannel. Você pode usar qualquer um desses switches deste cenário para alcançar os mesmos resultados:

- Qualquer switch das séries Catalyst 4500/4000, 5500/5000 ou 6500/6000 que execute CatOS

- Qualquer um dos switches Catalyst das séries 2900XL ou 3500XL de configuração fixa (L2)

Neste documento, duas portas Fast Ethernet de cada um dos switches são agrupadas em um FEC. Neste documento, os termos "FEC", "GEC", "port channel", "channel" e "port group" se referem ao EtherChannel.

Prerequisites

Requirements

Certifique-se de atender a estes requisitos antes de tentar esta configuração:

- Familiaridade com os comandos a serem usados para configurar o EtherChannel em um switch Catalyst 2900XL ou 3500XL

Para obter mais informações sobre os comandos, consulte a seção Configurando as Portas do Switch do documento Guia de Configuração do Software Catalyst 2900 XL e Catalyst 3500 XL, 12.0(5)WC5, 12.0(5)WC6.

- Familiaridade com os comandos a serem usados para configurar o EtherChannel em um switch que executa CatOS

Para obter mais informações sobre os comandos, consulte a seção Configuração do EtherChannel do documento Guia de Configuração de Software da Série Catalyst 6500, 8.7.

Componentes Utilizados

As informações neste documento são baseadas nestas versões de software e hardware:

- Switch Catalyst 3500XL (modelo WS-C3524-PWR-XL-EN) que executa o Software Cisco IOS® versão 12.0(5)WC9

- Switch Catalyst 6500 (modelo 6506 com Supervisor Engine II) que executa o software CatOS versão 8.2.1

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Conventions

Consulte as Convenções de Dicas Técnicas da Cisco para obter mais informações sobre convenções de documentos.

Informações de Apoio

Você deve criar manualmente o EtherChannel porque os switches Catalyst 2900XL/3500XL não suportam o Port Aggregation Protocol (PAgP); Os switches CatOS suportam PAgP. O PAgP facilita a criação automática de FEC e GEC. Para obter mais informações sobre PAgP, consulte a seção Configurando o EtherChannel do documento Guia de Configuração do Software para o Catalyst 6500 Series, 8.7.

Crie o canal de porta na ordem destas etapas:

Observação: ao executar as etapas nessa ordem, você evita possíveis problemas com o Spanning Tree Protocol (STP) que podem ocorrer durante o processo de configuração. O STP pode desligar portas com o status errdisable no switch Catalyst 6500 se você configurar o switch CatOS como um canal antes de configurar o switch XL como um canal.

1. Emita o comando set port disable module/port no switch CatOS.

O comando define para desabilitar o modo das portas para uso na canalização de portas.

2. Crie o canal da porta (grupo de portas) no switch XL.

3. Crie o canal de porta no switch CatOS.

Observação: não se esqueça de definir o modo de canal como "on". Essa configuração é necessária para desabilitar o PAgP nas portas e forçar as portas a formar um canal.

4. Emita o comando set port enable module/port no switch CatOS.

O comando reativa as portas que foram desativadas anteriormente.

Configurar

Nesta seção, você encontrará informações para configurar os recursos descritos neste documento.

Nota:Use a Command Lookup Tool (somente clientes registrados) para obter mais informações sobre os comandos usados neste documento.

Diagrama de Rede

Este documento utiliza a seguinte configuração de rede:

Configurações

Este documento utiliza as seguintes configurações:

- Catalyst 3524XL

- Catalyst 6506

Catalyst 3524XL

Current configuration:

!

version 12.0

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname cat3500

!

enable password mysecret

!--- This is the privileged mode password for the example.

!

!

!

!

!

ip subnet-zero

!

!

!

interface FastEthernet0/1

port group 1

!--- The port group

command !--- makes this interface a member of channel group 1.

!

interface FastEthernet0/2

port group 1

!--- This interface is also a member of channel group 1.

!

interface VLAN1

ip address 10.10.10.2 255.255.255.0

!--- This is the IP address for management.

no ip directed-broadcast

no ip route-cache

!

!

line con 0

transport input none

stopbits 1

line vty 0 4

password mysecret

!--- This is the Telnet password for the example.

login

line vty 5 15

login

!

end

cat3500#

Catalyst 6506

begin

!

# ***** NON-DEFAULT CONFIGURATION *****

!

!

#time: Sun Feb 1 2004, 14:03:48

!

#version 8.2(1)

!

!--- Output suppressed.

!

#ip

set interface sc0 1 10.10.10.3/255.255.255.0 10.10.10.255

!--- This is the IP address for management.

!

!--- Output suppressed.

!

#port channel

set port channel 2/1-2 15

!--- The set port channel

command !--- creates an EtherChannel on switches that run CatOS. !--- The admin group (15, in this case) is not configured, !--- but is a number that the system assigns randomly.

# default port status is enable

!

!

#module 1 : 2-port 1000BaseX Supervisor

!

#module 2 : 48-port 10/100BaseTX Ethernet

set port channel 2/1-2 mode on

!--- The set port channel

mode on

command disables PAgP. !--- The disablement forces the ports to form a channel with the XL switch !--- that does not support PAgP.

!

#module 3 empty

!

#module 4 empty

!

#module 5 empty

!

#module 6 empty

!

#module 15 : 1-port Multilayer Switch Feature Card

!

#module 16 empty

end

cat6506> (enable)

Verificar

Use esta seção para confirmar se a sua configuração funciona corretamente.

A Output Interpreter Tool ( somente clientes registrados) (OIT) oferece suporte a determinados comandos show. Use a OIT para exibir uma análise da saída do comando show.

- Verifique o canal de porta do Switch Catalyst 2900XL/3500XL:

- show port group

- show port group group-number

- Verifique o status de spanning tree no Switch Catalyst 2900XL/3500XL:

- show spanning-tree

- Verifique o canal da porta no Switch CatOS.

- show port capabilities module

- mostrar canal de porta

- show port channel module/port

- show port channel info

- Verifique o status do spanning tree no switch CatOS:

- show spantree

- show spantree vlan

- show spantree module/port

Exemplo de saída do comando show

Catalyst 2900XL/3500XL Switch

- show port group

cat3500# show port group

Group       Interface           Transmit Distribution

-----   ---------------------   ---------------------

1       FastEthernet0/1         source address

1       FastEthernet0/2         source address

cat3500#

- show spanning-tree

cat3500# show spanning-tree

Spanning tree 1 is executing the IEEE compatible Spanning Tree protocol

Bridge Identifier has priority 32768, address 00d0.5868.f180

Configured hello time 2, max age 20, forward delay 15

Current root has priority 32768, address 00d0.020e.2c00

Root port is 1, cost of root path is 12

Topology change flag not set, detected flag not set, changes 10

Times:  hold 1, topology change 35, notification 2

hello 2, max age 20, forward delay 15

Timers: hello 0, topology change 0, notification 0

Interface Fa0/1 (port 1) in Spanning tree 1 is FORWARDING

Port path cost 12, Port priority 128

Designated root has priority 32768, address 00d0.020e.2c00

Designated bridge has priority 32768, address 00d0.020e.2c00

Designated port is 33, path cost 0

Timers: message age 2, forward delay 0, hold 0

BPDU: sent 4, received 633

Interface Fa0/3 (port 15) in Spanning tree 1 is down

Port path cost 100, Port priority 128

Designated root has priority 32768, address 00d0.020e.2c00

Designated bridge has priority 32768, address 00d0.5868.f180

!--- Output suppressed.

Observação: essa saída não exibe a interface Fa0/2 porque a interface está agrupada com Fa0/1 no canal da porta. Consulte (porta 1) na saída.

Catalyst 6506 Switch

- show port capabilities module —Use este comando para verificar se o módulo suporta EtherChannel.

cat6506> (enable) show port capabilities 2

Model                    WS-X6348-RJ-45

Port                     2/1

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1Q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  yes

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on),send-(off)

Security                 yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(1q4t),tx-(2q2t)

CoS rewrite              yes

ToS rewrite              DSCP

UDLD                     yes

Inline power             auto,off

AuxiliaryVlan            1..1000,1025..4094,untagged,dot1p,none

SPAN                     source,destination

COPS port group          2/1-48

Link debounce timer      yes

Dot1q-all-tagged         yes

--------------------------------------------------------------

Model                    WS-X6348-RJ-45

Port                     2/2

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1Q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  yes

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on),send-(off)

Security                 yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(1q4t),TX(2q2t)

COs rewrite              yes

ToS rewrite              DSCP

UDLD                     yes

Inline power             auto,off

AuxiliaryVlan            1..1000,1025..4094,untagged,dot1p,none

SPAN                     source,destination

COPS port group          2/1-48

Link debounce timer      yes

Dot1q-all-tagged         yes

--------------------------------------------------------------

!--- Output suppressed.

- mostrar canal de porta

cat6506> (enable) show port channel

Port  Status     Channel              Admin Ch

Mode                 Group Id

----- ---------- -------------------- ----- -----

2/1  connected  on                      15  1762

2/2  connected  on                      15  1762

Port  Device-ID                       Port-ID                   Platform

----- ------------------------------- ------------------------- ----------------

2/1  cat3500                         FastEthernet0/1           cisco WS-C3524-PWR-XL

2/2  cat3500                         FastEthernet0/2           cisco WS-C3524-PWR-XL

cat6506> (enable)

- show port channel info

cat6506> (enable) show port channel info

Switch Frame Distribution Method: ip both

Port  Status     Channel              Admin Channel Speed Duplex Vlan

mode                 group id

----- ---------- -------------------- ----- ------- ----- ------ ----

2/1  connected  on                      15    1762 a-100 a-full    1

2/2  connected  on                      15    1762 a-100 a-full    1

Port  Channel Oper-group Neighbor   Oper-Distribution PortSecurity/

ifIndex            Oper-group Method            Dynamic port

----- ------- ---------- ---------- ----------------- -------------

2/1  67             241            ip both

2/2  67             241            ip both

Port  Device-ID                       Port-ID                   Platform

----- ------------------------------- ------------------------- ----------------

2/1  cat3500                         FastEthernet0/1           cisco WS-C3524-PWR-XL

2/2  cat3500                         FastEthernet0/2           cisco WS-C3524-PWR-XL

!--- Output suppressed.

- show spantree vlan

cat6506> (enable) show spantree 1

VLAN 1

Spanning tree mode          RAPID-PVST+

Spanning tree type          ieee

Spanning tree enabled

Designated Root             00-04-9b-bf-04-00

Designated Root Priority    32768

Designated Root Cost        0

Designated Root Port        1/0

Root Max Age   20 sec   Hello Time 2  sec   Forward Delay 15 sec

Bridge ID MAC ADDR          00-04-9b-bf-04-00

Bridge ID Priority          32768

Bridge Max Age 20 sec   Hello Time 2  sec   Forward Delay 15 sec

Port                     State         Role Cost      Prio Type

------------------------ ------------- ---- --------- ---- --------------------

1/1                     not-connected  -           4   32

1/2                     not-connected  -           4   32

2/1-2                    forwarding    DESG        12   32 P2P, PEER(STP)

2/3                     not-connected  -         100   32

2/4                     not-connected  -         100   32

2/5                     not-connected  -         100   32

2/6                     not-connected  -         100   32

!--- Output suppressed.

- show spantree module/port

cat6506> (enable) show spantree 2/1

Edge Port:          No, (Configured) Default

Link Type:         P2P, (Configured) Auto

Port Guard:    Default

Port                     Vlan State         Role Cost      Prio Type

------------------------ ---- ------------- ---- --------- ---- -----------------

2/1-2                    1    forwarding    DESG        12   32 P2P, PEER(STP)

cat6506> (enable)

cat6506> (enable) show spantree 2/2

Edge Port:          No, (Configured) Default

Link Type:         P2P, (Configured) Auto

Port Guard:    Default

Port                     Vlan State         Role Cost      Prio Type

------------------------ ---- ------------- ---- --------- ---- -----------------

2/1-2                    1    forwarding    DESG        12   32 P2P, PEER(STP)

cat6506> (enable)

Observação: a saída do comando show spantree module/port para as portas 2/1 e 2/2 exibe resultados idênticos porque as portas estão agrupadas em um canal.

Troubleshoot

Atualmente, não existem informações disponíveis específicas sobre Troubleshooting para esta configuração.

Informações Relacionadas

- Configuring EtherChannel and 802.1Q Trunking Between Catalyst 2900XL/3500XL and Catalyst 2940, 2950/2955, and 2970 Switches

- Configurando EtherChannel e entroncamento de Camada 2 entre Switches 2900XL/3500XL/2950 Series e Switches Catalyst executando o Cisco IOS Software

- Páginas de Suporte de Produtos de LAN

- Página de suporte da switching de LAN

- Suporte Técnico e Documentação - Cisco Systems