Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Informações de Apoio

Configurar

Diagrama de Rede

Configurações

Verificar

Troubleshoot

Introduction

Este documento descreve como configurar e verificar o peering do eBGP (eBorder Gateway Protocol) entre o par xus do Nе do vPC e outro dispositivo. A configuração no dispositivo externo é mostrada como Cisco CLI NX-OS para maior clareza.

Prerequisites

Requirements

A Cisco recomenda que você tenha conhecimento destes tópicos:

- conceitos básicos de operação e configuração do vPC. Referência: https://www.cisco.com/c/dam/en/us/td/docs/switches/datacenter/sw/design/vpc_design/vpc_best_practices_design_guide.pdf

- operação e configuração de BGP

Componentes Utilizados

As informações neste documento são baseadas nestas versões de software e hardware:

leaf1#

C93108TC-FX

NXOS 9.3(3)

leaf2#

C93108TC-FX

NXOS 9.3(3)

DispositivoExterno

N9K-C9396PX

NXOS: versão 9.2(3)

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. Se a rede estiver ativa, certifique-se de que você entenda o impacto potencial de qualquer comando.

Informações de Apoio

Correspondência de protocolos de roteamento (OSPF, ISIS, RIP, EIGRP, BGP) entre o par vPC e um dispositivo externo. Isso é suportado de acordo com: https://www.cisco.com/c/en/us/support/docs/ip/ip-routing/118997-technote-nexus-00.html. Este artigo descreve notas adicionais e exemplos de configuração para o eBGP como um protocolo de roteamento.

Vários problemas são colocados ao tentar habilitar o peering do protocolo de roteamento em um vPC, que não existem ao usar

canal de porta padrão:

1. Não é determinístico que membro do canal de porta o dispositivo externo usará para encaminhar o tráfego para cada endereço MAC. É possível que o dispositivo externo envie pacotes BGP para Leaf-1 pelo link para Leaf-1. Quando o Leaf-1 o receber, ele o direcionará à CPU e o descartará (não o próprio endereço ip), portanto, o BGP (unicast) ou outro protocolo (multicast) estará oscilando constantemente. Aqui ajuda o comando peer-gateway.

2. Mesmo com o comando peer-gateway, o TTL será reduzido em tal pacote. O novo comando no NX-OS - roteador peer-router de camada 3 desabilita isso.

3. O iBGP entre os dois membros do vPC é necessário para obedecer a regra BGP para o iBGP entre todos os vizinhos. Estamos executando o vrf no lado do vPC, portanto, somente esses dois membros precisam executar o iBGP. O TH também é necessário em caso de falha de link para o restante da rede NX-OS (VXlan ou outro) e fornece redundância.

Configurar

Diagrama de Rede

Dois comandos importantes são necessários para ativar esse peering:

- Peer-gateway - A funcionalidade de gateway peer do vPC permite que um switch vPC atue como o gateway ativo para pacotes endereçados ao endereço MAC do roteador do peer do vPC

- layer3 peer-router - sem alteração para o TTL de pacotes destinados ao peer, o dispositivo externo vê o domínio vPC como uma única entidade física da perspectiva de peering do protocolo de rota de camada também.

Configurações

Leaf 1:

! Form the vPC domain:

vpc domain 1

peer-switch

role priority 10 peer-keepalive destination 192.0.2.2 source 192.0.2.1 peer-gateway layer3 peer-router ipv6 nd synchronize ip arp synchronize

!

!vPC peer-link interface members

interface Ethernet1/53 - 54

description vPC-Peerlink member

switchport

switchport mode trunk

channel-group 11 mode active

no shutdown

!

! vPC peer-link port-channel

interface port-channel11

description vPC-peerlink

switchport

switchport mode trunk

spanning-tree port type network

no shutdown

vpc peer-link

!

! vPC port-channel member to External Device

interface Ethernet1/52

description ExternalDevice Eth2/13

switchport

switchport mode trunk

switchport trunk allowed vlan 203,205

mtu 9216

channel-group 12 mode active

no shutdown

!

! vPC port-channel to External Device

interface port-channel12

description vPC port-channel to External Device

switchport

switchport mode trunk

switchport trunk allowed vlan 203,205

mtu 9216

vpc 12

!

! Layer 3 interface to the Eternal device:

interface Vlan205

no shutdown

vrf member Customer

! BFD for eBGP

bfd interval 500 min_rx 500 multiplier 3

! Disable bfd echo, as it is not supported over vPC

no bfd echo

no ip redirects

! We use/29 as we need 3 ip address, one per each member of the ! vPC domain and 3rd for the External Device

ip address 198.51.100.1/29 tag 800204

! Disable redirects - this is needed to enable BFD

no ipv6 redirects

!

router bgp 65535

router bgp 65535

router-id 203.0.113.1

log-neighbor-changes

address-family ipv4 unicast

Customer router-id 198.51.100.1 address-family ipv4 unicast neighbor 198.51.100.2 description Leaf-2 remote-as 65535 address-family ipv4 unicast soft-reconfiguration inbound always neighbor 198.51.100.3 description to External Device bfd remote-as 65000 update-source Vlan205 address-family ipv4 unicast soft-reconfiguration inbound always ! Leaf 2:

! Form the vPC domain:

vpc domain 1

peer-switch

role priority 10

peer-keepalive destination 192.0.2.1 source 192.0.2.2

peer-gateway

layer3 peer-router

ipv6 nd synchronize

ip arp synchronize

!

!vPC peer-link interface members

interface Ethernet1/53 - 54

description vPC-Peerlink member

switchport

switchport mode trunk

channel-group 11 mode active

no shutdown

!

! vPC peer-link port-channel

interface port-channel11

description vPC-peerlink

switchport

switchport mode trunk

spanning-tree port type network

no shutdown

vpc peer-link

!

! vPC port-channel member to External Device

interface Ethernet1/52

description ExternalDevice Eth2/13

switchport

switchport mode trunk

switchport trunk allowed vlan 203,205

mtu 9216

channel-group 12 mode active

no shutdown

!

! vPC port-channel to External Device

interface port-channel12

description vPC port-channel to External Device

switchport

switchport mode trunk

switchport trunk allowed vlan 203,205

mtu 9216

vpc 12

!

! Layer 3 interface to the Eternal device:

interface Vlan205

no shutdown

vrf member Customer

! BFD for eBGP

bfd interval 500 min_rx 500 multiplier 3

! Disable bfd echo, as it is not supported over vPC

no bfd echo

no ip redirects

! We use/29 as we need 3 ip address, one per each member of the ! vPC domain and 3rd for the External Device

ip address 198.51.100.2/29 tag 800204

! Disable redirects - this is needed to enable BFD

no ipv6 redirects

!

router bgp 65535

router bgp 65535

router-id 203.0.113.2

log-neighbor-changes

address-family ipv4 unicast

vrf Customer

router-id 198.51.100.2

address-family ipv4 unicast

neighbor 198.51.100.1

description Leaf-2

remote-as 65535

address-family ipv4 unicast

soft-reconfiguration inbound always

neighbor 198.51.100.3

description to External Device

bfd

remote-as 65000

update-source Vlan205

address-family ipv4 unicast

soft-reconfiguration inbound always

!

External Device (NX-OS style CLI):

interface Ethernet2/13 - 14

switchport

switchport mode trunk

switchport trunk allowed vlan 203,205

mtu 9216

channel-group 12 mode active

no shutdown

!

interface port-channel12

switchport

switchport mode trunk

switchport trunk allowed vlan 203,205

mtu 9216

no shutdown

!

interface Vlan205

no shutdown

mtu 9216

! See notes in Leaf-1 and Leaf 2 for BFD

bfd interval 500 min_rx 500 multiplier 3

no bfd echo

no ip redirects

ip address 198.51.100.3/29

no ipv6 redirects

!

router bgp 65000

log-neighbor-changes

address-family ipv4 unicast

neighbor 198.51.100.1 remote-as 65535

description to Leaf-1

update-source Vlan205

bfd

neighbor 198.51.100.2 remote-as 65535

description to Leaf-2

update-source Vlan205

bfd

end

!

Verificar

Abaixo está a saída de show bgp ipv4 unicast neighbors. Verifica se:

1. A vizinhança de BGP está estabelecida e estável

2. O BFD está ativado entre vizinhos externos

Leaf 1/2: show bgp ipv4 unicast neighbors vrf Customer BGP neighbor is 203.0.113.2, remote AS 65535, ibgp link, Peer index 4 BGP version 4, remote router ID 203.0.113.2 Neighbor previous state = OpenConfirm BGP state = Established, up for 6d22h Neighbor vrf: Customer Peer is directly attached, interface Vlan205 Last read 00:00:14, hold time = 180, keepalive interval is 60 seconds Last written 00:00:03, keepalive timer expiry due 00:00:56 Received 10012 messages, 0 notifications, 0 bytes in queue ... BGP neighbor is 203.0.113.2.3, remote AS 65000, ebgp link, Peer index 3 BGP version 4, remote router ID 203.0.113.2 Neighbor previous state = OpenConfirm BGP state = Established, up for 1d00h Neighbor vrf: Customer Using Vlan205 as update source for this peer Peer is directly attached, interface Vlan205 BFD live-detection is configured and enabled, state is Up Last read 00:00:22, hold time = 180, keepalive interval is 60 seconds Last written 00:00:56, keepalive timer expiry due 00:00:03 ! External Device: show bgp ipv4 unicast neighbors BGP neighbor is 203.0.113.1, remote AS 65535, ebgp link, Peer index 3 Inherits peer configuration from peer-template Cust_BGP_Peer BGP version 4, remote router ID 203.0.113.1 BGP state = Established, up for 1d00h Peer is directly attached, interface Vlan205 Enable logging neighbor events BFD live-detection is configured and enabled, state is Up Last read 0.660288, hold time = 180, keepalive interval is 60 seconds Last written 00:00:26, keepalive timer expiry due 00:00:33 Received 10122 messages, 1 notifications, 0 bytes in queue Sent 10086 messages, 1 notifications, 0(0) bytes in queue Connections established 14, dropped 13 Last reset by us 1d00h, due to bfd session down Last reset by peer 6d22h, due to other configuration change ....

Troubleshoot

Os seguintes comandos ajudarão a verificar a operação:

show vpc show vpc consistency-parameters global show vpc consistency-parameters interface

show bgp ipv4 unicast neighbors show bgp ipv4 unicast summary