Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Configurar

Diagrama de Rede

Configurações

Verificar

Troubleshoot

Introduction

Este documento descreve a finalidade do comando dampen-igp-metric no Border Gateway Protocol (BGP) na família de Switches Cisco Nexus que executam o sistema operacional NX-OS.

Prerequisites

Requirements

A Cisco recomenda que você tenha conhecimento destes tópicos:

- Software Nexus NX-OS.

- Protocolo de roteamento BGP.

Componentes Utilizados

As informações neste documento são baseadas nestas versões de software e hardware:

- Cisco N9K-C9508

- NXOS versão 7.0(3)I7(6)

Este documento não se restringe a versões de software e hardware específicas.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. Se a rede estiver ativa, certifique-se de que você entenda o impacto potencial de qualquer comando.

Configurar

Por padrão, a família Nexus de Switches tem o comando dampen-igp-metric definido para seu valor padrão de 600 segundos na seção de configuração do BGP.

Isso afeta como o BGP lida com alterações de métrica do Interior Gateway Protocols (IGP) relatadas para rotas redistribuídas. O BGP atenua essas alterações à medida que as processa em um lote com um atraso de 10 minutos.

Esse comando permite ajustar esse atraso ou removê-lo totalmente para uma resposta mais rápida a essas alterações.

O atributo BGP MED (Multi Exit Discriminator) é atualizado com o novo custo da rota IGP redistribuída quando o temporizador expira.

Nexus - Nexus NX-OS

Nexus# configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

Nexus(config)# router bgp 65535

Nexus(config-router)# address-family ipv4 unicast

Nexus(config-router-af)# dampen-igp-metric ?

<20-3600>  Time interval in seconds

*Default value is 600

Nexus(config-router-af)# no dampen-igp-metric

Esse comando também pode ser configurado para endereço-família ipv6 unicast e por instâncias de VRF na seção de configuração de BGP.

Note: O comando dampen-igp-metric também controla o tempo de atraso para atualizar outros atributos de BGP, como o atributo Next-Hop, quando rotas IGP vazam para outros VRFs com o uso de BGP.

Diagrama de Rede

Neste cenário, o Switch Nexus foi configurado para redistribuir rotas OSPF (Open Shortest Path First) da Tabela de Roteamento para a tabela BGP.

Configurações

R1 - Cisco IOS

configure terminal

!

hostname R1

!

router ospf 1

router-id 10.255.255.1

!

interface Loopback0

ip address 10.255.255.1 255.255.255.255

ip ospf 1 area 0

!

interface GigabitEthernet0/0

ip address 10.1.2.1 255.255.255.0

ip ospf network point-to-point

ip ospf 1 area 0

no shutdown

!

end

Nexus - NX-OS

configure terminal

!

hostname Nexus

!

feature ospf

feature bgp

!

route-map ALL

!

router ospf 1

router-id 10.255.255.2

!

router bgp 65535

router-id 10.255.255.2

address-family ipv4 unicast

redistribute ospf 1 route-map ALL

neighbor 10.2.3.3

remote-as 65535

address-family ipv4 unicast

!

interface Ethernet1/1

ip address 10.1.2.2/24

ip ospf network point-to-point

ip router ospf 1 area 0.0.0.0

no shutdown

!

interface Ethernet1/2

ip address 10.2.3.2/24

no shutdown

R3 - Cisco IOS

configure terminal

!

hostname R3

!

router bgp 65535

bgp log-neighbor-changes

neighbor 10.2.3.2 remote-as 65535

!

interface GigabitEthernet0/0

ip address 10.2.3.3 255.255.255.0

no shutdown

!

end

Verificar

Execute o comando show bgp internal af. Certifique-se de que a linha IGP Metric Dampening Interval indica o valor desejado.

O valor padrão é 600 (segundos).

Nexus - NX-OS

Nexus# show bgp internal af

. . .

BGP Address Family Information for VRF: default

Import Pending               : No

Import Pending               : never

Import Pending Reset         : never

Table Context Address : 0xcfa08bf4

Address family: IPv4 Unicast

. . .

IGP Metric Dampening Interval  : 600

Caso a rota OSPF na Tabela de Roteamento atualize seu Custo, há um atraso para refletir esse novo valor no atributo de caminho BGP MED.

Nexus - NX-OS

Nexus# show ip route 10.255.255.1

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

10.255.255.1/32, ubest/mbest: 1/0

*via 10.1.2.1, Eth1/1, [110/41], 01:58:41, ospf-1, intra

Nexus#

* There is an update in the Cost of the OSPF route 10.255.255.1/32

Nexus# show ip route 10.255.255.1

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

10.255.255.1/32, ubest/mbest: 1/0

*via 10.1.2.1, Eth1/1, [110/190], 00:00:02, ospf-1, intra

Nexus#

Nexus# show bgp ipv4 unicast

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 4, Local Router ID is 10.255.255.2

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-i

njected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup

Network            Next Hop            Metric     LocPrf     Weight Path

*>r10.255.255.1/32    0.0.0.0                 41        100      32768 ?

Nexus#

* After 600 seconds.

Nexus# show bgp ipv4 unicast

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 5, Local Router ID is 10.255.255.2

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-i

njected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup

Network            Next Hop            Metric     LocPrf     Weight Path

*>r10.255.255.1/32    0.0.0.0                190        100      32768 ?

Execute o comando no dampen-igp-metric na seção de configuração da família de endereços BGP para atualizar imediatamente o atributo MED na tabela BGP em uma alteração de custo OSPF na Tabela de Roteamento.

Nexus - NX-OS

Nexus# configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

Nexus(config)# router bgp 65535

Nexus(config-router)#   address-family ipv4 unicast

Nexus(config-router-af)# no dampen-igp-metric

* There is an update in the Cost of the OSPF route 10.255.255.1/32

Nexus# show ip route 10.255.255.1

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

10.255.255.1/32, ubest/mbest: 1/0

*via 10.1.2.1, Eth1/1, [110/190], 00:00:02, ospf-1, intra

Nexus# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 7, Local Router ID is 10.255.255.2

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-i

njected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup

Network            Next Hop            Metric     LocPrf     Weight Path

*>r10.255.255.1/32    0.0.0.0                190        100      32768 ?

Troubleshoot

Para confirmar a funcionalidade do comando dampen-igp-metric no NX-OS, ative as próximas depurações.

- debug-filter bgp prefix <PREFIX/MASK>

- debug logfile <FILE_NAME>

- debug bgp dampening brib

Nexus - NX-OS

Nexus# debug-filter bgp prefix 10.255.255.1/32

Nexus# debug logfile bgpdebug.log

Nexus# debug bgp dampening brib

Nexus#

Nexus# show debug logfile bgpdebug.log

2019 Jul 23 21:13:27.676328 bgp: [25368] (default) BRIB: [IPv4 Unicast] Setting the update pending flag for 10.255.255.1/32

Nexus# show debug logfile bgpdebug.log

2019 Jul 23 21:13:27.676328 bgp: [25368] (default) BRIB: [IPv4 Unicast] Setting the update pending flag for 10.255.255.1/32

2019 Jul 23 21:20:47.641987 bgp: [25368] (default) BRIB: [IPv4 Unicast] Clearing the update pending flag for 10.255.255.1/32

2019 Jul 23 21:20:47.642013 bgp: [25368] (default) BRIB: [IPv4 Unicast] Originating prefix 10.255.255.1/32, route type redist

2019 Jul 23 21:20:47.642075 bgp: [25368] (default) BRIB: [IPv4 Unicast] Installing prefix 10.255.255.1/32 (redist) via 0.0.0.0 (0x0/0x0) into BRIB with extcomm Extcommunity: OSPF RT:0.0.0.0:0:0

2019 Jul 23 21:20:47.642395 bgp: [25368] (default) BRIB: [IPv4 Unicast] Path to 10.255.255.1/32 via 0.0.0.0 already exists, dflags=0x80002

2019 Jul 23 21:20:47.642415 bgp: [25368] (default) BRIB: [IPv4 Unicast] (10.255.255.1/32 (local)): bgp_brib_add: handling nexthop, path->flags2: 0x1

2019 Jul 23 21:20:47.642447 bgp: [25368] (default) BRIB: [IPv4 Unicast] (10.255.255.1/32 (local)): returning from bgp_brib_add, reeval=0new_path: 0, change: 1, undelete: 0, history: 0, force: 0, (pflags=0x2408) rnh_flag_change 0

2019 Jul 23 21:20:47.642475 bgp: [25368] (default) BRIB: [IPv4 Unicast] Cleanup for dest 10.255.255.1/32 exits since it's on newlist

Nexus#

Depois de concluído, desative as depurações com os próximos comandos:

- undebug all

- no debug-filter all

- clear debug logfile <FILE_NAME>